
 GPS week: 1125   Day: 5   MJD: 52124                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2774     96     0.06    -0.21     5.32     0.00
 cod |   288     0  21565     12    -2.88    14.11     0.12    14.16
 emr |    96     0   3915    192   964.66     6.12     0.09    19.86
 esa |   288     0  17975    787   963.36     5.95     0.12    13.77
 gfz |   288     0  14929    271     0.76    -0.83     0.11    15.35
 igu |    96     0   2490      0    11.33    -9.38     3.51     0.00
 jpl |   281     0   9173    279    14.00    -1.55     0.09    21.18
 ngs |    96     0   2774     90     2.92    -3.77     5.33     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  24303    969   293.57     6.48     0.11    15.68

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |  1091   115    17  -206   157  1690    57   697     -  -118 |
    2 | -1715    96  -116   166    34 -5290   -24 -1918     -  -201 |
    3 |   214    24   -65   104    39 -1031   111   482     -  -207 |
    4 | -2176    73   -90   107   141-12715  -120 -2359     -  -189 |
    5 |   733    36  -139   134  -103  2039   252   255     -  -142 |
    6 |  1186   166  -148   -76   190  4776   -85   454     -  -150 |
    7 |  -697    49     X    42   -33 -4661   -73 -1311     -     X |
    8 |  4997   -40    41    84    41 -2434   -43  3719     -   -67 |
    9 | -3122    44   -97   189    84  -185    64 -2840     -  -290 |
   10 |  5585    48  -177    58  -217  9671   366  4753     -   -44 |
   11 |  4218   -33   109   -47    69 -1866    47  4175     -   -74 |
   13 |  3639    35   157    61    43  -424   -68  3496     -  -149 |
   14 |  5148   -38    61    10    54  -832   103  5265     -  -115 |
   15 | -1459   144   -60     -   -95     -   152 -1678     -   -98 |
   17 | -6452   284   -92  -122    -6 18724   163 -6162     -  -215 |
   18 |   491    -5    12   137   -73 -1578   118   578     -  -133 |
   19 |-13951   188     1   275     X   307  -194-11638     -  -291 |
   20 |  3425  -143    13    76    81 -3090    56  3505     -   -55 |
   21 | -1491   214  -146     X   -18 -2178   304 -1253     -  -321 |
   22 |     X    89   -67   285  -203     -   221 35219     -  -272 |
   23 |  1604   150     X     5  -207     -    94  1490     -     X |
   24 | -3787   154  -143    78  -140  2397     4 -3632     -   -10 |
   25 |  7898    -7   -61    37   132  5427    38  6866     -  -152 |
   26 | -3805   138   -33    86   120 -5262    20 -3653     -  -313 |
   27 |  1238   -40    37   171   190 -3802  -195   269     -  -187 |
   28 |  -984    78   125  -134   -63  -831    88  -367     -     X |
   29 | -2452  -118  -146   168   133 -5308   155 -2117     -  -218 |
   30 | -1196    61   -30   105   102   236  -151 -1048     -  -125 |
   31 |  1478    -3    -5   125   -20  6393   -26  1517     -   -68 |
 -----+-------------------------------------------------------------+
 ALBH |     -   -60     -  -288     -     -     X     -     -   306 |
 ALGO |     -    12   141     X  -102     -   -44     -     -    87 |
 AMC2 |     -   -22     -     -     -     -  -200     -     -   284 |
 ANKR |     -   -23     -    24     -     -     -     -     -     - |
 AOML |     -  -234     -     -     -     -     -     -     -   211 |
 AUCK |     -     -     -   -10     -     -     -     -     -     9 |
 BAHR |     -     -    72     0   -40     -     -     -     -     8 |
 BOR1 |     -    64     -     -     -     -     -     -     -   -57 |
 CAS1 |     -     1     -     8  -119     -    96     -     -   -16 |
 CRO1 |     -   -50     -   -92     -     -   -67     -     -   214 |
 DAEJ |     - -1078     -     -     -     -     -     -     -   974 |
 DRAO |     -   -79     3     -     -     -     -     -     -    70 |
