
 GPS week: 1129   Day: 1   MJD: 52148                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2666      0     0.10    -0.35     4.81     0.00
 cod |   288     0  23400    273    -0.52     0.16     0.10    20.87
 emr |    96     0   3890      1    60.79     9.48     0.13    15.40
 esa |   288     0  17694    369    60.49     9.27     0.18     9.99
 gfz |   288     0  14925    309     0.17     0.43     0.14    15.06
 igu |    96     0   2099      0     0.01    -0.16     3.58     0.00
 jpl |   283     0  10317    482    -0.13    -4.59     0.11    21.41
 ngs |    96     0   2666      0     0.10    -0.36     4.90     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  25289    393   501.01     7.07     0.12    17.27

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 | -9073   -46   -91  -155   142 -5602   -20 -7798     -    63 |
    2 | -3112     0   210  -139    25    11   -31 -3075     -    11 |
    3 | -4200   140   -74     9  -130  7570    48 -4402     -   -71 |
    4 |  1766     3   -12   234   188 -1263  -131  1337     -  -201 |
    5 | -2706   164    53   130  -114 -1030   206 -2472     -  -293 |
    6 | -9309   219  -295   283   -32 -9521    53 -8014     -  -343 |
    7 | -1510    95   138  -173   -28 -4881   -61 -1226     -    11 |
    8 |  3642   -16    47   -26   125 -4213   -72  3588     -   -40 |
    9 |  2470    99   -32   131    91  5275    79  1597     -  -301 |
   10 |  2149   -17     0    81   -47 -1043   170  1732     -  -103 |
   11 |  5928   -43    55    45   -65   388     2  5439     -    61 |
   13 |  1964   -36    -1    44   177  1356  -108  1980     -   -83 |
   14 |  5525    97    46   -98    -3  1820   110  5387     -  -126 |
   15 | -7790   346  -322     -  -345     -   120 -8929     -  -141 |
   17 | -7986   371  -387   -32   -35     -    61 -7175     -  -308 |
   18 |  3693   135    81   -38  -106  1555    36  3898     -   -98 |
   20 |  6008   -76   180   -92   -29  2047    40  5911     -    96 |
   21 | -4075   222  -118    73   -90     -    77 -3051     -  -247 |
   22 |  1337   195   -41  -104  -140     -    55  1465     -   -77 |
   23 | -1417   323  -237   252  -141     -    59  -711     -  -361 |
   24 | -3567    69  -116   181    62     -   -31 -2473     -  -188 |
   25 |  7076   108  -134   121   184  9045   135  6011     -  -378 |
   26 |   154   102  -168   400   147 -1280   -17   -15     -  -420 |
   27 |  -789   -36   -50   217   148 -6999  -122  -715     -  -103 |
   28 |  6294   -13   162  -204   -98 -3108    29  5910     -   156 |
   29 |  1162    65  -136    69   186 -3117     X  1040     -  -239 |
   30 |  -365   137    22   259    22  1725    88  -440     -  -380 |
   31 |  6455     8  -136    47   -11 11262    86  4866     -   -29 |
 -----+-------------------------------------------------------------+
 ALBH |     -  -215     -  -109     -     -     X     -     -   311 |
 ALGO |     -   -86   116   508   -53     -  -134     -     -   -16 |
 AMC2 |     -    27     -     -     -     -  -232     -     -   252 |
 AOML |     -  -107     -     -     -     -     -     -     -   129 |
 AUCK |     -   -66     -    26     -     -     -     -     -    63 |
 BAHR |     -   104    29   -60   -16     -   -14     -     -   -68 |
 BOR1 |     -    38     -     -     -     -     -     -     -   -46 |
 BRUS |     -    59     -     -     -     -  -103     -     -    53 |
 CAS1 |     -    30     -    -6  -139     -    44     -     -    37 |
 CRO1 |     -  -159     -   -33     -     -   124     -     -    45 |
 DAEJ |     -  -772     -     -     -     -     -     -     -   932 |
 DAV1 |     -    -6     -     -  -107     -     -     -     -   100 |
 DRAO |     -  -116    45     -     -     -     -     -     -   126 |
 EISL |     -  -145     -   304     -     -     -     -     -     - |
 FAIR |     -     -   106  -164     -     -     -     -     -     - |
 GALA |     -   -94     -   -99    13     -     -     -     -   147 |
