
 GPS week: 1123   Day: 5   MJD: 52110                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2576      0     0.13    -0.28     5.15     0.00
 cod |   288     0  18838     46     0.51    -2.28     0.11    18.89
 emr |    96     0   3329    106   872.38     7.08     0.15    11.72
 esa |   288     0  16584    881   868.45     7.14     0.14    13.72
 gfz |   288     0  14446    322    -0.18     0.13     0.08    29.14
 igu |    96     0   2198      2     0.25    -0.45     4.00     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  15643    306   181.67     8.25     0.08    26.54

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   sio   usn |
 -----+-------------------------------------------------+
    1 |  1832    47  -105     9     4  9698     -   -27 |
    2 | -3805    69     7     3   -73 -1328     -    29 |
    3 |  1121   131     4   222   -80 10193     -  -113 |
    4 |   929    -6    10   203    68 -4393     -  -177 |
    5 |-11627   103     X   -16   -58-15420     -     X |
    6 | -2185   240   -63   192    17  2963     -  -279 |
    7 | -2973    86   147     1  -126 -1105     -    56 |
    8 |  1996    -4   -25   103   -60  3931     -    20 |
    9 | -5295    49   -68     5   169  2448     -  -212 |
   10 |-14279   108  -243     2   -94-13961     -    61 |
   11 |  6249  -110   414   -66   -10 -2339     -    62 |
   13 |  1838   -17   110    51   -38  2398     -     9 |
   14 |  1369    91    73     9   -21 -2160     -   -56 |
   17 | -1278   275  -219   -68   132     X     -  -271 |
   18 |  3241    11    85     8    50  1152     -   -80 |
   19 | 17653   137    83     X    46  7481     -  -156 |
   20 |  7006   -66    63   259  -105  -611     -    18 |
   21 |   -39    45  -105     X   150 12495     -  -178 |
   22 |   472   127  -266    22    36  7683     -  -100 |
   23 | -1015    99  -165  -354   124     -     -     - |
   25 |   444    60  -151    49   188 -5827     -  -251 |
   26 | -2512   161   -92    64   200 -4300     -  -355 |
   27 |   -80   -21   -37   162    53  3948     -  -121 |
   28 |  7130   152   267  -104  -200  8319     -   127 |
   29 | -2432    39  -279   -37   208   557     -  -198 |
   30 |  -591    64    -9    92   110 -1726     -  -211 |
   31 | -1144   -11    17   148   -29   636     -   -40 |
 -----+-------------------------------------------------+
 ALBH |     -  -366     -   504     -     -     -     - |
 ALGO |     -    -1   127     X   -99     -     -    91 |
 ANKR |     -    -9     -    12     -     -     -     - |
 AREQ |     -     -     -  -261   123     -     -     - |
 AUCK |     -  -103     -    -2     X     -     -    74 |
 BAHR |     -    -5     -   -58   -22     -     -    58 |
 CAS1 |     -    -2     -   -21   -89     -     -   109 |
 CRO1 |     -   -24     -    33     -     -     -     - |
 DAV1 |     -     1     -     -  -137     -     -   152 |
 DRAO |     -   -64    -7     -     -     -     -    47 |
 FAIR |     -     -   -66   -40     -     -     -    30 |
 GALA |     -    28     -  -286    66     -     -    56 |
 GUAM |     -     -     -  -147    24     -     -    49 |
 HRAO |     -  -246     -     -     -     -     -   175 |
 KARR |     -  -190     -     -   123     -     -     - |
 KIRU |     -    27     -   -37     -     -     -     - |
 KOKB |     -     -     -  -107     4     -     -    53 |
 KOSG |     -     -     -  -149     -     -     -    77 |
 KOUR |     -   -53     -    49    11     -     -     - |
 MALI |     -  -238     -   -87     -     -     -   208 |
 MAS1 |     -   -35   128    98  -108     -     -    74 |
 MATE |     -  -228     -     -     -     -     -   162 |
 MAW1 |     -   165     -     -  -107     -     -     - |
 MCM4 |     -    12     -   511  -105     -     -  -135 |
 MDO1 |     -   -30   134     -     -     -     -     2 |
 NLIB |     -   -28    34     -     -     -     -    14 |
 NYA1 |     -    25     -     -   -16     -     -     - |
 NYAL |     -     -     -  -308     -     -     -   159 |
 ONSA |     -  -100     -   226   -74     -     -    35 |
 PERT |     -  -105     -   145     -     -     -     - |
 PIE1 |     -   -68     -  -100     -     -     -   100 |
 REYK |     -    58     -   -80     -     -     -     - |
 SANT |     -     -     -    28  -183     -     -   174 |
 SELE |     -    95     -  -131     -     -     -     - |
 STJO |     -   -21    84     -     2     -     -     - |
 TRO1 |     -  -141     -     -    92     -     -     - |
 TSKB |     -  -125     -     3     -     -     -    87 |
 URUM |     -    25     -     -  -103     -     -    95 |
 USNO |     -   119     -  -251     -     -     -    45 |
 USUD |     -  -113     -   156     -     -     -     - |
 VILL |     -   209     -  -288     -     -     -     - |
 WHIT |     -     2     -     -    -1     -     -     - |
 WSRT |     -   -73     -     -     -     -     -    52 |
 WTZR |     -   -65     -   -26     -     -     -    60 |
 WUHN |     -   -17     -    21  -148     -     -   163 |
 YELL |     -   -62    99  -281    42     -     -   129 |
 YSSK |     -   -80     -     -    52     -     -     - |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------+--------------
    1 |  9829   122   145   264   123  4133     -    67 |  281   4.71
    2 |  5681   173    78   122    63  2580     -    54 |  288   2.21