 EISL |     -     -     -  -207     -     -     -     -     -   182 |
 GALA |     -     -     -  -182   163     -     -     -     -     - |
 GUAM |     -   -40     -   186   -79     -   -87     -     -    63 |
 HOB2 |     -    57     -  -506   157     -     -     -     -   239 |
 HRAO |     -   401     -     -     -     -  -153     -     -  -161 |
 IISC |     -     -     -   -79     -     -     -     -     -    70 |
 KERG |     -   262     -     -   -85     -     -     -     -  -153 |
 KIRU |     -   157     -  -161     -     -     -     -     -     - |
 KOKB |     -     -     -  -249    23     -    26     -     -   218 |
 KOSG |     -   -39     -   -97     -     -     -     -     -   121 |
 KUNM |     -   161     -     -     -     -     -     -     -  -145 |
 LPGS |     -     -     -     X   -82     -     3     -     -    71 |
 MAC1 |     -   -75     -   228  -162     -     -     -     -    26 |
 MALI |     -     -     -   -26     -     -     -     -     -    23 |
 MAS1 |     -    14   244  -113  -116     -     -     -     -    97 |
 MATE |     -  -117   136     -     -     -     -     -     -    48 |
 MAW1 |     -   100     -     -     -     -     -     -     -   -90 |
 MCM4 |     -    78     -    22    71     -     -     -     -  -173 |
 MDO1 |     -  -162    14     -     -     -     -     -     -   141 |
 MEDI |     -    -9     -     -     -     -     -     -     -     8 |
 METS |     -    39     -     -     -     -     -     -     -   -35 |
 MKEA |     -     -   -19  -189     -     -     -     -     -   174 |
 NLIB |     -   -18    40     -     -     -     -     -     -    -1 |
 NRC2 |     -  -123   109     -     -     -  -152     -     -   267 |
 NTUS |     -    14     -     -   -49     -     -     -     -    35 |
 NYA1 |     -     7     -     -   -41     -     6     -     -    25 |
 OHIG |     -  -184     -   355  -215     -    49     -     -    -3 |
 ONSA |     -   -25     -   -10    55     -     -     -     -   -22 |
 PERT |     -   -46     -   112     -     -     -     -     -   -57 |
 PIE1 |     -   -58     -  -173     -     -     -     -     -   204 |
 PIMO |     -     -     -   632     -     -     -     -     -  -555 |
 POTS |     -    28     -   -71     -     -     -     -     -    37 |
 REYK |     -    50     -     -     -     -     -     -     -   -45 |
 SANT |     -     -     -   -58     -     -     -     -     -    51 |
 SEY1 |     -  -453     -   -42   126     -   198     -     -   -15 |
 SFER |     -  -135     -     -     -     -     -     -     -   121 |
 STJO |     -  -109    22     -  -128     -     -     -     -   216 |
 THTI |     -     -     -     -    74     -     -     -     -   -73 |
 TRO1 |     -   -56     -     -    52     -     -     -     -     - |
 TROM |     -     -     -    68     -     -     -     -     -   -59 |
 TSKB |     -     9    72    36     -     -     -     -     -   -70 |
 URUM |     -     -     -     -  -128     -     -     -     -   125 |
 USNO |     -    -5     -  -348     -     -   -16     -     -   332 |
 USUD |     -  -124     -   -19     -     -     -     -     -   128 |
 WHIT |     -   -20     -     -    18     -     -     -     -     - |
 WSRT |     -    38     -     -     -     -   -66     -     -    52 |
 WTZR |     -    -3     -   -56     -     -    27     -     -    17 |
 WUHN |     -   -19     -    70    43     -   -41     -     -   -33 |
 YAR2 |     -     -     -     -     -     -   -77     -     -   104 |
 YELL |     -    57   180  -417   138     -  -174     -     -   333 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  6300   131    79   145    60  5005    97  5875     -    65 |  288   2.28
    2 |  2020   212    37   189   124  3194   106  2477     -   146 |  288   2.47
    3 |  3367   142    91   102    72  1510    50  3247     -   139 |  288   1.69
