
 GPS week: 1120   Day: 4   MJD: 52088                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2773      0    -0.01    -0.05     5.48     0.00
 cod |   288     0  19500      1     0.05     0.09     0.07    29.20
 emr |    96     0   3916    350   795.28     2.73     0.13    14.22
 esa |   288     0  13716    372   799.11     3.73     0.41     0.00
 gfz |   288     0  14819     12     0.38    -0.27     0.09    22.27
 igu |    96     0   2485      0     0.01    -0.08     3.22     0.00
 jpl |   285     0   8729     14    -1.68     6.19     0.10    19.22
 ngs |    96     0   2773      0    -0.01    -0.05     5.35     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  14746   1195  -973.50     5.78     0.13    15.09

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |  4486    59   -47 -2527   -11  6914  -147  3460     -     7 |
    2 |    46     9     X   508   -46  -338   313    31     -  -146 |
    3 | -1219     5    14  -276    78  1312  -267 -1730     -    32 |
    4 |   -95    96    14   363   -33   335  -103  -178     -   -80 |
    5 | -5982   128   -67   458  -182 -9380   317 -5624     -  -152 |
    6 |   310   164   -51 -1276   -76  8651   -96  -419     -  -130 |
    7 | -3731    17  -100 -2577   -41   798   222 -3593     -   -80 |
    8 |  6507    26    26  -314    66 36287   185  5936     -  -266 |
    9 | -5838   103  -160  1134   -21 -9944   248 -4915     -  -272 |
   10 |  9478   161    -3   566  -111  7162   249  7585     -  -298 |
   11 |  5413  -125    75  1293   154 -3589  -328  5303     -   190 |
   13 |  4338    22   148  2570     8  5830  -235  4361     -    30 |
   14 |  4616   102     X  1656  -150    94    31  4652     -     X |
   15 |-11264    65  -157 -2145    -4-15116   -89 -9798     -   -12 |
   17 | -3547   175  -217  2337    48     -   -20 -3329     -  -342 |
   18 |  2064   -84     X -1750    97 -4926  -137  2035     -   104 |
   19 |-15123  -122   -69   413   123 -6044    91-12298     -    24 |
   20 |  5977    49    72   166  -202 -2362    45  5742     -   154 |
   21 | -2607   108  -219 -1182    22     -  -340 -2185     -    48 |
   22 | -1223    23   -87 -1859    15  4178   174 -1027     -  -147 |
   23 | -1365    54   -66  1243  -167     -   274 -1150     -     - |
   24 |   871   130   -53 -1488   -66   316    68   691     -  -182 |
   25 |  2908    76   -75   262    18  4032  -137  2831     -   -67 |
   26 | -1002   214   -83  -124    72  -903   -75  -900     -  -452 |
   27 | -3302   -94    17  -116   154 -4432   189 -3889     -  -168 |
   28 |  7145   -46   210  2220     4 -9693    28  6497     -     X |
   29 |   429    42   -79  -950    -8  4022   -78   665     -     X |
   30 |  2745   173   -99 -1476   -16  -789  -188  2082     -  -177 |
   31 |  -905   -52   -21   353   137-12143   -45  -701     -   -67 |
 -----+-------------------------------------------------------------+
 ALBH |     -   -76     -     -     -     -   115     -     -     - |
 ALGO |     -   -53    32  7074   -43     -     -     -     -   157 |
 AREQ |     -     8     -  -164     -     -   -13     -     -     - |
 AUCK |     -  -400     -   -72   837     -  -109     -     -  -275 |
 BAHR |     -     -   253  -242  -157     -     -     -     -   152 |
 BJFS |     -  -147     -     -   193     -     -     -     -     - |
 BRMU |     -    20     -     -  -147     -     -     -     -   179 |
 CAS1 |     -     0     -     -  -103     -     -     -     -   153 |
 CRO1 |     -   -67     -     -     -     -   102     -     -     - |
 DAV1 |     -    31     -     -   -40     -     -     -     -     - |
 DRAO |     -    14   -79     -     -     -     -     -     -    -2 |
 EISL |     -   -30     -     -     -     -     -     -     -    58 |
 FAIR |     -     -   173  -602     -     -     3     -     -   -45 |
 GALA |     -    79     -     -  -117     -    16     -     -     - |
 GOLD |     -    65     -     X     -     -   -99     -     -     - |
 GUAM |     -   -34     -     7     -     -   -53     -     -   130 |
 HOB2 |     -  -218     -   455     -     -     -     -     -   422 |
 HRAO |     -    71     -     -     -     -  -108     -     -     - |
 JPLM |     -     -     -     -   -64     -    74     -     -     - |
