
 GPS week: 1127   Day: 6   MJD: 52139                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2736      0    -0.04     0.01     4.58     0.00
 cod |   288     0  23117    684     1.83    -5.64     0.08    18.69
 emr |    96     0   3949    159  1072.64    12.37     0.09    14.44
 esa |   288     0  18938    848  1062.11    12.32     0.12    10.99
 gfz |   288     0  14795     66     0.27    -0.31     0.09    14.44
 igu |    96     0   2105      0     0.26    -0.24     4.18     0.00
 jpl |   281     0  10161    577    -2.86     1.23     0.07    20.04
 ngs |    96     0   2736      0    -0.07     0.10     4.48     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  26771    330   404.18     9.90     0.07    21.39

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |  3697   -21  -268    58   156 -9528  -195  3668     -    37 |
    2 | -5761    -5  -123  -109  -125 -4612   204 -4837     -    72 |
    3 |   735   104  -161    18    87  1783    72  -270     -  -152 |
    4 | -2647   103   -98    52   131     -   -49 -2562     -  -160 |
    5 | -8623   117    51   147    26-14349   162 -6959     -  -280 |
    6 | -6703   269   -57   -31    34 -5054   148 -6168     -  -290 |
    7 | -2462    74  -129   -47  -126  1456    79 -2412     -    41 |
    8 | -1156  -120   -90    22    15  3760    62 -1371     -    76 |
    9 |   141   134    82   188    54  -925    97   973     -  -309 |
   10 | -5682   -71   -20   -23   -79 -2771   299 -4758     -    10 |
   11 |  8748   -10    19   -86  -205  2311   -26  8251     -   194 |
   13 |  3455    81     7    45   -83  2058  -222  3396     -    70 |
   14 |  6460    40    62   145    50  1951    26  6410     -  -168 |
   15 | -1196   215    -7     -     -     -   182 -1236     -  -261 |
   17 | -2708   257     6   -92   208     -   247 -2667     -  -428 |
   18 |  4980    68   152    66    -5   861    62  5075     -  -150 |
   19 | -6120   -31     X   263  -117     -  -291 -7040     -   112 |
   20 |  4651  -109   -81    15     1  1065    56  4838     -    81 |
   21 | -5335   290    -6  -346   183     -   145 -5123     -  -286 |
   22 | 14829    84  -174    22    72 -1673   184 12340     -  -185 |
   23 | -5864   180   109    57    92     -   210 -5704     -  -375 |
   24 | -5704     -     X  -171     -     -   167 -4599     -    -1 |
   25 |  4498   137   -40   193   134  7993   -44  4134     -  -274 |
   26 | -2617   109   129   281    36 -1990   111 -2361     -  -345 |
   27 |  9112   -85   -53  -334    74 17971    11  7333     -   198 |
   28 |  5522   -23  -114   -83   -24 -3800  -114  5369     -   160 |
   29 |  -933   123  -156   171   121 -2258    71  -911     -  -276 |
   30 | -5461   143     4   215   172  -342     2 -4954     -  -350 |
   31 |   333    95  -169    21  -143  6672    45   654     -    22 |
 -----+-------------------------------------------------------------+
 ALBH |     -  -128     -  -307     -     -     X     -     -   271 |
 ALGO |     -   -49   165     X   -32     -     -     -     -    27 |
 AMC2 |     -   -79     -     -     -     -  -107     -     -   168 |
 AOML |     -   -55     -     -     -     -     -     -     -    48 |
 AREQ |     -     -     -    -8     -     -     -     -     -     4 |
 AUCK |     -   -85     -   -37     -     -     -     -     -    93 |
 BAHR |     -    -2   -70    16    -6     -     -     -     -    13 |
 BILI |     -   -47     -     -    60     -     -     -     -     - |
 BOR1 |     -    28     -     -     -     -     -     -     -   -24 |
 BRUS |     -    60     -     -     -     -   -14     -     -   -40 |
 CAS1 |     -    16     -    20  -119     -    25     -     -    33 |
 CRO1 |     -  -148     -   -32     -     -    77     -     -    77 |
 DAV1 |     -    20     -     -  -160     -     -     -     -    92 |
 DRAO |     -  -101     1     -     -     -     -     -     -    88 |
 EISL |     -     -     -   -42     -     -     -     -     -    21 |
 FAIR |     -     -    34   -45     -     -     -     -     -     - |
 FORT |     -     X     -   499     -     -     -     -     -  -256 |
 GALA |     -   -56     -     -    29     -    60     -     -   -25 |
