
 GPS week: 1113   Day: 1   MJD: 52036                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2758      5    -1.03     0.50     6.20     0.00
 cod |   288     0  17892    206     7.01    -4.10     0.09    25.82
 esa |   288     0  13899    454  -128.40   121.39     0.28     0.00
 gfz |   287     0  14353      0     1.04     1.84     0.07    32.15
 igu |    96     0   2191      0    -1.40     0.86     6.18     0.00
 jpl |   280     0   7081     26    -1.00    -1.32     0.11    19.27
 ngs |    96     0   2758      1    -1.13     0.48     5.72     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  13964    870 -1048.88    32.81     0.10    22.75

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 |-19869    58  -143    53-31475    28-16787     -  -153 |
    2 |  4235     1   183   -37     -   110  3804     -     - |
    3 |  8302    69   378    31 11404  -240  7331     -   -42 |
    4 |-33548    95    -6   159-38105  -188-25722     -  -244 |
    5 |  6129    80   -49   -76     -    25  4508     -     7 |
    6 |  2055   102   263    63   -98  -287  1071     -   -74 |
    7 |   500   181   124   -36 10308   217   425     -  -227 |
    8 | -5178    -7  -380    91  -667   243 -6033     -  -234 |
    9 | -5515    82   137   -32 -2223   152 -4675     -  -119 |
   10 |  5557    81   285    31  2081    84  5325     -  -168 |
   11 |  4179    18   132    55  4885    73  4035     -  -123 |
   13 |  7638   -44  -192   -52  1694   -32  7076     -   133 |
   14 |  9866   -22   -16   -10  2738    28  9241     -    28 |
   15 | -9043    69     -     8     -  -482 -7730     -    78 |
   17 |   486   257   826   -75     -  -400    62     -     X |
   18 |  6985  -111   307   -13  3792    22  6965     -   135 |
   19 | -6420  -108  -248    -1  -614   392 -6757     -     - |
   20 |  9938     6   -65   -77  3707   208  9617     -     X |
   21 |  4209    43  -139   125     -  -345  3727     -   -90 |
   22 |  -490   -28   -17   -55 -2943   138  -384     -    54 |
   23 |  2326     3   317     -     -   258  2035     -  -123 |
   24 | -1663   157   -30   -61 -4993   -34 -1653     -   -76 |
   25 | -2184    21  -100    18  1471  -252 -1539     -    51 |
   26 |  -382    75   308    51  1076   119  -877     -  -199 |
   27 | -1159    70  -291    77 10437   341 -1404     -  -302 |
   28 |  4778   -13   -83  -150  5146   176  3431     -   146 |
   29 |  3200    11   -77    66  2738  -105  2546     -   -63 |
   30 | -2668    25    38    95   890  -254 -2628     -   -62 |
   31 |  6198    32   801    21 18881   116  4691     -  -106 |
 -----+-------------------------------------------------------+
 ALBH |     -   -69   208     -     -    92     -     -     - |
 ALGO |     -   -63  -210   -29     -     -     -     -   113 |
 AREQ |     -  -170  -266    19     -     -     -     -   166 |
 AUCK |     -  -164  -143     -     -   150     -     -    65 |
 BRMU |     -     0  -521    30     -     -     -     -   -50 |
 CAS1 |     -    33   -26   -44     -     -     -     -    24 |
 DAV1 |     -   -28     -   -78     -     -     -     -   148 |
 DRAO |     -   -94     -     -     -     -     -     -   107 |
 GALA |     -    -4  -236    90     -  -149     -     -     - |
 GOLD |     -    45     X     -     -   -61     -     -     - |
 GUAM |     -    49  -195   -47     -   -17     -     -    25 |
 HRAO |     -   198     -     -     -  -266     -     -     - |
 JPLM |     -     -     -     1     -    -2     -     -     - |
 KARR |     -   -89     -    72     -     -     -     -     - |
 KERG |     -   -24     -     -     -     -     -     -    27 |
 KOKB |     -     -   516     -     -   110     -     -   -93 |
 KOUR |     -    -3   191    20     -     -     -     -   -26 |
 MAC1 |     -    63   -21   -51     -     -     -     -     - |
 MAS1 |     -   -15   212   -69     -     -     -     -   114 |
 MCM4 |     -   166  -209  -133     -     -     -     -     X |
 MDO1 |     -  -105     -     -     -   141     -     -     - |
 NLIB |     -   -84     -     -     -     -     -     -    96 |
 NYA1 |     -    72     -   -58     -     -     -     -     - |
 OHIG |     -   -86    57  -107     -     -     -     -   247 |
 ONSA |     -  -102   245    27     -     -     -     -    79 |
 PETP |     -   -39     -    32     -     -     -     -     - |
 PIE1 |     -  -138  -496     -     -    -5     -     -   161 |
 SANT |     -     X   -68   -22     -   -75     -     -    89 |
 STJO |     -     0     -     0     -     -     -     -     - |
 THTI |     -     -     -   -28     -     -     -     -    40 |
 TIDB |     -   107     X   -86     -     -     -     -     - |
 TRO1 |     -  -104     -    83     -     -     -     -     - |
 USNO |     -   -74  -311     -     -     -     -     -    84 |
 USUD |     -   -49   363     -     -    66     -     -     - |
 WHIT |     -    23     -   -19     -     -     -     -     - |
 WSRT |     -   -55     -     -     -     -     -     -    62 |
 WTZR |     -  -125   150     -     -     -     -     -   142 |
 YELL |     -  -105  -288     -     -     -     -     -   120 |
 YSSK |     -  -106     -    85     -     -     -     -     - |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  7789    86    91    69 16061    46  6514     -   145 |  288   2.16
    2 |  3389   171    70   116     -   112  3654     -     - |  288   3.36
