
 GPS week: 1119   Day: 1   MJD: 52078                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2774      0    -0.08     0.10     4.87     0.00
 cod |   288     0  19598     12    -2.26     2.22     0.09    19.19
 emr |    96     0   3893     17   770.10     0.71     0.08    23.71
 esa |   288     0  16857   1164   763.92     0.68     0.09    17.72
 gfz |   288     0  15299     15    -0.42     0.35     0.08    20.97
 igu |    96     0   2390      0    -0.06     0.11     3.58     0.00
 jpl |     0     0      0      0   -27.65     0.00     0.00     0.00
 ngs |    96     0   2774      0    -0.08     0.13     4.60     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  16388    309 -1018.46     1.82     0.09    18.41

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 | -1913   -98  -243   278   -84 -6605     - -1888     -    34 |
    2 |  1905   149    56    95  -149  5586     -   875     -  -100 |
    3 |   946  -124  -265   -69   176  3830     -  1185     -   108 |
    4 |  2279    10   186   110   -66 -4039     -  1792     -  -121 |
    5 | -9981    80    24   170    78 -9380     - -8687     -  -343 |
    6 | -2402   127   -73     X    49   698     - -2285     -  -155 |
    7 | -5388   198   147    35  -174 -4150     - -4853     -   -97 |
    8 |-11840   219   174  -258   -77-15401     - -9676     -    33 |
    9 | -1013    82    -2   273    91  2980     - -1034     -  -450 |
   10 | -5610  -198   206   283    40 -2853     - -5489     -  -199 |
   11 |  1578  -110    79  -243   108   -36     -  2030     -   192 |
   13 |  2939    73   157  -373   -89   942     -  3181     -   315 |
   14 |  7529   141  -128    95   -35  1783     -  7239     -  -144 |
   15 |  7597   -46   -69    80   211 -1248     -  6931     -  -240 |
   17 | -1812   196   -91  -101   251     -     - -1714     -  -354 |
   18 |  7860   -83   -82    48   120 -1454     -  8074     -   -62 |
   19 |-12191  -193  -222   521  -292     -     --11221     -   115 |
   20 |  4648   -60   -57    98   -86   874     -  4667     -    91 |
   21 |  9971   102  -384   260    27     -     -  8426     -  -222 |
   22 |-10319   103  -183   -56   -34 -1964     - -9590     -    64 |
   23 |  5631    42   -81     X   270 17327     -  4945     -  -318 |
   24 |  -148     1    94    60   -87     -     -   215     -     - |
   25 | -3088   106  -204   187   -96 -1367     - -2554     -   -93 |
   26 | -3960    63    27   181   137 -2464     - -3769     -  -407 |
   27 |  6968   -44   -43   131   -30 12610     -  5012     -   -27 |
   28 |  5665   111   331  -848   129  2250     -  3495     -   411 |
   29 |  5471   110  -297   143   104 -1185     -  4793     -  -243 |
   30 |  3104    24  -171   301    22  6490     -  3516     -  -267 |
   31 | -4731  -112   -45   -39   179 -3296     - -3910     -   -29 |
 -----+-------------------------------------------------------------+
 ALGO |     -   -46   109     X  -126     -     -     -     -   145 |
 AREQ |     -   -80     -   -67     -     -     -     -     -   148 |
 AUCK |     -  -172     -   -31     -     -     -     -     -   209 |
 BAHR |     -    -3    85   -33   -37     -     -     -     -    40 |
 BRMU |     -     9     -     -  -115     -     -     -     -   122 |
 CAS1 |     -   -87     -   144   -73     -     -     -     -    36 |
 DAV1 |     -   -42     -     -    38     -     -     -     -     - |
 DRAO |     -  -125   -30     -     -     -     -     -     -   143 |
 FAIR |     -     -    72  -226     -     -     -     -     -   150 |
 FORT |     -  -279     -   234  -119     -     -     -     -   108 |
 GALA |     -   143     -  -117   -32     -     -     -     -     - |
 GUAM |     -  -175     -   187   -12     -     -     -     -    14 |
 HOB2 |     -   256   144  -157     -     -     -     -     -  -178 |
 KERG |     -    22     -     -     -     -     -     -     -   -23 |
 KIRU |     -    93     -  -101     -     -     -     -     -     - |
 KOKB |     -     -     -  -110    93     -     -     -     -     X |
 LPGS |     -     -     -  -280    49     -     -     -     -   213 |
 MAC1 |     -   -89     -    38    50     -     -     -     -     - |
 MALI |     -    47     -  -171     -     -     -     -     -   117 |
 MAS1 |     -    29   167  -114   -22     -     -     -     -    32 |
 MATE |     -   -60    48     -     -     -     -     -     -     - |