 KERG |     -   -57     -     -     -     -     -     -     -   110 |
 KOKB |     -     -     -    66   -15     -    17     -     -     X |
 MAC1 |     -    50     -     -   -65     -     -     -     -     - |
 MAS1 |     -   -44   129  -519   -18     -     -     -     -    72 |
 MATE |     -  -116   137     -     -     -     -     -     -   182 |
 MCM4 |     -    85     -  -257   -71     -     -     -     -   -63 |
 MDO1 |     -     1   -79     -     -     -    18     -     -     - |
 NLIB |     -  -170     -     -     -     -     -     -     -   328 |
 NRC2 |     -   -42    86     -     -     -     -     -     -     - |
 NYA1 |     -   -49     -     -    65     -     -     -     -     - |
 OHIG |     -    53     -   117   -69     -     -     -     -     - |
 ONSA |     -   -51   272     -  -145     -     -     -     -   227 |
 SANT |     -     -     -   -88   -73     -    -2     -     -   117 |
 SEY1 |     -    30     -  -680   -40     -     -     -     -     - |
 STJO |     -     0    51     -   -10     -     -     -     -     - |
 SUTH |     -    97     -   151     -     -  -148     -     -     - |
 THTI |     -     -     -     -   104     -     -     -     -  -154 |
 TRO1 |     -  -115     -     -   151     -     -     -     -     - |
 TSKB |     -  -148    89  -681     -     -     -     -     -   285 |
 USNO |     -   -25     -  -668     -     -     -     -     -    49 |
 USUD |     -    -7     -    69     -     -    11     -     -     - |
 WHIT |     -   -34     -     -    45     -     -     -     -     - |
 WILL |     -   -24     -     -     -     -    36     -     -     - |
 WSRT |     -   -71     -     -     -     -     -     -     -   138 |
 WTZR |     -   -95     -  -536     -     -     -     -     -   183 |
 WUHN |     -   -36     -     -   -61     -     -     -     -   159 |
 YELL |     -    -1     3  -658     -     -     -     -     -     - |
 YSSK |     -   -41     -     -     -     -    62     -     -     - |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  8120    60    59   340   103  4028    67  7934     -   110 |  278   2.97
    2 |  5254    59     X   128   108  4080    51  4639     -   129 |  288   3.20
    3 |  4096    52   102   233    48  2113   106  4230     -    73 |  288   1.96
    4 |  1095    76   106   384    85   724    38  1098     -   105 |  288   0.95
    5 |  9272    72   228   115   128  3538    73  8535     -   137 |  288   4.13
    6 | 10135    79   125   139   100  5538   136  9614     -   108 |  288   8.53
    7 |  1743   113   200   101   256   678    56  1746     -   127 |  288   0.88
    8 |  4625    33    92   133    81  4797    70  3685     -   122 |  288   3.96
    9 |  3482    40    40   119   101  2934    92  3473     -   161 |  288   1.22
   10 |  6678    53    37   106    87  2229   142  6539     -    80 |  288   2.22
   11 |  1464    93    95   112   135  1723   190  1444     -   114 |  288   0.38
   13 |  1114    78    75    85    60  2386   276  1198     -   136 |  288   0.23
   14 |  1035    59     X   281    44   725   113  1124     -     X |  282   0.35
   15 |  8481    60   181   485    70  2383    87  7850     -   108 |  288   3.64
   17 |  1745    79    88   960    89     -   167  1701     -   155 |  288   2.10
   18 |  1266    74     X   188    81  1755   202  1322     -   160 |  288   0.45
   19 | 12286    92    50   308    89  4074    45 13494     -    88 |  287   3.29
   20 |  1334    46    79   197    66   899   153  1518     -   108 |  288   0.16
   21 |  4143    95   246   386    82     -    69  4178     -   169 |  288   3.28
   22 |  1557    68    77   388    52  3986    85  1664     -    69 |  288   0.65
   23 |  5856    67   305   201    65     -   134  5404     -     - |  288   4.81
   24 |  3975   142   240   724   157  2551   120  4130     -   177 |  288   3.20
   25 |  4563   102    97   174    41  5380    84  4535     -   156 |  288   1.48
   26 |   795    70   119  2030    50  1265   123   967     -   106 |  277   0.65
   27 |  9238    41   107   139   117  4335    55  8775     -   202 |  288   4.60
   28 |  5016    89   113   108   142  5114   127  4185     -     X |  288   0.43
   29 |  2180    82   344   621    67  2481    82  2385     -     X |  276   0.43
