
 GPS week: 1120   Day: 1   MJD: 52085                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2778     64    -0.47     0.78     4.31     0.00
 cod |   288     0  20147      0    -7.38     6.34     0.09    18.19
 emr |    96     0   3777    263   781.82     5.91     0.12    11.11
 esa |   288     0  16235   2170   779.31     6.13     0.11    14.09
 gfz |   288     0  15130     23    -0.28     0.36     0.06    25.82
 igu |    96     0   2300      0    -7.43     6.56     3.00     0.00
 jpl |   282     0   8579    339    -6.30    16.03     0.11    13.10
 ngs |    96     0   2778     56    -0.64    -0.32     4.31     0.00
 usn |   288     0  16265   1135  -993.24     6.22     0.09    17.69

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   usn |
 -----+-------------------------------------------------------+
    1 | -2429    21  -162    81   -24 -5992  -110 -1463    23 |
    2 | -2118    82   -48     X   -63  7333   303 -2042   -91 |
    3 | -7806   -87  -416   367   123 -3837  -409 -7754  -150 |
    4 |  3237   102   280  -614    83  1504   -46  2759   220 |
    5 |   763  -238  -160  1361  -306  2429   273   450  -453 |
    6 |  5060   159     1     X   -15     -   -52  4220  -124 |
    7 | -4485   193   186  -527    76 -1458   379 -3762   -59 |
    8 | -2990   205   132  -455   -12-12610   208 -2452    47 |
    9 | -6707  -145   -91   765    -8    48   162 -6430  -488 |
   10 | -2330    49   -27   733  -207 -1351   166 -2102  -387 |
   11 |  6141   112    93  -923   227  1717   -43  5578   284 |
   13 |  4736  -259  -117  1619  -343   391  -579  4547  -235 |
   14 |  4046   356   340 -1490   190  2267   212  4257   409 |
   15 | -4344    93    57  -381   221 -4485    40 -3184  -142 |
   17 |  -141   313    90  -554   207     -    74  -295  -227 |
   18 |  5499   -29    21   178    46  -824  -332  5589   -64 |
   19 |-20646   110  -176   148   -53     -    74-17946  -149 |
   20 |  4957  -312  -265  1255  -280  3845    -7  5159  -212 |
   21 |  2091   -95  -413  1221   -86  6288  -480  1726  -382 |
   22 | -6934  -154  -322   663   -37-11832   114 -6615  -290 |
   23 |   343  -165  -213   523  -171     -   134   186     - |
   24 | -3364   -69     X  1001  -291     -   -38 -3146  -289 |
   25 | -7101    75    16  -363    82   642   -40 -6038   104 |
   26 |   975    21  -201  1115   -86   956  -359   899  -582 |
   27 |  3867    20   -52     X     3  4352   236  2645   -99 |
   28 |  9272   -25     X     X   -26 -4288   -12  9100    68 |
   29 |   354   322   159 -1668   465  3521    69   429   227 |
   30 | -1092   315   250 -1788   532  -312    36  -784   194 |
   31 |  7488    29   -84  -518   286 11853     2  6209     X |
 -----+-------------------------------------------------------+
 ALBH |     -   -60     -     -     -     -    83     -     - |
 ALGO |     -     1    76     X  -114     -     -     -   149 |
 AUCK |     -  -129     -  -125     -     -    92     -   167 |
 BAHR |     -   145   304  -220   -39     -     -     -    19 |
 BJFS |     -  -133     -     -    94     -     -     -     - |
 CAS1 |     -     3     -    97   -55     -     -     -     X |
 CRO1 |     -   -65     -     -     -     -    91     -     - |
 DAV1 |     -   -11     -     -   -96     -     -     -   151 |
 DRAO |     -   -69  -134     -     -     -     -     -    99 |
 EISL |     -   -39     -   -25     -     -     -     -    60 |
 FAIR |     -     -     X  -186     -     -   200     -     X |
 GALA |     -    -8     -     -   -45     -   103     -     - |
 GODE |     -    98     -  -127     -     -     -     -     - |
 GOLD |     -    72     -     X     -     -  -100     -     - |
 GUAM |     -   -16     -    -9     -     -   -87     -    84 |
 HOB2 |     -  -831     -  1090     -     -     -     -   -14 |
 HRAO |     -    59     -     -     -     -   -82     -     - |
 JPLM |     -     -     -     -   -66     -   130     -     - |
 KERG |     -    -8     -     -     -     -     -     -     8 |
 KIRU |     -   214     -  -276     -     -     -     -     - |
 KOKB |     -     -     -    32    25     -   -84     -     X |
 KOSG |     -    46     -   -60     -     -     -     -     - |
