
 GPS week: 1116   Day: 2   MJD: 52058                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2765      0    -0.13     0.03     5.21     0.00
 cod |   288     1  18546    112    -2.27     0.53     0.10    17.69
 emr |    96     0   3900     95   675.38     6.82     0.09    20.22
 esa |   288     0  16678    947   669.79     6.81     0.16     9.98
 gfz |   288     0  14935    234    -0.39     0.87     0.10    16.98
 igu |    96     0   2385      0    -0.19     0.15     4.12     0.00
 jpl |   279     0   7772    422     3.16     0.68     0.12    13.84
 ngs |    96     0   2765      0    -0.13     0.03     4.93     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  15851    597   263.19    33.85     0.08    21.29

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 | -6857   183    -8    37  -214-11214   -61 -5993     -    30 |
    2 |  1149    87  -243   -72    11     -   121  1334     -     - |
    3 |  4355    60    47  -507   100   137  -132  3391     -    81 |
    4 |  5656  -101    -6   223   148  8091  -200  4979     -   -86 |
    5 |   992    26   -56   -50    -4  3246   303   373     -   -87 |
    6 | -2046    -3    16   -53   174-12029  -153 -2188     -   -80 |
    7 | -1233    24   -59   121  -103  6302   413 -1164     -  -117 |
    8 | -4371   157   -39    24   -74-11261   107 -3781     -  -106 |
    9 | -5394    42  -125    77   217 -7289   262 -4408     -  -271 |
   10 |   900    49  -101   149   -57  3321   407   755     -  -166 |
   11 |  3452  -111    69   288   -93  2565    15  3548     -     X |
   13 |  8067    75   242  -146  -198 -2233     X  7754     -    88 |
   14 |  3546    44   135    21    37  -205  -117  3957     -   -76 |
   15 | -5973   -97  -161     -   131   214   130 -5657     -   -18 |
   17 | -1845    34  -208     X    91     -   180 -1082     -   -80 |
   18 |  7294  -167   126   163   153 -1293  -124  7209     -   -51 |
   19 | -7587   252   -82     8    -6 -7316     4 -7793     -  -166 |
   20 |  5893   136    43   -59  -228   875   189  5922     -    10 |
   21 | -4660   230  -127   183   124     -  -250 -4392     -  -187 |
   22 |  1255   115   -50   -88  -131  -551   111   371     -    39 |
   23 | -2357   149  -191  -278   156     -   335 -1867     -  -189 |
   24 | -4908  -103  -181    94   102  8120    68 -4765     -     - |
   25 |  2648    97   -94    68   105 -1295  -238  2208     -  -105 |
   26 |  -215    34  -160   206   183   359  -113  -291     -  -189 |
   27 | -7677   186    39  -187  -120 -3410   135 -7030     -   -18 |
   28 |    74   119   240  -131  -185  5084  -169   876     -    79 |
   29 |   233    66     1    42    97  3987  -129   409     -  -107 |
   30 |  -809    28   -52   228   203 -2413  -404 -1834     -  -171 |
   31 | 10796    43   -21    96   -77 18748    12  9454     -   -12 |
 -----+-------------------------------------------------------------+
 ALBH |     -    16     -  -175     -     -   110     -     -     - |
 ALGO |     -    14   141     X   -70     -     -     -     -    -1 |
 AREQ |     -   -51     -  -201     -     -  -116     -     -   209 |
 AUCK |     -  -170     -    21     -     -    -3     -     -   133 |
 BAHR |     -     4    44  -103   -84     -     -     -     -    98 |
 BRMU |     -     -     -  -288   -14     -     -     -     -   144 |
 CAS1 |     -    52     -    -9   -83     -     -     -     -    27 |
 DAV1 |     -   -87     -     -  -143     -     -     -     -   186 |
 DRAO |     -   -96   -40     -     -     -     -     -     -    92 |
 EISL |     -     -     -   181  -107     -     -     -     -     - |
 FAIR |     -     -    74   -99     -     -     X     -     -    23 |
 GODE |     -    -3     -     5     -     -     -     -     -     - |
 GOLD |     -    77     -     X     -     -   -99     -     -     - |
 GRAZ |     -   -96     -     -     -     -     -     -     -    80 |
 GUAM |     -    15     -   288    80     -  -153     -     -  -116 |
 HOB2 |     -     6   119  -267     -     -     -     -     -    83 |
 HRAO |     -    61     -     -     -     -   -78     -     -     - |
 KARR |     -   -91     -     -    95     -     -     -     -     - |
 KERG |     -   -35     -     -     -     -     -     -     -    29 |
