
 GPS week: 1123   Day: 3   MJD: 52108                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2772      0     0.03     0.13     4.78     0.00
 cod |   288     0  16827      1    -2.33     3.24     0.09    19.94
 emr |    96     0   3432      0   864.08     4.61     0.09    23.15
 esa |   288     0  15102    366   857.22     4.96     0.13    14.35
 gfz |   250     0  13016     24     2.08     0.08     0.12    14.66
 igu |    96     0   2574      2     0.01     0.14     3.79     0.00
 jpl |     0     0      0      0     0.00     0.00     0.00     0.00
 ngs |    96     0   2772      0     0.03     0.13     4.78     0.00
 usn |   288     0   8292      0   171.03     7.21     0.08    27.90

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   usn |
 -----+-------------------------------------------------------+
    1 |  3702    62   -19  -179     8  2706     -  3729    43 |
    2 | -2455    69    28   112   -67 -6098     - -2382   -84 |
    3 | -6713     3  -107   137    -9 -4686     - -6146   -39 |
    4 |  3501    76   108    23    32  1305     -  3141  -109 |
    5 | -2011    15   -30   -99   -41  1365     - -2166    68 |
    6 |  -732    74   -93    -4   197-15240     -  -539  -114 |
    7 | -2546    66   108  -200  -146  1936     - -2736    92 |
    8 | -3375    15   -11   157   -12 17272     - -2957   -82 |
    9 | -4984   -29   -46    32   238   -17     - -4571   -88 |
   10 | -1823   -64    -4   -45   -86  -149     - -1844   108 |
   11 |  4714   -98   125   -77   -72  -224     -  4690   103 |
   13 |  2414   -37   183   -43   -67    33     -  2606    27 |
   14 |  7220   -18    38  -153  -158   972     -  6722   150 |
   15 | -3769   -22  -137     -   116 -3894     - -3218     - |
   17 | -7913   116  -216  -154   130     -     - -7730    -1 |
   18 |  4265  -113    -1  -137   -72 -5117     -  4295   183 |
   19 | 10571  -163    98   515  -311 13160     -  7873   -56 |
   20 |  6001   -32    25   -47  -175  1370     -  5945   120 |
   21 | -1941    22  -193    64   -93     -     - -2519    47 |
   22 | -3518    90  -156     X  -156-17652     - -2725    51 |
   23 | -1948   -23  -274   389   236 -2988     - -1577  -192 |
   24 |  -196    56    69    10   -94  7059     -  -592   -21 |
   25 |  5344    -5   -91    66   144  8630     -  4901   -71 |
   26 | -5862    -8   -76   159    90 -3260     - -5434   -91 |
   27 | -3857   -56     9   233    -2  4674     - -2999   -82 |
   28 |  1421   -16   128   -31  -288 -7458     -  1678   123 |
   29 |  2632     8  -153    40    67  2785     -  2455   -14 |
   30 |  4348   -37   -16    41   268  3691     -  4158  -110 |
   31 | -1813    -3    44    53   -78   129     - -1527    -3 |
 -----+-------------------------------------------------------+
 ALBH |     -   165     -  -230     -     -     -     -     - |
 AUCK |     -   123     -   371  -587     -     -     -     - |
 CAS1 |     -    36     -    10   -66     -     -     -     - |
 CRO1 |     -   -63     -  -119   231     -     -     -     - |
 DRAO |     -  -108     5     -     -     -     -     -    76 |
 EISL |     -    65     -   -91     -     -     -     -     - |
 FAIR |     -     -    88  -141     -     -     -     -     - |
 GALA |     -     -     -  -107   105     -     -     -     - |
 GODE |     -    22     -   -31     -     -     -     -     - |
 GUAM |     -    -2     -  -167   190     -     -     -     - |
 HOB2 |     -  -480     -   667     -     -     -     -     - |
 KARR |     -   -79     -     -   108     -     -     -     - |
 KERG |     -    72     -     -   -97     -     -     -     - |
 KIRU |     -   231     -  -321     -     -     -     -     - |
 KOKB |     -     -     -    98   -96     -     -     -     - |
 KOSG |     -    -9     -    13     -     -     -     -     - |
 KOUR |     -     -     -   -37    36     -     -     -     - |
 MAC1 |     -  -123     -   196   -17     -     -     -     - |
 MAS1 |     -   -21   144   -65    19     -     -     -     - |
 MATE |     -  -123   106     -     -     -     -     -     - |
 MAW1 |     -    74     -     -  -101     -     -     -     - |
 MCM4 |     -     9     -  -111    88     -     -     -     - |
 NLIB |     -    -7     -     -    10     -     -     -     - |
 NYA1 |     -    28     -     -   -38     -     -     -     - |
 NYAL |     -     -   134  -217     -     -     -     -     - |
 ONSA |     -     4     -    -2    -4     -     -     -     - |
 PIE1 |     -   -77     -   107     -     -     -     -     - |
 REYK |     -    33     -   -46     -     -     -     -     - |
 SANT |     -     -     -    19   -19     -     -     -     - |
 STJO |     -  -105    69     -   108     -     -     -     - |
 TRO1 |     -  -101     -     -   137     -     -     -     - |
 USNO |     -    47     -   -66     -     -     -     -     - |
 USUD |     -   -19     -   129  -117     -     -     -     - |
 VILL |     -   116     -  -161     -     -     -     -     - |
 WHIT |     -   -24     -     -    32     -     -     -     - |
 WTZR |     -   -56     -    78     -     -     -     -     - |
 WUHN |     -    63     -   -70   -20     -     -     -     - |
 YELL |     -    16   170  -240   142     -     -     -     - |
 YSSK |     -    -7     -     -    10     -     -     -     - |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  4123    79   158   189   126  4726     -  4035    61 |  280   3.75