 LPGS |     -    45     -     X   -32     -     -     -     - |
 MAC1 |     -   123     -     -   -87     -     -     -     - |
 MALI |     -   119     -  -488     -     -     -     -   270 |
 MAS1 |     -    78   156   -92   -70     -     -     -    63 |
 MATE |     -  -139   227     -     -     -     -     -     - |
 MCM4 |     -    85     -     X    25     -     -     -  -141 |
 MDO1 |     -     -   -51     -     -     -    43     -     - |
 MKEA |     -     -     -    65     -     -   -69     -     - |
 NLIB |     -  -166     -     -     -     -     -     -   171 |
 NRC2 |     -   -61    99     -     -     -     -     -     - |
 OHIG |     -  -164     -   189   -71     -     -     -   120 |
 ONSA |     -   -86   275  -125     5     -     -     -   123 |
 PIE1 |     -   135     -  -248     -     -     X     -    59 |
 SANT |     -     -     -  -102   -37     -    -1     -   135 |
 SEY1 |     -     -     -  -181    99     -     -     -     - |
 STJO |     -    10    16     -    -9     -     -     -     - |
 SUTH |     -    68     -  -105     -     -  -366     -   277 |
 THTI |     -     -     -     -    37     -     -     -   -54 |
 TRO1 |     -  -110     -     -    77     -     -     -     - |
 URUM |     -  -181     -     -    22     -     -     -   155 |
 USNO |     -    46     -  -152     -     -     -     -    74 |
 USUD |     -  -135     -   -85     -     -   -35     -   230 |
 VILL |     -   121     -  -157     -     -     -     -     - |
 WHIT |     -   -45     -     -    32     -     -     -     - |
 WILL |     -   -41     -     -     -     -    57     -     - |
 WSRT |     -   -62     -     -     -     -     -     -    64 |
 WTZR |     -   -55     -  -189    14     -     -     -   187 |
 WUHN |     -    34     -     -  -184     -     -     -   233 |
 YELL |     -    76   121  -263   -27     -     -     -   145 |
 YSSK |     -     5     -     -     -     -    -7     -     - |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  8100   120    70    57   102  2804    85  8055    95 |  288   2.92
    2 |  3904    75    66     X    66  5245    65  3976   115 |  288   1.64
    3 |  2739    58   159    75    72  2628   124  2966   111 |  288   2.51
    4 |  1993   137    57   104    45   788    55  2075    45 |  288   0.75
    5 |  2224    59   107    65   125  3645    98  1983   127 |  288   1.95
    6 |  9674   100   190     X    57     -   177  9044    93 |  282   7.25
    7 |  3651   139   140    58    74  1702    96  3889    63 |  288   1.77
    8 |  5297    91   119   213    39  5665   114  5640    68 |  288   4.25
    9 |  1523    68   126   186    49  1520    94  1897   174 |  288   1.64
   10 |  3168   155    70   149    92  3747    99  3021   175 |  288   1.65
   11 |  3922   116   125   105    58   694   248  4005   182 |  288   0.41
   13 |   815   117   174    83    83   873   214   940    90 |  288   0.57
   14 |   571   109   103    66    80   580   111   776    99 |  288   0.16
   15 |  6999   118   327    97    55  2521    72  7309    75 |  288   2.93
   17 |  1552   109   187    67    90     -    64  1231    89 |  288   3.12
   18 |  1294    78    55    76    54   330   140  1457    84 |  288   0.43
   19 |  5757    87   149    62    65     -   255  7106    61 |  288   3.54
   20 |   642   117    85    67    38  1229   133   766   115 |  288   0.20
   21 |  3499    82    84    63    60  2715   207  3116    47 |  288   2.73
   22 |  1890   133    63   140   148  6277    73  2072    38 |  288   0.74
   23 |  6574   102    91    61    46     -    98  6484     - |  288   5.79
   24 |  3436    84     X    78    28     -   110  3061    40 |  288   3.00
   25 |  4456    91    68    73    49  2711    76  4854    87 |  288   2.89
   26 |   905    90    79    71    34   493    83  1017    59 |  288   0.54
   27 |  7506    59   161     X    34  2420   139  7165    48 |  288   2.01
   28 |  3186    89     X     X    71  1071   165  3313    65 |  288   1.33
   29 |  1012    95    77    71    41   801    61  1244    54 |  282   0.88
   30 |  2660    77   111    74   103  1885   126  2432   132 |  288   1.49
   31 |  6401   150    49   112   103  5915   217  6249     X |  288   3.41
