
 GPS week: 1127   Day: 5   MJD: 52138                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2762      0    -1.79     2.39     6.85     0.00
 cod |   288     0  24536    462    -2.07     3.54     0.09    18.78
 emr |    96     0   3996    317   393.83     9.02     0.12    12.87
 esa |   288     0  18318   1012  1059.62    11.33     0.14    10.93
 gfz |   288     0  15289     67    -0.31    -0.23     0.09    19.26
 igu |    96     0   2199      0    -1.83     2.50     4.57     0.00
 jpl |   281     0   9270    279    -0.45     4.53     0.09    18.00
 ngs |    96     0   2762     34     0.13    -0.26     4.61     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  25983   1419   393.47     9.42     0.09    20.16

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |  8251    -4  -141   -74     6  2555     3  6969     -    67 |
    2 | -9692    49   -16  -105   -25-10870    44 -9440     -    16 |
    3 |   765   107  -170    90   -41 11767   205   940     -  -150 |
    4 | -3214   -11   -61   156   199 -4998   -12 -3598     -  -242 |
    5 |  -645   161     8    -2    -6  9548   260 -2250     -  -270 |
    6 | -7114   238   -12    41    56 -4351    18 -6692     -  -303 |
    7 | -3478    22  -106  -123     0 -4984   182 -4127     -     X |
    8 | -2586   -69   -56    42   106-11180   -46 -3298     -   -29 |
    9 |   496   134   -11   171    36 -3600   -67  -476     -  -226 |
   10 |  2159   112    -6   -60  -139  4342   242  1651     -   -39 |
   11 |  7260  -113   -12   150   -82  1062    82  6382     -    71 |
   13 |  2983   -53     X   122    73 -2903  -181  2428     -     X |
   14 |  4698    93     X   -71   -16 -1166    18  4215     -   -42 |
   15 | -4364   182   166     -  -168     -   473 -4133     -  -219 |
   17 | -4854   329   -57   -26    64     -   109 -4827     -  -397 |
   18 |  2160    51   211    37   -68   428   -61  1824     -   -18 |
   19 |-15293     4  -170     X    33     -     -  6643     -     - |
   20 |  4809   -79    33   -18   -25   388    89  4143     -    57 |
   21 |  1016   166   -32   331   -15     -   108  -246     -  -342 |
   22 | 20200   180   -25    57   -79 -5576   129 15443     -  -180 |
   23 |  1780   186     X    73  -232     -    24   872     -     X |
   24 | -3105   115   -58    14   -41     -   224 -3508     -  -147 |
   25 |  2159   149    64   -48   111 -2523   -12  1658     -  -229 |
   26 | -1924   239    55   142    70 -2826  -138 -2433     -  -310 |
   27 |  2655  -141   -75   694     2 17290   -71  2389     -  -102 |
   28 |  2198    25   -46   -22   -49 -2891     4  2336     -    44 |
   29 |  -961    57  -227   116   131   270     4 -1435     -  -205 |
   30 | -7864    44     9   260   127 -3803  -143 -8121     -  -236 |
   31 |   447   -53   -94   160  -139 14094   191 -1100     -    23 |
 -----+-------------------------------------------------------------+
 ALBH |     -  -185     -     X     -     -     X     -     -   173 |
 ALGO |     -  -134   -70   974  -223     -  -158     -     -    46 |
 AMC2 |     -    -7     -     -     -     -  -156     -     -   143 |
 AOML |     -  -132     -     -     -     -     -     -     -   123 |
 AREQ |     -  -191     -   107     -     -     -     -     -   121 |
 AUCK |     -  -493     -  -319  1122     -     -     -     -  -439 |
 BAHR |     -   117   245  -179     3     -     -     -     -   -68 |
 BILI |     -    39     -     -   -38     -     -     -     -     - |
 BOR1 |     -    25     -     -     -     -     -     -     -   -23 |
 BRUS |     -    79     -     -     -     -   -23     -     -   -54 |
 CAS1 |     -    14     -    83  -120     -    73     -     -    -7 |
 CRO1 |     -   -72     -   -56     -     -  -138     -     -   216 |
 DAEJ |     - -1063     -     -     -     -     -     -     -   990 |
 DAV1 |     -    69     -     -  -146     -     -     -     -    87 |
 DRAO |     -  -102   -45     -     -     -     -     -     -   104 |
 FORT |     -     X     -   496     -     -     -     -     -  -269 |
