
 GPS week: 1128   Day: 1   MJD: 52141                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2633      0    -0.90    -0.54     5.35     0.00
 cod |    96     0   2563      0    -0.98    -0.44     5.40     0.00
 emr |    96     0   3319    248  1094.48    12.33     0.14    11.64
 esa |   288    33  12963    632    34.22   -19.33     0.12    16.45
 gfz |   288     0  13202    290    -0.01    -0.73     0.11    19.09
 igu |    96     0   2161      0    -0.79    -0.35     3.56     0.00
 jpl |   281     0   8175      3    -2.20     6.23     0.07    31.04
 ngs |    96     0   2633      0    -0.85    -0.69     5.06     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  14566    233   422.21    11.07     0.09    21.77

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |  2381  2411  -250   -18   223 -1063    29  2207     -  -160 |
    2 |  -624  -594  -152  -301   -19 -3626   323  -451     -     7 |
    3 | -2875 -2845     X  -350   234 -4305   224 -2319     -  -121 |
    4 | -4368 -4337   118  -135   108  1128    13 -3682     -   -42 |
    5 |  2962  2992    75   143  -138 10425   247  2014     -  -147 |
    6 |  2600  2630  -127   329   -23 10711    76  2438     -  -236 |
    7 |  2549  2579   -98  -241   -47 -9738   229  2231     -    51 |
    8 | -2517 -2487  -154  -185    87  7435   108 -2055     -    -5 |
    9 |  3704  3734    67   148    38 -3313    22  3146     -  -185 |
   10 |  2947  2977  -150   180   -63  2047   126  2637     -  -121 |
   11 |  5902  5932  -102   210  -133   752     9  6208     -   -16 |
   13 |  4479  4509    50    21    80 -1128  -122  4340     -   -12 |
   14 |  4295  4325     X   230   -36   553   -27  4511     -  -105 |
   17 |  1094     -     -   334     -  4660    62   213     -  -261 |
   18 |  3952  3982   331   124   -66  -921    52  4260     -  -118 |
   19 |-38369-38339  -165     X   232     -   -80-37307     -  -125 |
   20 |  4608  4638  -119   148     0 -1411    33  5033     -   -99 |
   21 | -5869 -5839   184    84   -45     -   196 -4757     -  -193 |
   22 |  7667  7697   -22  -308   -26     -   224  6148     -    83 |
   23 |  1386  1416    38   745  -251     -   144  1041     -  -342 |
   24 | -2497 -2467   -68   258  -161     -   -10 -2314     -     - |
   25 |    37    66   136     X   229  -215    17  -357     -  -230 |
   26 |  -937  -907    50   316   100 -2637    28  -725     -  -329 |
   27 |  7019  7049  -221   138    76 10821   -36  6398     -   -93 |
   28 | 10955 10985   -25    75  -166 -5112    67 10059     -    52 |
   29 |   -96   -65   -15    63   279 -3390    11   -74     -  -293 |
   30 |-10718-10688   173   294    65 -8105   -74 -9604     -  -236 |
   31 |  -886  -856  -247  -366   142 -1600   244  -638     -   -12 |
 -----+-------------------------------------------------------------+
 ALBH |     -     -     -  -178     -     -    94     -     -     - |
 ALGO |     -     -   -11   -29  -124     -    10     -     -   117 |
 AREQ |     -     -     -     9     -     -   -92     -     -   122 |
 ARTU |     -     -     -     -  -174     -   107     -     -     - |
 AUCK |     -     -     -   -19     X     -     -     -     -    15 |
 BAHR |     -     -   287  -101    26     -    16     -     -   -28 |
 CAS1 |     -     -     -    20  -107     -    50     -     -    10 |
 CRO1 |     -     -     -  -174     -     -    92     -     -     - |
 DAEJ |     -     -     -     -     -     -  -882     -     -  1257 |
 DAV1 |     -     -     -     -   -51     -     -     -     -    45 |
 DRAO |     -     -  -182     -     -     -     -     -     -    98 |
