
 GPS week: 1121   Day: 5   MJD: 52096                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2777      0     0.02    -0.08     5.29     0.00
 cod |   288     0  20289      0     0.21    -1.31     0.06    29.07
 emr |    96     0   3825    356   814.88     2.92     0.15     9.38
 esa |   288     0  16729   2816   808.40     2.68     0.15     9.54
 gfz |   288     0  15314      7    -0.07    -0.07     0.10    17.63
 igu |    96     0   2295      0     0.04    -0.20     4.57     0.00
 jpl |   286     0   8808    462     4.16    -6.08     0.10    15.83
 ngs |    96     0   2777      0     0.04    -0.10     5.04     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  15967    556  -935.66     5.01     0.09    18.54

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 | -4626   174    28 -1045    49  4649   -16 -4602     -   169 |
    2 | -6236   299   197 -1467   158-14055   431 -4817     -  -138 |
    3 | -9477   -20  -175   397   -63 -3272  -271 -9514     -    27 |
    4 | -2369    94   161     X    50 -1648  -106 -2482     -  -178 |
    5 |  1609    31  -192   861  -107 10552   186    -7     -  -436 |
    6 |  2879   369  -116  -885    12  3460    68  2076     -  -132 |
    7 | -2211   244   296 -1442   193-11167   318 -2113     -   -63 |
    8 |    87   243   164 -1133   263 13687   215    57     -  -209 |
    9 |   485     1  -149   827   145  7375   112    50     -  -585 |
   10 |  7741    71    -7   648  -187  5232   280  7574     -  -385 |
   11 |  5362   -56   159  -417   -10  -249  -140  4954     -   341 |
   13 |  1017  -127    18  1339  -182   -57  -385  1104     -  -168 |
   14 |   330  -236     X  1505  -119 -1843     X   686     -  -234 |
   15 |  -221   -75  -347  1281  -200  1040   -40  -861     -  -282 |
   17 |  1843   255  -344     X     -     -  -272  1974     -  -269 |
   18 |  3240    33     X     X   -37 -4978  -189  3263     -    63 |
   19 | 11084  -185  -116  1492  -154 12424    31 10297     -  -292 |
   20 |  7774  -110    44   578  -164  -581   -37  7348     -    39 |
   21 | -3578   249   -71 -1203    69     -    46 -2982     -   106 |
   22 | -7914     9  -207     X    69     -   109 -7254     -   -90 |
   23 | -2989  -155  -300   955  -295     -   219 -2149     -     - |
   24 |  2084   160    42  -438    26  6786   267  2171     -  -213 |
   25 | -7802   -28  -347   664    32-10018  -251 -6851     -  -166 |
   26 |  2621    97   -40     X   305 -2580   -74  2202     -  -405 |
   27 |  -934   198   249 -1456   230  6025   241  -581     -   -29 |
   28 | -3665    27     X   682  -261-14751   -81 -2584     -  -111 |
   29 |   645    21  -258     X    92 -4330  -101   293     -   -42 |
   30 |   429   141  -114  -274   317 -1866  -194   163     -  -283 |
   31 |  2781  -101   -48   283    63     -   -58  2548     -   -16 |
 -----+-------------------------------------------------------------+
 ALBH |     -   -92     -     X     -     -   169     -     -     - |
 ALGO |     -    61    44     X   -56     -     -     -     -   -51 |
 AREQ |     -   -94     -    97   201     -  -110     -     -     - |
 AUCK |     -   -56     -    -5     -     -    88     -     -    18 |
 BAHR |     -    87   282  -387   -41     -     -     -     -    53 |
 BJFS |     -    40     -     -   -66     -     -     -     -     - |
 CAS1 |     -    24     -   -23   -92     -     -     -     -    61 |
 COCO |     -     -     -   -71   -84     -     -     -     -   115 |
 CRO1 |     -    11     -   104     -     -   -83     -     -     - |
 DAEJ |     -  -879     -     -     -     -     -     -     -  1378 |
 DAV1 |     -    29     -     -  -132     -     -     -     -    79 |
 DRAO |     -    28   -57     -     -     -     -     -     -   -34 |
 FAIR |     -     -   373  -112   -31     -    38     -     -     X |
 FORT |     -  -122     -   441     -     -     -     -     -   -62 |
 GALA |     -    87     -  -101   -49     -   -46     -     -     - |
 GRAZ |     -   -80     -     -     -     -     -     -     -   126 |
 GUAM |     -   -17     -   163   -69     -    -7     -     -    15 |
 HOB2 |     - -1130     -  1384     -     -     -     -     -  1089 |
 HRAO |     -    83     -     -     -     -  -152     -     -     - |
 JPLM |     -     -     -     -   -60     -    66     -     -     - |
 KERG |     -   -42     -     -     -     -     -     -     -    66 |
 KIRU |     -   159     -  -485     -     -     -     -     -     - |
 KOKB |     -     -     -    -9     5     -     X     -     -     X |