 MCM4 |     -    44     -     X    50     -     -     -     -  -107 |
 MDO1 |     -  -119    96     -     -     -     -     -     -     - |
 NLIB |     -  -109     -     -     -     -     -     -     -   114 |
 NRC2 |     -  -155   126     -     -     -     -     -     -     - |
 NYA1 |     -   -18     -     -    17     -     -     -     -     - |
 OHIG |     -   -69     -   198  -105     -     -     -     -     - |
 ONSA |     -   -67     -    33   -11     -     -     -     -    50 |
 PIE1 |     -   -84     -  -101     -     -     -     -     -   185 |
 POTS |     -  -112     -   -36     -     -     -     -     -   152 |
 SELE |     -   165     -  -179     -     -     -     -     -     - |
 SEY1 |     -     -     -  -322   272     -     -     -     -     - |
 STJO |     -    -4   124     -   -43     -     -     -     -     - |
 SUTH |     -    22     -   -24     -     -     -     -     -     - |
 THTI |     -     -     -     -  -188     -     -     -     -   215 |
 TIXI |     -   -21     -     -    19     -     -     -     -     - |
 TRO1 |     -  -143     -     -   130     -     -     -     -     - |
 TSKB |     -    -6   102  -144     -     -     -     -     -   101 |
 URUM |     -     -     -     -  -131     -     -     -     -   150 |
 USNO |     -    72     -  -240     -     -     -     -     -   156 |
 USUD |     -   -47     -    51     -     -     -     -     -     - |
 VILL |     -   -24     -    26     -     -     -     -     -     - |
 WSRT |     -   -91     -     -     -     -     -     -     -    95 |
 WTZR |     -   -76     -   -11     -     -     -     -     -    89 |
 WUHN |     -   -89     -     -   -55     -     -     -     -   155 |
 YAR2 |     -   299     -    96     -     -     -     -     -  -495 |
 YELL |     -    32   146  -100     -     -     -     -     -     - |
 YSSK |     -   -23     -     -    21     -     -     -     -     - |
 ZWEN |     -     -     -     -  -305     -     -     -     -   347 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  3538    58    56    66    64  3869     -  3592     -    38 |  288   3.70
    2 |  7599    76    93   128   108  2856     -  7614     -    36 |  288   3.01
    3 |  2526   116   148   148   100  3873     -  2222     -   121 |  282   2.05
    4 |  2729    60    37    41    88   885     -  2448     -    72 |  288   0.90
    5 |  4950    85   100    76    58  7866     -  4936     -    61 |  288   4.00
    6 |  7703   168   142     X    95  4148     -  7714     -   130 |  276   7.81
    7 |  3078   152    54   130   106  1237     -  3303     -   102 |  279   1.29
    8 |  7401   101    50    55    81  5900     -  6983     -    47 |  288   4.38
    9 |  1329    49    66    32    33  2108     -  1272     -    66 |  288   1.13
   10 |  8747    93    47    64    60  4252     -  7820     -    72 |  288   1.83
   11 |   898    62    77    34    56  1018     -   790     -    80 |  288   0.48
   13 |  1608   101    54    67    42  1623     -  1541     -    53 |  288   0.59
   14 |  1801   111    63    87    32  1658     -  1559     -    54 |  288   0.25
   15 |  4727    64   109    73    57  3171     -  4286     -    52 |  288   2.86
   17 |  1246   111   131   120    55     -     -  1245     -    53 |  288   3.20
   18 |  2142   128    35   184    85   601     -  1964     -    53 |  288   0.49
   19 |  6882   143    61   102    52     -     -  7094     -   243 |  288   3.88
   20 |   771    69    54   136    59  1594     -   805     -   127 |  288   0.28
   21 |  5673    67   113    76   110     -     -  4567     -    42 |  288   2.74
   22 |  1296    88   112    49    60   956     -  1749     -    79 |  288   0.47
   23 |  8191   166    78     X   126  5411     -  8334     -    97 |  288   5.86
   24 |  3573    91    40    67   117     -     -  3545     -     - |  288   2.11
   25 |  3487    87    44    68    39  1521     -  3185     -    26 |  288   1.66
   26 |   778    73    85    70    96   678     -   757     -    66 |  288   0.40
   27 |  7186    53    69    56    44  5653     -  6135     -    49 |  288   5.17
   28 |  4764    76   149    49   130  1588     -  2012     -    72 |  288   0.36
   29 |  4615   121    68    81    63  1416     -  4674     -    71 |  288   0.65
   30 |  5306   100    90    31    47  4714     -  4620     -    55 |  288   1.52