    4 |  2339    92    76   216   172  6192    94  2441     -   146 |  283   0.80
    5 |  4815   163    85   192    31  3409    60  5058     -    51 |  288   2.92
    6 | 12257    71    59   141   207  2865    74 12575     -    71 |  288   6.62
    7 |  6573    95     X   135    79  5272    30  6746     -     X |  288   1.17
    8 |  3447   109   240    89   177  2737    57  3591     -   265 |  288   2.43
    9 |  5252   100    50   278    71  2047    61  5195     -    80 |  288   2.12
   10 |  4829    60    47    61    87  6465    56  3975     -    42 |  288   2.10
   11 |  1092    95   119    83   141  1653   189   987     -    76 |  288   0.42
   13 |  1508    89    72    73   103  1175   111  1488     -   120 |  288   0.43
   14 |  1103   147    78   136    67   823    53  1116     -    61 |  288   0.25
   15 |  9018   203    78     -    91     -    63  8904     -   118 |  276   3.57
   17 |  3127    75   131   216   160  3986    88  3281     -    95 |  284   3.74
   18 |  2076    94   210    77    92  1507   165  2152     -    59 |  288   0.44
   19 | 13422   143    82   154     X  4258    72 13456     -   138 |  287   2.06
   20 |  1033    96    93    90    84  2026   102  1030     -    72 |  288   0.19
   21 |  2757   246   130     X   238  2627    94  2435     -    92 |  288   2.29
   22 |     X   111   128   205   183     -    80  3344     -    87 |  287   6.67
   23 |  6983   160     X   212    60     -    87  7017     -     X |  288   6.54
   24 |  3658    62    58   126    76  3120    53  3633     -   130 |  281   2.03
   25 |  4122   124    87    51    49  3385    59  4364     -    76 |  288   1.91
   26 |   851   204    64    82   104  2675    59   812     -    54 |  288   0.50
   27 |  8114    70   136    82   173  5457    62  8133     -   180 |  288   6.21
   28 |  3197    80    76    64    48   974    53  3187     -     X |  288   0.70
   29 |  1351   169    42    51    84  2414    58  1493     -    63 |  288   0.68
   30 |  2148   112    81    89   206  1685    58  2031     -    63 |  288   1.50
   31 |  3438   171    90   228    68  5254   131  3300     -   110 |  288   2.26
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    43     -    38     -     -     X     -     -    34 |  286   0.08
 ALGO |     -    43    41     X    44     -    36     -     -    37 |  288   0.03
 AMC2 |     -    67     -     -     -     -    38     -     -    34 |  288   0.02
 ANKR |     -    42     -    43     -     -     -     -     -     - |  287  54.74
 AOML |     -    37     -     -     -     -     -     -     -    34 |  285  23.01
 AUCK |     -     -     -    54     -     -     -     -     -    48 |  288  21.21
 BAHR |     -     -    71    64    55     -     -     -     -    44 |  288   0.29
 BOR1 |     -    58     -     -     -     -     -     -     -    52 |  286   2.65
 CAS1 |     -    59     -    90    31     -    89     -     -    76 |  288  10.39
 CRO1 |     -   101     -    35     -     -    58     -     -    32 |  288   0.29
 DAEJ |     -    49     -     -     -     -     -     -     -    44 |  287   2.42
 DRAO |     -    30    26     -     -     -     -     -     -    34 |  288   0.05
 EISL |     -     -     -   115     -     -     -     -     -   101 |  286  27.40
 GALA |     -     -     -    77    69     -     -     -     -     - |  197  11.99
 GUAM |     -    42     -    45    53     -    96     -     -   172 |  288  21.71
 HOB2 |     -    90     -    79    50     -     -     -     -    39 |  288   0.14
 HRAO |     -   171     -     -     -     -    63     -     -    84 |  288  23.28
 IISC |     -     -     -   149     -     -     -     -     -   130 |  281  21.09
 KERG |     -    95     -     -    38     -     -     -     -    55 |  287   0.81
