
 GPS week: 1119   Day: 0   MJD: 52077                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2774      0    -0.06     0.08     6.23     0.00
 cod |   288     0  18690     40    -0.93    -0.35     0.08    22.45
 emr |    96     0   3817     96   771.06    -0.08     0.09    19.64
 esa |   288     0  16648   1230   764.94    -0.02     0.13    12.65
 gfz |   288     0  14540      0    -0.40     0.18     0.08    23.65
 igu |    96     0   2106     17    -0.33     1.44     4.12     0.00
 jpl |   288     0   7083    374     2.91    -2.81     0.14     0.00
 ngs |    96     0   2774      0    -0.06     0.08     6.16     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  16456    267 -1020.48     2.55     0.08    21.62

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |  2703   -46  -144   220    14  5169  -178  2068     -   -53 |
    2 |  4217   127    32  -105   -46  8226   286  3874     -   -29 |
    3 | -7599   -66   -86     X    76   870  -327 -7143     -    11 |
    4 |  1800    89    86    65    26  -733   137  1595     -  -185 |
    5 |   690   168  -107   261   -79     -   407   168     -  -208 |
    6 | -4310   198  -165  -289    93     -     0 -3711     -   -94 |
    7 | -3815   133   -48   -72    82 -2848   158 -3563     -  -173 |
    8 |  -169   126    51  -180    44-14423   251  -503     -   -89 |
    9 |  2428    84   -17   154   149 -2332   427  2324     -  -335 |
   10 | -5140   190    49    60    96  2937    32 -4519     -  -353 |
   11 |   580  -154   108   296  -131  4117  -231  1080     -    98 |
   13 |   706     0     X    39  -108   962   178   995     -    95 |
   14 |  3785    97    60   -94  -155  1524    90  3984     -   106 |
   15 | 10692   -58   -87   287   119     -  -348  9284     -  -213 |
   17 |  1985   297  -153  -117    98     -  -114  1578     -  -301 |
   18 |  6109   -92   101   -39    96 -3986  -179  6228     -   -17 |
   19 |  5598   -70  -152   426  -189     -   308  3619     -    71 |
   20 |  1897    62    99   -85   -75   116   214  2440     -    38 |
   21 | -2888   194  -241     X    -6     -  -293 -2698     -  -122 |
   22 | -9873    51  -229    62   -23-16851   -14 -8908     -     5 |
   23 |  -368   129  -155    30   233  2777   162  -472     -  -364 |
   24 | -2423   106  -112     X   -70 -5273   174 -2017     -     - |
   25 | -1725   -26  -172   118   -31  1598   -53 -2322     -    44 |
   26 | -6446   140    24   139   118   510   198 -6240     -  -362 |
   27 |  -743   -53   -40  -129   185  4054   325   303     -   -61 |
   28 |  2248   -84   269  -174  -165 10878    71  2993     -   287 |
   29 |  3889    68  -117  -101    52  2704  -106  3696     -   -32 |
   30 | -2465    84  -121   135    18 -2692   108 -2788     -  -148 |
   31 | -1916   -82   156  -171    97     -   -62 -1857     -     8 |
 -----+-------------------------------------------------------------+
 ALBH |     -  -295     -   523     -     -    41     -     -     - |
 ALGO |     -   -87   111     X   -58     -     -     -     -   120 |
 AREQ |     -     -     -  -135     -     -  -171     -     -    79 |
 AUCK |     -  -277     -   -23   362     -   -80     -     -   -95 |
 BAHR |     -    76   106  -236    41     -     -     -     -   -17 |
 BJFS |     -  -112     -     -   106     -     -     -     -     - |
 BRMU |     -   115     -  -326   -58     -     -     -     -   136 |
 CAS1 |     -   -39     -   140   -98     -     -     -     -    69 |
 DAV1 |     -   -47     -     -   -94     -     -     -     -   152 |
 DRAO |     -   -41    36     -     -     -     -     -     -    31 |
 FAIR |     -     -   -77  -162     -     - -1172     -     -   109 |
 FORT |     -  -579     -   280     -     -     -     -     -   149 |
 GALA |     -    95     -     -   -90     -    12     -     -     - |
 GUAM |     -   -56     -    55  -111     -   -54     -     -   147 |
 HOB2 |     -   176     -  -479     -     -     -     -     -    97 |
 KERG |     -   -72     -     -     -     -     -     -     -    75 |
 KIRU |     -   148     -  -264     -     -     -     -     -     - |
 KOKB |     -     -     -   -50    27     -     7     -     -     X |
 LPGS |     -     -     -  -240   128     -     -     -     -     - |
