
 GPS week: 1129   Day: 6   MJD: 52153                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2760     88     0.14    -0.50     4.62     0.00
 cod |   288     0  24014    158     4.96     3.21     0.12    23.91
 esa |   288     0  18854     85   100.73     8.38     0.12    25.09
 gfz |   288     0  15724    218    -0.10    -0.74     0.11    27.00
 igu |    96     0   2098      0     3.72     5.59     3.11     0.00
 ngs |    96     0   2760     91   246.17 -1458.39     4.38     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  25161    343   530.59     5.62     0.12    24.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igu   ngs   sio   usn |
 -----+-------------------------------------------------+
    1 |  7432   -16   -61    14 11316  5284     -    64 |
    2 |  4272   -61    93   -97  3489  3731     -    72 |
    3 |  3274    75   -51    45  8844  2912     -   -70 |
    4 | -2871   153   155   -55   879 -2814     -  -249 |
    5 | -5657   118   119    50  -751 -4956     -  -298 |
    6 |  1393   212   251   -11     -   190     -  -461 |
    7 | -3877    25    16   -72 -7275 -3714     -    41 |
    8 |  2129    55   -46  -122 -5756  1573     -   122 |
    9 | -7664   133   142   114 -5066 -6148     -  -403 |
   10 | -4553    38   -22     3 -3247 -4349     -   -18 |
   11 |   760  -106    42  -105  1185  1161     -   175 |
   13 |  5133   168    72  -249    82  5064     -    41 |
   14 |  6218    45    92   108   107  5798     -  -262 |
   15 | -9675   157     -    55     - -9379     -  -202 |
   17 | -3328   267  -165   229     - -3224     -  -328 |
   18 |  5672    59   134     7   808  5861     -  -208 |
   19 | -1227   -56   135    -9     -  -131     -   -58 |
   20 |  4287   -54   -61    15  1649  4438     -    99 |
   21 |  2771   107  -216   108     -  1856     -     X |
   22 | -4508   106  -224   231 -4568 -4510     -  -132 |
   23 |  1734    51   436   -38     -  1261     -  -405 |
   24 | -3578   255   112   -24 -2226 -3597     -  -344 |
   25 | -1002   161  -135   232 -4433 -1001     -  -291 |
   26 | -2572    78   385   -17 -3316 -2649     -  -461 |
   27 | -4272    -7   -61   -93  5320 -3654     -   172 |
   28 | 10245    93   -30  -342  7050  9439     -   323 |
   29 | -2363   -33   166   165   172 -2417     -  -326 |
   30 | 26462    27    45   177     - 23963     -  -271 |
   31 | -1498    51   -65   -99 -4430 -1460     -   129 |
 -----+-------------------------------------------------+
 ALBH |     -  -196   136     -     -     -     -    65 |
 ALGO |     -  -292   866  -350     -     -     -  -221 |
 AMC2 |     -   -85     -     -     -     -     -    85 |
 AOML |     -  -137     -     -     -     -     -   137 |
 AREQ |     -   -27    68  -208     -     -     -   189 |
 AUCK |     -  -450  -397  1085     -     -     -  -361 |
 BAHR |     -    33   -75   -42     -     -     -    92 |
 BOR1 |     -   179     -     -     -     -     -  -178 |
 BRMU |     -   -34     3    35     -     -     -    -9 |
 BRUS |     -     5     -     -     -     -     -    -5 |
 CAS1 |     -    13   -23   -13     -     -     -    26 |
 CRO1 |     -   -83    10     -     -     -     -    71 |
 DAEJ |     -  -903     -     -     -     -     -   900 |
 DAV1 |     -   -73     -    75     -     -     -   -12 |
 DRAO |     -   -14     -     -     -     -     -    14 |
 FORT |     -  -477   133     -     -     -     -   205 |
 GALA |     -    43  -123   -93     -     -     -   192 |
 GRAZ |     -     -  -180     -     -     -     -   189 |
 GUAM |     -     -    86     X     -     -     -   -90 |
 HOB2 |     -    35  -194     -     -     -     -   168 |
 HRAO |     -   191     -  -213     -     -     -    59 |
 KARR |     -  -487     -   432     -     -     -     - |
 KERG |     -    15     -     -     -     -     -   -15 |
 KIRU |     -   234  -223     -     -     -     -     - |
 KOKB |     -     -    98   -25     -     -     -   -90 |
 KOSG |     -   -72   -64     -     -     -     -   140 |
 MALI |     -     -   -89     -     -     -     -    93 |
 MAS1 |     -   197  -124  -179     -     -     -   135 |
 MATE |     -     1     -     -     -     -     -    -1 |
 MAW1 |     -   -15     -     -     -     -     -    15 |
 MCM4 |     -   -54   494  -195     -     -     -  -244 |
 MDO1 |     -    17  -120     -     -     -     -   109 |
 MEDI |     -   -83     -     -     -     -     -    83 |