    3 |  3035    50    93    93  4685    71  3075     -   159 |  288   2.48
    4 | 22733    81    98    59 18166   120 20157     -    51 |  288   0.59
    5 |  5600    96   155    71     -    47  4351     -    42 |  288   2.40
    6 |  7695    62    84    75  5485   116  7130     -    78 |  288   6.61
    7 |  1989    93    53    75  3147    84  2081     -    47 |  288   1.46
    8 |  6319    59   249    66  1971    83  5549     -    65 |  288   3.19
    9 |  3128    99   117    82  1650    55  3715     -    31 |  288   1.73
   10 |  2125   150   322    57   952   188  2130     -   188 |  278   1.42
   11 |  1503   154   190    53  2069    52  1642     -   111 |  288   0.30
   13 |  1444    82    88   111   588   211  1592     -    61 |  288   0.57
   14 |  1904    58   106    51  1251    63  1921     -    53 |  288   0.30
   15 |  6163    68     -    73     -   100  6104     -    84 |  288   2.41
   17 |  1912    72   923    51     -   110  1829     -     X |  287   2.40
   18 |  1236    95   319    68  1818   150  1356     -    60 |  287   0.40
   19 |  3403   249   157   188  4660   153  3612     -     - |  256   3.45
   20 |  1434    69   114    74  1321   154  1477     -     X |  283   0.29
   21 |  4053   132   225   185     -   214  3949     -   232 |  277   3.24
   22 |  7584    50    99    86  2405   152  6576     -    93 |  287   1.22
   23 |  5848   219   256     -     -   334  5646     -   115 |  275   5.43
   24 |  7432    67   113    51  4599    39  7114     -    29 |  288   3.09
   25 |  3696    46    73    32  2345    90  3421     -    53 |  288   1.69
   26 |  2095    66   111    38   557   192  2286     -    56 |  288   0.43
   27 |  4813    57    92    46  7567   125  4693     -    27 |  288   3.40
   28 |  9353    56    70    55   866    55  9143     -    69 |  288   0.57
   29 |  2627    39   227    26  2130    84  2718     -    41 |  288   0.42
   30 |  2982    87    77    55  1844    68  2810     -    49 |  288   1.87
   31 |  5195    91   124    51  9701    93  4242     -    48 |  288   2.79
 -----+-------------------------------------------------------+--------------
 ALBH |     -    34   215     -     -    46     -     -     - |  280   0.13
 ALGO |     -    27   729    26     -     -     -     -    19 |  287   0.06
 AREQ |     -    72    77    46     -     -     -     -    37 |  286    >>>
 AUCK |     -    59   134     -     -    64     -     -    42 |  288  22.24
 BRMU |     -   210   304   142     -     -     -     -    95 |  288  24.19
 CAS1 |     -    93   104    79     -     -     -     -   199 |  288  15.82
 DAV1 |     -    91     -    35     -     -     -     -   128 |  286  22.74
 DRAO |     -    23     -     -     -     -     -     -    26 |  288   0.03
 GALA |     -    45    69    39     -    84     -     -     - |  288  29.99
 GOLD |     -    27     X     -     -    36     -     -     - |  224  18.58
 GUAM |     -    55   114    47     -    85     -     -    86 |  288  21.88
 HRAO |     -    55     -     -     -    74     -     -     - |  277   0.98
 JPLM |     -     -     -    38     -    63     -     -     - |  274  36.59
 KARR |     -    67     -    54     -     -     -     -     - |  287 129.57
 KERG |     -    30     -     -     -     -     -     -    34 |  287    >>>
 KOKB |     -     -   809     -     -   170     -     -   144 |  210   0.45
 KOUR |     -   130   434   160     -     -     -     -   181 |  100    >>>
 MAC1 |     -    54   148    43     -     -     -     -     - |  287  13.54
 MAS1 |     -    73   220    52     -     -     -     -    26 |  288   2.62
 MCM4 |     -   154   838   123     -     -     -     -     X |  279   3.95
 MDO1 |     -    22     -     -     -    30     -     -     - |  278  14.21
 NLIB |     -   112     -     -     -     -     -     -   127 |  286 614.13
 NYA1 |     -    27     -    22     -     -     -     -     - |  287   0.09
 OHIG |     -   136   203    80     -     -     -     -    50 |  288  13.32
 ONSA |     -    49   205    31     -     -     -     -    76 |  260   0.11
 PETP |     -    19     -    15     -     -     -     -     - |  286  14.94
 PIE1 |     -   176   484     -     -   129     -     -   299 |  288  26.77
 SANT |     -     X   172    87     -   147     -     -   166 |  257  27.62
 STJO |     -    24     -    19     -     -     -     -     - |  287   3.54
 THTI |     -     -     -    33     -     -     -     -    47 |  286   3.16
 TIDB |     -    26     X    21     -     -     -     -     - |   82   0.13
 TRO1 |     -    39     -    31     -     -     -     -     - |  287  12.30
 USNO |     -    14    77     -     -     -     -     -    16 |  288   0.04
 USUD |     -    32   157     -     -    43     -     -     - |  272   0.17
 WHIT |     -    19     -    15     -     -     -     -     - |  287  12.42
 WSRT |     -    30     -     -     -     -     -     -    34 |  287   0.04
 WTZR |     -    34    91     -     -     -     -     -    39 |  288   0.09
 YELL |     -    77   345     -     -     -     -     -    87 |  287   0.06
 YSSK |     -    21     -    17     -     -     -     -     - |  286  14.49
 -----+-------------------------------------------------------+--------------
 TOT  |  6204    91   277    73  6180   114  5723     -   102 |


 BEST CLOCK FIT: DRAO   288   0.03 (ns) 