 GALA |     -    51     -     -   -32     -     -     -     -   -17 |
 GODE |     -  -128     -    36     -     -     -     -     -   103 |
 GUAM |     -    17     -  -349    86     -  -121     -     -   197 |
 HOB2 |     -   -15   151   -21   -71     -     -     -     -    61 |
 HRAO |     -    52     -     -     -     -  -111     -     -    47 |
 IISC |     -     -     -  -163     -     -     -     -     -    88 |
 KERG |     -   183     -     -     -     -  -297     -     -    85 |
 KIRU |     -   240     -  -412     -     -     -     -     -     - |
 KOKB |     -     -     -   188   -84     -   -37     -     -     X |
 KOUR |     -   -92     -    25     -     -     -     -     -    73 |
 KUNM |     -   218     -     -     -     -     -     -     -  -203 |
 LPGS |     -     -     -  -230    73     -   -39     -     -    88 |
 MALI |     -     -     -  -116     -     -     -     -     -    63 |
 MAS1 |     -     7    58    -5    -5     -     -     -     -   -12 |
 MATE |     -  -472  -213     -     -     -   792     -     -  -198 |
 MAW1 |     -   -38     -     -     -     -     -     -     -    35 |
 MCM4 |     -   178     -     X  -173     -     -     -     -     X |
 MDO1 |     -   -42   -64     -     -     -     -     -     -    53 |
 MEDI |     -  -124     -     -     -     -     -     -     -   115 |
 METS |     -     7     -     -     -     -     -     -     -    -7 |
 MKEA |     -     -   106  -270     -     -     -     -     -   124 |
 NLIB |     -  -109     -     -     -     -     -     -     -   102 |
 NPLD |     -    60     -     -     -     -     -     -     -   -56 |
 NRC2 |     -   -46    78     -     -     -  -136     -     -   145 |
 NTUS |     -   -34     -     -     -     -     -     -     -    32 |
 NYA1 |     -    69     -     -  -181     -   117     -     -     8 |
 OHIG |     -   -75     -   218  -233     -    85     -     -    98 |
 ONSA |     -    43   212  -221     -     -     -     -     -    34 |
 PENC |     -   322     -     -     -     -     -     -     -  -300 |
 PERT |     -   160     -  -152     -     -     -     -     -   -67 |
 PIE1 |     -    69     -  -352     -     -     -     -     -   127 |
 POTS |     -    82     -  -258     -     -     -     -     -    64 |
 REYK |     -   -71     -     -     -     -     -     -     -    67 |
 RIOG |     -   -39     -   199   -44     -     -     -     -   -29 |
 SANT |     -     X     -    12   -16     -     -     -     -     8 |
 SEY1 |     -     -     -   -16     4     -     -     -     -     4 |
 SFER |     -  -633     -     -     -     -     -     -     -   589 |
 STJO |     -   -91   -13     -  -104     -     -     -     -   188 |
 THTI |     -     -     -     -    -8     -  -245     -     -   214 |
 TLSE |     -   216     -     -     -     -     -     -     -  -202 |
 TRO1 |     -  -124     -     -   120     -     -     -     -     - |
 TROM |     -     -     -    40     -     -     -     -     -   -22 |
 TSKB |     -    88   164  -312     -     -     -     -     -    52 |
 USNO |     -     5     -  -220     -     -   -94     -     -   196 |
 USUD |     -   -80     -    60     -     -     -     -     -    42 |
 VILL |     -    15     -   -19     -     -     -     -     -    -4 |
 WHIT |     -   -30     -     -    30     -     -     -     -     - |
 WSRT |     -   -15     -     -     -     -  -114     -     -   113 |
 WTZR |     -     -     -  -112     -     -   -88     -     -   138 |
 WUHN |     -    31     -   -48    15     -     -     -     -   -17 |
 YELL |     -   -44   188  -200   -13     -  -113     -     -   221 |
 ZWEN |     -     -     -  -265   145     -     -     -     -     5 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  6729    76    74    69    54  2275    77  6506     -    66 |  288   3.32
    2 |  4623   191    59   268    89  7032   139  3450     -    59 |  288   1.28
    3 |  4918    88    78   190    67  6802    93  5472     -   103 |  288   0.93
