
 GPS week: 1129   Day: 5   MJD: 52152                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2744     99    -0.28     0.53     5.73     0.00
 cod |   288     0  24228    100     4.39    -4.57     0.10    18.74
 esa |   288     0  18632   1461    96.23     5.07     0.13    12.38
 gfz |   288     0  15495    465     0.75    -1.12     0.10    17.16
 igu |    96     0   2185     25   120.02  -180.91    32.64     0.00
 jpl |   280     0   9818    273     9.07     2.35     0.10    17.46
 ngs |    96     0   2744     78    15.14     4.25     5.54     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  24672    852   527.64     3.05     0.05    34.26

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 | -5846   196  -140    64-87326   -61 -5728     -   -69 |
    2 |  5278  -102   136   -70     -   139  4110     -    -2 |
    3 | -3460    95     5   189-75581    58 -2669     -  -158 |
    4 | -1085   107    27   164-78867    59 -1284     -  -169 |
    5 |  4753   -39   166   -41-68763   251  4767     -   -62 |
    6 |   497    37   157    61******   123  1451     -  -147 |
    7 | -1560   -61    47    22-77570   -13 -1537     -     9 |
    8 |  6186    40   168   -37-86537   -25  4717     -   -52 |
    9 |  2241    59   261    97-74362    42  1842     -  -181 |
   10 |  4519   -64   -59   -45-70320   238  3941     -    39 |
   11 |  3309   108  -127    36-74981   -50  2983     -   -14 |
   13 |  1875   198   -50   -13-76200   -16  1961     -   -80 |
   14 |  3123   218   199    75-75406    51  3176     -  -237 |
   15 |-13602   101     -  -145     -   131-12508     -    -5 |
   17 |  1845   211     X   106     -    59   811     -  -187 |
   18 |  3031   164   163   -84-75254   -40  2948     -   -93 |
   19 |-13054  -100    20    95     -     --12770     -     - |
   20 |  5400    45  -225    -4-74848    -6  5232     -    60 |
   21 |  -376    85     X  -114-76232    63    94     -     X |
   22 |-10584   280  -114    49-87028   117 -8566     -  -172 |
   23 |  3634   161  -151  -122     -   101  2883     -     X |
   24 | -2876     0   181   -84-70398    21 -3197     -   -24 |
   25 |  4568   263   281   154-76187   137  4086     -  -324 |
   26 | -1097    -5   277   153-78139   168 -1182     -  -228 |
   27 | -6012    76     5    92-77944   -86 -4566     -   -62 |
   28 |  2374    27  -115  -114-76644    -1  2420     -    84 |
   29 |  -264   186   354   260-76351    86  -344     -  -387 |
   30 | 36795    91   -35    64     -    96 30133     -   -84 |
   31 | -1207   120   -84   -78-91394   -16 -1666     -     7 |
 -----+-------------------------------------------------------+
 ALBH |     -  -339    -8     -     -    23     -     -   179 |
 ALGO |     -  -119   919  -108     -  -225     -     -   -70 |
 AMC2 |     -   -50     -     -     -  -134     -     -    94 |
 AOML |     -    30     -     -     -     -     -     -   -16 |
 AREQ |     -  -147     4   -88     -     -     -     -   122 |
 AUCK |     -   -42    -2     -     -     -     -     -    23 |
 BAHR |     -    68     3    14     -  -141     -     -    23 |
 BILI |     -    62     -   -67     -     -     -     -     - |
 BOR1 |     -  -116   103     -     -     -     -     -    26 |
 BRMU |     -    45  -116   110     -     -     -     -   -38 |
 BRUS |     -    22     -     -     -   101     -     -   -61 |
 CAS1 |     -   -74    52   -84     -    57     -     -    36 |
 CRO1 |     -  -135  -104     -     -   -31     -     -   127 |
 DAEJ |     -  -452     -     -     -     -     -     -   247 |
 DAV1 |     -    28     -   -74     -     -     -     -    22 |
