
 GPS week: 1120   Day: 3   MJD: 52087                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2769      0     0.20    -0.52     5.51     0.00
 cod |   288     0  18438     70    -0.36    -1.99     0.08    22.65
 emr |    96     0   3917    227   791.46     2.54     0.12    12.98
 esa |   288     0  16252   2333   785.00     2.29     0.15    11.61
 gfz |   288     0  14819      5     0.58    -0.26     0.08    26.08
 igu |    96     0   2481      0     0.36    -1.06     3.83     0.00
 jpl |     0     0      0      0     0.00     0.00     0.00     0.00
 ngs |    96     0   2769      0     0.19    -0.44     5.20     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  16293    398  -980.51     5.77     0.07    26.68

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |   937    57  -290     X   -34 -4191     -  1013     -    32 |
    2 |   498   249  -131   676  -270  3489     -   701     -  -195 |
    3 | -3446  -104  -338   141    -3  4934     - -3048     -    82 |
    4 |  1316   270   160  -591    14   -69     -  1073     -   -12 |
    5 |  2082   223     X  -609   153 10941     -   876     -   -73 |
    6 | -7097   -55  -190  1074  -118 -7321     - -6252     -  -276 |
    7 | -1650   188   -58    66    27 -5315     - -1806     -  -205 |
    8 |  9339   286   -32   -92   -52  2067     -  7666     -  -145 |
    9 | -3597   193   245  -371   259 -2951     - -3463     -  -288 |
   10 |  4108   125   -14  1047  -142 10855     -  3961     -  -419 |
   11 |  5975   -73    43   300  -142  3223     -  5852     -    64 |
   13 |  5382   -54   -22   398  -216 -7834     -  5335     -    79 |
   14 |  3986   -64     X     X     6   199     -  4494     -    48 |
   15 | -9110   215   204  -926     --10142     - -8476     -   180 |
   17 | -3714   -18  -129  1578    -8     -     - -3317     -  -508 |
   18 |  5453   124   251 -1447   327 -3380     -  5509     -   165 |
   19 |-23198     5  -395   476  -108     -     --20402     -   -43 |
   20 |  6678   -91  -110   311   -42   300     -  6477     -     X |
   21 |  3500    85  -217     X   204  7241     -   972     -  -226 |
   22 | -3248   176  -246 -1235   214 -4480     - -2852     -   112 |
   23 |  -397   282   208 -1100   215     -     - -1555     -     - |
   24 | -2898    70    43  1074  -207-10973     - -2729     -  -333 |
   25 | -1815    60  -174  -339   145  -197     - -1635     -   -17 |
   26 |  -936   184   161     X   141 -4116     -  -785     -  -314 |
   27 | -5361   167  -176   132   -34   308     - -4178     -  -138 |
   28 |  7583   -45   168     X  -195 12061     -  7646     -   201 |
   29 | -2048   -72  -187     X   200 -1178     - -1800     -  -105 |
   30 |  3194    88    91  -656   227  5904     -  3642     -   -25 |
   31 |  8502    11  -190   346   -92   673     -  7001     -   -39 |
 -----+-------------------------------------------------------------+
 ALBH |     -    81     -  -159     -     -     -     -     -     - |
 ALGO |     -   -56   158     X  -106     -     -     -     -   125 |
 AREQ |     -   -97     -   117    31     -     -     -     -     - |
 AUCK |     -  -331     -  -590   494     -     -     -     -   -20 |
 BAHR |     -     -   111  -126    20     -     -     -     -    17 |
 BJFS |     -  -110     -     -    96     -     -     -     -     - |
 CAS1 |     -    20     -   179   -81     -     -     -     -   -16 |
 DAEJ |     - -1178     -     -     -     -     -     -     -  1000 |
 DAV1 |     -    18     -     -  -161     -     -     -     -   143 |
 DRAO |     -  -169   -13     -     -     -     -     -     -   146 |
 FAIR |     -     -  -201  -337     -     -     -     -     -   199 |
 FORT |     -  -322     -  -110     -     -     -     -     -   252 |
 GODE |     -  -114     -   223     -     -     -     -     -     - |
 GUAM |     -   -21     -    89     -     -     -     -     -   -21 |
 HOB2 |     -    93     -    62     -     -     -     -     -  -102 |
 KERG |     -    79     -     -     -     -     -     -     -   -67 |
 KIRU |     -   170     -  -332     -     -     -     -     -     - |
 KOKB |     -     -     -    47   173     -     -     -     -  -224 |
 MAC1 |     -   172     -     -  -150     -     -     -     -     - |