 GODE |     -   -79     -   -92     -     -     -     -     -   144 |
 GUAM |     -    97     -  -302   162     -  -163     -     -   130 |
 HRAO |     -   -21     -     -     -     -  -143     -     -   197 |
 IISC |     -   100     -  -209     -     -     -     -     -     X |
 KERG |     -  -501     -     -     -     -   954     -     -  -526 |
 KIRU |     -   171     -  -358     -     -     -     -     -     - |
 KOKB |     -     -     -    74   138     -    59     -     -  -291 |
 KOSG |     -   -81     -   -74     -     -     -     -     -   140 |
 KUNM |     -   228     -     -     -     -     -     -     -  -276 |
 LPGS |     -     -     -  -333    98     -   130     -     -   -27 |
 MAC1 |     -   -26     -   -13  -107     -     -     -     -   133 |
 MAS1 |     -    41   177  -147   -83     -     -     -     -    56 |
 MATE |     -  -133     8     -     -     -   110     -     -    26 |
 MAW1 |     -    -4     -     -     -     -     -     -     -     4 |
 MCM4 |     -     -     -    75   -36     -     -     -     -   -12 |
 MDO1 |     -  -135     -     -     -     -     -     -     -   164 |
 MEDI |     -   -48     -     -     -     -     -     -     -    58 |
 METS |     -    91     -     -     -     -     -     -     -  -110 |
 MKEA |     -     -     -  -169     -     -     -     -     -    98 |
 NKLG |     -     -     -  -223     X     -     -     -     -   129 |
 NLIB |     -  -131     -     -     -     -     -     -     -   158 |
 NPLD |     -    35     -     -     -     -     -     -     -   -42 |
 NRC2 |     -   -97   218     -     -     -  -134     -     -   216 |
 NTUS |     -    17     -     -     -     -     -     -     -   -21 |
 NYA1 |     -     3     -     -   120     -   -90     -     -     2 |
 NYAL |     -     -    62     -     -     -     -     -     -   -56 |
 OHIG |     -   -65     -   124  -164     -    78     -     -    51 |
 ONSA |     -   -28   131  -176     -     -     -     -     -    96 |
 PIE1 |     -  -129     -    76     -     -     -     -     -   110 |
 POTS |     -   -20     -   -78     -     -     -     -     -    69 |
 REYK |     -    -8     -     -     -     -     -     -     -    10 |
 RIOG |     -   -38     -   309  -127     -     -     -     -   -23 |
 SANT |     -     -     -    40   -77     -     -     -     -    35 |
 SEY1 |     -     -     -   624  -138     -     -     -     -  -223 |
 SFER |     -  -132     -     -     -     -     -     -     -   159 |
 STJO |     -  -110    94     -   -75     -     -     -     -   170 |
 THTI |     -     -     -     -    92     -  -338     -     -   319 |
 TIDB |     -     X     -     X     -     -   -46     -     -    57 |
 TRO1 |     -   -95     -     -   132     -     -     -     -     - |
 TROM |     -     -     -   -31     -     -     -     -     -    18 |
 TSKB |     -    86    82  -188     -     -     -     -     -   -18 |
 USNO |     -   -40     -  -287     -     -    10     -     -   202 |
 USUD |     -   -57     -  -110     -     -     -     -     -   135 |
 VILL |     -   -41    52    46     -     -     -     -     -     8 |
 WES2 |     -   -77     -     -     -     -     -     -     -    93 |
 WHIT |     -   -20     -     -    28     -     -     -     -     - |
 WSRT |     -    68     -     -     -     -   -96     -     -    36 |
 WTZR |     -   -52     -  -107     -     -    32     -     -    86 |
 WUHN |     -   203     -   -51    57     -  -150     -     -   -83 |
 YAR2 |     -     -     -     -     -     -   -65     -     -    81 |
 YELL |     -     9   190   -98    11     -  -175     -     -   194 |
 YSSK |     -   -14     -     -    19     -     -     -     -     - |
 ZWEN |     -     -     -     -    62     -     -     -     -   -54 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  6611    88   143    73   154  5294    48  7385     -    99 |  288   5.42
    2 |  1738   131   202   233    95  2411   131  1778     -    83 |  288   1.55
    3 |  3691   110    64   214   117  1972    47  3803     -   144 |  288   2.16