 GALA |     -     -     -    31   -27     -     -     -     -     - |
 GUAM |     -     -     -  -145   -21     -   -89     -     -   237 |
 HOB2 |     -     -     -    20   -94     -     -     -     -    69 |
 HRAO |     -     -     -     -     -     -  -186     -     -   265 |
 IISC |     -     -     -  -323    54     -     -     -     -   169 |
 KERG |     -     -     -     -     -     -  -146     -     -   209 |
 KOKB |     -     -     -     X   -92     -    56     -     -     X |
 LPGS |     -     -     -   -46    40     -     -     -     -     - |
 MALI |     -     -     -  -105   -52     -     -     -     -   116 |
 MAS1 |     -     -   178  -130   -30     -    42     -     -    24 |
 MCM4 |     -     -     -   -44   -53     -     -     -     -    76 |
 MDO1 |     -     -  -111     -     -     -     -     -     -    59 |
 NKLG |     -     -     -  -230   -27     -     -     -     -   176 |
 PERT |     -     -     -   -16     -     -     -     -     -    12 |
 PIE1 |     -     -     -   -17     -     -     -     -     -    13 |
 POTS |     -     -     -  -104     5     -     7     -     -    54 |
 RIOG |     -     -     -   321   -27     -  -138     -     -     - |
 SANT |     -     -     -   173   -37     -     -     -     -   -95 |
 STJO |     -     -    96     -   -59     -     -     -     -     - |
 TSKB |     -     -   239  -198     -     -     -     -     -    88 |
 USNO |     -     -     -  -209     -     -    49     -     -    72 |
 VILL |     -     -     -   -28     -     -     -     -     -    21 |
 YELL |     -     -   145  -306    83     -   -75     -     -   207 |
 ZWEN |     -     -     -  -145   -36     -     -     -     -   129 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  4631  4651    60    99    97  3326    46  4695     -    32 |  288   3.78
    2 |  2784  2794   158   137   111  2998   113  3074     -    81 |  288   2.16
    3 |  3748  3735     X    70    47  2032    51  3280     -    40 |  288   2.11
    4 |  4412  4369    70   213   116  2093    73  4397     -    52 |  276   0.99
    5 | 14158 14156   182    76    90  3600    67 11808     -    56 |  288   3.19
    6 |  5859  5862   258    33    85  7207    34  5472     -    54 |  288   5.85
    7 |  3741  3746    72   118    50  5555    67  3561     -    79 |  288   1.19
    8 |  4647  4624    86    58    90  5599    37  4831     -    68 |  276   2.88
    9 |  5355  5369   293   182   218  2504   114  5158     -   305 |  264   1.67
   10 |  2876  2868   148   207   129  2521    47  3217     -    47 |  288   2.37
   11 |  1419  1408    45    48    78   668    49  1422     -    47 |  285   0.39
   13 |  1319  1335   156    70    42   950    86  1185     -    74 |  288   0.25
   14 |   717   720     X   240   100   738    71   743     -   248 |  288   0.29
   17 |  3152     -     -   291     -  1845    69  4489     -   191 |  220   3.12
   18 |   765   769    61   183   130   559    83   759     -    57 |  288   0.37
   19 |  4561  4540   122     X   132     -   183  4297     -   105 |  272   2.76
   20 |  1173  1132    87    84    96   640   116  1134     -    68 |  288   0.22
   21 |  4159  4193   143   136    67     -    63  4658     -    36 |  288   2.89
   22 |  3760  3799    91    85   180     -    99  3641     -    78 |  288   1.05
   23 |  9971  9992   279   268   101     -    69 10226     -    83 |  288   6.21
   24 |  3875  3832   186   160   121     -   143  3892     -     - |  235   2.73
   25 |  4454  4442   197     X   205  2716    66  3848     -   125 |  276   2.45
   26 |   961   943   195   186    70  1229    77   929     -    87 |  288   0.48