 MALI |     -     -     -     5     -     -     -     -     -    -2 |
 MAS1 |     -   -59   169    82  -103     -     -     -     -    88 |
 MATE |     -    -9    16     -     -     -     -     -     -     - |
 MCM4 |     -   259     -  -540     6     -     -     -     -   -63 |
 MDO1 |     -   -83   145     -     -     -     -     -     -     - |
 MKEA |     -     -     -    55   -25     -     -     -     -     - |
 NLIB |     -   -15     -     -     -     -     -     -     -    13 |
 NRC2 |     -  -143   250     -     -     -     -     -     -     - |
 NYA1 |     -    75     -     -   -65     -     -     -     -     - |
 OHIG |     -   -41     -   357  -208     -     -     -     -    84 |
 ONSA |     -   -55    88    37    -9     -     -     -     -    25 |
 PIE1 |     -  -246     -   626     -     -     -     -     -   -64 |
 POTS |     -  -132     -   -20     -     -     -     -     -   121 |
 SANT |     -     -     -   199  -198     -     -     -     -   111 |
 SEY1 |     -    92     -  -316    73     -     -     -     -     - |
 STJO |     -     0   210     -   -35     -     -     -     -     - |
 SUTH |     -   -45     -    87     -     -     -     -     -     - |
 THTI |     -     -     -     -    72     -     -     -     -   -70 |
 TRO1 |     -   -77     -     -    67     -     -     -     -     - |
 TSKB |     -  -121    86  -167     -     -     -     -     -   159 |
 URUM |     -     -     -     -  -182     -     -     -     -   178 |
 USNO |     -   -59     -   -92     -     -     -     -     -    90 |
 USUD |     -   -30     -    59     -     -     -     -     -     - |
 WHIT |     -   -51     -     -    44     -     -     -     -     - |
 WSRT |     -   -78     -     -     -     -     -     -     -    66 |
 WTZR |     -  -154     -    69     -     -     -     -     -   101 |
 WUHN |     -    48     -     -  -155     -     -     -     -   110 |
 YELL |     -    42   241   -98   -33     -     -     -     -     - |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  6169    72   127     X    73  3992     -  6170     -    44 |  278   5.14
    2 |  5413   138   139   211   115  3770     -  5335     -    70 |  288   2.29
    3 |  3827   185    91   129   109  2444     -  3986     -    68 |  288   2.20
    4 |  1763    69    83    84    63   604     -  2072     -    46 |  288   0.74
    5 |  8728    72     X   204    46  2590     -  8576     -    93 |  288   2.65
    6 |  9349    87   195    72    73  3061     - 10600     -    52 |  288   8.62
    7 |  2101    86    76    68   133  2061     -  2132     -    88 |  288   0.76
    8 |  7691   139    54   128    58  5433     -  6207     -   114 |  288   5.00
    9 |  3460    61   132   163    77  3730     -  3527     -   132 |  288   1.85
   10 |  4786    95    46   144   133  6842     -  4774     -    74 |  288   2.83
   11 |   826   119   189    83    87  1030     -   835     -    40 |  288   0.35
   13 |  1338    68    85   255   164  3214     -  1476     -    47 |  288   0.30
   14 |  1281    96     X     X   134   602     -  1095     -   104 |  288   0.17
   15 |  6534   226   174   253     -  8351     -  6069     -   170 |  288   3.10
   17 |  2388    60    94    97    65     -     -  2367     -    59 |  288   2.92
   18 |   933   120    60    39    25  1853     -   835     -    90 |  288   0.45
   19 |  8640    91    86   306    28     -     -  7939     -    98 |  288   4.15
   20 |   495    69   327    59    83   421     -   634     -     X |  288   0.18
   21 | 11341   191   193     X   123  7049     - 10385     -    80 |  268   3.26
   22 |  8983    87    66    49   122  4371     -  8084     -    79 |  287   0.52
   23 |  8929    90   254   144    97     -     -  7013     -     - |  288   5.18
   24 |  3077   100    72    66    60  3708     -  3055     -    54 |  288   2.70
   25 |  1723    83    43   249    34  1635     -  1767     -    62 |  288   1.59
   26 |   834    68    90     X    46  2212     -   696     -    40 |  276   0.69
   27 |  6639    44    81    98    60  3435     -  6174     -    30 |  288   4.32
   28 |  2253    47    75     X    38  5199     -  2213     -    27 |  288   0.48
   29 |  1817    73   250     X    56   623     -  1906     -    45 |  277   0.82
   30 |  4021    60   200   219    56  2569     -  3614     -    84 |  288   1.18
