
 GPS week: 1129   Day: 3   MJD: 52150                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2726      9    -0.23     0.58     4.58     0.00
 cod |   288     0  21929     56    -2.61     4.49     0.10    26.40
 emr |    96     0   3740     47    80.36     8.85     0.18    11.40
 esa |   288     0  16560   1891   121.50     9.50     0.16    14.76
 gfz |   288     0  14116    289     0.35    -1.29     0.12    21.91
 igu |    96     0   2178     19    16.58   -25.27     3.68     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  22880    296   515.51     6.65     0.10    25.54

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   sio   usn |
 -----+-------------------------------------------------+
    1 |   695   113   -94   -39   -44 11428     -   -42 |
    2 |  -708    -5   153     X    15  9105     -   -30 |
    3 |  5549    17   -15   184   -67 15612     -   -66 |
    4 | -5514    63    52   398  -115 -1020     -  -189 |
    5 | -7907    94    90   116   -11 -8163     -  -166 |
    6 |  1043   166  -232   239   -67  6839     -  -216 |
    7 | -7745   285   396 -1021   142     -     -   129 |
    8 | -7788    42  -121     X    52 -1856     -   -68 |
    9 | -8035   341   -68     X     3 -6116     -  -317 |
   10 |  4038    65    96   311   -45  4375     -  -222 |
   11 |  3759   -28   128   -36   -21 -1750     -    48 |
   13 |  1233    97   215    37  -146 -1520     -   -27 |
   14 |   238     2  -135   167    49 -1329     -  -120 |
   15 |  3516   195   -70     -  -136     -     -   -36 |
   17 |  2918     -    13     X   124     -     -  -106 |
   18 | -1147   -64   -76   384   -62 -2390     -   -91 |
   19 |-19457  -524  -107     X   686     -     -     - |
   20 |  3912    41    25  -300    59 -1081     -    77 |
   21 |  5111    52  -358   473    37     -     -  -304 |
   22 |  5007  -144  -228   108   252 -7648     -   -96 |
   23 |  2467   242  -156   315  -106     -     -  -279 |
   24 |  5414   179   161     X   -78 -6717     -  -143 |
   25 |  -916    61  -154   536     X -2845     -  -325 |
   26 | -4737    99   -81   483    34 -4722     -  -398 |
   27 | -2691   -97  -186   446   111  6008     -  -207 |
   28 |  8270   -44   -30   355  -117 -1235     -   -56 |
   29 | -2782   -60  -300   331   174 -2431     -  -234 |
   30 | 14528   239   227  -840   162 11843     -    77 |
   31 | -1765    10  -229   269    44-11189     -  -169 |
 -----+-------------------------------------------------+
 ALBH |     -  -113     -     X     -     -     -   116 |
 AMC2 |     -   -20     -     -     -     -     -    21 |
 AOML |     -    19     -     -     -     -     -   -20 |
 AREQ |     -     -     -   -99     -     -     -    57 |
 AUCK |     -  -288     -  -128   553     -     -  -104 |
 BAHR |     -   -55     -    99     -     -     -     - |
 BILI |     -    89     -     -  -108     -     -     - |
 BOR1 |     -   -99     -     -     -     -     -   103 |
 BRMU |     -    68     -  -231    15     -     -    51 |
 BRUS |     -     3     -     -     -     -     -    -3 |
 CAS1 |     -   -38     -    -1   -30     -     -    66 |
 CRO1 |     -    37     -  -268     -     -     -   117 |
 DAEJ |     - -1126     -     -     -     -     -  1164 |
 DRAO |     -   -17    -6     -     -     -     -    19 |
 EISL |     -   148     -  -214    -3     -     -     - |
 FAIR |     -     -    79   -61     -     -     -     - |
 GALA |     -     -     -     -    -5     -     -     5 |
 GODE |     -    65     -  -258     -     -     -    50 |
 GUAM |     -     -     -   542  -365     -     -     - |
 HRAO |     -   129     -     -  -413     -     -   221 |
 KIRU |     -   170     -  -304     -     -     -     - |
 KOSG |     -  -136     -    71     -     -     -    99 |
 LPGS |     -     -     -  -712    57     -     -   324 |
 MAS1 |     -    63    95  -124   -28     -     -    17 |
 MATE |     -   -98   136     -     -     -     -    81 |
 MAW1 |     -    87     -     -  -297     -     -   165 |
 MCM4 |     -   227     -  -366   -25     -     -     X |
 MDO1 |     -   -14     -     -     -     -     -    14 |
 MEDI |     -  -135     -     -     -     -     -   139 |
 METS |     -  -146     -     -     -     -     -   151 |
 MKEA |     -     -     -  -220     -     -     -   127 |