 KOSG |     -    31     -   -94     -     -     -     -     -     - |
 MAC1 |     -   -29     -     -    48     -     -     -     -     - |
 MALI |     -     -     -  -535     -     -     -     -     -   276 |
 MAS1 |     -     4   130  -108   -27     -     -     -     -    53 |
 MATE |     -  -107   144     -     -     -     -     -     -   143 |
 MAW1 |     -    71     -     -  -117     -     -     -     -     - |
 MCM4 |     -    40     -   -29  -141     -     -     -     -    87 |
 MDO1 |     -   -52     3     -     -     -    96     -     -     - |
 MKEA |     -     -     -    88     -     -   -53     -     -     - |
 NLIB |     -   -12     -     -     -     -     -     -     -    19 |
 NRC2 |     -   -42   130     -     -     -     -     -     -     - |
 NYA1 |     -    -6     -     -    10     -     -     -     -     - |
 ONSA |     -    31     -  -364   -86     -     -     -     -   221 |
 POTS |     -    66     -  -201     -     -     -     -     -     - |
 SANT |     -     -     -    30    76     -   -98     -     -    -1 |
 SEY1 |     -     -     -  -354   192     -     -     -     -     - |
 STJO |     -   -77   116     -   106     -     -     -     -     - |
 SUTH |     -   227     -  -297     -     -  -240     -     -     - |
 THTI |     -     -     -     -    86     -     -     -     -   -82 |
 TRO1 |     -   -80     -     -   131     -     -     -     -     - |
 TSKB |     -   -73   148     X     -     -     -     -     -    89 |
 USNO |     -    77     -  -139     -     -     -     -     -   -50 |
 USUD |     -     1     -  -254     -     -   160     -     -     - |
 VILL |     -   180     -  -547     -     -     -     -     -     - |
 WILL |     -    -2     -     -     -     -     3     -     -     - |
 WSRT |     -   -81     -     -     -     -     -     -     -   127 |
 WUHN |     -    27     -     -  -159     -     -     -     -   108 |
 YELL |     -    19    94  -201   -22     -     -     -     -    79 |
 YSSK |     -    18     -     -   -24     -    -6     -     -     - |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  3459    83   118    88   222  2701    92  3363     -   255 |  283   3.30
    2 |  6248    62   164   119   114  5952    86  5524     -    57 |  288   4.13
    3 |  2520    66    83   139   135  2009    80  2630     -    58 |  288   2.06
    4 |  1221    46   209     X   107  1086   151  1369     -    64 |  288   1.17
    5 | 11771    40   105   102   113  7146    88 10960     -    88 |  288   6.32
    6 | 10505    39   170    84    61  3384    79 10173     -   129 |  288   8.10
    7 |  1332   100   115   243   112  6707    85  1246     -   101 |  288   1.01
    8 |  3976    51    93   127    50  7515    90  3961     -    57 |  288   3.00
    9 |  3112    54    98   155    67  1822    92  3341     -    70 |  288   1.59
   10 |  6019    69   163   164   190  5435   193  6124     -   144 |  288   2.16
   11 |  2843    48    73   154    56  1141    82  2567     -    63 |  288   0.32
   13 |  1444    82    97    97    53   689   269  1462     -    86 |  288   0.28
   14 |   709    64     X   104   110  1187     X   737     -    73 |  288   0.25
   15 |  7273    71   185   122    61  4314    79  6807     -    93 |  288   4.63
   17 |  1889   105   213     X     -     -   231  1871     -   166 |  283   2.83
   18 |   759    70     X     X    37  2153   158   890     -    74 |  288   0.40
   19 |  7716    52    82   130    49  9730   109  6747     -    98 |  288   3.71
   20 |  1799    79   104   105    81  1035    94  1750     -    45 |  288   0.15
   21 |  8345    64   212    98    58     -    82  7304     -    56 |  288   3.21
   22 |  2843    52    88     X    60     -    95  2388     -    44 |  288   0.53
   23 |  6677    69   258   187   128     -   174  7018     -     - |  288   6.68
   24 |  3047    64   195   240   271  5960   123  2983     -   236 |  288   2.80
   25 |  2995    98   232   275    80  4327    68  3531     -   105 |  288   1.66
   26 |  1389   122    99     X   108  1509    66  1719     -    96 |  278   0.25
   27 | 10894    51   129   152    63  4608    52 10399     -    75 |  288   4.19
   28 |  4098    60     X    82    98  6917    46  3465     -    49 |  288   1.36
   29 |  2844   111   314     X   153  3336   224  2988     -   214 |  278   1.04
   30 |  1874    75    84   113   153  1383   160  2000     -   113 |  288   1.54
   31 |  5338    61   156   156   134     -    69  5450     -   121 |  288   4.10
