
 GPS week: 1124   Day: 3   MJD: 52115                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2777      0    -0.04     0.03     5.77     0.00
 cod |   288     0  20393     12     1.18    -3.67     0.07    25.30
 emr |    96     0   3908     10   905.51     3.63     0.09    18.99
 esa |   288     0  16795    389   113.74    -5.23     0.10    17.00
 gfz |   288     0  15047     12     0.65    -0.75     0.09    19.15
 igu |    96     0   2389      1     0.04    -0.14     3.63     0.00
 jpl |     0     0      0      0     0.00     0.00     0.00     0.00
 ngs |    96     0   2777      0     0.00    -0.02     5.29     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  16024     16   225.23     4.48     0.09    19.56

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |  2476   -32   -71     5   -30 12119     -  1945     -    91 |
    2 | -1317   -67    20    66     0  8186     - -1059     -    23 |
    3 | -2660   110  -132   -69    39  1091     - -3006     -   -78 |
    4 | -1571   142   101     1   -89  1393     - -1429     -  -133 |
    5 |  4391   273   -20   -22   -81  6667     -  4359     -  -248 |
    6 |  -636   237  -185   -55    32  1139     -    71     -  -230 |
    7 | -3135    30    64    41  -150  6306     - -2891     -    52 |
    8 | -7224   -68    69   164  -114 -4799     - -7007     -    35 |
    9 |  -740   165   -93    71    79 -1659     -  -760     -  -322 |
   10 | -2409    64    20     2  -106  -749     - -1840     -    12 |
   11 |  6349  -119   141    -2     5 -2441     -  6018     -   106 |
   13 |  4517     2   153    88  -111 -1836     -  4309     -   -24 |
   14 |  4315    95    48  -131     2   236     -  4268     -   -27 |
   15 | -3353   118   -83     -    69     -     - -3745     -  -188 |
   17 | -2566   308  -118   -50    20     -     - -2595     -  -321 |
   18 |  6137    43   -64    97    42 -2338     -  6026     -  -159 |
   19 |-10857   -42    14   575   -78     -     - -8284     -  -380 |
   20 |  3958  -143    33    12     7 -3580     -  4015     -   154 |
   21 |  -832   131  -119   -75    -5 -6955     -  -182     -   -71 |
   22 |  7086    -9  -100  -130   173  3496     -  5798     -   -12 |
   23 |  5745     9  -283   356  -214     -     -  5007     -     - |
   24 | -4743   113    48  -104   -47  5723     - -4806     -   -27 |
   25 | -1672    43  -188     3   213 -6389     - -2981     -  -206 |
   26 | -4793   114    19   240    83 -1302     - -4510     -  -445 |
   27 | -1994  -145    81   197   -20-11770     - -1580     -     9 |
   28 |  2292   -24   184    53  -170  4299     -  2746     -    92 |
   29 |  4277   -43  -244   196   100 -5919     -  3924     -  -124 |
   30 |  1500   172  -210   170   115   899     -   696     -  -401 |
   31 | -2698   -39     0    -9    65 -1717     - -2671     -    -6 |
 -----+-------------------------------------------------------------+
 ALGO |     -     3    74  -133   -16     -     -     -     -   103 |
 ANKR |     -   -41     -    61     -     -     -     -     -     - |
 AREQ |     -    60     -  -100    10     -     -     -     -     - |
 AUCK |     -  -252     -  -169   562     -     -     -     -   -79 |
 BAHR |     -    -2   165   -61   -54     -     -     -     -    57 |
 BJFS |     -  -102     -     -   135     -     -     -     -     - |
 CAS1 |     -   -76     -    99   -88     -     -     -     -    98 |
 CRO1 |     -   -77     -   114     -     -     -     -     -     - |
 DAV1 |     -    29     -     -   -38     -     -     -     -     - |
 DRAO |     -   -36   -43     -     -     -     -     -     -    60 |
 EISL |     -  -135     -   201     -     -     -     -     -     - |
 FAIR |     -     -    46   -95     -     -     -     -     -    67 |
 GALA |     -   129     -  -162   -17     -     -     -     -     - |
 GUAM |     -   -24     -  -173     7     -     -     -     -   175 |
 HOB2 |     -   295     -  -821     -     -     -     -     -   321 |
 HRAO |     -  -184     -     -     -     -     -     -     -   238 |
 KARR |     -   -90     -     -   118     -     -     -     -     - |
 KERG |     -   -55     -     -     -     -     -     -     -    71 |
 KIRU |     -    74     -  -111     -     -     -     -     -     - |
 KOKB |     -     -     -   -20    24     -     -     -     -    -5 |
 KOSG |     -   -30     -    44     -     -     -     -     -     - |