 GODE |     -   -34     -  -165     -     -     -     -     -   101 |
 GUAM |     -     -     -   -35   139     -  -160     -     -    69 |
 HOB2 |     -     5     -  -113  -130     -     -     -     -   142 |
 HRAO |     -     -     -     -     -     -  -357     -     -   335 |
 IISC |     -     -     -  -182     -     -     -     -     -    94 |
 KERG |     -   107     -     -     -     -  -194     -     -    84 |
 KIRU |     -   129     -  -220     -     -     -     -     -     - |
 KOKB |     -     -     -   -80   141     -   -50     -     -     X |
 KOSG |     -     -     -  -103     -     -     -     -     -    53 |
 KUNM |     -   -86     -     -     -     -   -43     -     -   111 |
 LPGS |     -     -     -  -119    17     -   -46     -     -    81 |
 MAC1 |     -   -97     -   243     5     -     -     -     -   -44 |
 MALI |     -     -     -   -55     -     -     -     -     -    28 |
 MAS1 |     -     3   146   -12   -38     -   -10     -     -     6 |
 MATE |     -   -99    92     -     -     -     X     -     -    66 |
 MCM4 |     -     -     -   334  -181     -     -     -     -   -49 |
 MDO1 |     -  -109   140     -     -     -     -     -     -    63 |
 MEDI |     -  -101     -     -     -     -     -     -     -    88 |
 METS |     -   -67     -     -     -     -     -     -     -    58 |
 MKEA |     -     -    -2  -147     -     -     -     -     -    76 |
 NKLG |     -     -     -   -53     -     -     -     -     -    27 |
 NLIB |     -   -76     -     -     -     -     -     -     -    66 |
 NPLD |     -    50     -     -     -     -     -     -     -   -43 |
 NRC2 |     -  -141   186     -     -     -     -     -     -    81 |
 NYA1 |     -    28     -     -  -105     -    71     -     -   -18 |
 OHIG |     -  -114     -   227   -88     -    33     -     -     3 |
 ONSA |     -   -31   134  -113     -     -     -     -     -    55 |
 PENC |     -   312     -     -     -     -     -     -     -  -273 |
 PERT |     -   -67     -   -52     -     -     -     -     -    83 |
 PIE1 |     -  -202     -   323     -     -     -     -     -    11 |
 PIMO |     -     -     -   741     -     -     -     -     -  -381 |
 POTS |     -   -61     -   -56     -     -     -     -     -    82 |
 REYK |     -  -103     -     -     -     -     -     -     -    90 |
 RIOG |     -    21     -   184   -83     -     -     -     -   -57 |
 SANT |     -     X     -    47   -12     -     -     -     -   -17 |
 SEY1 |     -     -     -   -57  -426     -     -     -     -   311 |
 SFER |     -   -86     -     -     -     -     -     -     -    75 |
 STJO |     -   -87   101     -    36     -     -     -     -    29 |
 THTI |     -     -     -     -    62     -  -170     -     -   109 |
 TIDB |     -     X     -     X     -     -    30     -     -   -28 |
 TLSE |     -  -205     -     -     -     -     -     -     -   179 |
 TRO1 |     -   -62     -     -    80     -     -     -     -     - |
 TROM |     -     -     -    -1     -     -     -     -     -     1 |
 TSKB |     -    -3     5   -27     -     -     -     -     -    15 |
 USNO |     -   -95     -  -199     -     -   107     -     -    87 |
 VILL |     -   -61     -    79     -     -     -     -     -    13 |
 WES2 |     -   -79     -     -     -     -     -     -     -    69 |
 WHIT |     -   -40     -     -    51     -     -     -     -     - |
 WSRT |     -    -5     -     -     -     -   -67     -     -    65 |
 WTZR |     -   -19     -  -170     -     -    28     -     -    79 |
 WUHN |     -    83     -  -279    11     -     -     -     -    63 |
 YAR2 |     -     -     -     -     -     -  -177     -     -   166 |
 YELL |     -   -55   197  -311    24     -     -     -     -   148 |
 YSSK |     -   -45     -     -     -     -    42     -     -     - |
 ZWEN |     -     -     -     -     8     -     -     -     -    -5 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  5392    71    86    94    99  3457    51  5542     -    83 |  288   3.85
    2 |  4493    66    54   193    57  1789    82  4123     -    78 |  288   1.42
    3 |  7087    62    70    71    82  2192    81  6505     -    38 |  288   1.55