 DRAO |     -   -70     -     -     -     -     -     -    38 |
 FORT |     -   -98     X     -     -     -     -     -    54 |
 GALA |     -   -95  -103    32     -     -     -     -    73 |
 GRAZ |     -     -  -190     -     -     -     -     -    69 |
 GUAM |     -  -170     X    19     -  -243     -     -   193 |
 HOB2 |     -   -73  -180     -     -     -     -     -   105 |
 HRAO |     -   139     -     -     -  -403     -     -   122 |
 KARR |     -   156     -  -170     -     -     -     -     - |
 KERG |     -  -222     -     -     -   640     -     -  -192 |
 KIRU |     -   204  -308     -     -     -     -     -     - |
 KOSG |     -  -122   -43     -     -     -     -     -    83 |
 MAC1 |     -    32  -144  -343     -     -     -     -   209 |
 MAS1 |     -   -33   120    49     -     -     -     -   -50 |
 MATE |     -   -81     -     -     -     X     -     -    45 |
 MAW1 |     -     0     -     -     -     -     -     -     0 |
 MCM4 |     -    33     X   -36     -     -     -     -     X |
 MDO1 |     -  -258   -45     -     -     -     -     -   131 |
 MEDI |     -  -170     -     -     -     -     -     -    93 |
 METS |     -   -23     -     -     -     -     -     -    13 |
 MKEA |     -     -  -112    -9     -   -64     -     -    76 |
 NKLG |     -     -   -14     X     -     -     -     -     5 |
 NLIB |     -   -57     -     -     -     -     -     -    31 |
 NPLD |     -    30     -     -     -     -     -     -   -17 |
 NRC2 |     -    66  -321     -     -    15     -     -    73 |
 NTUS |     -  -203     -     -     -     -     -     -   111 |
 NYA1 |     -    95     -   100     -   -37     -     -   -85 |
 NYAL |     -     -   -35     -     -     -     -     -    12 |
 OHIG |     -  -145   209  -118     -    56     -     -    35 |
 ONSA |     -     -   -26  -141     -     -     -     -    80 |
 PENC |     -   185     -     -     -     -     -     -  -101 |
 PERT |     -   -34  -250     -     -     -     -     -   110 |
 PIE1 |     -  -171   165     -     -     -     -     -    34 |
 REYK |     -   138     8     -     -     -     -     -   -78 |
 SANT |     -     -   106   131     -  -131     -     -   -34 |
 SFER |     -  -366     -     -     -     -     -     -   200 |
 STJO |     -   -99  -230    69     -     -     -     -   100 |
 THTI |     -     -     -   -50     -  -157     -     -   100 |
 TIXI |     -     7     -    -8     -     -     -     -     - |
 TLSE |     -   173     -     -     -     -     -     -   -95 |
 TRO1 |     -  -146     -   159     -     -     -     -     - |
 TROM |     -     -    71     -     -     -     -     -   -26 |
 TSKB |     -   218  -178   -84     -     -     -     -   -12 |
 USNO |     -    -7  -321     -     -    72     -     -    85 |
 USUD |     -   -97    83     -     -     -     -     -    23 |
 VILL |     -   -23    72     -     -     -     -     -   -13 |
 WES2 |     -   -32     -     -     -     -     -     -    17 |
 WHIT |     -   -68     -    75     -     -     -     -     - |
 WSRT |     -   -23     -     -     -   -60     -     -    41 |
 WTZR |     -   -25     1  -114     -     2     -     -    69 |
 WUHN |     -     -  -296     X     -    15     -     -    99 |
 YELL |     -    25  -133     -     -   -96     -     -    82 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  7276    91    64    43 34036    52  6964     -    32 |  288   4.74
    2 |  5682   109   164    47     -   171  6054     -    55 |  288   2.55
    3 |  5042   106    78    69 33836    86  5141     -    30 |  288   1.90
    4 |  1855   158   262    94 32969    73  1836     -    55 |  282   0.98