   27 |  7051  7060   123   155   214  7425    44  5778     -   173 |  277   4.30
   28 |  6607  6614   131    70    48  3725    47  6265     -    39 |  288   0.31
   29 |  1082  1114   243   171    79  1894    59  1045     -    79 |  288   0.65
   30 |  4315  4283   159    69   102  3333    54  4465     -    44 |  288   1.32
   31 | 10845 10829   209    86   112  5223    86 10517     -    65 |  288   4.62
 -----+-------------------------------------------------------------+--------------
 ALBH |     -     -     -    92     -     -    49     -     -     - |  183   0.10
 ALGO |     -     -    81    49    45     -    41     -     -    39 |  288   0.05
 AREQ |     -     -     -    79     -     -    34     -     -    73 |  286  20.24
 ARTU |     -     -     -     -    75     -    46     -     -     - |  278  10.13
 AUCK |     -     -     -    83     X     -     -     -     -    63 |  255  16.27
 BAHR |     -     -    87   101   118     -    42     -     -   134 |  288   0.52
 CAS1 |     -     -     -    38    52     -    52     -     -    30 |  287   9.38
 CRO1 |     -     -     -    48     -     -    25     -     -     - |  179   0.20
 DAEJ |     -     -     -     -     -     -    15     -     -    21 |  250   1.98
 DAV1 |     -     -     -     -    23     -     -     -     -    20 |  288  24.65
 DRAO |     -     -    32     -     -     -     -     -     -    17 |   96   0.04
 GALA |     -     -     -    28    24     -     -     -     -     - |  188  15.97
 GUAM |     -     -     -   110   173     -    64     -     -    49 |  288  21.78
 HOB2 |     -     -     -    33    32     -     -     -     -    36 |  288   0.10
 HRAO |     -     -     -     -     -     -    43     -     -    61 |  281  25.28
 IISC |     -     -     -    56    61     -     -     -     -    45 |  288  18.14
 KERG |     -     -     -     -     -     -    24     -     -    34 |  279   2.76
 KOKB |     -     -     -     X   244     -   150     -     -     X |  154   7.36
 LPGS |     -     -     -    66    57     -     -     -     -     - |  189  19.79
 MALI |     -     -     -    93    41     -     -     -     -    77 |  288  26.86
 MAS1 |     -     -    64    78    69     -    59     -     -    32 |  288   2.17
 MCM4 |     -     -     -    51    28     -     -     -     -    32 |  266  39.55
 MDO1 |     -     -    69     -     -     -     -     -     -    37 |   96  17.60
 NKLG |     -     -     -    34    45     -     -     -     -    37 |  179 196.68
 PERT |     -     -     -    68     -     -     -     -     -    52 |  195  14.52
 PIE1 |     -     -     -    89     -     -     -     -     -    67 |  192   0.06
 POTS |     -     -     -    99    67     -    65     -     -    33 |  266  25.45
 RIOG |     -     -     -    59    77     -    42     -     -     - |  286  10.91
 SANT |     -     -     -   179   192     -     -     -     -   247 |  284  20.22
 STJO |     -     -    81     -    49     -     -     -     -     - |   96   2.46
 TSKB |     -     -   103    68     -     -     -     -     -    59 |  226   1.47
 USNO |     -     -     -    55     -     -    52     -     -    54 |  285   0.07
 VILL |     -     -     -    64     -     -     -     -     -    48 |  195  17.32
 YELL |     -     -    62    51    48     -    45     -     -    38 |  288   0.08
 ZWEN |     -     -     -    58    43     -     -     -     -    28 |  288  20.33
 -----+-------------------------------------------------------------+--------------
 TOT  |  5352  5399   145   119   106  3563    68  5064     -    91 |


 BEST CLOCK FIT: ALGO   288   0.05 (ns) 

