
 GPS week: 1113   Day: 0   MJD: 52035                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2771      0    -0.30     0.26     4.87     0.00
 cod |   288     0  21071      8     3.33    -1.93     0.11    19.09
 esa |   288     0  16861   1441  -111.59    -9.46     0.13    15.35
 gfz |   276     0  14174      8    -0.78     3.88     0.09    22.96
 igu |    96     0   2108      0    -0.31     0.26     3.31     0.00
 jpl |   278     0   8597    418    -1.88     1.07     0.11    18.29
 ngs |    96     0   2771      0    -0.28     0.24     4.70     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  16092    272 -1081.87    32.38     0.09    24.30

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 |   -46     6   252  -229     -   169   -48     -   -23 |
    2 |   721   -76  -333   156     -   261  1515     -     - |
    3 |  -723    -2   628   -78 -1201  -387  -710     -  -201 |
    4 |-23394    74   -27   160 -2536   -23-21427     -  -177 |
    5 | -2768   267  -316   -85     -   207 -1975     -    -6 |
    6 |  6230    74   442    49  2382  -315  5715     -  -274 |
    7 |  4574    72   119   -45 -6549   356  3794     -  -207 |
    8 |    63    79   -42    83   568   396     4     -  -235 |
    9 |   578   147   -16    28 -9130   138   402     -  -182 |
   10 |  5044    -3   809   -43  3128   -82  4448     -  -396 |
   11 |  3903    -5   162  -162  2130   291  3557     -   -45 |
   13 |  5262  -109   211  -200  7074   -77  5088     -   164 |
   14 |  6445   198  -291  -141  6204    56  6277     -   130 |
   15 |-14015   103     -    64-21833  -319-11802     -   -33 |
   17 | -5903   241     X   144     -  -138 -6334     -  -266 |
   18 |  6395    -6  -198    51  2070  -108  6266     -   125 |
   19 | -8110  -166   -45    -1  4596   400 -7468     -     - |
   20 |  6128     2   -45   -77  3103   518  5854     -  -113 |
   21 | -1378   234    47   -48     -  -151  -946     -  -116 |
   22 |   557   186    19    52  9179   113  -631     -  -242 |
   23 |  3753   304     X    -7     -     X  3492     -  -233 |
   24 |  3485    33    10   143 -3000    50  3484     -  -179 |
   25 |   164   108   -56   -71  4460   -10  -203     -    19 |
   26 |  3104   -86   399   240  3037   -94  2667     -  -368 |
   27 | -2000    52    20   136     -   400 -2292     -  -336 |
   28 |  8279   -61    49  -173  6260    -2  7777     -   173 |
   29 |  3188   135  -270    50   765    14  2753     -    16 |
   30 | -1492   259  -244    57 -1967  -250 -2018     -    -3 |
   31 | -7684   -32   757  -211 -8611     4 -6891     -  -263 |
 -----+-------------------------------------------------------+
 ALBH |     -  -123     X     -     -   128     -     -     - |
 ALGO |     -    35  -260   -73     -     -     -     -   193 |
 AREQ |     -  -154   -35   125     -   -81     -     -    85 |
 AUCK |     -  -526  -196  1356     -  -415     -     -  -356 |
 BAHR |     -    35   -43     -     -     -     -     -     - |
 BOR1 |     -   -99   123     -     -     -     -     -     - |
 BRMU |     -   130  -283   -13     -     -     -     -    89 |
 BRUS |     -   -83     -     -     -    86     -     -     - |
 CAS1 |     -    36   -99     -     -     -     -     -    34 |
 DAEJ |     - -1388     -     -     -     -     -     -  1091 |
 DAV1 |     -   -23     -     -     -     -     -     -    18 |
 DRAO |     -   -75     -     -     -     -     -     -    59 |
 EISL |     -     -    29     -     -     -     -     -   -18 |
 FAIR |     -     -   -80     -     -     X     -     -    51 |
 FORT |     -     -    16     -     -     -     -     -   -10 |
 GALA |     -    67  -272    80     -    65     -     -     - |
 GODE |     -   164  -204     -     -     -     -     -     - |
 GOLD |     -    38     X     -     -   -39     -     -     - |
 GUAM |     -     -     X   -18     -   -43     -     -    48 |
 HOB2 |     -     -   -62     -     -     -     -     -    39 |
 HRAO |     -   148     -     -     -  -155     -     -     - |
 KARR |     -   -32     -    26     -     -     -     -     - |
 KERG |     -   -31     -     -     -     -     -     -    24 |
 KOUR |     -   -31    38     -     -     -     -     -     - |
 MAC1 |     -   124     7  -425     -     -     -     -   283 |