 MAC1 |     -   132     -   202  -234     -     -     -     -     - |
 MALI |     -    99     -  -222     -     -     -     -     -    33 |
 MAS1 |     -   -12   163   -55   -46     -     -     -     -    45 |
 MATE |     -   -35    40     -     -     -     -     -     -     - |
 MCM4 |     -   -29     -   381   -80     -     -     -     -   -97 |
 MDO1 |     -   -80    91     -     -     -   101     -     -     - |
 NLIB |     -   -20     -     -     -     -     -     -     -    21 |
 NRC2 |     -  -151   173     -     -     -     -     -     -     - |
 OHIG |     -   -57     -   292  -261     -     -     -     -   172 |
 PIE1 |     -   -83     -   123     -     -   -31     -     -    14 |
 POTS |     -     -     -   -89     -     -     -     -     -    52 |
 SANT |     -     -     -    46  -106     -    66     -     -    84 |
 SEY1 |     -   142     -  -242     8     -     -     -     -     - |
 STJO |     -   -62   168     -    12     -     -     -     -     - |
 SUTH |     -  -100     -   178     -     - -1098     -     -     - |
 THTI |     -     -     -     -  -114     -     -     -     -   124 |
 TIXI |     -     5     -     -    -5     -     -     -     -     - |
 TRO1 |     -  -130     -     -   124     -     -     -     -     - |
 TROM |     -     -     -  -130     -     -     -     -     -    76 |
 TSKB |     -  -125   159  -126     -     -     -     -     -   155 |
 URUM |     -  -184     -     -     -     -     -     -     -   191 |
 USNO |     -   -69     -  -139     -     -     -     -     -   150 |
 USUD |     -   -47     -    84     -     -    27     -     -     - |
 WHIT |     -   -54     -     -    52     -     -     -     -     - |
 WSRT |     -  -103     -     -     -     -     -     -     -   107 |
 WTZR |     -  -129     -   -81     -     -     -     -     -   181 |
 WUHN |     -   -69     -     -     -     -     -     -     -    71 |
 YELL |     -    45   127  -145     -     -     -     -     -     - |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  7997    50    87   143    71  7726    84  7207     -    42 |  288   4.57
    2 |  2713    74    48   176   128  1993   120  2956     -    54 |  288   1.73
    3 |  2462   156   138     X   139  2805   185  2724     -    61 |  276   2.21
    4 |  1485    73   108    97    58   532    79  1234     -    56 |  288   0.47
    5 |  3752   114   101   251    62     -   156  5055     -   112 |  288   3.39
    6 |  8072   151   160   246    96     -   102  9058     -   105 |  281   8.30
    7 |  1719   175   139   179   148  3478   139  1529     -    44 |  281   2.61
    8 |  9535    63    35   167    75  9275   320  8924     -    43 |  288   5.74
    9 |  2793    95    46    94   101  3350   102  2926     -    70 |  288   1.46
   10 |  4719    73    31    85    42  4384    61  5223     -    49 |  288   1.90
   11 |  1479    98    89   118   103  1792   169  1341     -    71 |  288   0.31
   13 |  1891   166     X   114    95   961   371  1791     -    66 |  288   0.51
   14 |  1884    52    68    88    28  1035    55  1938     -    73 |  288   0.18
   15 |  4918    60    44   111    71     -   120  5187     -   119 |  288   2.81
   17 |  3327    72    80    84    46     -   127  2888     -    85 |  288   3.19
   18 |  2129    79    78   132   119  1733    60  2087     -    97 |  288   0.40
   19 | 19506   160   183    91    90     -   179 19683     -    93 |  288   6.59
   20 |  2822    71    78   104   117   636    75  2555     -   119 |  288   0.21
   21 |  7147    61   100     X    41     -   124  6022     -    34 |  288   2.72
   22 |  3035    63    52    70   126  7097    86  2405     -   150 |  288   0.70
   23 |  8064    86   113   169    48  3557    90  8179     -    92 |  288   4.43
   24 |  2047    47    87     X    48  3242    90  2109     -     - |  288   1.81
   25 |  4342    32    79   102   101  1330   136  3839     -    55 |  288   1.12
   26 |  1608    60    85    47    41   899   134  1477     -    35 |  288   0.61
   27 | 11050    76   150   127   117  5739   129 10320     -    46 |  288   3.93
   28 |  9428   151    94   195   114  7713   138  9295     -   127 |  288   0.68
   29 |  2836    49   117   105    70  2572    81  2710     -    44 |  288   0.50