 NLIB |     -    18     -     -     -     -     -   -19 |
 NPLD |     -    41     -     -     -     -     -   -42 |
 NRC2 |     -    35    89     -     -     -     -   -49 |
 NTUS |     -  -162     -     -     -     -     -   167 |
 NYA1 |     -    23     -     -     4     -     -   -28 |
 NYAL |     -     -    34    56     -     -     -   -37 |
 OHIG |     -   -50     -   198  -112     -     -    32 |
 ONSA |     -     -   151  -121  -122     -     -   152 |
 PERT |     -   -41     -    66     -     -     -     4 |
 PIE1 |     -    70     -  -196     -     -     -    41 |
 POTS |     -     -     -   -86     -     -     -    50 |
 REYK |     -    30     -     -     -     -     -   -31 |
 RIOG |     -   -33     -   349   -45     -     -  -129 |
 SANT |     -     -     -   145  -118     -     -    14 |
 SFER |     -  -202     -     -     -     -     -   209 |
 STJO |     -    -3    87     -   -60     -     -    42 |
 TLSE |     -    52     -     -     -     -     -   -54 |
 TRO1 |     -  -194     -     -   233     -     -     - |
 TROM |     -     -     -   -58     -     -     -    33 |
 TSKB |     -    75   204  -250     -     -     -    37 |
 URUM |     -   -40     -     -     -     -     -    42 |
 USNO |     -   134     -  -509     -     -     -   155 |
 USUD |     -   -75     -   135     -     -     -    -1 |
 VILL |     -   -33    81    40     -     -     -    -1 |
 WES2 |     -     6     -     -     -     -     -    -6 |
 WHIT |     -    18     -     -   -22     -     -     - |
 WSRT |     -   -26     -     -     -     -     -    27 |
 WTZR |     -     -     -   -22     -     -     -    13 |
 WUHN |     -   -93     -    66    56     -     -    10 |
 YELL |     -    95   104  -293     -     -     -    56 |
 YSSK |     -     9     -     -   -11     -     -     - |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------+--------------
    1 |  3873    55   313    36    64  5819     -    53 |  288   3.07
    2 |  4418   117   148     X   144  4362     -   211 |  288   2.43
    3 |  4214    95   319    63   166  7142     -    88 |  288   2.54
    4 |  2687   143   366   113   206   969     -    73 |  281   0.88
    5 |  6602    57   107    46   117  5471     -    88 |  288   3.57
    6 |  5902    99   212   217    83  3329     -   102 |  288   5.50
    7 |  8268   202   103   231    94     -     -    60 |  288   0.75
    8 |  2460   172   129     X    59  2215     -   149 |  276   2.38
    9 |  4703   301   173     X   227  3646     -   148 |  276   1.90
   10 |  2222    97    79    85    50  2078     -    79 |  288   1.95
   11 |  4186    79    46    56    45  1364     -    94 |  288   0.28
   13 |  1499    60   129   274   106   882     -    45 |  288   0.28
   14 |  1848    82    87    53    62   872     -    79 |  288   0.23
   15 |  4326   310   479     -   236     -     -   343 |  276   3.96
   17 |  6034     -   362     X   274     -     -   202 |  275   3.87
   18 |  2080   117   253    78   140  1090     -    63 |  288   0.45
   19 |  4531   222   319     X   256     -     -     - |  170   3.63
   20 |  1105    77   105    96   142   955     -   152 |  288   0.22
   21 |  6348    70   151    70    80     -     -    37 |  288   4.04
   22 |  3311    97    84   124    78  3768     -    76 |  288   1.33
   23 |  4923   177   351   325   178     -     -   363 |  288   5.50
   24 |  3932    91    40     X   113  2592     -    43 |  276   2.24
   25 |  2596    65    81   258     X  1205     -   104 |  276   1.26
   26 |  1496   111   108   272    54  2555     -    81 |  288   0.43
   27 |  5004   175   141   263   183  4624     -   141 |  281   4.30
   28 |  2839   120   216   104   214  1462     -   142 |  288   0.67
   29 |  1547    82   116    62    66  2439     -    68 |  288   0.59
   30 | 10905    72   207    83   115  9182     -   120 |  258   6.09
   31 |  5645    86    78   323   103  4276     -   125 |  288   3.21
 -----+-------------------------------------------------+--------------
 ALBH |     -   144     -     X     -     -     -   149 |  284  13.69
 AMC2 |     -    29     -     -     -     -     -    30 |  286   0.06
 AOML |     -    72     -     -     -     -     -    75 |  286  31.74
 AREQ |     -     -     -   441     -     -     -   255 |  245    >>>