 MAS1 |     -   -73     8   -16     -     -     -     -    66 |
 MAW1 |     -   -58     -    48     -     -     -     -     - |
 MCM4 |     -   -57   494  -279     -     -     -     -     X |
 MDO1 |     -   -53     -     -     -    55     -     -     - |
 MKEA |     -    -7   -85   -84     -    37     -     -   108 |
 MONP |     -     2     -     -     -    -2     -     -     - |
 NLIB |     -   -74     -     -     -     -     -     -    58 |
 NSSP |     -    70     -     -     -   -73     -     -     - |
 NYA1 |     -    79     -   -66     -     -     -     -     - |
 OHIG |     -  -116   222  -187     -     -     -     -   120 |
 ONSA |     -   -81    83   -42     -     -     -     -    50 |
 PETP |     -   -14     -    11     -     -     -     -     - |
 PIE1 |     -   159  -761     -     -     -     -     -   358 |
 POL2 |     -    58   -72     -     -     -     -     -     - |
 REYK |     -    48   -60     -     -     -     -     -     - |
 SANT |     -   -84    36   -98     -    72     -     -    45 |
 STJO |     -    19     -   -16     -     -     -     -     - |
 SUTH |     -   290   -51  -122     -  -274     -     -   114 |
 THTI |     -   -81     -  -149     -     -     -     -   187 |
 TRO1 |     -  -108     -    90     -     -     -     -     - |
 TSKB |     -     -  -157     -     -     -     -     -    99 |
 USNO |     -    54  -326     -     -     -     -     -   164 |
 USUD |     -    -8    -3     -     -    12     -     -     - |
 WHIT |     -    26     -   -22     -     -     -     -     - |
 WSRT |     -   -97     -     -     -     -     -     -    76 |
 WTZR |     -  -174   103     -     -     -     -     -    72 |
 YELL |     -    65  -220     -     -     -     -     -    84 |
 YSSK |     -    40     -    27     -   -78     -     -     - |
 ZIMM |     -  -104   129     -     -     -     -     -     - |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  5596   218   157    72     -   105  5678     -   290 |  288   2.71
    2 |  5259   156   197   123     -   107  4667     -     - |  283   3.06
    3 |  4596    84   119    77  4332   127  4691     -    67 |  288   1.94
    4 |  8810    73   136    55  5697   134  7461     -    33 |  288   4.74
    5 |  7152    83   119   148     -    94  6422     -    64 |  288   3.33
    6 | 10788    81   164   124  3550   135 10436     -    57 |  288   8.91
    7 |  3545   104    68    64  3537    80  4239     -    57 |  288   1.41
    8 |  4339   124   115    55  1497    93  4447     -    62 |  288   3.54
    9 |  3272    58   109    50  4721    79  3585     -   103 |  288   2.27
   10 |  1978   293   296    62  1826   161  2256     -   116 |  276   1.67
   11 |  1053   285   106   117   881    94   938     -    92 |  288   0.35
   13 |  1097    77    54    72  3130   103  1090     -    57 |  288   0.32
   14 |  1143    63   140    90  2128    97  1127     -    42 |  288   0.15
   15 |  7829   149     -    71  5358   109  8142     -    94 |  288   3.44
   17 |  3877   210     X   104     -    79  3531     -    82 |  288   2.57
   18 |  1202    79   144   164   614    98  1244     -    76 |  288   0.48
   19 |  4409   130    75    89  3140   142  4843     -     - |  288   2.76
   20 |   915   104    56    41  1355   135  1013     -    61 |  288   0.24
   21 |  4311   306   306   143     -   158  3779     -   159 |  277   2.36
   22 |  7648    83    95    81  4221   145  6987     -   101 |  288   1.28
   23 |  5637   231     X   254     -     X  5399     -   179 |  276   4.55
   24 |  3595    90    42    90  4152   122  3562     -    32 |  288   4.17
   25 |  2506   119    80   145  3700   140  2790     -   152 |  288   2.25
   26 |  1075    36    57   101  1492   155   924     -    61 |  288   0.80
   27 |  3667    47    76    82     -    89  3723     -    40 |  288   2.44
   28 |  1691   108    83    74  3497   106  1646     -    85 |  288   0.68
   29 |  1684    76   192    57   764   117  1725     -    39 |  288   0.51
   30 |  4633   187   144   208  2606   198  4164     -    63 |  288   1.50
   31 |  7199    72    57    38  3559   142  7108     -    45 |  288   4.05
 -----+-------------------------------------------------------+--------------
 ALBH |     -    57     X     -     -    60     -     -     - |  277   0.12