 -----+-------------------------------------------------------+--------------
 ALBH |     -    20     -     -     -     -    28     -     - |  282   0.13
 ALGO |     -    34    42     X    31     -     -     -    54 |  288   0.05
 AUCK |     -    40     -    62     -     -   107     -    53 |  288  16.95
 BAHR |     -   190   216   166    74     -     -     -    84 |  288   0.50
 BJFS |     -    40     -     -    29     -     -     -     - |  288   1.74
 CAS1 |     -    57     -    54    32     -     -     -     X |  288   9.77
 CRO1 |     -    48     -     -     -     -    67     -     - |  276   0.37
 DAV1 |     -    64     -     -    27     -     -     -    47 |  288  23.21
 DRAO |     -    25    36     -     -     -     -     -    22 |  288   0.06
 EISL |     -    36     -    65     -     -     -     -    40 |  288  20.38
 FAIR |     -     -     X    58     -     -    63     -     X |  243   0.97
 GALA |     -    30     -     -    33     -    94     -     - |  288  22.02
 GODE |     -   165     -   213     -     -     -     -     - |  222   0.15
 GOLD |     -    20     -     X     -     -    27     -     - |   79   6.58
 GUAM |     -    42     -    60     -     -    50     -    35 |  288  18.50
 HOB2 |     -    46     -    67     -     -     -     -    47 |  288   0.09
 HRAO |     -    66     -     -     -     -    91     -     - |  282  21.37
 JPLM |     -     -     -     -    45     -    88     -     - |  277  26.24
 KERG |     -    79     -     -     -     -     -     -    81 |  287   1.03
 KIRU |     -    36     -    46     -     -     -     -     - |  287 359.01
 KOKB |     -     -     -   199    65     -   195     -     X |  284   0.83
 KOSG |     -    34     -    44     -     -     -     -     - |  288  20.99
 LPGS |     -   145     -     X   102     -     -     -     - |  277  29.98
 MAC1 |     -    54     -     -    38     -     -     -     - |  288  11.45
 MALI |     -   118     -   177     -     -     -     -   183 |  288  24.93
 MAS1 |     -    63    54    37    36     -     -     -    48 |  288   1.75
 MATE |     -    79   129     -     -     -     -     -     - |   92   0.06
 MCM4 |     -   151     -     X    51     -     -     -   228 |  281    >>>
 MDO1 |     -     -   107     -     -     -    91     -     - |   89 166.89
 MKEA |     -     -     -    46     -     -    49     -     - |  280  29.37
 NLIB |     -    59     -     -     -     -     -     -    61 |  229   0.06
 NRC2 |     -    18    30     -     -     -     -     -     - |   96   0.13
 OHIG |     -    92     -    41    36     -     -     -    73 |  288  16.86
 ONSA |     -    30    44    43    20     -     -     -    47 |  288   0.28
 PIE1 |     -    15     -    40     -     -     X     -    25 |  288   0.05
 SANT |     -     -     -   185   116     -   101     -   125 |  288  17.28
 SEY1 |     -     -     -   176    96     -     -     -     - |  280  41.42
 STJO |     -    40    62     -    33     -     -     -     - |  286   1.93
 SUTH |     -    98     -   120     -     -   110     -    43 |  288  10.62
 THTI |     -     -     -     -    34     -     -     -    50 |  287   2.25
 TRO1 |     -    19     -     -    13     -     -     -     - |  288  13.18
 URUM |     -    49     -     -    32     -     -     -    21 |  288  18.09
 USNO |     -    18     -    41     -     -     -     -    42 |  288   0.04
 USUD |     -    45     -    90     -     -    35     -    78 |  288   0.19
 VILL |     -   200     -   259     -     -     -     -     - |  231   2.73
 WHIT |     -    36     -     -    25     -     -     -     - |  288  25.89
 WILL |     -    27     -     -     -     -    38     -     - |  277   1.65
 WSRT |     -    45     -     -     -     -     -     -    46 |  288   0.05
 WTZR |     -    47     -    51    17     -     -     -    44 |  288   0.09
 WUHN |     -    35     -     -    40     -     -     -    58 |  287  22.17
 YELL |     -    68   117    70    23     -     -     -   110 |  288  90.34
 YSSK |     -    33     -     -     -     -    46     -     - |  278  15.79
 -----+-------------------------------------------------------+--------------
 TOT  |  4309    88   121   106    64  2998   112  4309    90 |


 BEST CLOCK FIT: USNO   288   0.04 (ns) 