   30 |  4145    95    82   123    55  2279   118  3782     -    45 |  288   1.32
   31 |  5141   110    91    43    67     -   112  5241     -    40 |  280   3.27
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    49     -    88     -     -    97     -     -     - |  264   0.14
 ALGO |     -    55    33     X    43     -     -     -     -    38 |  288   0.03
 AREQ |     -     -     -    33     -     -    62     -     -    20 |  288  39.15
 AUCK |     -    38     -    72    21     -   114     -     -    31 |  288  20.87
 BAHR |     -    55    37    56    49     -     -     -     -    40 |  288   0.48
 BJFS |     -    29     -     -    28     -     -     -     -     - |  288   1.23
 BRMU |     -    52     -    43    39     -     -     -     -    43 |  288  25.49
 CAS1 |     -    29     -   203    36     -     -     -     -   160 |  288   9.89
 DAV1 |     -    41     -     -    22     -     -     -     -    30 |  288  21.67
 DRAO |     -    20    37     -     -     -     -     -     -    29 |  288   0.07
 FAIR |     -     -    95   292     -     -   281     -     -   136 |  215   1.25
 FORT |     -   125     -   193     -     -     -     -     -   107 |  238   0.20
 GALA |     -    56     -     -    53     -    76     -     -     - |  287  22.25
 GUAM |     -    54     -    97    30     -   134     -     -    43 |  288  18.86
 HOB2 |     -    29     -    91     -     -     -     -     -    29 |  288   0.06
 KERG |     -    43     -     -     -     -     -     -     -    44 |  287   1.81
 KIRU |     -    23     -    41     -     -     -     -     -     - |  288   2.00
 KOKB |     -     -     -   189   101     -   238     -     -     X |  259   0.85
 LPGS |     -     -     -    88    47     -     -     -     -     - |  254  28.81
 MAC1 |     -    53     -   125    31     -     -     -     -     - |  288  12.10
 MALI |     -    54     -    62     -     -     -     -     -    37 |  288  11.00
 MAS1 |     -    42    36    49    44     -     -     -     -    22 |  288   2.18
 MATE |     -    18    21     -     -     -     -     -     -     - |   95   0.11
 MCM4 |     -    67     -   277    79     -     -     -     -    32 |  288   8.45
 MDO1 |     -    21    25     -     -     -    76     -     -     - |   96  15.36
 NLIB |     -   250     -     -     -     -     -     -     -   260 |  269    >>>
 NRC2 |     -    14    16     -     -     -     -     -     -     - |   96   0.07
 OHIG |     -    60     -    68    36     -     -     -     -    26 |  288  13.21
 PIE1 |     -    52     -    66     -     -    71     -     -    29 |  288   0.06
 POTS |     -     -     -   200     -     -     -     -     -   117 |  276  15.17
 SANT |     -     -     -    89    98     -   181     -     -   123 |  284  16.05
 SEY1 |     -    74     -   117    82     -     -     -     -     - |  279  34.94
 STJO |     -    26    46     -    27     -     -     -     -     - |  288   3.92
 SUTH |     -    65     -   116     -     -   318     -     -     - |  288  14.62
 THTI |     -     -     -     -    56     -     -     -     -    62 |  287   2.86
 TIXI |     -    13     -     -    12     -     -     -     -     - |  287  12.13
 TRO1 |     -    30     -     -    28     -     -     -     -     - |  288  12.68
 TROM |     -     -     -    34     -     -     -     -     -    20 |  288  14.09
 TSKB |     -    44   114    70     -     -     -     -     -    64 |  288   1.02
 URUM |     -    19     -     -     -     -     -     -     -    20 |  288  36.82
 USNO |     -    56     -    58     -     -     -     -     -    46 |  288   0.09
 USUD |     -    50     -    89     -     -    84     -     -     - |  288   0.17
 WHIT |     -    41     -     -    39     -     -     -     -     - |  288  22.61
 WSRT |     -    40     -     -     -     -     -     -     -    42 |  288   0.04
 WTZR |     -    44     -    37     -     -     -     -     -    32 |  288   0.07
 WUHN |     -    83     -     -     -     -     -     -     -    86 |  287  21.02
 YELL |     -    60    65   127     -     -     -     -     -     - |  288   0.11
 -----+-------------------------------------------------------------+--------------
 TOT  |  6225    80    88   128    75  4121   141  6157     -    79 |


 BEST CLOCK FIT: ALGO   288   0.03 (ns) 