 ALGO |     -    64   338   111     -     -     -     -    74 |  286   0.09
 AREQ |     -   101    43    63     -    79     -     -    31 |  288  25.54
 AUCK |     -    92    72    54     -    91     -     -    49 |  288  18.15
 BAHR |     -    67    84     -     -     -     -     -     - |  278   0.41
 BOR1 |     -    45    56     -     -     -     -     -     - |  288   1.68
 BRMU |     -    71    58    38     -     -     -     -    36 |  288  21.94
 BRUS |     -    54     -     -     -    56     -     -     - |  277   0.12
 CAS1 |     -   108    89     -     -     -     -     -   132 |  288  14.56
 DAEJ |     -    37     -     -     -     -     -     -    29 |  287    >>>
 DAV1 |     -    22     -     -     -     -     -     -    17 |  288  22.90
 DRAO |     -    19     -     -     -     -     -     -    15 |  288   0.04
 EISL |     -     -    57     -     -     -     -     -    36 |  206  35.24
 FAIR |     -     -   171     -     -     X     -     -   108 |  284   0.12
 FORT |     -     -    91     -     -     -     -     -    57 |  191   0.40
 GALA |     -    92    54    46     -    97     -     -     - |  287  30.76
 GODE |     -   212   263     -     -     -     -     -     - |   99   0.23
 GOLD |     -    48     X     -     -    50     -     -     - |  276  27.97
 GUAM |     -     -     X   154     -   225     -     -    49 |  287  21.16
 HOB2 |     -     -   186     -     -     -     -     -   117 |  241 435.63
 HRAO |     -    65     -     -     -    67     -     -     - |  277   0.95
 KARR |     -    61     -    51     -     -     -     -     - |  276 140.12
 KERG |     -    44     -     -     -     -     -     -    34 |  287    >>>
 KOUR |     -   156   194     -     -     -     -     -     - |  116    >>>
 MAC1 |     -    47    77    34     -     -     -     -    37 |  288  12.06
 MAS1 |     -    38    35    26     -     -     -     -    38 |  288   1.88
 MAW1 |     -    42     -    35     -     -     -     -     - |  276  26.16
 MCM4 |     -    60    93    49     -     -     -     -     X |  274    >>>
 MDO1 |     -    64     -     -     -    66     -     -     - |  262  12.36
 MKEA |     -    41    78    40     -    95     -     -    49 |  288  30.06
 MONP |     -    52     -     -     -    55     -     -     - |  276  30.09
 NLIB |     -    38     -     -     -     -     -     -    30 |  288   0.06
 NSSP |     -    47     -     -     -    49     -     -     - |  277  23.33
 NYA1 |     -    27     -    23     -     -     -     -     - |  276   0.07
 OHIG |     -    66   121    42     -     -     -     -    42 |  288  15.91
 ONSA |     -    43    66    27     -     -     -     -    34 |  288   0.21
 PETP |     -    38     -    31     -     -     -     -     - |  275  11.79
 PIE1 |     -    34    75     -     -     -     -     -    32 |  288   0.03
 POL2 |     -    24    29     -     -     -     -     -     - |  288  40.17
 REYK |     -    58    72     -     -     -     -     -     - |  288   9.76
 SANT |     -    87   144   164     -   157     -     -   214 |  264  22.67
 STJO |     -    25     -    20     -     -     -     -     - |  276   4.92
 SUTH |     -   112    98    45     -   148     -     -    71 |  288  36.18
 THTI |     -   335     -   134     -     -     -     -   120 |  286   4.41
 TRO1 |     -    40     -    33     -     -     -     -     - |  276  12.40
 TSKB |     -     -   110     -     -     -     -     -    69 |  283   1.04
 USNO |     -    32    47     -     -     -     -     -    32 |  288   0.04
 USUD |     -    44    74     -     -    75     -     -     - |  288   0.21
 WHIT |     -    31     -    26     -     -     -     -     - |  276  10.79
 WSRT |     -    34     -     -     -     -     -     -    26 |  288   0.06
 WTZR |     -    34    44     -     -     -     -     -    34 |  288   0.10
 YELL |     -   115   332     -     -     -     -     -   122 |  286   0.11
 YSSK |     -    45     -    67     -   103     -     -     - |  287  15.15
 ZIMM |     -    25    31     -     -     -     -     -     - |   87    >>>
 -----+-------------------------------------------------------+--------------
 TOT  |  4870   110   132    94  3311   112  4700     -    88 |


 BEST CLOCK FIT: PIE1   288   0.03 (ns) 