 MALI |     -     7     -  -234     -     -     -     -     -   195 |
 MAS1 |     -   -32   221  -185    17     -     -     -     -   113 |
 MATE |     -  -159    73     -     -     -     -     -     -   182 |
 MCM4 |     -    -1     -   267  -265     -     -     -     -    32 |
 MDO1 |     -     3    -4     -     -     -     -     -     -     - |
 NLIB |     -  -165     0     -     -     -     -     -     -   213 |
 NRC2 |     -   -98   131     -     -     -     -     -     -     - |
 NYA1 |     -   -12     -     -    16     -     -     -     -     - |
 NYAL |     -     -     -    94     -     -     -     -     -   -82 |
 OHIG |     -     -     -   208  -184     -     -     -     -     0 |
 ONSA |     -   -44     -   -19   -14     -     -     -     -    86 |
 PERT |     -  -101     -    16     -     -     -     -     -   117 |
 PIE1 |     -  -126     -     X     -     -     -     -     -   163 |
 REYK |     -   102     -  -152     -     -     -     -     -     - |
 SANT |     -     -     -    65  -103     -     -     -     -    38 |
 STJO |     -    58    73     -  -101     -     -     -     -     - |
 TIXI |     -   -27     -     -    35     -     -     -     -     - |
 TRO1 |     -   -72     -     -    95     -     -     -     -     - |
 TSKB |     -   -46   136   -19     -     -     -     -     -    32 |
 URUM |     -   -90     -     -     -     -     -     -     -   117 |
 USNO |     -   -26     -   -51     -     -     -     -     -    78 |
 USUD |     -   -88     -   131     -     -     -     -     -     - |
 WHIT |     -   -28     -     -    37     -     -     -     -     - |
 WSRT |     -   -54     -     -     -     -     -     -     -    69 |
 WTZR |     -  -120     -   -15     -     -     -     -     -   168 |
 WUHN |     -    93     -  -296   -50     -     -     -     -   186 |
 YELL |     -    86    45  -138    -5     -     -     -     -     - |
 YSSK |     -   -28     -     -    37     -     -     -     -     - |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  5267   123   115   150   133  2705     -  5253     -    75 |  286   2.62
    2 |  4750   100    89    62   128  3880     -  4539     -    58 |  288   3.44
    3 | 10429    54    54   130    72  5660     -  8793     -    52 |  288   2.60
    4 |  1512   130    77    73   140  1265     -  1574     -    68 |  281   0.77
    5 | 11139    44   143   109    32  9392     -  9518     -    64 |  288   2.15
    6 |  6557   112    96    40    61  4129     -  6488     -    59 |  288   6.79
    7 |  1757    71    82    77    62  2718     -  1973     -    62 |  288   1.82
    8 |  2933    70    63    97    38  1835     -  3256     -    51 |  288   2.50
    9 |  1855    62    68    50    34  2060     -  1890     -    71 |  288   2.28
   10 |  6084   101    53    87   147  2249     -  5085     -   101 |  288   2.02
   11 |  1458    86    74   156    73  1761     -  1467     -    74 |  288   0.37
   13 |  1410   113    83    55   167  1836     -  1463     -    35 |  288   0.42
   14 |   741    82   158    40    59   609     -   873     -    49 |  288   0.24
   15 |  2106   106   138     -    66     -     -  2167     -    65 |  288   2.43
   17 |  1916   123   114   221   126     -     -  2005     -    55 |  288   3.28
   18 |   831   105    64    90   216  1267     -   938     -    59 |  288   0.44
   19 | 15675   119   259   202   236     -     - 15748     -   172 |  286   3.17
   20 |   694    84    62    72    49  2171     -   569     -    37 |  288   0.32
   21 |  9505   146   180   230   118  6497     -  7365     -   117 |  286   2.62
   22 |  4612    47    42    71    78  1669     -  3729     -   101 |  288   1.18
   23 |  7855   101    87   176    74     -     -  7974     -     - |  288   5.39
   24 |  3589   126    38   130    77  2605     -  3608     -   184 |  280   2.15
   25 |  7437    51    56    78    30  4724     -  5843     -    73 |  288   2.05
   26 |  1665   138    69   118   190   892     -  1786     -    78 |  288   0.36
   27 |  6417    64    69    70    45  5428     -  5298     -    54 |  288   2.38
   28 |  3697   117    66    34   138  3331     -  3385     -    33 |  288   0.64
   29 |  2212    94   102    91   151  3560     -  2387     -   181 |  285   0.71
   30 |  4952    54    63    64    87  1403     -  4410     -    85 |  288   1.11
