
 GPS week: 1126   Day: 5   MJD: 52131                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2654     25     1.09    -2.79     4.27     0.00
 cod |   288     0  22042     40    -1.14    -0.79     0.08    24.97
 emr |    96     0   3721    220  1023.29     2.31     0.14     9.61
 esa |   288     1  17102    716 -1320.86     7.52     0.12    14.05
 gfz |   288     0  14272      9     1.35    -0.67     0.08    23.65
 igu |    96     0   2389      0  2512.97-10458.48     2.55     0.00
 ngs |    96     0   2654     29     1.11    -2.64     4.08     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  22767    650   354.02     3.25     0.07    27.72

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 |  5577    22  -192   -15    48  5789  4523     -   -31 |
    2 | -4265     1   -99   374  -102 -3390 -4100     -   -91 |
    3 |  1673    91  -176    33   146 -4030   953     -  -202 |
    4 |  -849    78   -32   204   -18   681 -1013     -  -133 |
    5 | -3891   239   124  -126    29 -5712 -3396     -  -191 |
    6 |  9155   242   -60   -38   100 14203  8153     -  -277 |
    7 |  2390   117    36   113  -188 -5235  2172     -    -7 |
    8 |  5379   -94   -59   327  -109   931  5124     -    18 |
    9 | -1292   205  -111    63    86   961 -1173     -  -277 |
   10 | -5891    47   -66  -163   -89 -3550 -5487     -   124 |
   11 |  7096   -95   -11   203   -62   -83  6828     -    35 |
   13 |  5173    63   -22   195  -169 -1928  5396     -    -8 |
   14 |  7015   186  -174  -133    26 -1139  6896     -  -106 |
   17 |  4912   161  -270   187   124  4081  4702     -  -289 |
   18 |  5735    89     X   -37    40 -1377  5567     -   -95 |
   19 |-26098    -9     -     X   113     --26978     -   -70 |
   20 |  8525   -80    35   -17     7 -3393  8046     -    71 |
   21 |  -408   271  -166  -186   165     -  -735     -  -271 |
   22 |-30957   -59   -85   358     2     --28402     -  -126 |
   23 | -2922   201     X  -408   -14 -4725 -2833     -     X |
   24 | -3176   181    40  -119   -99 -6155 -2500     -   -27 |
   25 | -5591    88   -34   -36   227 -7571 -5585     -  -251 |
   26 |   271   225   -48   161    54  -172   123     -  -324 |
   27 |  4165  -147   -38   297   -17 16539  3266     -     2 |
   28 |  5913   -44    70   207  -195  2667  5947     -    93 |
   29 |   762    95  -269     7   235 -1548   661     -  -261 |
   30 |  1787   212    37   -44   151  2306  1784     -  -302 |
   31 | -3718    62  -106     X     1  1822 -2875     -   -44 |
 -----+-------------------------------------------------------+
 ALBH |     -  -294     -    64     -     -     -     -   234 |
 ALGO |     -  -167   210   135  -154     -     -     -   187 |
 AMC2 |     -  -115     -     -     -     -     -     -   104 |
 AOML |     -  -182     -     -     -     -     -     -   164 |
 AREQ |     -   -56     -  -240     -     -     -     -   172 |
 BAHR |     -    81  -131    93   -89     -     -     -   -29 |
 BJFS |     -   -24     -     -    26     -     -     -     - |
 BOR1 |     -    11     -     -     -     -     -     -   -10 |
 BRUS |     -    15     -     -     -     -     -     -   -14 |
 CAS1 |     -    56     -    83   -88     -     -     -   -17 |
 CRO1 |     -  -158     -     -     -     -     -     -   142 |
 DRAO |     -   -54   136     -     -     -     -     -    33 |
 EISL |     -   -42     -  -254     -     -     -     -   162 |
 FORT |     -    98     -   293     -     -     -     -  -217 |
 GALA |     -    81     -  -282   -11     -     -     -    79 |
 GODE |     -   -69     -  -173     -     -     -     -   139 |
 GUAM |     -   -51     -   188  -108     -     -     -    42 |
 HRAO |     -   -20     -     -     -     -     -     -    18 |
 IISC |     -   136     -  -166     -     -     -     -   -40 |
 KERG |     -   248     -     -  -186     -     -     -   -64 |
 KIRU |     -   145     -  -257     -     -     -     -     - |
 KOKB |     -     -     -    19   -11     -     -     -     X |
 KOSG |     -   -93     -   -44     -     -     -     -   107 |
 LPGS |     -     -     -  -363   139     -     -     -    59 |
 MALI |     -     -     -   -88     -     -     -     -    45 |
 MAS1 |     -   -70   240   -28    16     -     -     -    35 |
 MATE |     -  -127    15     -     -     -     -     -   113 |
