
 GPS week: 1119   Day: 2   MJD: 52079                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2766      0    -0.06     0.21     4.83     0.00
 cod |   288     0  19030    177     0.01     1.24     0.08    19.22
 emr |    96     0   3819     92   769.78     1.04     0.09    15.74
 esa |   288     0  11736     47   403.96     1.10     1.35     0.00
 gfz |   288     0  15422     60    -0.06     0.02     0.05    28.30
 igu |    96     0   2384      0     0.06    -0.03     3.86     0.00
 jpl |   282     0   8002     43    -5.52    -2.55     0.09    15.10
 ngs |    96     0   2766      0    -0.04     0.19     4.64     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  14932    277 -1018.01     5.51     0.07    21.63

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |  -232    28  -127 -1697    65   -59  -206  -399     -    -5 |
    2 |  6542   154   -11  4649  -117  8002   234  6102     -   -60 |
    3 |   927   -88  -261  -797   171  1907  -394  1004     -    32 |
    4 |   749   100   107  -695   -22  -943    35   391     -   -98 |
    5 |   661    97   -56 -2236   -30 12922   232   457     -  -113 |
    6 | -5250   158  -136  1903    48 -4994     1 -4734     -  -171 |
    7 |   392   136    70  -322   -41  2764    36   263     -   -95 |
    8 | -2323   121    24 -3836    34  9251    60 -2345     -  -176 |
    9 | -1563    88    -4   934    94  2701   341 -1788     -  -328 |
   10 | -8459   216   222  1530    29-10570   219 -7303     -  -356 |
   11 |  2072  -121   -11  -276    66  -415  -172  2439     -    80 |
   13 |  3972   -31    88  1788    37   -71  -139  3954     -     4 |
   14 |  2502    58    51  3218   -19 -1367   -44  2889     -   -26 |
   15 |  2871   105    27 -3037   -24 -4189    97  2319     -   -98 |
   17 |   -69    79  -222  2828     -     -    24   175     -     - |
   18 |  7881   -53   106 -2093    57 -2223   -97  7807     -   -24 |
   19 | -9472   -58  -137 -4457    44     -    92 -8385     -    -2 |
   20 |  3191   -27   -15  4198   -17  -613    93  3529     -    21 |
   21 |  1061   175   -91 -2841    -5     -  -150  1162     -   -81 |
   22 | -3718  -230  -352 -3141    41  4757  -101 -4604     -   287 |
   23 |  5677   192   -57  2343     0     -   450  5773     -  -325 |
   24 |  5111   160   -10 -1918  -163  -107   194  4461     -     - |
   25 |   210    26  -118 -3154    46  2620  -126   483     -   -15 |
   26 | -2106   226   110  -761    21  -436   216 -2083     -  -329 |
   27 | -7403   -19   -66  4520   124-10997   242 -6538     -  -217 |
   28 |  4054    52   188   397  -120 -1994   -47  3536     -    83 |
   29 |    60    95  -193  1299    32 -3406  -183  -164     -   -23 |
   30 |   263    57  -128 -2323   100  2021  -164  -645     -  -101 |
   31 | -8111   -39     X   173   118 -4756  -119 -8220     -   -75 |
 -----+-------------------------------------------------------------+
 ALBH |     -   -61     -     -     -     -    77     -     -     - |
 ALGO |     -    21   127     -  -110     -     -     -     -    94 |
 AREQ |     -   -41     -     -     -     -  -135     -     -   128 |
 AUCK |     -  -181     -    60   174     -    18     -     -   -31 |
 BAHR |     -    20   178   197   -61     -     -     -     -    18 |
 BJFS |     -  -131     -     -    89     -     -     -     -     - |
 BRMU |     -   -67     -     -   -36     -     -     -     -   107 |
 CAS1 |     -    26     -   384   -77     -     -     -     -    77 |
 CRO1 |     -   -46     -     -     -     -    58     -     -     - |
 DAV1 |     -   -11     -     -  -137     -     -     -     -   189 |
 DRAO |     -    11    15     -     -     -     -     -     -   -13 |
 FAIR |     -     -   -33     -     -     -  -212     -     -   128 |
 FORT |     -  -520     -     -     -     -     -     -     -   462 |
 GALA |     -    66     -     -   -10     -   -66     -     -     - |
 GOLD |     -    94     -     -     -     -  -120     -     -     - |
 GUAM |     -  -116     -   527     0     -   -12     -     -   107 |
 JPLM |     -     -     -     -    11     -   -21     -     -     - |
 KERG |     -   -68     -     -     -     -     -     -     -    61 |
