
 GPS week: 1125   Day: 4   MJD: 52123                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2773     96     0.04    -0.28     4.48     0.00
 cod |   288     0  22233     10    10.60    -9.27     0.09    17.36
 emr |    96     0   3910     98   953.21     9.95     0.10    16.32
 esa |   288     0  17778    374   201.86    -0.68     0.11    14.10
 gfz |   288     0  14699     22     0.55    -0.57     0.10    15.70
 igu |    96     0   2201      0     7.82    -1.18     3.08     0.00
 jpl |   279     0   9382    125    -0.18     0.24     0.09    18.86
 ngs |    96     0   2773     96     1.52    -2.21     4.30     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  24275   1145   281.87    10.85     0.09    17.65

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |  1886   109   -44  -220    81  7254     X   944     -     9 |
    2 |   756   -10  -228   237    71 -2209   107  -281     -  -221 |
    3 | -1327    97  -103   -26   -45  5384   267 -1477     -  -156 |
    4 | -1812    46     X    59    -8  8072  -179 -1751     -     X |
    5 | -1999   201    -2  -213    28 -5315   232 -1825     -  -161 |
    6 | -5520   215   -30    16    19 -1635    -7 -4431     -  -222 |
    7 |   874    75  -193   -26   110 -8395   117   731     -  -159 |
    8 |  4190    11    61   -14     2 -2084    52  4184     -   -44 |
    9 |   776   158   -40   -50    93  5246    95    62     -  -228 |
   10 | -3777   -31   -38   -24  -110 -1284   335 -3566     -   -28 |
   11 |  5090  -186     0   -14   105  3135    89  4818     -    56 |
   13 |  4394   -30    29   113    55  -768   -65  4255     -   -90 |
   14 |  4411    81    20     7   -19 -2526     8  4715     -   -78 |
   15 | -4264   122    71     -  -189     -   278 -3540     -  -132 |
   17 | -4430   135   -55    26   -31 -4087   125 -4406     -  -172 |
   18 |  5598   -43    51   161  -124    -3    82  5565     -   -38 |
   19 |-22177  -109  -132   486    59     -  -266-19912     -  -171 |
   20 |  5527   -99   -36   -32   116 -2805    63  5470     -     1 |
   21 |  9079   140   -87    -8   -61     -   195  7140     -  -156 |
   22 |     X   145   -91   243  -130     -   181     X     -  -319 |
   23 |  6995   165   -62   150    34     -    12  6464     -  -298 |
   24 | -4771    67   -70    33   -63  5328    53 -4677     -   -40 |
   25 |  4251   109  -143   159    62  4045   -27  4314     -  -233 |
   26 | -1509    79   -23   212    73  -877    40 -1492     -  -322 |
   27 | -1004    20   -24   148    77 -4585  -117  -195     -  -133 |
   28 |  2527    13   173  -152   -14 -8946   120  2227     -     X |
   29 |  2376    18  -151    24   152     -    45  1928     -  -150 |
   30 | -2374   108   -25    57   126 -2065  -152 -2070     -  -170 |
   31 | -4204    53     2  -129    76  9424    80 -3588     -   -61 |
 -----+-------------------------------------------------------------+
 ALBH |     -   -66     -     -     -     -    61     -     -     X |
 ALGO |     -   -52   139  -173   -58     -   -73     -     -   271 |
 AMC2 |     -   -90     -     -     -     -  -258     -     -   356 |
 AUCK |     -   -92     -    92     -     -     -     -     -    17 |
 BAHR |     -   143    42   -99   -57     -     -     -     -   -24 |
 BJFS |     -   -29     -     -    32     -     -     -     -     - |
 BOR1 |     -   120     -     -     -     -     -     -     -  -118 |
 BRMU |     -   -56     -     -   -26     -     -     -     -    78 |
 CAS1 |     -   -18     -    51  -103     -   130     -     -   -67 |
 CRO1 |     -  -165     -     -     -     -     -     -     -   163 |
 DAV1 |     -    34     -     -   -72     -     -     -     -    31 |
 DRAO |     -   -58    79     -     -     -     -     -     -    33 |
 EISL |     -  -291     -    34     -     -     -     -     -   259 |