   31 |  7323   106    39   144   105  6063     -  7170     -    32 |  282   2.98
 -----+-------------------------------------------------------------+--------------
 ALGO |     -    28    45     X    32     -     -     -     -    41 |  288   0.03
 AREQ |     -    41     -    17     -     -     -     -     -    45 |  288  20.55
 AUCK |     -    48     -    31     -     -     -     -     -    51 |  288  18.88
 BAHR |     -    35    61    39    48     -     -     -     -    22 |  288   0.27
 BRMU |     -    33     -     -    20     -     -     -     -    46 |  288  31.85
 CAS1 |     -    43     -    89    45     -     -     -     -   169 |  288   8.94
 DAV1 |     -    41     -     -    37     -     -     -     -     - |  286  20.21
 DRAO |     -    43    47     -     -     -     -     -     -    59 |  288   0.08
 FAIR |     -     -    87   200     -     -     -     -     -   188 |  190   1.58
 FORT |     -    83     -    62    69     -     -     -     -    41 |  288   0.09
 GALA |     -    54     -    22    52     -     -     -     -     - |  288  21.62
 GUAM |     -    40     -    68    36     -     -     -     -    52 |  288  13.13
 HOB2 |     -    38    45    26     -     -     -     -     -    29 |  288   0.09
 KERG |     -    33     -     -     -     -     -     -     -    35 |  287   1.99
 KIRU |     -    59     -    64     -     -     -     -     -     - |  288   2.79
 KOKB |     -     -     -   175   148     -     -     -     -     X |  247   2.18
 LPGS |     -     -     -   162    70     -     -     -     -    89 |  284 243.71
 MAC1 |     -    71     -   174    88     -     -     -     -     - |  288  10.21
 MALI |     -    24     -    36     -     -     -     -     -    25 |  288  46.88
 MAS1 |     -    29    35    29    29     -     -     -     -    42 |  288   1.82
 MATE |     -    33    27     -     -     -     -     -     -     - |   95   0.11
 MCM4 |     -   197     -     X   131     -     -     -     -   253 |  274  15.18
 MDO1 |     -    36    30     -     -     -     -     -     -     - |   90  10.01
 NLIB |     -   242     -     -     -     -     -     -     -   252 |  272   0.19
 NRC2 |     -    27    22     -     -     -     -     -     -     - |   96   0.17
 NYA1 |     -    50     -     -    46     -     -     -     -     - |  288   0.08
 OHIG |     -   108     -    86    61     -     -     -     -     - |  288  15.64
 ONSA |     -    53     -    34    13     -     -     -     -    24 |  288   0.17
 PIE1 |     -    49     -    45     -     -     -     -     -    76 |  287   0.07
 POTS |     -    70     -    35     -     -     -     -     -    43 |  288  23.07
 SELE |     -    23     -    25     -     -     -     -     -     - |  287  35.49
 SEY1 |     -     -     -   260   220     -     -     -     -     - |  216  43.69
 STJO |     -    32    44     -    29     -     -     -     -     - |  288   3.94
 SUTH |     -   105     -   114     -     -     -     -     -     - |  288  25.74
 THTI |     -     -     -     -    70     -     -     -     -    80 |  287   0.93
 TIXI |     -    44     -     -    41     -     -     -     -     - |  287   9.23
 TRO1 |     -    65     -     -    59     -     -     -     -     - |  288  12.08
 TSKB |     -    53    61    71     -     -     -     -     -    46 |  288   1.18
 URUM |     -     -     -     -    17     -     -     -     -    20 |  288  43.49
 USNO |     -    32     -    32     -     -     -     -     -    40 |  288   0.05
 USUD |     -    43     -    46     -     -     -     -     -     - |  288   0.17
 VILL |     -   166     -   180     -     -     -     -     -     - |  231   3.94
 WSRT |     -    41     -     -     -     -     -     -     -    43 |  288   0.06
 WTZR |     -    48     -    31     -     -     -     -     -    28 |  288   0.08
 WUHN |     -    41     -     -    61     -     -     -     -    56 |  287  21.34
 YAR2 |     -    96     -   100     -     -     -     -     -    47 |  278 304.64
 YELL |     -    42    47    54     -     -     -     -     -     - |  288   0.06
 YSSK |     -    22     -     -    20     -     -     -     -     - |  287  14.07
 ZWEN |     -     -     -     -   162     -     -     -     -   184 |  242  16.60
 -----+-------------------------------------------------------------+--------------
 TOT  |  4875    86    76    93    78  3584     -  4600     -    89 |


 BEST CLOCK FIT: ALGO   288   0.03 (ns) 