 KOKB |     -     -     -   -42    37     -   -69     -     -     X |
 MAC1 |     -    61     -   387   -41     -     -     -     -     - |
 MAS1 |     -    29   152    90  -151     -     -     -     -   135 |
 MATE |     -   -59    72     -     -     -     -     -     -     - |
 MCM4 |     -    56     -    32    13     -     -     -     -   -69 |
 MDO1 |     -   -44    43     -     -     -    42     -     -     - |
 NLIB |     -    -8     -     -     -     -     -     -     -     7 |
 NRC2 |     -   -94   115     -     -     -     -     -     -     - |
 NYA1 |     -    12     -     -    -8     -     -     -     -     - |
 OHIG |     -    66     -     -   -45     -     -     -     -     - |
 ONSA |     -   -84     -   306    -9     -     -     -     -    86 |
 POTS |     -  -140     -   163     -     -     -     -     -   125 |
 SANT |     -     X     -     -   -45     -    -3     -     -    60 |
 STJO |     -   -39   103     -     8     -     -     -     -     - |
 SUTH |     -   102     -   232     -     -  -130     -     -     - |
 THTI |     -     -     -     -   -43     -     -     -     -    56 |
 TIXI |     -   -14     -     -    10     -     -     -     -     - |
 TRO1 |     -  -211     -     -   143     -     -     -     -     - |
 TSKB |     -  -140    93   397     -     -     -     -     -   102 |
 URUM |     -     -     -     -  -169     -     -     -     -   221 |
 USNO |     -   -24     -     -     -     -     -     -     -    21 |
 USUD |     -   -66     -   211     -     -    84     -     -     - |
 WHIT |     -   -38     -     -    26     -     -     -     -     - |
 WSRT |     -   -85     -     -     -     -     -     -     -    76 |
 WTZR |     -  -163     -   241     -     -     -     -     -   145 |
 WUHN |     -   -29     -     -  -136     -     -     -     -   204 |
 YELL |     -  -103   125     -     -     -     -     -     -     - |
 YSSK |     -   -56     -     -    49     -   -21     -     -     - |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  3182    58    57  3602    70  2810    83  3115     -    52 |  288   2.91
    2 |  8762   111    97  1147    55  6253    70  7700     -    67 |  288   1.94
    3 |  4971   153    75   400    80  5927   169  4957     -   137 |  276   2.70
    4 |  1833    82    49   155    71   857    95  1477     -    69 |  288   0.91
    5 |  3568   105    75   505   104  5521    99  3409     -    53 |  286   2.39
    6 |  9118   138   103  2306    97  4678    98  9993     -    88 |  277   9.10
    7 |  2553   129    61  2949   123  3015   102  2503     -    46 |  276   0.60
    8 |  5369    38    42   791    62  5540    92  5268     -   108 |  288   5.23
    9 |  1770    39    87  2581    45  1297    85  1705     -    64 |  288   1.15
   10 |  5134    79   120  1595    54  4004    75  5666     -   112 |  288   2.68
   11 |  2055    90   102  1509    54   713   123  1735     -    82 |  288   0.54
   13 |  1012    89   135  3345    30   534   130   980     -    63 |  288   0.53
   14 |  1511    81    79   211    40  1223    66  1516     -    39 |  288   0.16
   15 |  3386   102    92  1894    67  2016   126  3370     -    61 |  288   1.85
   17 |  1925   155   134   155     -     -   191  1926     -     - |  186   2.35
   18 |  1785   125   180   138    71  1260    68  1810     -    50 |  288   0.50
   19 |  5386   204    86  2657    47     -   132  4119     -    91 |  287   3.61
   20 |  1665    74    58   216    58   610    59  1451     -    44 |  288   0.25
   21 |  7709   148    84  1363    62     -    69  7751     -   167 |  288   3.31
   22 |  6846    86    91   272    52  1000    57  5946     -   119 |  288   1.20
   23 |  5769   117    99  1187    68     -   127  5714     -    91 |  286   5.89
   24 |  2199    74   125   350    36  3070    44  2696     -     - |  288   2.29
   25 |  5495    66    58   144    39  4032   125  5125     -    50 |  288   1.67
   26 |   529    52   104  3249    45   611   132   620     -    29 |  288   0.56
   27 |  8552    36    89  1192    28 10336    48  7213     -    47 |  288   4.09
   28 |  5446    54    67   331    54  3480   108  5421     -    31 |  288   1.85
   29 |  1675    64    52   217    31  2424    35  1859     -    38 |  288   1.04