    4 |  1376   214    83   159    67  2370   170  1239     -    58 |  281   0.87
    5 |  7251   108   125   138    65  6821    86  7300     -    47 |  288   3.59
    6 |  5610    98    50   203    90  2084    71  6284     -    49 |  288   5.72
    7 |  3723   138    87   148    82  4119   131  3173     -     X |  288   0.98
    8 |  3812    75    62    30    67  7829    43  3383     -    34 |  288   2.25
    9 |  6270   125    44   144    85  3164    95  5726     -   185 |  284   1.47
   10 |  2339   183   103    86   135  2727    50  2920     -    65 |  288   2.15
   11 |  1699   100    90   127    56  1090   105  1187     -    73 |  288   0.41
   13 |  1527    59     X    77    67  1680    54   721     -     X |  288   0.34
   14 |   930    85     X   158    96   436    92  1158     -   100 |  288   0.19
   15 |  7014   201    70     -   157     -   148  6217     -   252 |  277   2.42
   17 |  2473   228    91   146   142     -   124  2138     -   223 |  282   3.36
   18 |  1137    99    99   103    35   561    99   707     -   146 |  288   0.41
   19 | 27338   122   228     X   119     -     -  5362     -     - |  262   6.59
   20 |  1404    90   181    79    82   518   113  1151     -    64 |  288   0.27
   21 |  3843    56   163   241    53     -    40  3416     -   108 |  288   2.65
   22 |  7667    42   119    80    53  4480    84  7595     -    27 |  288   0.95
   23 |  9993    67     X   223    82     -   115  9641     -     X |  288   5.34
   24 |  2940    86   178   209   160     -   167  2535     -   105 |  281   2.08
   25 |  2267   166   253   249   177  1683   120  1511     -   119 |  282   1.26
   26 |  1156   154    96    84   105  1210    44   872     -    30 |  288   0.50
   27 |  7644    54   219   154    71 10711    86  6874     -    48 |  280   3.44
   28 |  3996    51   112   102   111   943   125  4331     -    47 |  288   0.62
   29 |  1440    82   325   115   132   597    67   890     -    87 |  288   0.91
   30 |  2497    83    42    86    93  1579    60  1917     -    57 |  288   1.36
   31 |  8119   228    56   235   162  9256    48  8070     -    72 |  288   4.01
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    42     -     X     -     -     X     -     -    39 |  286   0.12
 ALGO |     -    37    99   186    56     -    48     -     -    39 |  288   0.06
 AMC2 |     -    40     -     -     -     -    49     -     -    22 |  288   0.06
 AOML |     -    56     -     -     -     -     -     -     -    52 |  286  24.63
 AREQ |     -    42     -    90     -     -     -     -     -    26 |  288  18.87
 AUCK |     -    83     -    48    52     -     -     -     -    37 |  288  16.93
 BAHR |     -    33    33    58    32     -     -     -     -    41 |  288   0.41
 BILI |     -    41     -     -    40     -     -     -     -     - |  287  11.90
 BOR1 |     -    38     -     -     -     -     -     -     -    35 |  286   2.20
 BRUS |     -    25     -     -     -     -    33     -     -    33 |  288   0.05
 CAS1 |     -    98     -    57    55     -   148     -     -   233 |  288   8.17
 CRO1 |     -    73     -   130     -     -   139     -     -   201 |  288   0.24
 DAEJ |     -    26     -     -     -     -     -     -     -    24 |  285   1.43
 DAV1 |     -    86     -     -    53     -     -     -     -    88 |  287  23.84
 DRAO |     -    27    88     -     -     -     -     -     -    30 |  288   0.11
 FORT |     -     X     -    74     -     -     -     -     -    40 |  288   0.26
 GALA |     -   195     -     -    75     -     -     -     -   242 |  288  18.26
 GODE |     -    58     -   188     -     -     -     -     -    68 |  288   0.09
 GUAM |     -    55     -    62    35     -    50     -     -    35 |  288  22.23
 HOB2 |     -    68    53    42    54     -     -     -     -    37 |  283   0.09
 HRAO |     -    56     -     -     -     -    45     -     -    60 |  288  23.59
 IISC |     -     -     -    35     -     -     -     -     -    19 |  286  19.69