    3 |  2500    77   152   190    62  3417     -    28 |  288   2.53
    4 |  1253    72   115    46   118  2362     -    87 |  288   0.83
    5 |  9438   122     X    90    89 11534     -     X |  288   2.33
    6 |  7749   100   204   189    66  2759     -    96 |  288   7.17
    7 |  1428   113    86   128    70  1484     -    59 |  288   1.23
    8 |  4361   108    68    84    61  2938     -    40 |  288   2.68
    9 |  7977   157   225    43    37  2952     -   147 |  288   1.51
   10 |  3715   172   174   123   107  6332     -    45 |  288   2.63
   11 |  1703    85   180    67    43   861     -    64 |  288   0.42
   13 |  3021    77   111    70    78  2688     -    56 |  288   0.39
   14 |   875   143    65   152    39   897     -    34 |  288   0.18
   17 |  1561   164   307   170    84     X     -   105 |  288   3.27
   18 |  1237    78   206   126   140  1128     -   104 |  288   0.60
   19 |  8749    84   122     X    65  6404     -    76 |  243   3.92
   20 |   620    89    65   158    18   673     -    44 |  288   0.23
   21 |  6708   363   191     X   111   759     -   214 |  284   3.90
   22 |  6172   112    86    79   117   353     -    53 |  288   0.49
   23 |  4677   275   244   334    64     -     -     - |  288   4.77
   25 |  1278    82   108   196    28  1498     -    70 |  288   1.23
   26 |   921   153   100    81    49  1834     -    90 |  286   0.76
   27 |  4482   101    75   128    28  4969     -    32 |  288   4.27
   28 |  3713    71   142    94    67  3645     -    46 |  288   0.98
   29 |   966   215   130   115   152   731     -    58 |  281   1.01
   30 |  2638    49   222    81    43  1515     -    63 |  288   1.06
   31 | 10114   101   182   247   120  6015     -    93 |  288   3.48
 -----+-------------------------------------------------+--------------
 ALBH |     -   138     -   190     -     -     -     - |  216   0.07
 ALGO |     -    31    50     X    33     -     -    36 |  288   0.03
 ANKR |     -   236     -   325     -     -     -     - |  287 242.26
 AREQ |     -     -     -   159    75     -     -     - |  275  17.71
 AUCK |     -    80     -   198     X     -     -    59 |  288  19.74
 BAHR |     -    97     -   102    25     -     -    50 |  276   0.65
 CAS1 |     -    47     -    74    35     -     -    30 |  288   8.64
 CRO1 |     -    26     -    36     -     -     -     - |  280   0.12
 DAV1 |     -    43     -     -    34     -     -    30 |  288  17.51
 DRAO |     -    90    93     -     -     -     -    72 |  288   0.07
 FAIR |     -     -   241   264     -     -     -   111 |  249   0.42
 GALA |     -    64     -   152   175     -     -   230 |  278  25.34
 GUAM |     -     -     -   101    55     -     -    26 |  288  15.61
 HRAO |     -    47     -     -     -     -     -    33 |  284  19.21
 KARR |     -    29     -     -    19     -     -     - |  288  83.35
 KIRU |     -    61     -    84     -     -     -     - |  287   2.20
 KOKB |     -     -     -   285   198     -     -   301 |  279   0.78
 KOSG |     -     -     -    33     -     -     -    17 |  288 107.61
 KOUR |     -    63     -   137    32     -     -     - |  288  18.75
 MALI |     -    45     -    85     -     -     -    27 |  288  27.61
 MAS1 |     -    44    41    73    28     -     -    39 |  288   2.28
 MATE |     -    36     -     -     -     -     -    26 |  287   0.14
 MAW1 |     -    49     -     -    32     -     -     - |  287  30.60
 MCM4 |     -    82     -   187   122     -     -   120 |  287  12.08
 MDO1 |     -   135   130     -     -     -     -    84 |  286 116.78
 NLIB |     -    48    64     -     -     -     -    34 |  283   0.06
 NYA1 |     -    58     -     -    37     -     -     - |  288   0.07
 NYAL |     -     -     -    55     -     -     -    28 |  288   0.07
 ONSA |     -    35     -    25    18     -     -    28 |  288   0.31
 PERT |     -    41     -    57     -     -     -     - |  288  15.75
 PIE1 |     -    62     -    76     -     -     -    20 |  288   0.07
 REYK |     -    31     -    43     -     -     -     - |  280   9.69
 SANT |     -     -     -   131   117     -     -   113 |  285  18.43
 SELE |     -    32     -    44     -     -     -     - |  286  39.18
 STJO |     -    51    66     -    27     -     -     - |  288   2.35
 TRO1 |     -    85     -     -    55     -     -     - |  287  13.20
 TSKB |     -    55     -    72     -     -     -    25 |  288   1.60
 URUM |     -    32     -     -    21     -     -    33 |  288  51.28
 USNO |     -    61     -    51     -     -     -    27 |  288   0.04
 USUD |     -    85     -   117     -     -     -     - |  281   0.19
 VILL |     -   168     -   231     -     -     -     - |  208   4.24
 WHIT |     -    75     -     -    49     -     -     - |  288  18.27
 WSRT |     -    40     -     -     -     -     -    29 |  288   0.04
 WTZR |     -   118     -   144     -     -     -    21 |  287   0.09
 WUHN |     -    84     -   139    21     -     -    25 |  287  18.31
 YELL |     -    49   151    42    42     -     -    52 |  288   0.06
 YSSK |     -    24     -     -    16     -     -     - |  278  13.90
 -----+-------------------------------------------------+--------------
 TOT  |  5148   108   150   145    78  4002     -    84 |


 BEST CLOCK FIT: ALGO   288   0.03 (ns) 