 KIRU |     -  -283     -   502     -     -     -     -     -     - |
 KOKB |     -     -     X   -52    71     -   -39     -     -     X |
 KOSG |     -   -46     -    81     -     -     -     -     -     - |
 LPGS |     -     -     -  -390     X     -     -     -     -   183 |
 MAC1 |     -    69     -    65  -109     -     -     -     -     - |
 MALI |     -  -102     -    56  -241     -     -     -     -   249 |
 MAS1 |     -     -    74   -61  -164     -     -     -     -   136 |
 MCM4 |     -     -     -   -44   146     -     -     -     -  -103 |
 MDO1 |     -  -115   106     -     -     -    98     -     -     - |
 MKEA |     -    25     -   -38     -     -    -5     -     -     - |
 NRC2 |     -  -111    97     -     -     -     -     -     -     - |
 OHIG |     -     -     -   173  -274     -     -     -     -   138 |
 ONSA |     -  -114   108    18   -22     -     -     -     -    70 |
 PIE1 |     -    -6     -    87     -     -    22     -     -   -49 |
 POTS |     -  -114     -   179   -64     -     -     -     -    62 |
 SEY1 |     -     -     -  -272   160     -     -     -     -     - |
 STJO |     -   -55   147     -    -1     -     -     -     -     - |
 SUTH |     -   153     -  -105     -     -  -124     -     -     - |
 THTI |     -   -73     -     -   -54     -     -     -     -   103 |
 TRO1 |     -  -174     -     -   182     -     -     -     -     - |
 USNO |     -    25     -  -176     -     -     -     -     -    62 |
 USUD |     -   -51     -    96     7     -   -37     -     -    14 |
 WHIT |     -   -27     -     -    28     -     -     -     -     - |
 WSRT |     -  -117     -     -     -     -     -     -     -    97 |
 WTZR |     -  -116     -   -40     -     -     -     -     -   114 |
 WUHN |     -   -12     -     -   123     -     -     -     -   -88 |
 YELL |     -   -31   115   -72     -     -     -     -     -    23 |
 YSSK |     -    14     -     -     -     -   -18     -     -     - |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  6030   101   144   165    63  7585   104  5014     -    64 |  288   3.13
    2 |  6729    92    93   189    63     -    98  6713     -     - |  288   2.98
    3 |  3534   226    57   164   182  2348   244  3885     -   119 |  278   2.12
    4 |  2731   117    92   142    97  3977   172  2622     -    81 |  288   0.69
    5 |  7638    64    79    69    48  3619    93  7304     -    53 |  288   2.92
    6 |  8320   135   135   178   214  4842   135  8201     -   116 |  278   7.79
    7 |  1574    99   124   187    66  2162   174  1409     -    66 |  278   1.26
    8 |  4110   103    55   145    93  5566    87  4556     -   102 |  288   3.82
    9 |  7524    83    64   346    39  1988   127  6230     -   108 |  288   1.69
   10 |  2511   130    92   177    82  2524    98  2349     -    74 |  277   1.74
   11 |  2015   157   106   108    52  1635   114  1867     -     X |  288   0.32
   13 |   921    60   104    98    72   771     X   772     -    86 |  288   0.50
   14 |  2040   112    54   123   140   510    64  2237     -    45 |  288   0.27
   15 |  8227   101    69     -    43  3826    98  6647     -    94 |  288   3.65
   17 |  5244   315    97     X   120     -   268  4251     -   117 |  285   2.63
   18 |  1451    77    94    98    97   930    74  1349     -   113 |  288   0.45
   19 |  9920    80    67   220   128  7991   182 10076     -    71 |  288   3.71
   20 |   900    95   122   183   148   735   201   836     -    71 |  288   0.22
   21 |  7991   260   108   219   292     -   195  7372     -   128 |  282   4.09
   22 |  3923    64    51   156    49  1528   119  3492     -    38 |  288   0.75
   23 |  5217   217   178   186   176     -    90  5401     -   109 |  280   4.82
   24 |  3238    71   111   109    70  6534   112  2980     -     - |  288   1.76
   25 |  1646    84    74   295    61  1327   149  1453     -   100 |  288   1.40
   26 |  1214    61    94   127    98   641    58  1115     -    40 |  288   0.81
   27 |  5766    53    41   158    40  6016   135  6567     -   118 |  288   3.63
   28 |  6022    74   201   112    49  3127   171  5847     -    69 |  288   0.40
   29 |  2915    66    79    59   131  2533    67  2721     -    61 |  288   0.58