    4 |   839   194   144   174   186     -   104   892     -    59 |  281   0.59
    5 |  3659    70   103    68   118  7354    58  3867     -    82 |  288   3.21
    6 |  8163   137   206   137    96  4771    81  8651     -    91 |  288   6.84
    7 |  1923    65    88    89    97  2024    88  1998     -    51 |  288   1.93
    8 |  3283    61    79   134   115  2831    43  3497     -   122 |  286   2.52
    9 |  7021    81    60   128    52  2591    71  6628     -    61 |  283   2.31
   10 |  3706    84   134    62    61  1683   118  3837     -    77 |  288   1.53
   11 |  1777    65    63    61    60   875    58  1453     -    38 |  288   0.38
   13 |   741    80   139   111   120  1053   108   815     -    99 |  288   0.23
   14 |   976    75    67   115   105  1009    55   990     -    82 |  288   0.18
   15 |  2093   246   112     -     -     -   118  2072     -   158 |  273   2.17
   17 |  1356   289   115   220    96     -   157  1228     -   169 |  280   3.12
   18 |   708   111    56   168    75   798    65   746     -   116 |  288   0.41
   19 | 10007   161     X   162   103     -   202  9679     -   197 |  279   3.49
   20 |   822    73   174    83    89   817    53   892     -    65 |  288   0.21
   21 |  4113    64    85   206    96     -    57  4096     -    49 |  288   4.36
   22 |  4985    87    97   158    68  2682    69  4392     -    68 |  288   0.90
   23 |  8565    65    69    98    55     -    73  8549     -    87 |  288   5.08
   24 |  6245     -     X   296     -     -   158  6060     -   142 |  220   2.63
   25 |  2330   110    82   151   296  3341    61  2452     -    88 |  280   2.10
   26 |  1403    56    90   108   107  1383    61  1580     -    41 |  288   0.64
   27 |  7302    67   134    82    88 14758    48  6535     -    56 |  282   3.89
   28 |  1775    85    96    94    65  1824    45  2024     -    71 |  288   0.96
   29 |  1088   109   104    94   112  2277    48  1178     -    31 |  288   0.81
   30 |  3001    64    87    53   108  1469    54  3032     -   101 |  288   1.04
   31 |  4737    74    65   263   124  4573    47  4632     -    50 |  288   3.32
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    20     -    40     -     -     X     -     -    24 |  288   0.10
 ALGO |     -    26    56     X    29     -     -     -     -    26 |  288   0.04
 AMC2 |     -    51     -     -     -     -    31     -     -    36 |  288   0.03
 AOML |     -    59     -     -     -     -     -     -     -    52 |  285  24.56
 AREQ |     -     -     -    73     -     -     -     -     -    38 |  155   8.27
 AUCK |     -    60     -    82     -     -     -     -     -    77 |  288  16.60
 BAHR |     -    36    31    44    37     -     -     -     -    32 |  288   0.47
 BILI |     -    42     -     -    54     -     -     -     -     - |  287  11.70
 BOR1 |     -    21     -     -     -     -     -     -     -    19 |  286   2.61
 BRUS |     -    59     -     -     -     -    48     -     -    45 |  288   0.05
 CAS1 |     -    68     -   262    60     -    33     -     -   113 |  288   8.72
 CRO1 |     -    40     -    58     -     -    32     -     -    27 |  288   0.27
 DAV1 |     -    67     -     -    28     -     -     -     -    73 |  288  24.18
 DRAO |     -    44    50     -     -     -     -     -     -    34 |  288   0.04
 EISL |     -     -     -   129     -     -     -     -     -    66 |  276 122.18
 FAIR |     -     -   135   178     -     -     -     -     -     - |   73   0.27
 FORT |     -     X     -   148     -     -     -     -     -    76 |  266   0.18
 GALA |     -    96     -     -    59     -    88     -     -    37 |  288  20.40
 GODE |     -    77     -   211     -     -     -     -     -    93 |  285  13.77
 GUAM |     -     -     -   112    31     -    33     -     -    62 |  288  18.39
 HOB2 |     -    40     -    94    29     -     -     -     -    53 |  288   0.07
 HRAO |     -     -     -     -     -     -    62     -     -    58 |  278  22.56
 IISC |     -     -     -    45     -     -     -     -     -    23 |  286  12.90
 KERG |     -    73     -     -     -     -    52     -     -    82 |  286   1.70
 KIRU |     -    21     -    36     -     -     -     -     -     - |  288   1.91