 FAIR |     -     -    73   -84     -     -     -     -     -     - |
 GALA |     -     -     -  -284   133     -     -     -     -   109 |
 GODE |     -   -76     -   -55     -     -     -     -     -   115 |
 GOLD |     -    -3     -     X     -     -  -184     -     -   200 |
 GUAM |     -   -34     -   140  -106     -   -24     -     -    40 |
 HOB2 |     -   -43     -  -291     -     -     -     -     -   275 |
 HRAO |     -   352     -     -     -     -  -127     -     -  -217 |
 IISC |     -     -     -  -109     -     -     -     -     -    87 |
 KERG |     -   129     -     -     -     -     -     -     -  -127 |
 KIRU |     -   214     -  -263     -     -     -     -     -     - |
 KOKB |     -     -     -   -51    60     -   -11     -     -     X |
 KOSG |     -     -     -   -26     -     -     -     -     -    21 |
 LPGS |     -     -     -  -255    29     -    37     -     -   110 |
 MAC1 |     -   -12     -   132  -194     -     -     -     -    80 |
 MALI |     -    -7     -    98     -     -     -     -     -   -71 |
 MAS1 |     -   -55     -  -120   134     -     -     -     -    30 |
 MATE |     -  -172   -37     -     -     -     -     -     -   180 |
 MAW1 |     -     5     -     -     -     -     -     -     -    -5 |
 MCM4 |     -     -     -   -91    -5     -     -     -     -    68 |
 MDO1 |     -  -213    51     -     -     -     -     -     -   194 |
 MEDI |     -   -10     -     -     -     -     -     -     -    10 |
 METS |     -   -27     -     -     -     -     -     -     -    27 |
 MKEA |     -     -   129   -88     -     -     -     -     -    30 |
 NLIB |     -  -183    22     -     -     -     -     -     -   170 |
 NRC2 |     -   -36   218     -     -     -  -168     -     -   141 |
 NTUS |     -    77     -     -     -     -     -     -     -   -75 |
 NYA1 |     -     8     -     -   -63     -    14     -     -    34 |
 OHIG |     -  -306     -   451  -195     -    46     -     -    62 |
 ONSA |     -     5     -    36  -114     -     -     -     -    68 |
 PERT |     -    67     -   -53     -     -     -     -     -   -23 |
 PIMO |     -     -     -   628     -     -     -     -     -  -502 |
 POTS |     -     -     -  -118     -     -     -     -     -    95 |
 REYK |     -   -64     -     -     -     -     -     -     -    63 |
 SANT |     -     -     -    28   -33     -     -     -     -     6 |
 SEY1 |     -  -509     -  -155   -89     -   168     -     -   479 |
 STJO |     -  -110   115     -    11     -     -     -     -    64 |
 THTI |     -     -     -     -   -40     -  -315     -     -   354 |
 TRO1 |     -   -63     -     -    70     -     -     -     -     - |
 TROM |     -     -     -     7     -     -     -     -     -    -6 |
 TSKB |     -     8   129   -95     -     -     -     -     -    29 |
 URUM |     -    -4     -     -     -     -     -     -     -     4 |
 USNO |     -   -89     -   -33     -     -   -62     -     -   177 |
 USUD |     -    36     -   -83     -     -     -     -     -    31 |
 VILL |     -    78     -   -97     -     -     -     -     -     - |
 WHIT |     -   -51     -     -    56     -     -     -     -     - |
 WSRT |     -    29     -     -     -     -  -106     -     -    80 |
 WTZR |     -   -48     -   -87     -     -     5     -     -   111 |
 WUHN |     -    45     -    24    63     -    68     -     -  -189 |
 YAR2 |     -     -     -     -     -     -    32     -     -   -35 |
 YELL |     -   -35   199  -180     -     -  -153     -     -   278 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  5414   128    56    98    79  2741     X  4867     -   112 |  288   3.02
    2 |  6604   148    80   211    79  3224    92  5478     -    76 |  288   3.13
    3 |  3853    80    86    77    49  2167    47  3660     -    63 |  288   1.78