   31 |  2161   100    92   140    89  2933     -  2064     -    79 |  288   1.98
 -----+-------------------------------------------------------------+--------------
 ALGO |     -    32    39    41    42     -     -     -     -    41 |  288   0.05
 ANKR |     -    28     -    42     -     -     -     -     -     - |  288  19.28
 AREQ |     -    51     -    41    48     -     -     -     -     - |  288  28.59
 AUCK |     -    41     -   142    67     -     -     -     -    71 |  287  16.54
 BAHR |     -    43    39    47    61     -     -     -     -    36 |  288   0.60
 BJFS |     -    46     -     -    60     -     -     -     -     - |  287   1.06
 CAS1 |     -   117     -   109    19     -     -     -     -    66 |  288   7.78
 CRO1 |     -    41     -    61     -     -     -     -     -     - |  285   0.14
 DAV1 |     -    72     -     -    96     -     -     -     -     - |  288  20.39
 DRAO |     -    22    47     -     -     -     -     -     -    25 |  288   0.07
 EISL |     -    58     -    87     -     -     -     -     -     - |  233  25.11
 FAIR |     -     -   173   201     -     -     -     -     -   210 |  276   0.36
 GALA |     -    23     -    46    54     -     -     -     -     - |  269  20.23
 GUAM |     -    30     -    59    26     -     -     -     -    32 |  288  18.76
 HOB2 |     -    84     -   103     -     -     -     -     -    35 |  288   0.15
 HRAO |     -    44     -     -     -     -     -     -     -    56 |  284  22.69
 KARR |     -    24     -     -    31     -     -     -     -     - |  288  78.89
 KERG |     -    44     -     -     -     -     -     -     -    57 |  287   1.76
 KIRU |     -    26     -    38     -     -     -     -     -     - |  288   1.73
 KOKB |     -     -     -   211   188     -     -     -     -   328 |  288   0.41
 KOSG |     -    27     -    41     -     -     -     -     -     - |  288   7.39
 MALI |     -    37     -    83     -     -     -     -     -    48 |  288   8.81
 MAS1 |     -    36    43    48    43     -     -     -     -    40 |  288   2.19
 MATE |     -    25    33     -     -     -     -     -     -    30 |  287   0.11
 MCM4 |     -   149     -   139    72     -     -     -     -   173 |  288   5.77
 MDO1 |     -    46    61     -     -     -     -     -     -     - |   93    >>>
 NLIB |     -    78    45     -     -     -     -     -     -    89 |  284 288.28
 NRC2 |     -    28    37     -     -     -     -     -     -     - |   96   0.15
 NYA1 |     -    22     -     -    29     -     -     -     -     - |  288   0.12
 NYAL |     -     -     -    44     -     -     -     -     -    38 |  286   0.13
 OHIG |     -     -     -    27    40     -     -     -     -    36 |  288  11.98
 ONSA |     -    28     -    52    26     -     -     -     -    32 |  288   1.13
 PERT |     -    61     -    64     -     -     -     -     -    58 |  288  15.42
 PIE1 |     -    18     -     X     -     -     -     -     -    23 |  288   0.04
 REYK |     -    31     -    46     -     -     -     -     -     - |  286  10.42
 SANT |     -     -     -    98    52     -     -     -     -    95 |  285  17.50
 STJO |     -    28    65     -    32     -     -     -     -     - |  286   2.76
 TIXI |     -    26     -     -    34     -     -     -     -     - |  285  10.63
 TRO1 |     -    19     -     -    25     -     -     -     -     - |  288  12.79
 TSKB |     -    52    89    54     -     -     -     -     -    71 |  288   1.67
 URUM |     -    39     -     -     -     -     -     -     -    50 |  288  22.16
 USNO |     -    34     -    49     -     -     -     -     -    40 |  288   0.05
 USUD |     -    31     -    46     -     -     -     -     -     - |  288   0.25
 WHIT |     -    41     -     -    54     -     -     -     -     - |  288  11.53
 WSRT |     -    22     -     -     -     -     -     -     -    28 |  288   0.06
 WTZR |     -    23     -    39     -     -     -     -     -    26 |  288   0.14
 WUHN |     -    46     -    53    52     -     -     -     -    28 |  287  15.28
 YELL |     -    37    74    56    41     -     -     -     -     - |  288   0.15
 YSSK |     -    28     -     -    37     -     -     -     -     - |  287  11.76
 -----+-------------------------------------------------------------+--------------
 TOT  |  5769    73    94   101    93  3628     -  5290     -    90 |


 BEST CLOCK FIT: PIE1   288   0.04 (ns) 