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    26     -     X     -     -    48     -     -     - |  286   0.10
 ALGO |     -    55    85     X    39     -     -     -     -    53 |  288   0.05
 AREQ |     -    98     -   165    41     -    78     -     -     - |  288    >>>
 AUCK |     -    55     -   101     -     -    65     -     -    65 |  288  15.50
 BAHR |     -    21    39    93    34     -     -     -     -    41 |  288   0.42
 BJFS |     -    15     -     -    25     -     -     -     -     - |  288   1.11
 CAS1 |     -    58     -    83    49     -     -     -     -   127 |  288   9.80
 COCO |     -     -     -   307   104     -     -     -     -    75 |  269  29.04
 CRO1 |     -    36     -    88     -     -    54     -     -     - |  288   0.13
 DAEJ |     -    37     -     -     -     -     -     -     -    58 |  286   1.37
 DAV1 |     -    33     -     -    20     -     -     -     -    46 |  288  24.81
 DRAO |     -    21    60     -     -     -     -     -     -    30 |  288   0.08
 FAIR |     -     -   397   243    95     -   142     -     -     X |  273   0.62
 FORT |     -    37     -   107     -     -     -     -     -    43 |  288   0.18
 GALA |     -    67     -    85    31     -   112     -     -     - |  288  20.86
 GRAZ |     -    20     -     -     -     -     -     -     -    31 |  286    >>>
 GUAM |     -    25     -   145    67     -    48     -     -    32 |  288  12.96
 HOB2 |     -    66     -   125     -     -     -     -     -   137 |  288   0.10
 HRAO |     -    33     -     -     -     -    61     -     -     - |  286  18.86
 JPLM |     -     -     -     -    37     -    41     -     -     - |  283   7.45
 KERG |     -    26     -     -     -     -     -     -     -    42 |  287   1.43
 KIRU |     -    44     -   134     -     -     -     -     -     - |  288   2.20
 KOKB |     -     -     -   205   111     -     X     -     -     X |  272   1.14
 KOSG |     -    16     -    48     -     -     -     -     -     - |  288  50.38
 MAC1 |     -    21     -     -    35     -     -     -     -     - |  288  13.86
 MALI |     -     -     -    63     -     -     -     -     -    32 |  288 116.25
 MAS1 |     -    37    46   108    34     -     -     -     -    38 |  288   2.14
 MATE |     -    15    32     -     -     -     -     -     -    24 |  287   0.11
 MAW1 |     -    43     -     -    71     -     -     -     -     - |  285  31.60
 MCM4 |     -   108     -   272    57     -     -     -     -   121 |  268    >>>
 MDO1 |     -    34   183     -     -     -    32     -     -     - |  287    >>>
 MKEA |     -     -     -   115     -     -    69     -     -     - |  280  31.17
 NLIB |     -    38     -     -     -     -     -     -     -    60 |  250   0.05
 NRC2 |     -    22    69     -     -     -     -     -     -     - |   96   0.08
 NYA1 |     -    41     -     -    67     -     -     -     -     - |  288   0.06
 ONSA |     -    47     -    99    42     -     -     -     -    29 |  288   0.86
 POTS |     -    22     -    66     -     -     -     -     -     - |  281  17.36
 SANT |     -     -     -   249    82     -   138     -     -   105 |  288  18.52
 SEY1 |     -     -     -   115    62     -     -     -     -     - |  283  34.13
 STJO |     -    63   125     -    90     -     -     -     -     - |  288   2.82
 SUTH |     -    30     -   104     -     -    75     -     -     - |  288  45.91
 THTI |     -     -     -     -    45     -     -     -     -    43 |  287   1.61
 TRO1 |     -    43     -     -    72     -     -     -     -     - |  288  14.44
 TSKB |     -    37   145     X     -     -     -     -     -    54 |  287   1.07
 USNO |     -    27     -   100     -     -     -     -     -    41 |  288   0.05
 USUD |     -    43     -   149     -     -    58     -     -     - |  288   0.21
 VILL |     -    89     -   272     -     -     -     -     -     - |  218   6.03
 WILL |     -    29     -     -     -     -    53     -     -     - |  285   3.16
 WSRT |     -    18     -     -     -     -     -     -     -    28 |  288   0.08
 WUHN |     -    70     -     -    95     -     -     -     -    28 |  287  18.42
 YELL |     -    40   100   207    61     -     -     -     -    55 |  288   0.18
 YSSK |     -    41     -     -    62     -    61     -     -     - |  287  11.85
 -----+-------------------------------------------------------------+--------------
 TOT  |  5294    58   153   153    95  4570   103  5043     -    93 |


 BEST CLOCK FIT: ALGO   288   0.05 (ns) 