    5 |  7438   144   148    68 30916   146  6499     -    33 |  288   3.51
    6 |  6015    96    99   126 36316   171  5550     -    55 |  257 681.56
    7 |  1504    64   153    61 31917   116  1681     -    80 |  288   1.92
    8 |  4733   180   176    70 33675    91  3642     -   103 |  282   2.56
    9 |  5358   176   163   159 31792    44  5799     -    28 |  282   3.29
   10 |  2556   102   115    43 33026    41  2781     -    49 |  288   1.43
   11 |  2429    70    53    67 32819   116  2172     -    53 |  288   0.26
   13 |  2102   155   214    80 32936    40  2111     -    47 |  288   0.28
   14 |  1596   100   239    60 32944    98  1804     -    96 |  288   0.23
   15 |  5616   170     -   137     -    77  4838     -   135 |  276   4.06
   17 |  5054   163     X   175     -    91  4989     -   144 |  277   3.34
   18 |  1538    99   239    57 32906    60  1578     -    36 |  288   0.40
   19 | 18749   217   256   259     -     - 18830     -     - |  263   2.17
   20 |  1214    73   182    87 32901    62  1265     -    32 |  288   0.18
   21 |  4452    76     X    66 31714   196  3762     -     X |  280   3.08
   22 |  5517   148   264    84 32833    61  5646     -   108 |  288   1.30
   23 |  7031   101   188    81     -    47  6104     -     X |  288   5.80
   24 |  4053   185    94   112 30850   128  4018     -    72 |  282   3.74
   25 |  3060   112   272   308 32872    86  2773     -    87 |  282   2.72
   26 |  1115    86   223    57 32411    97  1136     -    59 |  288   0.59
   27 |  6343   107   234    77 31553    75  4736     -    84 |  281   3.37
   28 |  2571    55    76    79 33461    55  2680     -    50 |  288   0.83
   29 |  1582    92   176    37 32886    45  1375     -    74 |  288   0.46
   30 |  7859    88   118   149     -    89  9614     -    34 |  288   0.53
   31 |  9336    62    59    60 33947    75  8812     -    41 |  288   2.80
 -----+-------------------------------------------------------+--------------
 ALBH |     -    37    89     -     -    34     -     -    28 |  288   0.05
 ALGO |     -    59    76    40     -    46     -     -    29 |  288   0.08
 AMC2 |     -    31     -     -     -    28     -     -    24 |  288   0.04
 AOML |     -   116     -     -     -     -     -     -    64 |  286  30.52
 AREQ |     -    99    97    58     -     -     -     -    20 |  288  30.61
 AUCK |     -    62   117     -     -     -     -     -    61 |  288  19.96
 BAHR |     -    37   108    45     -    39     -     -    26 |  288   0.54
 BILI |     -    23     -    25     -     -     -     -     - |  285  12.62
 BOR1 |     -    41    56     -     -     -     -     -    24 |  288   2.60
 BRMU |     -    49    64    46     -     -     -     -    41 |  288  28.02
 BRUS |     -    81     -     -     -    65     -     -    23 |  288   0.07
 CAS1 |     -    50   112    48     -    44     -     -    34 |  288   8.43
 CRO1 |     -   123   112     -     -    49     -     -    44 |  288   0.14
 DAEJ |     -    49     -     -     -     -     -     -    27 |  209   1.60
 DAV1 |     -    85     -    54     -     -     -     -    54 |  287  25.42
 DRAO |     -    31     -     -     -     -     -     -    17 |  288   0.07
 FORT |     -   234     X     -     -     -     -     -   128 |  216    >>>
 GALA |     -   177    58    78     -     -     -     -    58 |  288  20.45
 GRAZ |     -     -   156     -     -     -     -     -    56 |  275    >>>
 GUAM |     -   202     X   222     -   379     -     -    51 |  278  27.06
 HOB2 |     -    38    86     -     -     -     -     -    26 |  288   0.06
