
 GPS week: 1123   Day: 4   MJD: 52109                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2771      0    -0.10    -0.02     4.91     0.00
 cod |   288     0  15855     27     1.50    -4.24     0.08    25.38
 emr |    96     0   3624    196   869.70     3.35     0.12    15.09
 esa |   288     0  16553    637   319.34    -4.48     0.13    14.46
 gfz |   288     0  13777      0     0.15     0.16     0.08    25.51
 igu |    96     0   2454      0     0.13    -0.34     3.89     0.00
 ngs |    96     0   2771      0    -0.10     0.08     5.10     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  15717    360   178.09     5.47     0.10    19.57

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 | -5026    21  -114   -29   -41-11110 -4148     -    80 |
    2 |  4331   -13    26   107  -189 10049  3966     -   184 |
    3 | -4465   145  -119  -144    -2    73 -4106     -    -3 |
    4 |  3737    47    83   203   -56  -266  3183     -  -145 |
    5 | -2739    69     X  -194    53 -7691 -1976     -     X |
    6 |  8838   200    -4    10    80  7647  7792     -  -333 |
    7 | -3435    15   -21   106  -166 -1875 -3301     -   129 |
    8 | -1554   -15   -39     1   -72-10952 -1851     -   124 |
    9 | -9012   180   -78    41    31 -4628 -8671     -  -246 |
   10 |  3103   -68  -100    77   -77  5909  2219     -   138 |
   11 |  8207  -161     X    70    -7  6087  7518     -   129 |
   13 |  1685    93   109  -115   -60 -2166  1571     -    35 |
   14 |  3404    88   -72   -86   107 -1798  3430     -  -142 |
   15 | -6813   177    39     -   -96     - -4947     -   -77 |
   17 | -3228   155  -144   -28   164  -878 -2430     -  -332 |
   18 |  2970   -12    12    39    70 -3959  2903     -  -112 |
   19 | -8166     1   -66   475  -159     - -6510     -  -157 |
   20 |  7725   -33   -28   123   -42   859  7308     -     7 |
   21 | -5228   187  -262    53    32 -3599 -5219     -  -219 |
   22 |  3178   -11  -197    87    22 19973  2758     -   -31 |
   23 |  3254    34  -152     X   168     -  3187     -  -212 |
   24 |  1668    23    40   214  -147 -4136  1136     -     - |
   25 |  -999    43  -159    67   163  1829 -1105     -  -263 |
   26 | -3232   141  -110   292    26  2014 -3175     -  -317 |
   27 | -1787   -57    67   177  -128  -621 -1254     -    84 |
   28 |  3251    92    65    99  -232 10970  3035     -   124 |
   29 |  -253   148  -281   121    83 -2323  -488     -  -270 |
   30 |  4313   137    27    55   132  1221  3465     -  -382 |
   31 | -4160    68   -37    30   164-13157 -4651     -  -329 |
 -----+-------------------------------------------------------+
 ALBH |     -  -156     -   274     -     -     -     -     - |
 ALGO |     -   -63   133     -   -65     -     -     -   131 |
 ANKR |     -   111     -  -194     -     -     -     -     - |
 ARTU |     -   120     -     -  -119     -     -     -     - |
 AUCK |     -   -50     -   -81     -     -     -     -   124 |
 BOR1 |     -   -54     -    94     -     -     -     -     - |
 CAS1 |     -     -     -     -  -115     -     -     -   150 |
 CRO1 |     -     -     -   -67    38     -     -     -     - |
 DAV1 |     -     -     -     -  -119     -     -     -   156 |
 DRAO |     -   -34    12     -     -     -     -     -    41 |
 FAIR |     -     -   271   225     -     -     -     -  -278 |
 GALA |     -     -     -  -111    63     -     -     -     - |
 GODE |     -    54     -   -94     -     -     -     -     - |
 GRAZ |     -   -32     -   -59     -     -     -     -    85 |
 GUAM |     -  -484     -  -342   811     -     -     -  -176 |
 HRAO |     -     -     -     -  -113     -     -     -   148 |
 IRKT |     -    58     -  -101     -     -     -     -     - |
 KOKB |     -     -     -  -202   122     -     -     -     2 |
