
 GPS week: 1120   Day: 2   MJD: 52086                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2780     26    -1.62     2.04     5.17     0.00
 cod |   288     0  18240    288    -1.48     3.19     0.08    20.85
 emr |    96     0   3929    314   786.26     5.69     0.10    15.24
 esa |   288     0  15629   4540   780.13     5.61     0.10    15.47
 gfz |   288     0  14763      0    -0.47     0.34     0.05    30.30
 igu |    96     0   2492     42    -2.16     4.36     3.66     0.00
 jpl |     0     0      0      0     0.00     0.00     0.00     0.00
 ngs |    96     0   2780     20    -1.69     1.84     5.10     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  15480    896  -989.37     8.65     0.09    18.14

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |  1913   -49   -95   -59    52  4503     -  2043     -    35 |
    2 | -1178   131    32     X   -15   777     - -1271     -  -135 |
    3 | -3627  -121     X   323   -44   272     - -3952     -   -66 |
    4 |  2485   -32   -32   644  -256 -3593     -  2282     -   -76 |
    5 | -6364    48  -367   832  -107  -872     - -5802     -  -481 |
    6 | -2742   190  -353     X   -70 -6388     - -2690     -     X |
    7 |   346    56    51     X    29   787     -   427     -  -127 |
    8 |  3171   139   139  -153    63 13876     -  2745     -  -174 |
    9 | -3940   344   122 -1006   332  2530     - -3252     -  -147 |
   10 | -3309   -64  -192  1046  -183  -812     - -3195     -  -459 |
   11 |  2405   -61   204     X   -63  -626     -  2621     -   117 |
   13 |  7424   250   313  -430  -210  2560     -  7201     -   325 |
   14 |  2636  -114  -225   689  -132  -298     -  3043     -  -182 |
   15 |  2730   -64  -172     X   133 11528     -  2155     -  -102 |
   17 | -3269   105  -193     X   146-20497     - -3132     -  -306 |
   18 |  4300   -31    84     X     1 -2784     -  4305     -    16 |
   19 |-25421   126     3     X   -29     -     --22853     -   -76 |
   20 |  5118   -50   108     X   -64   373     -  5153     -   134 |
   21 |   325   224   -28  -946   298 -4053     -   438     -     X |
   22 |   573  -263     X   836  -127  6346     -  1588     -  -210 |
   23 |  -316     0     X     X     0  4429     -   177     -     - |
   24 |   829   354    87  -777   115     -     -   394     -    39 |
   25 | -1510   -60  -297   194    88  4345     -  -790     -  -164 |
   26 |  1046     9  -257   929  -179   910     -  1075     -  -408 |
   27 | -6818    56   170     X   -21-12540     - -6282     -   -77 |
   28 | 10887   -14   317  -339   -19 -4713     -  9204     -   249 |
   29 | -1265   -44  -275     X   136 -1391     - -1133     -  -101 |
   30 | -4270   281  -257  -197    91 -3866     - -4114     -  -227 |
   31 | 10773   -49   146     X    -6     -     -  8835     -    26 |
 -----+-------------------------------------------------------------+
 ALGO |     -   -34   167     X   -53     -     -     -     -    81 |
 AUCK |     -   -84     -   -30     -     -     -     -     -   122 |
 BAHR |     -   131   103  -265   -48     -     -     -     -   127 |
 BJFS |     -  -122     -     -    84     -     -     -     -     - |
 CAS1 |     -     -     -     -   -96     -     -     -     -   161 |
 CRO1 |     -     6     -    -8     -     -     -     -     -     - |
 DAV1 |     -     -     -     -   -87     -     -     -     -   146 |
 DRAO |     -    -4    41     -     -     -     -     -     -    -6 |
 EISL |     -   -81     -  -116     -     -     -     -     -   190 |
 FAIR |     -     -  -224     X     -     -     -     -     -   188 |
 GALA |     -     X     -  -107    55     -     -     -     -     - |
 GODE |     -   -69     -    92     -     -     -     -     -     - |
 GUAM |     -  -154     -   242     -     -     -     -     -   -34 |
 HRAO |     -     6     -     -    -4     -     -     -     -     - |
 KIRU |     -   172     -  -233     -     -     -     -     -     - |
 KOKB |     -     -     -   -71   139     -     -     -     -  -301 |
 KOSG |     -   -25     -    33     -     -     -     -     -     - |
 MALI |     -     -     -   -74     -     -     -     -     -    63 |