 KOKB |     -     -     -   111    81     -    61     -     -     X |  285   2.29
 KOSG |     -     -     -    55     -     -     -     -     -    28 |  286  71.67
 KUNM |     -    58     -     -     -     -    34     -     -    51 |  286  29.71
 LPGS |     -     -     -   188   210     -   180     -     -    90 |  265  95.07
 MAC1 |     -    70     -    60    39     -     -     -     -    59 |  288  15.62
 MALI |     -     -     -    41     -     -     -     -     -    21 |  288  41.96
 MAS1 |     -    30    57    55    40     -    39     -     -    24 |  288   1.74
 MATE |     -    42    42     -     -     -     X     -     -    34 |  287   0.06
 MCM4 |     -     -     -    50    30     -     -     -     -    31 |  288  61.61
 MDO1 |     -    48    61     -     -     -     -     -     -    39 |  286  13.98
 MEDI |     -    41     -     -     -     -     -     -     -    36 |  286   0.19
 METS |     -    26     -     -     -     -     -     -     -    23 |  285   0.21
 MKEA |     -     -    55    63     -     -     -     -     -    26 |  286  31.67
 NKLG |     -     -     -    54     -     -     -     -     -    28 |  287    >>>
 NLIB |     -    43     -     -     -     -     -     -     -    37 |  264   0.07
 NPLD |     -    32     -     -     -     -     -     -     -    28 |  285   0.06
 NRC2 |     -    30    49     -     -     -     -     -     -    27 |  286   0.06
 NYA1 |     -    39     -     -    44     -    29     -     -    30 |  288   0.31
 OHIG |     -    51     -    63    46     -    34     -     -    51 |  288  13.13
 ONSA |     -    30    56    36     -     -     -     -     -    27 |  288   0.97
 PENC |     -    51     -     -     -     -     -     -     -    44 |  285   2.42
 PERT |     -   102     -   103     -     -     -     -     -    78 |  288  15.34
 PIE1 |     -    26     -    33     -     -     -     -     -    29 |  288   0.03
 PIMO |     -     -     -    72     -     -     -     -     -    37 |   77  16.31
 POTS |     -    35     -    49     -     -     -     -     -    36 |  288  12.82
 REYK |     -    20     -     -     -     -     -     -     -    17 |  286   9.49
 RIOG |     -   105     -   122    21     -     -     -     -    57 |  288  13.29
 SANT |     -     X     -    91    95     -     -     -     -    89 |  285  18.81
 SEY1 |     -     -     -    79   153     -     -     -     -   120 |  276  48.60
 SFER |     -    30     -     -     -     -     -     -     -    26 |  285   1.39
 STJO |     -    57    41     -    59     -     -     -     -    36 |  288   2.27
 THTI |     -     -     -     -    91     -    53     -     -    37 |  287   6.93
 TIDB |     -     X     -     X     -     -    39     -     -    37 |  276   0.22
 TLSE |     -    56     -     -     -     -     -     -     -    49 |  284   0.59
 TRO1 |     -    33     -     -    42     -     -     -     -     - |  287  13.29
 TROM |     -     -     -    35     -     -     -     -     -    18 |  286  15.71
 TSKB |     -    38    74    99     -     -     -     -     -    56 |  288   1.02
 USNO |     -    62     -    46     -     -    37     -     -    21 |  288   0.06
 VILL |     -    44     -    47     -     -     -     -     -    32 |  288  17.33
 WES2 |     -    28     -     -     -     -     -     -     -    24 |  286  10.21
 WHIT |     -    37     -     -    48     -     -     -     -     - |  288  16.50
 WSRT |     -    47     -     -     -     -    43     -     -    30 |  288   0.06
 WTZR |     -    29     -    35     -     -    42     -     -    35 |  288   0.05
 WUHN |     -    59     -   115    23     -     -     -     -    65 |  287  15.10
 YAR2 |     -     -     -     -     -     -    39     -     -    36 |  126   6.07
 YELL |     -    72    46    52    55     -     -     -     -    27 |  288   0.08
 YSSK |     -    66     -     -     -     -    61     -     -     - |  280  11.41
 ZWEN |     -     -     -     -    27     -     -     -     -    18 |  288  13.10
 -----+-------------------------------------------------------------+--------------
 TOT  |  4579    78    92   116    92  4181    72  4479     -    66 |


 BEST CLOCK FIT: PIE1   288   0.03 (ns) 