 KERG |     -    51     -     -     -     -    61     -     -    74 |  286   1.41
 KIRU |     -   116     -   200     -     -     -     -     -     - |  285   4.04
 KOKB |     -     -     -   189   165     -   149     -     -     X |  285   2.25
 KOUR |     -    45     -    82     -     -     -     -     -    45 |  288  22.93
 KUNM |     -    38     -     -     -     -     -     -     -    35 |  268  34.26
 LPGS |     -     -     -   284   216     -   184     -     -   152 |  263 178.01
 MALI |     -     -     -    51     -     -     -     -     -    27 |  288 297.20
 MAS1 |     -    58    20    59    61     -     -     -     -    35 |  288   3.08
 MATE |     -    46    54     -     -     -    41     -     -    43 |  287   0.13
 MAW1 |     -   101     -     -     -     -     -     -     -    94 |  269  31.80
 MCM4 |     -    72     -     X    70     -     -     -     -     X |  264    >>>
 MDO1 |     -    41    94     -     -     -     -     -     -    52 |  284 185.71
 MEDI |     -    24     -     -     -     -     -     -     -    23 |  286   0.16
 METS |     -    28     -     -     -     -     -     -     -    26 |  285   0.19
 MKEA |     -     -   102   133     -     -     -     -     -    56 |  286  31.84
 NLIB |     -    79     -     -     -     -     -     -     -    74 |  284  13.89
 NPLD |     -    31     -     -     -     -     -     -     -    28 |  285   0.06
 NRC2 |     -    56   133     -     -     -    48     -     -    42 |  288   0.10
 NTUS |     -    42     -     -     -     -     -     -     -    39 |  288   6.75
 NYA1 |     -    24     -     -    52     -    43     -     -    32 |  288   0.31
 OHIG |     -   195     -   144   123     -    71     -     -    35 |  288  14.66
 ONSA |     -    32    41    70     -     -     -     -     -    27 |  288   0.80
 PENC |     -    21     -     -     -     -     -     -     -    19 |  285   5.40
 PERT |     -    72     -    45     -     -     -     -     -    68 |  288  11.78
 PIE1 |     -    79     -   135     -     -     -     -     -    25 |  288   0.04
 POTS |     -    41     -    93     -     -     -     -     -    28 |  288  26.15
 REYK |     -    41     -     -     -     -     -     -     -    38 |  283  10.81
 RIOG |     -    92     -    94    65     -     -     -     -    47 |  288  11.56
 SANT |     -     X     -    65    42     -     -     -     -    57 |  282  18.82
 SEY1 |     -     -     -   101    49     -     -     -     -    55 |  288  46.44
 SFER |     -    41     -     -     -     -     -     -     -    38 |  213   0.70
 STJO |     -    50    46     -    56     -     -     -     -    71 |  288   2.63
 THTI |     -     -     -     -   156     -    60     -     -   159 |  287   4.89
 TLSE |     -    36     -     -     -     -     -     -     -    34 |  256   0.62
 TRO1 |     -    57     -     -    55     -     -     -     -     - |  288  22.89
 TROM |     -     -     -   235     -     -     -     -     -   127 |  278 138.63
 TSKB |     -    63    75    62     -     -     -     -     -    62 |  288   1.19
 USNO |     -    46     -    67     -     -    39     -     -    39 |  288   0.08
 USUD |     -    51     -    46     -     -     -     -     -    41 |  288   0.20
 VILL |     -    28     -    58     -     -     -     -     -    20 |  288  17.89
 WHIT |     -    29     -     -    28     -     -     -     -     - |  288  27.58
 WSRT |     -    45     -     -     -     -    37     -     -    34 |  288   0.05
 WTZR |     -     -     -    93     -     -    96     -     -    62 |  206 199.94
 WUHN |     -    48     -    38    53     -     -     -     -    39 |  287  22.43
 YELL |     -   118   155   195   165     -   159     -     -   205 |  288   0.08
 ZWEN |     -     -     -   273    72     -     -     -     -    87 |  277  14.03
 -----+-------------------------------------------------------------+--------------
 TOT  |  6847    92   120   140    95  4570    95  4611     -    87 |


 BEST CLOCK FIT: PIE1   288   0.04 (ns) 