    4 |  1330   123     X   112   106  3575    75  1413     -     X |  278   0.69
    5 |  3207    77    72   110    86  3021    52  3264     -    43 |  288   2.68
    6 |  9166    51    77    80    97  4405   114  7754     -    55 |  288   7.21
    7 |  1276    84    90    92    50  3037   110  1686     -   107 |  288   0.50
    8 |  5036   142    42    93    25  1633    67  5009     -    99 |  288   2.44
    9 |  6825    70    55   111    45  2921   120  6828     -    61 |  288   2.73
   10 |  2666    94   180    42    92  1284    42  2571     -    64 |  288   2.48
   11 |  2093   141   103    58    43  1023   103  1952     -   103 |  288   0.28
   13 |   951   112    87    62    76   587   130   791     -   149 |  288   0.38
   14 |   765   114    57    90   134  1671   102   740     -   118 |  288   0.24
   15 |  4068   218    68     -    75     -   103  4663     -   209 |  277   3.76
   17 |  1743   144   127    73   111  2099    49  1594     -   188 |  284   3.10
   18 |  1201    86    56    90    92   585    59  1123     -   170 |  288   0.40
   19 |  5902   114    82   148   299     -   104  5635     -   163 |  287   4.71
   20 |  2001    73   242    99    70  1357    43  2019     -   108 |  288   0.23
   21 |  6198    94   128    66   112     -    67  6979     -    72 |  288   3.81
   22 |     X    75    65    40   107     -    76     X     -    74 |  288   9.54
   23 |  6239    84    52   192   148     -    95  6243     -    85 |  288   5.15
   24 |  2821   144   118    81   243  3586    75  2982     -    79 |  282   2.38
   25 |  3710    62    45    74    71  3976    70  3645     -    96 |  288   1.37
   26 |   905   108   132   294    44   946    88   931     -   105 |  288   0.57
   27 |  8500   122    71   118    36  4580    81  7982     -   108 |  288   4.43
   28 |  4192    96   134    81    56  5335    59  4031     -     X |  288   0.72
   29 |  3216    85    40    47   164     -    92  3200     -    87 |  288   0.60
   30 |  2497    50    42    28    59  2082   106  2567     -    39 |  288   1.14
   31 |  5465    74   111   122    77  6327    49  5321     -    92 |  288   3.12
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    31     -     -     -     -    29     -     -     X |  275  14.97
 ALGO |     -    54    40    70    56     -    70     -     -    53 |  288   0.07
 AMC2 |     -    57     -     -     -     -    52     -     -    28 |  288   0.05
 AUCK |     -    78     -    53     -     -     -     -     -    45 |  288  21.42
 BAHR |     -    70    65    65    43     -     -     -     -    41 |  288   0.26
 BJFS |     -    55     -     -    61     -     -     -     -     - |  288   1.08
 BOR1 |     -    28     -     -     -     -     -     -     -    27 |  286   2.11
 BRMU |     -    25     -     -    22     -     -     -     -    34 |  288  27.20
 CAS1 |     -    61     -    31    33     -    80     -     -   138 |  288   8.86
 CRO1 |     -    25     -     -     -     -     -     -     -    25 |  285   0.27
 DAV1 |     -    76     -     -    33     -     -     -     -    90 |  288  26.60
 DRAO |     -    28    38     -     -     -     -     -     -    20 |  288   0.07
 EISL |     -    91     -    88     -     -     -     -     -    68 |  285  23.03
 FAIR |     -     -   209   242     -     -     -     -     -     - |   93   0.30
 GALA |     -     -     -   100    72     -     -     -     -    33 |  266  13.83
 GODE |     -    78     -   221     -     -     -     -     -    97 |  285   0.08
 GOLD |     -    33     -     X     -     -    32     -     -    42 |  276  20.45
 GUAM |     -    37     -    73    36     -    71     -     -   127 |  288  18.96
 HOB2 |     -   146     -   176     -     -     -     -     -    54 |  288   0.25