    4 |  2795   108   105   218   161  1091    57  3122     -    76 |  280   0.82
    5 |  4529    53    63    48    89  4821    77  4554     -    84 |  288   3.38
    6 |  7552    89    67   153    59  4886    60  8639     -    99 |  288   6.01
    7 |  3480    95    99    80    56  1395    77  3325     -    73 |  288   1.41
    8 |  3584   127   146   202    70  1618    38  3624     -    97 |  282   2.82
    9 |  4667   191   133   161    94  2432    55  4847     -    76 |  281   2.50
   10 |  3329    96    48   106   159  3409    51  3704     -    74 |  288   3.15
   11 |  2711    77    88    82    70   702    68  2311     -    45 |  288   0.49
   13 |  1077    86   204   196   117   857   120  1039     -   104 |  288   0.27
   14 |   869    76    95   292   179   753   250   891     -   134 |  288   0.24
   15 | 12186   215   296     -   403     -   148 12250     -   284 |  276   2.62
   17 |  5119   118   220   167   130     -    94  5021     -    87 |  281   3.12
   18 |  1461   224   418   370   112   632    68  1410     -   412 |  288   0.49
   20 |  1383    74    90    92    54  1397   103  1360     -    82 |  288   0.22
   21 |  6552   100   146   235    57     -    74  6670     -   185 |  288   3.36
   22 |  1926   131    46   197   109     -    94  1710     -   118 |  288   1.81
   23 |  8371    96    72   261   208     -    71  8173     -   230 |  288   6.26
   24 |  6490    79    79   234    99     -    58  6275     -   145 |  279   2.28
   25 |  5467   247   103   344   365  8128   204  4759     -    89 |  281   2.35
   26 |  1973   212    55   122   220  2358    55  1999     -    61 |  288   0.86
   27 |  3167   175   208   305   288  4295   157  3313     -   151 |  280   3.33
   28 |  3927    85    52   179    58  2455    57  4255     -    62 |  288   1.83
   29 |  1165    71    82   176    94  1901     X  1246     -    54 |  288   0.58
   30 |  2334    59    35    34    61  1603    70  2460     -    69 |  288   1.16
   31 |  6644   153    87   322   105  8427    89  6446     -   115 |  288   4.22
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    75     -   330     -     -     X     -     -    92 |  287   0.12
 ALGO |     -    25    30    62    40     -    33     -     -    23 |  288   0.06
 AMC2 |     -    26     -     -     -     -    23     -     -    22 |  288   0.05
 AOML |     -   121     -     -     -     -     -     -     -   146 |  275  35.59
 AUCK |     -    98     -   106     -     -     -     -     -    64 |  288  21.63
 BAHR |     -    51    50    84    74     -    87     -     -    52 |  288   0.35
 BOR1 |     -    35     -     -     -     -     -     -     -    42 |  279   1.63
 BRUS |     -   117     -     -     -     -   113     -     -    36 |  288   0.28
 CAS1 |     -    47     -    83    89     -    75     -     -    51 |  288  10.87
 CRO1 |     -    68     -    54     -     -    96     -     -    48 |  288   0.34
 DAEJ |     -    42     -     -     -     -     -     -     -    51 |  283   1.13
 DAV1 |     -   139     -     -    65     -     -     -     -   115 |  288  21.14
 DRAO |     -    37    48     -     -     -     -     -     -    34 |  287   0.09
 EISL |     -    77     -   160     -     -     -     -     -     - |  221  20.63
 FAIR |     -     -   123   189     -     -     -     -     -     - |   83   0.43
 GALA |     -    26     -    38    37     -     -     -     -    31 |  288  16.01
 GODE |     -    79     -   288     -     -     -     -     -    95 |  284   0.10
 GUAM |     -   323     -    96   140     -    73     -     -   143 |  288  24.56
 HRAO |     -   118     -     -     -     -    35     -     -   118 |  286  30.11
 IISC |     -    89     -   187     -     -     -     -     -     X |  279  20.18
 KERG |     -    75     -     -     -     -    64     -     -    96 |  285   1.78
 KIRU |     -    28     -    59     -     -     -     -     -     - |  287  62.47
 KOKB |     -     -     -   150   159     -   183     -     -   393 |  284   0.65