   30 |  5853   113    91   353   114  1200    54  5168     -    95 |  288   1.32
   31 |  6181    70     X  1358    66  4913    63  6323     -    86 |  278   4.40
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    41     -     -     -     -    52     -     -     - |  282   0.11
 ALGO |     -    57    47     -    40     -     -     -     -    42 |  288   0.06
 AREQ |     -    63     -     -     -     -    42     -     -    46 |  288  19.71
 AUCK |     -    59     -   144    25     -   115     -     -    66 |  287  23.05
 BAHR |     -    70    68   194    42     -     -     -     -    26 |  288   0.48
 BJFS |     -    38     -     -    26     -     -     -     -     - |  286   0.59
 BRMU |     -    28     -     -    19     -     -     -     -    19 |  288  30.21
 CAS1 |     -    37     -   274    24     -     -     -     -    49 |  288   8.83
 CRO1 |     -    48     -     -     -     -    61     -     -     - |  275   0.43
 DAV1 |     -    68     -     -    18     -     -     -     -    52 |  288  18.87
 DRAO |     -    38    26     -     -     -     -     -     -    30 |  288   0.11
 FAIR |     -     -   165     -     -     -   159     -     -   111 |  212   0.15
 FORT |     -   153     -     -     -     -     -     -     -   136 |  147   0.19
 GALA |     -    77     -     -    42     -    77     -     -     - |  288  22.19
 GOLD |     -    38     -     -     -     -    49     -     -     - |  282  16.42
 GUAM |     -    74     -   145    35     -    85     -     -    58 |  288  13.84
 JPLM |     -     -     -     -    16     -    30     -     -     - |  275  18.52
 KERG |     -    43     -     -     -     -     -     -     -    38 |  287   1.24
 KOKB |     -     -     -   621    54     -   101     -     -     X |  251   0.64
 MAC1 |     -    28     -   209    19     -     -     -     -     - |  287  12.45
 MAS1 |     -    23    30   261    21     -     -     -     -    34 |  288   1.58
 MATE |     -    25    30     -     -     -     -     -     -     - |   95   0.08
 MCM4 |     -    89     -   536    53     -     -     -     -    40 |  287    >>>
 MDO1 |     -    39    36     -     -     -    53     -     -     - |  280    >>>
 NLIB |     -    24     -     -     -     -     -     -     -    21 |  279   0.07
 NRC2 |     -    31    38     -     -     -     -     -     -     - |   96   0.13
 NYA1 |     -    43     -     -    29     -     -     -     -     - |  288   0.07
 OHIG |     -    32     -     -    22     -     -     -     -     - |  281  15.71
 ONSA |     -    78     -   231    28     -     -     -     -    42 |  288   0.25
 POTS |     -    30     -   194     -     -     -     -     -    27 |  288  18.77
 SANT |     -     X     -     -    74     -   162     -     -    86 |  284  14.27
 STJO |     -    45    47     -    34     -     -     -     -     - |  288   1.57
 SUTH |     -    61     -   117     -     -    78     -     -     - |  274  30.45
 THTI |     -     -     -     -    52     -     -     -     -    69 |  287   3.92
 TIXI |     -    23     -     -    16     -     -     -     -     - |  287  11.34
 TRO1 |     -    63     -     -    43     -     -     -     -     - |  287  13.58
 TSKB |     -    35    30   169     -     -     -     -     -    27 |  288   1.54
 URUM |     -     -     -     -    13     -     -     -     -    17 |  288  33.52
 USNO |     -    29     -     -     -     -     -     -     -    26 |  288   0.05
 USUD |     -    37     -   187     -     -    47     -     -     - |  268   0.17
 WHIT |     -    31     -     -    21     -     -     -     -     - |  288  16.25
 WSRT |     -    61     -     -     -     -     -     -     -    54 |  288   0.05
 WTZR |     -    42     -   207     -     -     -     -     -    38 |  287   0.08
 WUHN |     -    61     -     -    52     -     -     -     -    52 |  287  23.85
 YELL |     -    20    25     -     -     -     -     -     -     - |   95   0.12
 YSSK |     -    32     -     -    37     -    72     -     -     - |  287  12.90
 -----+-------------------------------------------------------------+--------------
 TOT  |  4831    77    86  1347    54  3864    93  4637     -    68 |


 BEST CLOCK FIT: USNO   288   0.05 (ns) 