 HRAO |     -    96     -     -     -     -    47     -     -    56 |  288  23.29
 IISC |     -     -     -    30     -     -     -     -     -    24 |  282  21.85
 KERG |     -    95     -     -     -     -     -     -     -    94 |  287   1.42
 KIRU |     -    40     -    49     -     -     -     -     -     - |  288   2.61
 KOKB |     -     -     -   239   113     -   229     -     -     X |  286   0.71
 KOSG |     -     -     -    67     -     -     -     -     -    54 |  285 113.40
 LPGS |     -     -     -   193   280     -   186     -     -   196 |  232 104.88
 MAC1 |     -    83     -   124    63     -     -     -     -   204 |  288  17.04
 MALI |     -    81     -    56     -     -     -     -     -    93 |  288  29.42
 MAS1 |     -    68     -    48    81     -     -     -     -    33 |  288   3.03
 MATE |     -    19    38     -     -     -     -     -     -    20 |  287   0.17
 MAW1 |     -   106     -     -     -     -     -     -     -   105 |  286  17.83
 MCM4 |     -     -     -    61    48     -     -     -     -    72 |  272    >>>
 MDO1 |     -    21    24     -     -     -     -     -     -    22 |  286  10.68
 MEDI |     -    18     -     -     -     -     -     -     -    17 |  286   0.48
 METS |     -    24     -     -     -     -     -     -     -    24 |  283   0.55
 MKEA |     -     -    90    59     -     -     -     -     -    34 |  286  29.73
 NLIB |     -   182   119     -     -     -     -     -     -   141 |  279 415.39
 NRC2 |     -    72    51     -     -     -    89     -     -    54 |  287   0.64
 NTUS |     -    63     -     -     -     -     -     -     -    62 |  288   6.40
 NYA1 |     -    88     -     -    39     -    81     -     -    52 |  281   0.18
 OHIG |     -    34     -    67   214     -    41     -     -   142 |  288  11.61
 ONSA |     -    31     -    37    36     -     -     -     -    19 |  288   0.77
 PERT |     -    27     -    82     -     -     -     -     -    54 |  288  16.68
 PIMO |     -     -     -   250     -     -     -     -     -   200 |  164  23.99
 POTS |     -     -     -    52     -     -     -     -     -    41 |  240  21.09
 REYK |     -    19     -     -     -     -     -     -     -    19 |  286  15.20
 SANT |     -     -     -   127   134     -     -     -     -   196 |  285  15.60
 SEY1 |     -   350     -   121    66     -   107     -     -    96 |  288  39.42
 STJO |     -    27    42     -    40     -     -     -     -    41 |  288   1.94
 THTI |     -     -     -     -    53     -    50     -     -    65 |  287   2.24
 TRO1 |     -    23     -     -    25     -     -     -     -     - |  288  11.66
 TROM |     -     -     -    43     -     -     -     -     -    34 |  286  12.95
 TSKB |     -    58    92    59     -     -     -     -     -    53 |  288   0.74
 URUM |     -    74     -     -     -     -     -     -     -    73 |  288  17.14
 USNO |     -    21     -    47     -     -    48     -     -    16 |  288   0.04
 USUD |     -    37     -    47     -     -     -     -     -    52 |  288   0.24
 VILL |     -   116     -   143     -     -     -     -     -     - |  267    >>>
 WHIT |     -    22     -     -    25     -     -     -     -     - |  288  12.60
 WSRT |     -    40     -     -     -     -    45     -     -    25 |  288   0.07
 WTZR |     -    28     -    52     -     -    44     -     -    32 |  288   0.18
 WUHN |     -    51     -   112    49     -    86     -     -   109 |  287  18.02
 YAR2 |     -     -     -     -     -     -    26     -     -    28 |  269   2.15
 YELL |     -    59    63    72     -     -    69     -     -    57 |  288   0.08
 -----+-------------------------------------------------------------+--------------
 TOT  |  4480    92    95   110   100  3077    86  4304     -    91 |


 BEST CLOCK FIT: USNO   288   0.04 (ns) 