 KOSG |     -  -122     -    86     -     -     -     -    95 |
 LHAS |     -    57     -  -100     -     -     -     -     - |
 MAC1 |     -     -     -     -  -122     -     -     -   159 |
 MAS1 |     -    -2   231    10   -88     -     -     -    50 |
 MATE |     -  -171   141     -     -     -     -     -   186 |
 MCM4 |     -     -     -   -21  -129     -     -     -   184 |
 MDO1 |     -    23   157  -296     -     -     -     -   147 |
 MDVO |     -    -2     -     4     -     -     -     -     - |
 MKEA |     -     -     -  -201     -     -     -     -   149 |
 NLIB |     -   -99    77   -49     -     -     -     -   141 |
 ONSA |     -   -69     -   -12    42     -     -     -    45 |
 PIE1 |     -   -49     -     X     -     -     -     -    64 |
 SEY1 |     -     -     -   470  -266     -     -     -     - |
 SFER |     -  -175     -     -     -     -     -     -   227 |
 STJO |     -   -49   323  -169    80     -     -     -     - |
 TRO1 |     -   -97     -     -    96     -     -     -     - |
 USNO |     -    -6     -   -68     -     -     -     -    59 |
 USUD |     -  -155     -    68     -     -     -     -   150 |
 VILL |     -    66     -  -116     -     -     -     -     - |
 WHIT |     -   -27     -     -    27     -     -     -     - |
 WSRT |     -   -20     -     -     -     -     -     -    26 |
 WTZR |     -  -118     -    80     -     -     -     -    94 |
 WUHN |     -    73     -  -212  -108     -     -     -   202 |
 YAR2 |     -   265     -  -121     -     -     -     -  -215 |
 YELL |     -    12   150  -264   -47     -     -     -   202 |
 YSSK |     -   -60     -     -    60     -     -     -     - |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  6512   105   191   159    81  4937  7698     -   126 |  279   3.80
    2 |  3086    32   129    44   106  4854  3199     -   115 |  288   2.29
    3 |  1567    52   147   243   126  1786  2303     -    69 |  288   1.78
    4 |  1773    62    61    70    58   845  1816     -    38 |  288   0.69
    5 |  5427    45     X   169    88  2405  5139     -     X |  286   1.83
    6 |  8657   156    80    97   107  4773  9142     -   109 |  288   7.73
    7 |  1953   103    70    61    63  2311  2239     -    39 |  288   1.98
    8 |  3659    50    63    56    52  3721  3584     -    93 |  288   3.03
    9 |  7761    86   200   156    76  8445  7726     -   190 |  288   2.38
   10 |  4029    52    51   102    84  2152  4941     -    58 |  288   2.62
   11 |  2807    98     X    83   120  2564  2668     -   132 |  287   0.47
   13 |  1186   129   167   164   102   581  1248     -    90 |  288   0.30
   14 |   792    70    80    75    88   831   992     -    52 |  288   0.22
   15 |  8378    71   121     -    65     -  7951     -   151 |  278   2.18
   17 |  4905    74   177   177    61   689  4365     -   102 |  288   3.35
   18 |   916    87    64   148    73  1245  1087     -   125 |  288   0.49
   19 | 13862   132   113   182   179     - 15299     -   135 |  278   4.74
   20 |  1473   102   204   174   103  1056  1621     -   188 |  288   0.27
   21 |  2381   156   107   218   101  2890  2525     -   107 |  288   2.33
   22 |  1714    47   115   143    72 10511  1754     -    37 |  288   0.60
   23 |  5916    72    71     X    71     -  5665     -    54 |  288   6.17
   24 |  2794    88    47   100    82  3905  3188     -     - |  288   2.33
   25 |  1489    69   187    42   116  2608  1337     -    62 |  288   1.60
   26 |   981   226   188   358   178  1861  1172     -   188 |  270   0.56
   27 |  6860    40    72    43    99  3305  6118     -    94 |  288   3.02
   28 |  1376   255   135   246   104  5703  1401     -    62 |  288   0.53
   29 |  1022   129   133   103    85   511  1090     -   112 |  278   0.46