 MAS1 |     -   -53   104   -62    52     -     -     -     -    -2 |
 MATE |     -   -37    50     -     -     -     -     -     -     - |
 MCM4 |     -    27     -     X   -19     -     -     -     -     X |
 MDO1 |     -   -46    63     -     -     -     -     -     -     - |
 MKEA |     -    -9     -    13     -     -     -     -     -     - |
 NLIB |     -   -21    62     -     -     -     -     -     -     6 |
 NRC2 |     -  -150   206     -     -     -     -     -     -     - |
 NYA1 |     -    21     -     -   -15     -     -     -     -     - |
 OHIG |     -  -107     -   392  -161     -     -     -     -    56 |
 ONSA |     -   -18   118   -21   -52     -     -     -     -    94 |
 PIE1 |     -   -92     -    -7     -     -     -     -     -   111 |
 POTS |     -    -4     -     5     -     -     -     -     -     - |
 SANT |     -     -     -  -105   -23     -     -     -     -   125 |
 SEY1 |     -   -89     -  -650   360     -     -     -     -     - |
 STJO |     -  -102   181     -    40     -     -     -     -     - |
 SUTH |     -   -66     -  -162     -     -     -     -     -   214 |
 THTI |     -     -     -     -    35     -     -     -     -   -59 |
 TRO1 |     -  -135     -     -    93     -     -     -     -     - |
 URUM |     -  -121     -     -  -102     -     -     -     -   310 |
 USNO |     -   -18     -  -221     -     -     -     -     -   209 |
 USUD |     -   -17     -  -238     -     -     -     -     -   222 |
 WHIT |     -   -52     -     -    36     -     -     -     -     - |
 WSRT |     -   -86     -     -     -     -     -     -     -    99 |
 WTZR |     -  -144     -   -16     -     -     -     -     -   179 |
 WUHN |     -   102     -     -  -154     -     -     -     -   140 |
 YELL |     -    13   105  -100   -52     -     -     -     -   129 |
 YSSK |     -   -22     -     -    15     -     -     -     -     - |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  3299    78    84    73    62  2993     -  3499     -    57 |  288   3.19
    2 |  3457    75    99     X    50  2709     -  3497     -    40 |  288   1.88
    3 |  4514   173     X    51    47  1520     -  4276     -   144 |  288   2.03
    4 |   908    80    80   143    73  1691     -  1307     -   266 |  288   0.44
    5 |  3991    87    71    89    44  2908     -  4399     -    46 |  288   2.32
    6 |  9513   113   253     X   103  6203     -  9606     -     X |  277   8.19
    7 |  2168    57    64     X    47  1728     -  2154     -    66 |  288   0.81
    8 |  4222    46    45    94    44  6264     -  3851     -    50 |  288   3.31
    9 |  4029   107    94   134    47  2643     -  3970     -    54 |  288   2.01
   10 |  2929    64   125    77    80  3194     -  3068     -   145 |  288   2.55
   11 |  2402    75   151     X    59   653     -  2356     -    71 |  288   0.43
   13 |  1356   110   124   202    33  1108     -  1204     -   115 |  288   0.30
   14 |  1047    68    56   125    52   974     -  1071     -    48 |  288   0.22
   15 |  6364    95    71     X    36  3705     -  6518     -   139 |  288   2.82
   17 |  1405    61   153     X    35  9536     -  1496     -    50 |  288   3.19
   18 |   788    71   198     X    50  1723     -   874     -    91 |  288   0.41
   19 | 16316    81    47     X    80     -     - 16041     -    80 |  282   2.55
   20 |   957    75    62     X    40   596     -   971     -    50 |  288   0.35
   21 |  4864   116    39   147    62  6268     -  5150     -     X |  288   4.28
   22 |  7815   147     X    65    35  4674     -  6900     -   156 |  288   0.73
   23 |  6482    73     X     X    50  5039     -  6695     -     - |  288   5.65
   24 |  2259    83   138    70    75     -     -  2557     -    44 |  288   2.42
   25 |  2981    90    84    64    28  1990     -  2666     -   100 |  288   1.67
   26 |  1019    75   152    67    41   985     -   977     -    44 |  286   0.34
   27 |  3486    29   109     X    32  5894     -  3088     -    41 |  288   3.02
   28 |  8139    71   149    81    54  4008     -  8254     -    39 |  288   0.82
   29 |   935    65    85     X    54  1580     -   965     -    35 |  278   0.89