   30 |  3825   122    83   297   144  1406   205  3449     -   218 |  288   0.93
   31 |  6403   146   150   199    68  3536    69  6481     -   178 |  288   3.78
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    45     -     -     -     -    68     -     -     - |  285   0.06
 ALGO |     -    31    42    96    30     -     -     -     -    51 |  288   0.03
 AREQ |     -    25     -   182     -     -    38     -     -     - |  280  16.81
 AUCK |     -    42     -   115    37     -    67     -     -   114 |  288  19.86
 BAHR |     -     -    69    83    28     -     -     -     -    37 |  287   0.36
 BJFS |     -    85     -     -   112     -     -     -     -     - |  286   0.52
 BRMU |     -    35     -     -    52     -     -     -     -    47 |  288  30.85
 CAS1 |     -    28     -     -    50     -     -     -     -    43 |  288   8.99
 CRO1 |     -    29     -     -     -     -    44     -     -     - |  279   0.15
 DAV1 |     -    40     -     -    52     -     -     -     -     - |  288  20.72
 DRAO |     -    31    32     -     -     -     -     -     -    61 |  288   0.09
 EISL |     -    25     -     -     -     -     -     -     -    49 |  283  22.64
 FAIR |     -     -   102   522     -     -   104     -     -   118 |  281   0.43
 GALA |     -    41     -     -    75     -    79     -     -     - |  288  19.69
 GOLD |     -    35     -     X     -     -    53     -     -     - |  285  20.00
 GUAM |     -    70     -   204     -     -    80     -     -   194 |  288  17.48
 HOB2 |     -    58     -   135     -     -     -     -     -   112 |  288   2.39
 HRAO |     -    74     -     -     -     -   112     -     -     - |  281  16.79
 JPLM |     -     -     -     -    47     -    55     -     -     - |  282  28.00
 KERG |     -    47     -     -     -     -     -     -     -    91 |  287   1.99
 KOKB |     -     -     -   399   136     -   157     -     -     X |  256   0.86
 MAC1 |     -    29     -     -    38     -     -     -     -     - |  288  16.89
 MAS1 |     -    19    49    65    26     -     -     -     -    21 |  288   2.09
 MATE |     -    19    53     -     -     -     -     -     -    29 |  287   0.08
 MCM4 |     -   109     -   276    35     -     -     -     -   176 |  286    >>>
 MDO1 |     -    40    34     -     -     -    56     -     -     - |  285   7.07
 NLIB |     -    55     -     -     -     -     -     -     -   106 |  176    >>>
 NRC2 |     -   100   205     -     -     -     -     -     -     - |   95   0.14
 NYA1 |     -   104     -     -   136     -     -     -     -     - |  287   0.41
 OHIG |     -    50     -   192    65     -     -     -     -     - |  286  13.99
 ONSA |     -    26    81     -    30     -     -     -     -    41 |  288   0.29
 SANT |     -     -     -   284   186     -   113     -     -   271 |  282  14.83
 SEY1 |     -    25     -   150    33     -     -     -     -     - |  270  31.04
 STJO |     -    17    33     -    19     -     -     -     -     - |  288   3.21
 SUTH |     -    71     -   191     -     -   108     -     -     - |  279  11.74
 THTI |     -     -     -     -    74     -     -     -     -   109 |  287   1.73
 TRO1 |     -    16     -     -    21     -     -     -     -     - |  288  12.46
 TSKB |     -   156    99   225     -     -     -     -     -   334 |  281   1.02
 USNO |     -    26     -    77     -     -     -     -     -    50 |  288   0.03
 USUD |     -    24     -   141     -     -    36     -     -     - |  268   0.19
 WHIT |     -    24     -     -    31     -     -     -     -     - |  288  25.75
 WILL |     -    32     -     -     -     -    48     -     -     - |  281   4.63
 WSRT |     -    18     -     -     -     -     -     -     -    35 |  288   0.07
 WTZR |     -    16     -   148     -     -     -     -     -    32 |  288   0.20
 WUHN |     -    57     -     -    51     -     -     -     -    52 |  287  16.74
 YELL |     -    19    39   282     -     -     -     -     -     - |   96   0.13
 YSSK |     -    23     -     -     -     -    35     -     -     - |  281  10.72
 -----+-------------------------------------------------------------+--------------
 TOT  |  5477    67   132   405    91  3220   102  5352     -   129 |


 BEST CLOCK FIT: USNO   288   0.03 (ns) 