 KIRU |     -    55     -    57     -     -     -     -     -     - |  288   1.76
 KOKB |     -     -     -   157   189     -   214     -     -   256 |  287   0.74
 KOSG |     -    53     -    61     -     -     -     -     -    28 |  288  59.95
 KUNM |     -    64     -     -     -     -     -     -     -    58 |  286  56.56
 LPGS |     -     -     -     X   263     -   145     -     -   210 |  222    >>>
 MAC1 |     -    69     -    97    33     -     -     -     -    25 |  288  20.32
 MALI |     -     -     -   121     -     -     -     -     -   107 |  288  68.42
 MAS1 |     -    32    53    50    53     -     -     -     -    38 |  288   2.83
 MATE |     -    36    42     -     -     -     -     -     -    39 |  287   0.15
 MAW1 |     -    95     -     -     -     -     -     -     -    85 |  286  14.56
 MCM4 |     -   231     -   246   140     -     -     -     -   293 |  271    >>>
 MDO1 |     -    72    53     -     -     -     -     -     -    51 |  286   9.56
 MEDI |     -    65     -     -     -     -     -     -     -    59 |  285   0.64
 METS |     -    58     -     -     -     -     -     -     -    52 |  285   0.35
 MKEA |     -     -    46    52     -     -     -     -     -    39 |  286  30.38
 NLIB |     -   119    89     -     -     -     -     -     -    75 |  280   0.08
 NRC2 |     -    55    40     -     -     -    36     -     -    39 |  288   0.09
 NTUS |     -    71     -     -    30     -     -     -     -    67 |  288   6.65
 NYA1 |     -    29     -     -    57     -   101     -     -   179 |  284   0.10
 OHIG |     -    41     -    57   198     -    50     -     -   154 |  288  12.93
 ONSA |     -    47     -    62    26     -     -     -     -    25 |  288   1.36
 PERT |     -    36     -    50     -     -     -     -     -    50 |  288  14.88
 PIE1 |     -    77     -   111     -     -     -     -     -    34 |  288   0.05
 PIMO |     -     -     -    78     -     -     -     -     -    69 |  130  22.85
 POTS |     -    49     -    75     -     -     -     -     -    55 |  277  18.97
 REYK |     -    53     -     -     -     -     -     -     -    47 |  284  10.50
 SANT |     -     -     -   150     -     -     -     -     -   132 |  280  16.51
 SEY1 |     -   425     -    86    56     -   111     -     -   122 |  288  33.67
 SFER |     -   347     -     -     -     -     -     -     -   313 |  285  50.06
 STJO |     -    55    54     -    53     -     -     -     -    71 |  288   2.62
 THTI |     -     -     -     -    93     -     -     -     -    91 |  287   2.07
 TRO1 |     -    57     -     -    52     -     -     -     -     - |  288  14.01
 TROM |     -     -     -    21     -     -     -     -     -    19 |  286  16.97
 TSKB |     -    95    85   129     -     -     -     -     -   172 |  288   1.20
 URUM |     -     -     -     -    46     -     -     -     -    45 |  288    >>>
 USNO |     -    43     -    37     -     -    37     -     -    30 |  288   0.05
 USUD |     -   123     -   111     -     -     -     -     -   203 |  288   0.23
 WHIT |     -    22     -     -    20     -     -     -     -     - |  288  49.47
 WSRT |     -    49     -     -     -     -    45     -     -    38 |  288   0.05
 WTZR |     -    51     -    57     -     -    54     -     -    26 |  288   0.09
 WUHN |     -    61     -    45    70     -    58     -     -   146 |  287  16.40
 YAR2 |     -     -     -     -     -     -    25     -     -    34 |  266   3.48
 YELL |     -    40    51    61    46     -    38     -     -   116 |  288   0.11
 -----+-------------------------------------------------------------+--------------
 TOT  |  5324   117    92   119   110  3511    86  5326     -   107 |


 BEST CLOCK FIT: AMC2   288   0.02 (ns) 