 HRAO |     -    68     -     -     -    98     -     -    34 |  288  28.36
 KARR |     -   302     -   329     -     -     -     -     - |  180  20.47
 KERG |     -    40     -     -     -    60     -     -    23 |  287   1.95
 KIRU |     -    21    32     -     -     -     -     -     - |  288   6.71
 KOSG |     -    37    38     -     -     -     -     -    22 |  288  21.45
 MAC1 |     -   149   114   105     -     -     -     -   165 |  288  20.69
 MAS1 |     -    52    59    41     -     -     -     -    36 |  288   1.84
 MATE |     -    26     -     -     -     X     -     -    14 |  287   0.08
 MAW1 |     -    83     -     -     -     -     -     -    45 |  280  25.75
 MCM4 |     -    52     X    57     -     -     -     -     X |  284   9.83
 MDO1 |     -    45   132     -     -     -     -     -    47 |  285 324.07
 MEDI |     -    57     -     -     -     -     -     -    31 |  286   0.36
 METS |     -    51     -     -     -     -     -     -    28 |  284   0.44
 MKEA |     -     -    84    30     -    39     -     -    24 |  288  37.60
 NKLG |     -     -    85     X     -     -     -     -    31 |   89  47.16
 NLIB |     -    38     -     -     -     -     -     -    21 |  288   0.07
 NPLD |     -    48     -     -     -     -     -     -    26 |  285   0.06
 NRC2 |     -    70    69     -     -    37     -     -    25 |  288   0.08
 NTUS |     -    58     -     -     -     -     -     -    32 |  288   7.17
 NYA1 |     -    74     -    32     -    72     -     -    20 |  288   0.09
 NYAL |     -     -    35     -     -     -     -     -    13 |  288   0.08
 OHIG |     -   183   106    80     -    44     -     -    44 |  288  14.14
 ONSA |     -     -    38    34     -     -     -     -    25 |  216   1.27
 PENC |     -    64     -     -     -     -     -     -    35 |  285   3.82
 PERT |     -    29    77     -     -     -     -     -    28 |  288  19.95
 PIE1 |     -    31    45     -     -     -     -     -    14 |  288   0.06
 REYK |     -    85    43     -     -     -     -     -    47 |  288   8.86
 SANT |     -     -   128   119     -   108     -     -    87 |  285  24.36
 SFER |     -    65     -     -     -     -     -     -    36 |  285   1.17
 STJO |     -    48   166    39     -     -     -     -    32 |  288   4.05
 THTI |     -     -     -    85     -    80     -     -    20 |  287   2.41
 TIXI |     -    36     -    39     -     -     -     -     - |  287  10.74
 TLSE |     -    34     -     -     -     -     -     -    19 |  286   0.42
 TRO1 |     -    38     -    42     -     -     -     -     - |  288  12.28
 TROM |     -     -    42     -     -     -     -     -    15 |  286  13.00
 TSKB |     -    38    64    56     -     -     -     -    45 |  288   1.61
 USNO |     -    48    45     -     -    32     -     -    27 |  288   0.05
 USUD |     -    49    79     -     -     -     -     -    17 |  288   0.16
 VILL |     -    62    73     -     -     -     -     -    27 |  288  17.57
 WES2 |     -    45     -     -     -     -     -     -    25 |  285   0.08
 WHIT |     -    22     -    24     -     -     -     -     - |  288   5.20
 WSRT |     -    60     -     -     -    67     -     -    16 |  288   0.06
 WTZR |     -    68   158    80     -    69     -     -    26 |  285   0.07
 WUHN |     -     -    45     X     -    34     -     -    21 |  287  72.15
 YELL |     -    55    85     -     -    38     -     -    66 |  288   0.08
 -----+-------------------------------------------------------+--------------
 TOT  |  5732    98   134   101 32637    98  5542     -    54 |


 BEST CLOCK FIT: AMC2   288   0.04 (ns) 