 MAW1 |     -     2     -     -     -     -     -     -    -2 |
 MCM4 |     -   113     -    41    50     -     -     -  -212 |
 MDO1 |     -  -139   266     -     -     -     -     -    96 |
 METS |     -   -12     -     -     -     -     -     -    11 |
 MKEA |     -   -44   124  -194     -     -     -     -   123 |
 NRC2 |     -  -141   209     -     -     -     -     -   101 |
 NTUS |     -   -73     -     -     -     -     -     -    66 |
 NYA1 |     -   -77     -     -   -48     -     -     -   110 |
 OHIG |     -   -41     -   264   -67     -     -     -   -40 |
 ONSA |     -   -49   149   -37   -42     -     -     -    82 |
 PERT |     -   -15     -    69     -     -     -     -   -21 |
 PIE1 |     -  -109     -   131     -     -     -     -    33 |
 POTS |     -   -32     -  -122     -     -     -     -    91 |
 REYK |     -     2     -     -     -     -     -     -    -1 |
 SANT |     -   142     -    10    57     -     -     -  -106 |
 SFER |     -  -613     -     -     -     -     -     -   552 |
 STJO |     -  -144   203     -    31     -     -     -    81 |
 THTI |     -     -     -     -  -153     -     -     -   131 |
 TRO1 |     -   -57     -     -    60     -     -     -     - |
 TROM |     -     -     -   -55     -     -     -     -    28 |
 TSKB |     -   -64   -95    32  -122     -     -     -   156 |
 USNO |     -   -55     -  -260     -     -     -     -   177 |
 USUD |     -  -162     -   146     -     -     -     -    60 |
 VILL |     -    13     -   -35     -     -     -     -     6 |
 WSRT |     -   -21     -     -     -     -     -     -    19 |
 WTZR |     -   -33     -   -74     -     -     -     -    67 |
 WUHN |     -    25     -  -198   213     -     -     -  -103 |
 YELL |     -   -80   270  -271     6     -     -     -   175 |
 YSSK |     -  -112     -     -   118     -     -     -     - |
 ZWEN |     -     -     -     -   -67     -     -     -    57 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  7128   122   215    92    32  2804  5674     -    71 |  288   3.54
    2 |  2517    89    89   196   165  2413  2709     -   174 |  288   2.16
    3 |  4162    81   108    96    46  3107  4228     -    42 |  288   3.30
    4 |   909   176   188   252   121   685   904     -   134 |  282   0.71
    5 |  4634   103    74    92   146  2436  4201     -    74 |  288   2.15
    6 |  6977    78    66   124    70  4657  7129     -   137 |  288   5.44
    7 |  2259    54   111   114    32  3136  2263     -    92 |  288   1.67
    8 |  5674    75   207    73   105  2949  5654     -    78 |  288   3.35
    9 |  3176    88   153    80    98  1884  3299     -    41 |  288   1.62
   10 |  4660    52   110    74    68  2014  4628     -    37 |  288   2.55
   11 |  1101    76   280   223   109   498  1179     -    57 |  288   0.38
   13 |  2619    94   131   121    99   487  2505     -    56 |  288   0.34
   14 |   861    74   191    45    61   588   845     -    61 |  288   0.27
   17 |  4147   185   258   208   111  1098  3848     -   108 |  277   3.36
   18 |  1070    88     X    66    89   565  1168     -    56 |  288   0.46
   19 |  4804   163     -     X    57     -  3746     -   141 |  225    >>>
   20 |   866    46   225    90    69  1543   962     -    37 |  288   0.32
   21 |  5218    64   244   106    63     -  5369     -    54 |  288   2.44
   22 | 10082    58   126   234   116     - 10232     -    98 |  285   3.02
   23 |  5076    91     X   197    93  2738  4982     -     X |  285   5.68
   24 |  4470    95   129   206   112  4238  3694     -   109 |  283   2.76
   25 |  2305    73    87    97    46  3510  2856     -    36 |  288   1.08
   26 |   916    54   226   202    32   519   935     -    76 |  288   0.65
   27 |  5646    79    77    73    64  4825  4873     -    55 |  288   3.92
   28 |  2202    95   102    86    80  2746  2015     -    81 |  288   0.34
   29 |  1054    59   251    61    78   540  1041     -    51 |  288   0.49
   30 |  2008    59    42   169    63  1361  1940     -    82 |  288   1.07
   31 |  6048    75    59     X    60  3262  5485     -    32 |  288   3.10
 -----+-------------------------------------------------------+--------------
 ALBH |     -    41     -    39     -     -     -     -    27 |  288   0.06
 ALGO |     -    53    97    83    54     -     -     -    58 |  288   0.13