 AUCK |     -    94     -   224    59     -     -    38 |  288  17.30
 BAHR |     -    32     -    57     -     -     -     - |  287   0.36
 BILI |     -    39     -     -    47     -     -     - |  286  11.84
 BOR1 |     -    24     -     -     -     -     -    25 |  285   1.84
 BRMU |     -    94     -   179    50     -     -    29 |  288  27.90
 BRUS |     -    36     -     -     -     -     -    37 |  286   0.04
 CAS1 |     -    91     -   100    82     -     -   130 |  288   8.66
 CRO1 |     -    65     -   111     -     -     -    42 |  288   0.14
 DAEJ |     -    30     -     -     -     -     -    31 |  287   1.63
 DRAO |     -    40    53     -     -     -     -    40 |  287   0.09
 EISL |     -   137     -    93    97     -     -     - |  288  26.27
 FAIR |     -     -   266   205     -     -     -     - |   78   0.11
 GALA |     -     -     -     -    64     -     -    55 |  288  16.07
 GODE |     -    93     -   374     -     -     -   109 |  288   0.10
 GUAM |     -     -     -    66    45     -     -     - |  138  25.49
 HRAO |     -   136     -     -    35     -     -   123 |  286  28.90
 KIRU |     -    26     -    47     -     -     -     - |  287   1.41
 KOSG |     -    33     -    31     -     -     -    29 |  288  40.56
 LPGS |     -     -     -   310   102     -     -   123 |  264  47.65
 MAS1 |     -    50    50    39    62     -     -    35 |  288   2.27
 MATE |     -    22    60     -     -     -     -    18 |  287   0.12
 MAW1 |     -    63     -     -    69     -     -    28 |  285  30.54
 MCM4 |     -   106     -   266    74     -     -     X |  288  21.89
 MDO1 |     -   219     -     -     -     -     -   226 |  284 447.71
 MEDI |     -    34     -     -     -     -     -    36 |  286   0.29
 METS |     -    24     -     -     -     -     -    25 |  285   0.75
 MKEA |     -     -     -    94     -     -     -    54 |  263  33.71
 NLIB |     -    61     -     -     -     -     -    63 |  271   0.08
 NPLD |     -    33     -     -     -     -     -    34 |  284   0.06
 NRC2 |     -    39    61     -     -     -     -    33 |  286   0.11
 NTUS |     -    82     -     -     -     -     -    85 |  288   7.02
 NYA1 |     -    69     -     -    60     -     -    45 |  288   0.13
 NYAL |     -     -    56   103     -     -     -    53 |  288   0.12
 OHIG |     -   207     -   108   129     -     -    60 |  288  16.50
 ONSA |     -     -    53    79    43     -     -    26 |  240   1.68
 PERT |     -    85     -   102     -     -     -    40 |  288  16.46
 PIE1 |     -    50     -   125     -     -     -    42 |  288   0.06
 POTS |     -     -     -    71     -     -     -    41 |  274  13.19
 REYK |     -    24     -     -     -     -     -    25 |  284  10.00
 RIOG |     -   104     -   132   131     -     -    82 |  264  11.44
 SANT |     -     -     -   162   101     -     -    97 |  285  21.73
 SFER |     -    21     -     -     -     -     -    21 |  284   1.28
 STJO |     -    60    72     -    90     -     -    56 |  288   3.06
 TLSE |     -    25     -     -     -     -     -    26 |  286   0.54
 TRO1 |     -    53     -     -    64     -     -     - |  288  14.04
 TROM |     -     -     -    70     -     -     -    40 |  286  16.03
 TSKB |     -    46   150    89     -     -     -    33 |  288   1.13
 URUM |     -    29     -     -     -     -     -    30 |  288  24.67
 USNO |     -    62     -   126     -     -     -    37 |  288   0.05
 USUD |     -    33     -    94     -     -     -    36 |  288   0.21
 VILL |     -    30    44    54     -     -     -    20 |  288  18.71
 WES2 |     -    39     -     -     -     -     -    40 |  286   0.08
 WHIT |     -    27     -     -    33     -     -     - |  288  33.33
 WSRT |     -    19     -     -     -     -     -    19 |  288   0.05
 WTZR |     -     -     -   136     -     -     -    78 |  242   0.34
 WUHN |     -    69     -   133    27     -     -    40 |  287  22.19
 YELL |     -    23    53    66     -     -     -    44 |  288   0.12
 YSSK |     -    28     -     -    33     -     -     - |  277   9.63
 -----+-------------------------------------------------+--------------
 TOT  |  4583   100   184   165   118  3677     -   103 |


 BEST CLOCK FIT: BRUS   286   0.04 (ns) 