   31 |  6740   114   110   116    32  4204     -  6264     -    41 |  288   4.29
 -----+-------------------------------------------------------------+--------------
 ALBH |     -   120     -   235     -     -     -     -     -     - |   96   0.32
 ALGO |     -    35    35     X    26     -     -     -     -    25 |  288   0.04
 AREQ |     -    44     -    33    33     -     -     -     -     - |  288  15.79
 AUCK |     -    73     -    89    36     -     -     -     -    57 |  288  16.02
 BAHR |     -     -    48    43    25     -     -     -     -    23 |  288   0.30
 BJFS |     -    42     -     -    36     -     -     -     -     - |  288   0.84
 CAS1 |     -    46     -   112    43     -     -     -     -    44 |  288   9.57
 DAEJ |     -    27     -     -     -     -     -     -     -    23 |  286   1.08
 DAV1 |     -    33     -     -    43     -     -     -     -    47 |  288  22.01
 DRAO |     -    20    32     -     -     -     -     -     -    16 |  288   0.07
 FAIR |     -     -   147   330     -     -     -     -     -   150 |  248   0.57
 FORT |     -    81     -    80     -     -     -     -     -    49 |  288   0.20
 GODE |     -   138     -   269     -     -     -     -     -     - |  235   0.12
 GUAM |     -    54     -    50     -     -     -     -     -    44 |  288  12.89
 HOB2 |     -    63     -   108     -     -     -     -     -    31 |  288   0.08
 KERG |     -    49     -     -     -     -     -     -     -    42 |  287   1.38
 KIRU |     -    34     -    67     -     -     -     -     -     - |  288   2.90
 KOKB |     -     -     -   189   195     -     -     -     -   238 |  284   0.83
 MAC1 |     -    37     -     -    32     -     -     -     -     - |  288  11.54
 MALI |     -     -     -   106     -     -     -     -     -    46 |  288 118.34
 MAS1 |     -    27    62    58    34     -     -     -     -    33 |  288   2.61
 MATE |     -    26    46     -     -     -     -     -     -     - |   95   0.13
 MCM4 |     -    75     -   203    75     -     -     -     -    92 |  283   6.36
 MDO1 |     -    33    57     -     -     -     -     -     -     - |   96  12.73
 MKEA |     -     -     -   107    48     -     -     -     -     - |  277  27.99
 NLIB |     -    24     -     -     -     -     -     -     -    21 |  287   0.06
 NRC2 |     -    20    36     -     -     -     -     -     -     - |   96   0.07
 NYA1 |     -    28     -     -    24     -     -     -     -     - |  288   0.10
 OHIG |     -    67     -    85    55     -     -     -     -    42 |  288  12.02
 ONSA |     -    58    48    53    25     -     -     -     -    28 |  288   0.25
 PIE1 |     -    17     -    52     -     -     -     -     -    22 |  288   0.06
 POTS |     -    45     -    46     -     -     -     -     -    28 |  288  13.18
 SANT |     -     -     -   279   157     -     -     -     -   143 |  286  12.39
 SEY1 |     -   131     -   236    35     -     -     -     -     - |  280  34.58
 STJO |     -    22    61     -    21     -     -     -     -     - |  288   3.04
 SUTH |     -    35     -    67     -     -     -     -     -     - |  288  15.27
 THTI |     -     -     -     -    71     -     -     -     -    70 |  287   1.58
 TRO1 |     -    46     -     -    40     -     -     -     -     - |  288  14.05
 TSKB |     -    31    49    47     -     -     -     -     -    36 |  287   1.33
 URUM |     -     -     -     -    31     -     -     -     -    31 |  288  43.50
 USNO |     -    36     -    75     -     -     -     -     -    37 |  288   0.05
 USUD |     -    28     -    54     -     -     -     -     -     - |  278   0.20
 WHIT |     -    18     -     -    15     -     -     -     -     - |  288  38.25
 WSRT |     -    58     -     -     -     -     -     -     -    49 |  288   0.08
 WTZR |     -    46     -    44     -     -     -     -     -    35 |  288   0.11
 WUHN |     -    55     -     -    90     -     -     -     -    51 |  287  17.08
 YELL |     -    22    51    72    34     -     -     -     -     - |  288   0.10
 -----+-------------------------------------------------------------+--------------
 TOT  |  5507    80   123   146    77  3827     -  5203     -    73 |


 BEST CLOCK FIT: ALGO   288   0.04 (ns) 