 METS |     -   -41     -     -     -     -     -    41 |
 MKEA |     -   101  -135     -     -     -     -    42 |
 NLIB |     -  -103     -     -     -     -     -   102 |
 NPLD |     -     8     -     -     -     -     -    -8 |
 NRC2 |     -   105  -306     -     -     -     -   218 |
 NYA1 |     -    15     -   -59     -     -     -    52 |
 NYAL |     -     -    -5     -     -     -     -     5 |
 OHIG |     -   -30   127  -131     -     -     -    44 |
 ONSA |     -     -    21   -89     -     -     -    78 |
 PENC |     -   195     -     -     -     -     -  -194 |
 PERT |     -     8  -101     -     -     -     -    98 |
 PIE1 |     -     9  -140     -     -     -     -   137 |
 REYK |     -   183  -260     -     -     -     -    90 |
 SANT |     -     X    62  -117     -     -     -    54 |
 SFER |     -  -264     -     -     -     -     -   263 |
 STJO |     -    15  -226   -38     -     -     -   266 |
 THTI |     -     -     -  -132     -     -     -   149 |
 TLSE |     -    31     -     -     -     -     -   -31 |
 TRO1 |     -  -199     -   177     -     -     -     - |
 TROM |     -     -   -19     -     -     -     -    20 |
 TSKB |     -   277  -258  -102     -     -     -   108 |
 USNO |     -   -17  -247     -     -     -     -   275 |
 USUD |     -    46   115  -119     -     -     -   -32 |
 VILL |     -    38   -66     -     -     -     -    32 |
 WES2 |     -   -42     -     -     -     -     -    42 |
 WHIT |     -    52     -   -46     -     -     -     - |
 WSRT |     -   -22     -     -     -     -     -    22 |
 WTZR |     -   -72     2    24     -     -     -    42 |
 WUHN |     -   -44    31   204     -     -     -  -219 |
 YAR2 |     -  -100   108     -     -     -     -   -15 |
 YELL |     -   -33  -126     -     -     -     -   164 |
 YSSK |     -    11     -    -9     -     -     -     - |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igu   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------+--------------
    1 |  7786    89    44    99  8757  7066     -    38 |  288   3.95
    2 |  5048    56   220   128  1222  5118     -    94 |  288   1.60
    3 |  2612    98    80   108  3003  2632     -   118 |  288   2.67
    4 |  1159   137   252    71   886  1200     -   143 |  283   1.00
    5 |  5969   123    85   119  1978  5845     -    67 |  288   2.40
    6 | 11651    96   126    99     - 11394     -    39 |  288   5.22
    7 |  1459    55    89    51  3188  1400     -    45 |  288   1.13
    8 |  4264   156   131   113  4196  4191     -   144 |  281   2.26
    9 |  6644   111    94   120  3964  7157     -   132 |  280   2.59
   10 |  2219   209   143   132  2629  2167     -   169 |  288   2.29
   11 |   808    48   102    46   587   716     -    68 |  288   0.34
   13 |   816    99    32    52   571   908     -    75 |  288   0.40
   14 |  1927   194   108   102   832  1730     -   248 |  288   0.49
   15 |  3456   252     -   185     -  3644     -   184 |  274   3.03
   17 |  1722   309   276   263     -  1672     -   224 |  278   3.38
   18 |  1196    81   154    44   579  1286     -    91 |  288   0.46
   19 |  6712   282   322   230     -  5884     -   251 |  283   4.36
   20 |   726   114    66    54   692   801     -    50 |  288   0.23
   21 |  5381   155    55   161     -  4686     -     X |  288   3.61
   22 |  2572   128    43   174  2007  2377     -   115 |  288   1.17
   23 |  7621    75   207    98     -  7445     -   133 |  288   5.33
   24 |  2286   100   161    83  2200  2412     -   125 |  282   2.35
   25 |  1691   405   234   263  2665  1848     -   106 |  282   1.79
   26 |  1516   208    57   132  3026  1584     -   374 |  288   0.77
   27 |  9083   209   138    86  5257  6991     -   176 |  280   5.73
   28 |  3360    54    70    73  3398  3267     -    49 |  288   0.36
   29 |  1133   131    73    79  1183   908     -    27 |  288   0.55
   30 |  1550   163    56   122     -  3389     -    58 |  288   0.64
   31 |  2502    83    75   101  2476  2773     -   128 |  288   2.15
 -----+-------------------------------------------------+--------------
 ALBH |     -    79    90     -     -     -     -    34 |  288   0.07
 ALGO |     -    32    33    25     -     -     -    38 |  288   0.05
 AMC2 |     -    35     -     -     -     -     -    34 |  286   0.05
 AOML |     -    53     -     -     -     -     -    53 |  282  18.79
 AREQ |     -    99    86    50     -     -     -    45 |  288  28.14
