
 GPS week: 1117   Day: 4   MJD: 52067                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2768      0     0.15    -0.17     5.05     0.00
 cod |   287     0  17005     28     0.89    -4.76     0.07    29.38
 emr |    96     0   3918      3   731.46     9.38     0.08    23.98
 gfz |   288     0  14122     30    -0.21     0.59     0.10    18.63
 igu |    96     0   2576      0     0.13    -0.12     3.68     0.00
 ngs |    96     0   2768      0     0.15    -0.17     4.94     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  15104    283   541.32    34.78     0.07    28.01

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   igu   ngs   sio   usn |
 -----+-------------------------------------------------+
    1 | -8849    46   -42  -164 -9148 -6866     -    73 |
    2 |  -372   190   -71    17 -5550  -436     -  -190 |
    3 |  1644    -6    20   -54  7229  1701     -    34 |
    4 |   348   -23    78   183   640   193     -  -120 |
    5 |  5907   162  -203    10 14973  4331     -  -118 |
    6 | -8990    24  -183   247-16427 -9108     -  -136 |
    7 | -1781   128   103  -125 -2109 -1616     -   -74 |
    8 |  -714   101    36    44 -2030  -344     -  -145 |
    9 | -1051    83   -92   239 -2598  -751     -  -219 |
   10 | -1183   165  -123   102 -2043 -1107     -  -205 |
   11 |  4257  -107    60  -120  -919  4068     -   173 |
   13 |  5375  -108    66   -87 -1495  5251     -   152 |
   14 |  4888    26    13  -117 -2569  4838     -    47 |
   15 |  7695    89  -163   -69 22346  4983     -     - |
   17 | -2257   247  -166   -56     - -2154     -  -174 |
   18 |  3108    21   -20    64 -4923  3149     -   -57 |
   19 |   318    61    43  -114  5311   -75     -     2 |
   20 |  5014    13    55  -126 -1720  4892     -    54 |
   21 | -2037   195  -102  -155   674 -1531     -   -71 |
   22 | -5173    99  -113  -140 -5140 -5185     -    23 |
   23 | -4947   241  -120   127-12555 -3599     -  -304 |
   24 |   306   112   -87   122 10663  -126     -  -174 |
   25 |  1979    58  -150    14  6593  1154     -   -28 |
   26 | -1076    49   -41   307 -1334  -998     -  -243 |
   27 | -7500   118    82   -22     - -5536     -  -132 |
   28 | -1474  -143   374  -196 -6499  -589     -   174 |
   29 |   372    31  -101    48 -2116   470     -   -35 |
   30 |  6267    65  -218   127   467  5994     -   -91 |
   31 |  -479   -40   142     7 10233 -1451     -    -4 |
 -----+-------------------------------------------------+
 ALGO |     -  -117   119   -14     -     -     -    97 |
 AUCK |     -  -105     -     -     -     -     -   110 |
 BAHR |     -     4   100  -129     -     -     -    53 |
 BRMU |     -     -     -   -76     -     -     -    51 |
 CAS1 |     -    15     -  -113     -     -     -    60 |
 DAV1 |     -   -13     -  -127     -     -     -   100 |
 DRAO |     -    10    50     -     -     -     -   -25 |
 GALA |     -    -8     -    13     -     -     -     - |
 GODE |     -   -56     -     -     -     -     -    59 |
 GUAM |     -     3     -    -5     -     -     -     X |
 HOB2 |     -  -169    22     -     -     -     -   170 |
 KARR |     -    21     -   -32     -     -     -     - |
 KERG |     -    24     -     -     -     -     -   -26 |
 KOKB |     -     -   -40   289     -     -     -  -139 |
 KSTU |     -    -9     -    14     -     -     -     - |
 MAC1 |     -   -27     -    42     -     -     -     - |
 MALI |     -  -227     -   262     -     -     -    51 |
 MAS1 |     -   -40    96   -60     -     -     -    54 |
 MATE |     -  -110   135     -     -     -     -     - |
 MCM4 |     -     -     -   -82     -     -     -    55 |
 MDO1 |     -  -162    71     -     -     -     -   148 |
 NRC2 |     -  -130   159     -     -     -     -     - |
 NYA1 |     -    -3     -     4     -     -     -     - |
 OHIG |     -     -     -  -177     -     -     -   118 |
 ONSA |     -   -78     -   -67     -     -     -   127 |
 PIE1 |     -   -68     -     -     -     -     -    72 |
 POTS |     -  -119     -     -     -     -     -   125 |
 STJO |     -     4   169   -79     -     -     -     - |
 THTI |     -    -2     -     -     -     -     -     3 |
 TRO1 |     -  -114     -   179     -     -     -     - |
 TSKB |     -     -    51     -     -     -     -   -44 |
 WHIT |     -   -71     -   113     -     -     -     - |
 WSRT |     -  -111     -     -     -     -     -   116 |
 WTZR |     -  -135     -     -     -     -     -   142 |
 YAKZ |     -  -112     -     -     -     -     -   118 |
 YELL |     -  -136     4     -     -     -     -   141 |
 YSSK |     -   -14     -    22     -     -     -     - |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   igu   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------+--------------
    1 |  9581    56    44    42  3078  8587     -    74 |  288   4.27