 AMC2 |     -    63     -     -     -     -     -     -    57 |  286   0.06
 AOML |     -    34     -     -     -     -     -     -    30 |  286  21.37
 AREQ |     -    38     -    67     -     -     -     -    57 |  288  19.19
 BAHR |     -    43    40    46    31     -     -     -    38 |  288   0.22
 BJFS |     -    62     -     -    66     -     -     -     - |  287   1.08
 BOR1 |     -    30     -     -     -     -     -     -    27 |  285   1.78
 BRUS |     -    21     -     -     -     -     -     -    19 |  286   0.04
 CAS1 |     -    30     -    93    36     -     -     -    25 |  288   7.94
 CRO1 |     -    40     -     -     -     -     -     -    36 |  248   0.26
 DRAO |     -    44    77     -     -     -     -     -    40 |  288   0.08
 EISL |     -   178     -   149     -     -     -     -   136 |  285  22.91
 FORT |     -   109     -    93     -     -     -     -    75 |  287   0.26
 GALA |     -    43     -    55    36     -     -     -    66 |  288  19.50
 GODE |     -   113     -   259     -     -     -     -    67 |  287  69.48
 GUAM |     -    70     -    69    42     -     -     -    50 |  288  21.46
 HRAO |     -    73     -     -     -     -     -     -    66 |  284  24.23
 IISC |     -    83     -   167     -     -     -     -    76 |  286  21.83
 KERG |     -    64     -     -    70     -     -     -    26 |  287   1.83
 KIRU |     -    42     -    75     -     -     -     -     - |  280   3.02
 KOKB |     -     -     -   128    76     -     -     -     X |  228   2.07
 KOSG |     -    27     -    39     -     -     -     -    22 |  288  76.55
 LPGS |     -     -     -   235   181     -     -     -   179 |  199 142.78
 MALI |     -     -     -    62     -     -     -     -    31 |  278 321.24
 MAS1 |     -    54    74   111    53     -     -     -    26 |  288   1.75
 MATE |     -    44    51     -     -     -     -     -    35 |  287   0.13
 MAW1 |     -    97     -     -     -     -     -     -    87 |  250  27.60
 MCM4 |     -   106     -   172   125     -     -     -   141 |  269    >>>
 MDO1 |     -    55   143     -     -     -     -     -    50 |  286 167.67
 METS |     -    18     -     -     -     -     -     -    16 |  285   0.21
 MKEA |     -    44   152    46     -     -     -     -    31 |  288  38.63
 NRC2 |     -    64   101     -     -     -     -     -    55 |  283   0.08
 NTUS |     -    29     -     -     -     -     -     -    26 |  287   8.30
 NYA1 |     -    54     -     -    59     -     -     -    49 |  287   0.53
 OHIG |     -   110     -   110    45     -     -     -   118 |  288  15.77
 ONSA |     -    16    34    46    25     -     -     -    15 |  288   1.77
 PERT |     -    28     -    31     -     -     -     -    25 |  288  17.81
 PIE1 |     -    45     -    38     -     -     -     -    40 |  288   0.04
 POTS |     -    59     -    50     -     -     -     -    41 |  277  20.07
 REYK |     -    30     -     -     -     -     -     -    27 |  283  12.27
 SANT |     -   247     -   195   178     -     -     -   154 |  276  19.34
 SFER |     -    30     -     -     -     -     -     -    27 |  210   0.97
 STJO |     -    46    58     -    62     -     -     -    55 |  288   4.54
 THTI |     -     -     -     -    55     -     -     -    47 |  287   4.01
 TRO1 |     -    32     -     -    34     -     -     -     - |  288  14.78
 TROM |     -     -     -    83     -     -     -     -    42 |  276  16.31
 TSKB |     -   103    63    65    43     -     -     -    46 |  288   0.80
 USNO |     -    78     -    57     -     -     -     -    52 |  288   0.11
 USUD |     -    58     -    52     -     -     -     -    43 |  288   0.77
 VILL |     -    33     -    62     -     -     -     -    30 |  288  17.20
 WSRT |     -    34     -     -     -     -     -     -    30 |  288   0.04
 WTZR |     -    27     -    46     -     -     -     -    19 |  288   0.13
 WUHN |     -    40     -    56    53     -     -     -    76 |  287  22.86
 YELL |     -    85    98   134    57     -     -     -    60 |  288   0.07
 YSSK |     -    46     -     -    48     -     -     -     - |  287  15.03
 ZWEN |     -     -     -     -    20     -     -     -    17 |  277  15.06
 -----+-------------------------------------------------------+--------------
 TOT  |  4274    77   144   121    81  2550  4078     -    69 |


 BEST CLOCK FIT: BRUS   286   0.04 (ns) 