   30 |  6459    60   151   116    45  1691   119  6114     -    53 |  288   2.15
   31 |  6298   198    52   312   181  9179   151  5312     -    68 |  276   3.04
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    37     -    57     -     -    59     -     -     - |  287   0.14
 ALGO |     -    28    33     X    48     -     -     -     -    33 |  288   0.05
 AREQ |     -    39     -    68     -     -   130     -     -   108 |  288    >>>
 AUCK |     -    41     -   131     -     -    54     -     -    42 |  288  24.92
 BAHR |     -    72    87   102    92     -     -     -     -   119 |  288   0.45
 BRMU |     -     -     -   148    47     -     -     -     -    58 |  285  28.95
 CAS1 |     -    52     -    91    45     -     -     -     -    61 |  288  12.27
 DAV1 |     -    55     -     -    58     -     -     -     -    34 |  288  19.59
 DRAO |     -    38    39     -     -     -     -     -     -    35 |  288   0.04
 EISL |     -     -     -   169    99     -     -     -     -     - |  274  17.39
 FAIR |     -     -    59   161     -     -     X     -     -    68 |  285   0.24
 GODE |     -   161     -   286     -     -     -     -     -     - |   96   0.14
 GOLD |     -    56     -     X     -     -    71     -     -     - |  277  17.70
 GRAZ |     -   137     -     -     -     -     -     -     -   114 |  246    >>>
 GUAM |     -    61     -   120    84     -    81     -     -    50 |  288  14.47
 HOB2 |     -    59    52   108     -     -     -     -     -    31 |  288   0.09
 HRAO |     -    40     -     -     -     -    51     -     -     - |  277   1.25
 KARR |     -    31     -     -    32     -     -     -     -     - |  281 127.68
 KERG |     -    40     -     -     -     -     -     -     -    33 |  287   1.49
 KIRU |     -    66     -   117     -     -     -     -     -     - |  283   2.04
 KOKB |     -     -     X   249   140     -   166     -     -     X |  284   0.93
 KOSG |     -    51     -    91     -     -     -     -     -     - |  287  11.59
 LPGS |     -     -     -   295     X     -     -     -     -   138 |  214 110.89
 MAC1 |     -    39     -    95    44     -     -     -     -     - |  288  18.09
 MALI |     -    53     -    95    65     -     -     -     -    38 |  288  11.35
 MAS1 |     -     -    43   128    50     -     -     -     -    49 |  288   2.26
 MCM4 |     -     -     -   136   178     -     -     -     -   196 |  288   1.73
 MDO1 |     -    46    57     -     -     -    70     -     -     - |  281   4.44
 MKEA |     -    54     -    55     -     -    59     -     -     - |  287  32.44
 NRC2 |     -    73    64     -     -     -     -     -     -     - |   94 182.16
 OHIG |     -     -     -   132   110     -     -     -     -    39 |  251  11.17
 ONSA |     -    28    60   141    43     -     -     -     -    63 |  288   0.13
 PIE1 |     -   140     -   197     -     -   107     -     -    43 |  286  81.81
 POTS |     -    51     -   129    56     -     -     -     -    59 |  275  11.88
 SEY1 |     -     -     -   279   164     -     -     -     -     - |  271  40.29
 STJO |     -    24    50     -    29     -     -     -     -     - |  288   1.30
 SUTH |     -    87     -    79     -     -   112     -     -     - |  287  14.31
 THTI |     -    54     -     -    59     -     -     -     -    71 |  287   2.58
 TRO1 |     -    24     -     -    25     -     -     -     -     - |  287  11.31
 USNO |     -    26     -    34     -     -     -     -     -    22 |  288   0.04
 USUD |     -    72     -    60    28     -    76     -     -   110 |  288   0.20
 WHIT |     -    48     -     -    50     -     -     -     -     - |  287  17.56
 WSRT |     -    48     -     -     -     -     -     -     -    40 |  287   0.05
 WTZR |     -    42     -   146     -     -     -     -     -    72 |  288   0.06
 WUHN |     -    86     -     -    28     -     -     -     -    76 |  287  18.78
 YELL |     -    38    46    78     -     -     -     -     -    35 |  288   0.08
 YSSK |     -    32     -     -     -     -    41     -     -     - |  275  12.41
 -----+-------------------------------------------------------------+--------------
 TOT  |  5213    97    92   159   102  4122   118  4931     -    81 |


 BEST CLOCK FIT: DRAO   288   0.04 (ns) 