 KOSG |     -    69     -   124     -     -     -     -     -    44 |  287  67.74
 KUNM |     -    30     -     -     -     -     -     -     -    36 |  209  45.12
 LPGS |     -     -     -   286   298     -   444     -     -   343 |  268  31.86
 MAC1 |     -    36     -    54    31     -     -     -     -    32 |  288  14.96
 MAS1 |     -    43    67    72    30     -     -     -     -    40 |  288   2.24
 MATE |     -    35    42     -     -     -    40     -     -    31 |  287   0.09
 MAW1 |     -    61     -     -     -     -     -     -     -    73 |  277  27.04
 MCM4 |     -     -     -   299   192     -     -     -     -   147 |  287  48.91
 MDO1 |     -    20     -     -     -     -     -     -     -    24 |  285  15.26
 MEDI |     -    27     -     -     -     -     -     -     -    33 |  286   0.30
 METS |     -    22     -     -     -     -     -     -     -    27 |  285   0.16
 MKEA |     -     -     -    56     -     -     -     -     -    32 |  286  41.73
 NKLG |     -     -     -   247     X     -     -     -     -   143 |  277    >>>
 NLIB |     -    72     -     -     -     -     -     -     -    87 |  264   0.05
 NPLD |     -    37     -     -     -     -     -     -     -    45 |  284   0.06
 NRC2 |     -    47    59     -     -     -    47     -     -    31 |  288   0.11
 NTUS |     -    30     -     -     -     -     -     -     -    36 |  280   9.33
 NYA1 |     -    31     -     -    63     -    61     -     -    31 |  288   0.10
 NYAL |     -     -    47     -     -     -     -     -     -    42 |   96   0.11
 OHIG |     -   134     -    79    79     -    46     -     -    96 |  288  13.97
 ONSA |     -    47    58    67     -     -     -     -     -    29 |  288   2.26
 PIE1 |     -    37     -    89     -     -     -     -     -    23 |  288   0.08
 POTS |     -   117     -   108     -     -     -     -     -   143 |  255  14.01
 REYK |     -    16     -     -     -     -     -     -     -    20 |  283   8.56
 RIOG |     -   156     -   203   117     -     -     -     -    98 |  252  11.36
 SANT |     -     -     -   183    83     -     -     -     -   152 |  284  17.55
 SEY1 |     -     -     -   533   201     -     -     -     -   150 |  210  53.70
 SFER |     -    26     -     -     -     -     -     -     -    31 |  284   1.05
 STJO |     -    35    71     -    34     -     -     -     -    53 |  288  15.92
 THTI |     -     -     -     -    98     -    48     -     -    70 |  287   2.24
 TIDB |     -     X     -     X     -     -    44     -     -    55 |  275   0.09
 TRO1 |     -    33     -     -    45     -     -     -     -     - |  287  14.65
 TROM |     -     -     -    62     -     -     -     -     -    36 |  285  15.31
 TSKB |     -    36    73    92     -     -     -     -     -    40 |  288   1.52
 USNO |     -    51     -    61     -     -    29     -     -    35 |  288   0.06
 USUD |     -   223     -   150     -     -     -     -     -   350 |  288   0.20
 VILL |     -    26    75    55     -     -     -     -     -    32 |  288  15.98
 WES2 |     -    34     -     -     -     -     -     -     -    41 |  285   0.23
 WHIT |     -    41     -     -    57     -     -     -     -     - |  286  14.71
 WSRT |     -    55     -     -     -     -    48     -     -    41 |  286   0.05
 WTZR |     -    77     -    85     -     -    73     -     -    31 |  288   0.07
 WUHN |     -    56     -    65    46     -    67     -     -    44 |  287  21.28
 YAR2 |     -     -     -     -     -     -    47     -     -    59 |  103   3.11
 YELL |     -    43    33    71    52     -    36     -     -    41 |  288   0.09
 YSSK |     -    38     -     -    52     -     -     -     -     - |  274  11.72
 ZWEN |     -     -     -     -    36     -     -     -     -    31 |  288  16.12
 -----+-------------------------------------------------------------+--------------
 TOT  |  4814   101   127   182   137  3582   106  4898     -   116 |


 BEST CLOCK FIT: NLIB   264   0.05 (ns) 