 AUCK |     -    64    59    28     -     -     -    45 |  288  16.81
 BAHR |     -    96   186   101     -     -     -   193 |  287   0.41
 BOR1 |     -   332     -     -     -     -     -   331 |  238   2.92
 BRMU |     -    91    38    47     -     -     -   134 |  288  25.59
 BRUS |     -    54     -     -     -     -     -    53 |  286   0.04
 CAS1 |     -    81    39    76     -     -     -    64 |  288   8.40
 CRO1 |     -    69    69     -     -     -     -    27 |  288   0.14
 DAEJ |     -    64     -     -     -     -     -    63 |  286   1.71
 DAV1 |     -    47     -    50     -     -     -    37 |  288  23.57
 DRAO |     -    52     -     -     -     -     -    51 |  288   0.11
 FORT |     -   138   259     -     -     -     -   265 |  208   0.30
 GALA |     -   151    61    58     -     -     -    41 |  288  18.40
 GRAZ |     -     -   198     -     -     -     -   207 |  280  39.39
 GUAM |     -     -   287     X     -     -     -   300 |  214  24.12
 HOB2 |     -    39    34     -     -     -     -    48 |  288   0.07
 HRAO |     -    44     -    56     -     -     -    57 |  288  28.96
 KARR |     -   391     -   346     -     -     -     - |  190  13.80
 KERG |     -    53     -     -     -     -     -    53 |  287   1.40
 KIRU |     -    60    57     -     -     -     -     - |  288   5.05
 KOKB |     -     -   142   190     -     -     -   295 |  280   0.60
 KOSG |     -    75    37     -     -     -     -    57 |  288  35.49
 MALI |     -     -   165     -     -     -     -   172 |  287  61.53
 MAS1 |     -    80    28    44     -     -     -    59 |  288   1.80
 MATE |     -    55     -     -     -     -     -    54 |  287   0.11
 MAW1 |     -    79     -     -     -     -     -    79 |  280  26.76
 MCM4 |     -    93    42    38     -     -     -    38 |  288  27.36
 MDO1 |     -    40    30     -     -     -     -    25 |  288  12.18
 MEDI |     -    48     -     -     -     -     -    48 |  286   0.12
 METS |     -    75     -     -     -     -     -    74 |  285   0.43
 MKEA |     -   228   154     -     -     -     -   380 |  288  41.46
 NLIB |     -   117     -     -     -     -     -   117 |  283  12.88
 NPLD |     -    64     -     -     -     -     -    64 |  285   0.06
 NRC2 |     -    56    34     -     -     -     -    62 |  288   0.12
 NYA1 |     -    63     -    18     -     -     -    47 |  288   0.14
 NYAL |     -     -    36     -     -     -     -    37 |  288   0.13
 OHIG |     -    82    80    47     -     -     -    37 |  288  15.53
 ONSA |     -     -    47    27     -     -     -    66 |  264   1.19
 PENC |     -    71     -     -     -     -     -    70 |  285   3.90
 PERT |     -    76    38     -     -     -     -    85 |  288  18.51
 PIE1 |     -    78    55     -     -     -     -    90 |  287 199.27
 REYK |     -    89    33     -     -     -     -    80 |  288   7.99
 SANT |     -     X   121   155     -     -     -   121 |  280  21.35
 SFER |     -    81     -     -     -     -     -    81 |  284   0.89
 STJO |     -    44   124    54     -     -     -    73 |  288   3.34
 THTI |     -     -     -    60     -     -     -    67 |  287   2.82
 TLSE |     -    50     -     -     -     -     -    50 |  286   0.55
 TRO1 |     -   100     -    89     -     -     -     - |  287  14.71
 TROM |     -     -    33     -     -     -     -    35 |  286  15.67
 TSKB |     -    73    45    38     -     -     -    33 |  288   1.27
 USNO |     -    46    49     -     -     -     -    57 |  288   0.06
 USUD |     -    47    36    30     -     -     -    75 |  288   0.14
 VILL |     -   118    67     -     -     -     -    59 |  288  17.97
 WES2 |     -    41     -     -     -     -     -    41 |  277   0.09
 WHIT |     -    54     -    47     -     -     -     - |  288  13.78
 WSRT |     -    95     -     -     -     -     -    95 |  287   0.05
 WTZR |     -    94    29    39     -     -     -    58 |  288   0.11
 WUHN |     -    48    53    32     -     -     -    62 |  287  26.93
 YAR2 |     -    53   139     -     -     -     -   109 |  274 249.91
 YELL |     -    40    33     -     -     -     -    33 |  288   0.08
 YSSK |     -    50     -    45     -     -     -     - |  287  13.82
 -----+-------------------------------------------------+--------------
 TOT  |  4622   125   119   112  3114  4381     -   124 |


 BEST CLOCK FIT: BRUS   286   0.04 (ns) 