    2 |  5951   104    59    68   160  5021     -  5716    59 |  288   4.77
    3 |  2295    81    67    89   121  2836     -  1920    59 |  288   2.55
    4 |  2061   216    98   193   142   515     -  2283    50 |  288   0.54
    5 |  4777    43   123   130   142  5101     -  5152    50 |  288   3.03
    6 |  8909    79   104   111   194  4929     -  9079    82 |  288   9.35
    7 |  2866    50    71    90    91  2085     -  2549    41 |  288   1.16
    8 |  3959    63    59    54    81  8115     -  4235    34 |  288   2.90
    9 |  1623    68    56    66   101  1897     -  1514    35 |  288   1.43
   10 |  2348   112    58    73   151  2800     -  2396    57 |  288   2.64
   11 |  1461    78    66    64   143   703     -  1502    58 |  288   0.76
   13 |   792    93   149   112    92   811     -   753    80 |  288   0.33
   14 |  2029    74   118    64   119   817     -  2062    45 |  288   0.46
   15 |  4988    74    77     -    95  3719     -  5998     - |  258   4.49
   17 |  2556    83   133   122   108     -     -  2639    62 |  288   3.16
   18 |  1272   118    80   139   115  2720     -  1160   118 |  288   0.54
   19 | 15648   144    98   210   287  5896     - 14523   179 |  272   4.78
   20 |   961   132    66    76   124  1504     -   904   108 |  288   0.29
   21 |  6330    65    67    98   138     -     -  5690    88 |  288   3.29
   22 |  5196    77    92     X   104  4650     -  4428    60 |  286   0.54
   23 |  4291   123   108   184   170  2169     -  4343   129 |  288   5.02
   24 |  3044    63    67   152   167  5252     -  3120    49 |  288   2.18
   25 |  3967    60    53    65   115  4602     -  5301    67 |  288   2.33
   26 |  1786   101    71   256   188   956     -  1789    95 |  283   0.25
   27 |  5854   119    53    78   160  5312     -  6593    37 |  288   4.15
   28 |  1768    58    61    44   160  4011     -  1416    44 |  288   1.03
   29 |  1631   185   108    99   109   917     -  1572   111 |  281   0.71
   30 |  2444    42   100    96   134  2610     -  2682    65 |  288   1.07
   31 |  6287    88   115   193   154  4103     -  7075    81 |  288   4.97
 -----+-------------------------------------------------------+--------------
 ALBH |     -   311     -   432     -     -     -     -     - |  288   0.23
 AUCK |     -    76     -   152   135     -     -     -     - |  288  18.00
 CAS1 |     -   136     -   127   101     -     -     -     - |  288   8.80
 CRO1 |     -    47     -    61    95     -     -     -     - |  288   0.30
 DRAO |     -    62    27     -     -     -     -     -    39 |  288   0.20
 EISL |     -    54     -    74     -     -     -     -     - |  263  44.33
 FAIR |     -     -    99   160     -     -     -     -     - |   96   0.14
 GALA |     -     -     -    87    85     -     -     -     - |  246  22.27
 GODE |     -   133     -   185     -     -     -     -     - |  261  13.40
 GUAM |     -    32     -    92    98     -     -     -     - |  288  16.17
 HOB2 |     -   106     -   148     -     -     -     -     - |  109   0.10
 KARR |     -    46     -     -    62     -     -     -     - |  249  68.65
 KERG |     -    62     -     -    84     -     -     -     - |  249   1.37
 KIRU |     -    33     -    46     -     -     -     -     - |  288   2.99
 KOKB |     -     -     -   160   156     -     -     -     - |  205   0.86
 KOSG |     -    27     -    38     -     -     -     -     - |  288  10.14
 KOUR |     -     -     -    71    70     -     -     -     - |  249  15.16
 MAC1 |     -    82     -   130   116     -     -     -     - |  288  15.28
 MAS1 |     -    62    81    60   145     -     -     -     - |  288   1.99
 MATE |     -    41    36     -     -     -     -     -     - |   93   0.22
 MAW1 |     -    69     -     -    94     -     -     -     - |  250  29.99
 MCM4 |     -   108     -   175   114     -     -     -     - |  288  22.26
 NLIB |     -    86     -     -   117     -     -     -     - |  244 143.12
 NYA1 |     -    59     -     -    80     -     -     -     - |  250   0.26
 NYAL |     -     -    41    66     -     -     -     -     - |   96   0.15
 ONSA |     -    42     -    59   110     -     -     -     - |  288   0.20
 PIE1 |     -    27     -    38     -     -     -     -     - |  288   0.25
 REYK |     -    23     -    32     -     -     -     -     - |  287   9.51
 SANT |     -     -     -    96    94     -     -     -     - |  229  17.60
 STJO |     -    59    87     -   110     -     -     -     - |  262   4.45
 TRO1 |     -    63     -     -    85     -     -     -     - |  250  14.37
 USNO |     -    24     -    33     -     -     -     -     - |  288   0.22
 USUD |     -    28     -    91    96     -     -     -     - |  288   0.32
 VILL |     -   194     -   269     -     -     -     -     - |  250   3.04
 WHIT |     -    44     -     -    60     -     -     -     - |  250  17.51
 WTZR |     -    29     -    40     -     -     -     -     - |  288   0.25
 WUHN |     -    48     -    86    90     -     -     -     - |  287  17.37
 YELL |     -    34   107    55   106     -     -     -     - |  288   0.27
 YSSK |     -    53     -     -    73     -     -     -     - |  235  13.27
 -----+-------------------------------------------------------+--------------
 TOT  |  4783    95    88   132   125  3792     -  4784    77 |


 BEST CLOCK FIT: ONSA   288   0.20 (ns) 