    2 |  3476    75    79   135  3815  3678     -   118 |  288   1.72
    3 |  2521   205   123    88  2749  2553     -   153 |  276   1.78
    4 |   925    73    82   124   756  1223     -    29 |  288   0.71
    5 |  6385    64    53    66  9888  7236     -    62 |  288   4.72
    6 | 10232   182    84   195  8759 10238     -    82 |  277   7.08
    7 |  1072   129   206    78  1709  1070     -    63 |  276   0.98
    8 |  6750    32    86    72  2575  6823     -    68 |  288   4.54
    9 |  3843    40    42    85  2140  3848     -    27 |  288   1.51
   10 |  3257   180    45   258  4835  3229     -    75 |  288   1.66
   11 |   695    49    63    79   374   541     -    78 |  288   0.31
   13 |  1600    53    38   128   710  1613     -   102 |  288   0.39
   14 |  1274    59    85    44  1096  1554     -    83 |  288   0.25
   15 |  8341    39    57    48  5617  7826     -     - |  288   3.04
   17 |  1192    50    43    48     -  1154     -    45 |  288   2.96
   18 |   765    84    28    68  2184   679     -    46 |  288   0.46
   19 |  5572    54    80    65  2497  5452     -    96 |  288   2.89
   20 |   670    87   116   173   703   640     -    33 |  288   0.28
   21 |  4942    57    84    49  2658  4870     -    40 |  288   2.70
   22 |  2010    75   154   191  3446  1981     -   216 |  288   1.48
   23 |  8704    86   122   133  3386  9244     -    79 |  288   5.73
   24 |  6205    40    93   149  1229  5669     -    76 |  288   1.68
   25 |  5255    93    79    52  1977  4749     -    94 |  288   1.27
   26 |  1679    38   118   137  1312  1460     -    58 |  288   0.66
   27 |  7659    31    72    43     -  6884     -    32 |  288   3.83
   28 |  5873    52   123    79  1427  5841     -    57 |  288   1.04
   29 |  1731    52    34    97   619  1483     -    31 |  288   0.61
   30 |  1810    41   132   121  1334  1838     -    57 |  288   1.03
   31 |  6319   125    69   145  6429  6128     -    56 |  277   3.99
 -----+-------------------------------------------------+--------------
 ALGO |     -    77    45    53     -     -     -    44 |  288   0.04
 AUCK |     -    23     -     -     -     -     -    24 |  287  17.13
 BAHR |     -    24    61    26     -     -     -    32 |  288   0.37
 BRMU |     -     -     -   141     -     -     -    94 |  288  28.71
 CAS1 |     -    21     -    32     -     -     -    35 |  288  16.48
 DAV1 |     -    60     -    66     -     -     -    42 |  288  16.54
 DRAO |     -    57    51     -     -     -     -    47 |  288   0.04
 GALA |     -    40     -    63     -     -     -     - |  287  22.33
 GODE |     -    34     -     -     -     -     -    36 |  286  13.55
 GUAM |     -    21     -    34     -     -     -     X |  283  15.95
 HOB2 |     -    35    26     -     -     -     -    34 |  288   0.08
 KARR |     -    50     -    79     -     -     -     - |  287  68.60
 KERG |     -    62     -     -     -     -     -    65 |  287   1.26
 KOKB |     -     -   100   204     -     -     -    96 |  207   1.01
 KSTU |     -    18     -    28     -     -     -     - |  287  14.24
 MAC1 |     -    19     -    30     -     -     -     - |  287  11.64
 MALI |     -    80     -   211     -     -     -    87 |  288  26.83
 MAS1 |     -    37    40    39     -     -     -    21 |  288   2.18
 MATE |     -    12    14     -     -     -     -     - |   95   0.17
 MCM4 |     -     -     -   122     -     -     -    81 |  189   3.59
 MDO1 |     -    61    83     -     -     -     -    45 |  286  33.06
 NRC2 |     -    19    23     -     -     -     -     - |   95   0.10
 NYA1 |     -    25     -    39     -     -     -     - |  287   0.09
 OHIG |     -     -     -   146     -     -     -    97 |  286  26.04
 ONSA |     -    25     -    24     -     -     -    25 |  288   0.47
 PIE1 |     -    26     -     -     -     -     -    27 |  287   0.07
 POTS |     -    26     -     -     -     -     -    27 |  287  12.60
 STJO |     -    21    49    32     -     -     -     - |  288   3.27
 THTI |     -    24     -     -     -     -     -    25 |  287    >>>
 TRO1 |     -    21     -    34     -     -     -     - |  287  11.49
 TSKB |     -     -    21     -     -     -     -    18 |   96   1.06
 WHIT |     -    30     -    47     -     -     -     - |  286  28.27
 WSRT |     -    27     -     -     -     -     -    28 |  287   0.05
 WTZR |     -    43     -     -     -     -     -    45 |  287   0.07
 YAKZ |     -    28     -     -     -     -     -    30 |  286  10.76
 YELL |     -    38    33     -     -     -     -    41 |  288   0.12
 YSSK |     -    28     -    45     -     -     -     - |  287  10.53
 -----+-------------------------------------------------+--------------
 TOT  |  5048    67    82   105  3677  4944     -    70 |


 BEST CLOCK FIT: DRAO   288   0.04 (ns) 