   30 |  4749    46   181   132    86  2410  4592     -   118 |  288   1.40
   31 |  4771    85   170   114    73  3834  4939     -   142 |  288   4.05
 -----+-------------------------------------------------------+--------------
 ALBH |     -    27     -    47     -     -     -     -     - |  287   0.16
 ALGO |     -    42    29     -    30     -     -     -    31 |  288   0.04
 ANKR |     -    24     -    43     -     -     -     -     - |  288 611.86
 ARTU |     -    50     -     -    50     -     -     -     - |  282  11.28
 AUCK |     -    20     -    46     -     -     -     -    27 |  288  15.65
 BOR1 |     -    23     -    40     -     -     -     -     - |  288   4.25
 CAS1 |     -     -     -     -    76     -     -     -    99 |  283   9.01
 CRO1 |     -     -     -    57    32     -     -     -     - |  288   0.12
 DAV1 |     -     -     -     -    32     -     -     -    41 |  288  18.92
 DRAO |     -    42    53     -     -     -     -     -    43 |  288   0.09
 FAIR |     -     -   173   182     -     -     -     -   105 |  239   0.22
 GALA |     -     -     -    36    20     -     -     -     - |  288  21.72
 GODE |     -   142     -   249     -     -     -     -     - |  255   0.15
 GRAZ |     -    85     -   126     -     -     -     -    62 |  288  52.71
 GUAM |     -    29     -    71    38     -     -     -    83 |  288  18.34
 HRAO |     -     -     -     -   169     -     -     -   221 |  288  21.86
 IRKT |     -    21     -    37     -     -     -     -     - |  287   0.10
 KOKB |     -     -     -   136   135     -     -     -   231 |  281   0.32
 KOSG |     -    26     -    62     -     -     -     -    53 |  288  40.41
 LHAS |     -    65     -   113     -     -     -     -     - |  288  13.45
 MAC1 |     -     -     -     -    34     -     -     -    44 |  286  13.12
 MAS1 |     -    77    47    46    28     -     -     -    86 |  288   2.29
 MATE |     -    53    33     -     -     -     -     -    64 |  287   0.14
 MCM4 |     -     -     -   172    34     -     -     -   127 |  288   9.81
 MDO1 |     -    36    72   146     -     -     -     -    82 |  277 156.53
 MDVO |     -    89     -   155     -     -     -     -     - |  283   0.68
 MKEA |     -     -     -    48     -     -     -     -    36 |  288  27.50
 NLIB |     -    38   111   227     -     -     -     -   151 |  287    >>>
 ONSA |     -    30     -    59    33     -     -     -    55 |  288   0.24
 PIE1 |     -    35     -     X     -     -     -     -    45 |  288   0.08
 SEY1 |     -     -     -    60    34     -     -     -     - |  172  37.28
 SFER |     -    60     -     -     -     -     -     -    78 |  249  24.53
 STJO |     -    70    77   165    33     -     -     -     - |  288   2.79
 TRO1 |     -    35     -     -    34     -     -     -     - |  287  13.70
 USNO |     -    33     -    57     -     -     -     -    42 |  288   0.07
 USUD |     -    50     -    90     -     -     -     -    50 |  288   0.20
 VILL |     -   139     -   244     -     -     -     -     - |  230   3.31
 WHIT |     -    21     -     -    20     -     -     -     - |  288  14.56
 WSRT |     -    49     -     -     -     -     -     -    63 |  287   0.06
 WTZR |     -    26     -    62     -     -     -     -    48 |  288   0.08
 WUHN |     -    77     -    74    48     -     -     -    39 |  287  18.26
 YAR2 |     -   119     -   159     -     -     -     -   191 |  253 492.03
 YELL |     -    42    41    55    25     -     -     -    43 |  288   0.12
 YSSK |     -    21     -     -    21     -     -     -     - |  279  13.18
 -----+-------------------------------------------------------+--------------
 TOT  |  4906    82   122   134    83  3893  5096     -   103 |


 BEST CLOCK FIT: ALGO   288   0.04 (ns) 