   30 |  1941   145    52    47   146  1353     -  1862     -    76 |  288   1.97
   31 | 10364    89    70     X    29     -     -  8993     -    79 |  288   3.30
 -----+-------------------------------------------------------------+--------------
 ALGO |     -    22    28     X    23     -     -     -     -    46 |  288   0.05
 AUCK |     -    41     -    54     -     -     -     -     -    38 |  288  21.61
 BAHR |     -    24    43    54    24     -     -     -     -    35 |  288   0.58
 BJFS |     -    23     -     -    16     -     -     -     -     - |  288   0.94
 CAS1 |     -     -     -     -    57     -     -     -     -    95 |  286   9.41
 CRO1 |     -    35     -    47     -     -     -     -     -     - |  288   0.14
 DAV1 |     -     -     -     -    18     -     -     -     -    30 |  288  23.93
 DRAO |     -    46    15     -     -     -     -     -     -    54 |  288   0.10
 EISL |     -    87     -   113     -     -     -     -     -    48 |  288  32.48
 FAIR |     -     -    33     X     -     -     -     -     -    28 |   96   0.08
 GALA |     -     X     -   158    81     -     -     -     -     - |  284  21.52
 GODE |     -   134     -   180     -     -     -     -     -     - |  216   0.17
 GUAM |     -    90     -    64     -     -     -     -     -   114 |  288  15.21
 HRAO |     -    77     -     -    53     -     -     -     -     - |  288  19.51
 KIRU |     -    42     -    57     -     -     -     -     -     - |  288   3.88
 KOKB |     -     -     -   119    83     -     -     -     -   197 |  285   0.71
 KOSG |     -    20     -    27     -     -     -     -     -     - |  288  86.93
 MALI |     -     -     -    95     -     -     -     -     -    81 |  288 186.77
 MAS1 |     -    44    37    33    38     -     -     -     -    25 |  288   1.76
 MATE |     -    33    45     -     -     -     -     -     -     - |   95   0.07
 MCM4 |     -    40     -     X    28     -     -     -     -     X |  277   4.29
 MDO1 |     -   109   150     -     -     -     -     -     -     - |   94  71.59
 MKEA |     -    23     -    31     -     -     -     -     -     - |  287  27.89
 NLIB |     -    23    32     -     -     -     -     -     -    28 |  287   0.06
 NRC2 |     -    25    35     -     -     -     -     -     -     - |   96   0.08
 NYA1 |     -    26     -     -    18     -     -     -     -     - |  288   0.10
 OHIG |     -    46     -    86    36     -     -     -     -    91 |  288  13.07
 ONSA |     -    39    43    45    18     -     -     -     -    26 |  288   0.27
 PIE1 |     -    41     -    67     -     -     -     -     -    78 |  275 105.04
 POTS |     -    20     -    26     -     -     -     -     -     - |  205  56.35
 SANT |     -     -     -   206    95     -     -     -     -   211 |  252  18.86
 SEY1 |     -   220     -   197    63     -     -     -     -     - |  282  40.63
 STJO |     -    59    45     -    37     -     -     -     -     - |  288   2.41
 SUTH |     -   128     -    92     -     -     -     -     -    82 |  288   9.46
 THTI |     -     -     -     -    50     -     -     -     -    83 |  287   3.34
 TRO1 |     -    46     -     -    32     -     -     -     -     - |  288  12.81
 URUM |     -    24     -     -    28     -     -     -     -    50 |  288  16.70
 USNO |     -    27     -    29     -     -     -     -     -    46 |  288   0.03
 USUD |     -    42     -    58     -     -     -     -     -    69 |  288   0.17
 WHIT |     -    14     -     -    10     -     -     -     -     - |  288   9.95
 WSRT |     -    21     -     -     -     -     -     -     -    24 |  288   0.05
 WTZR |     -    31     -    45     -     -     -     -     -    16 |  288   0.05
 WUHN |     -    76     -     -    43     -     -     -     -    74 |  287  20.77
 YELL |     -    40    41    36    17     -     -     -     -    25 |  288   0.07
 YSSK |     -    74     -     -    51     -     -     -     -     - |  234  12.36
 -----+-------------------------------------------------------------+--------------
 TOT  |  5174    77    98    98    54  3656     -  5097     -    88 |


 BEST CLOCK FIT: USNO   288   0.03 (ns) 

