
 GPS week: 1112   Day: 5   MJD: 52033                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2762      0     0.10    -0.16     5.08     0.00
 cod |   288     0  18376     25    -2.93     0.99     0.11    28.88
 esa |   288     0  16231    317   -86.49   -15.70     0.15    20.05
 gfz |   288     0  13361     38    -0.01    -0.08     0.12    24.76
 igu |    96     0   2301      0    -0.07     0.08     4.72     0.00
 jpl |   276     0   7351     20    -2.89     0.42     0.12    26.32
 ngs |    96     0   2762      0     0.10    -0.17     4.87     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igu   jpl   ngs   sio |
 -----+-------------------------------------------------+
    1 |  5166    77    17   -76 17152   -53  4397     - |
    2 | -1413  -165    25    27  8457   279  -295     - |
    3 |  -242     2   128   -35-11514  -146  -778     - |
    4 | -8033  -234   299   120  5059  -160 -7327     - |
    5 | -4690   191  -466    29  4073   288 -4584     - |
    6 |  -452    87  -173   117  7595  -161  -763     - |
    7 | -4934  -148    91   -77  2123   364 -4428     - |
    8 | -2050   -73   204   -98 -8647    37 -1972     - |
    9 |  3234   121  -299     8 15347   164  2960     - |
   10 | -3905  -324   388   -96-11449   326 -2988     - |
   11 |  4337    21    45  -134 -1249   152  4641     - |
   13 |  5359   181    24   -57 -2674  -339  5320     - |
   14 |  2167   299  -293   -36 -1002  -145  2359     - |
   15 |  1333   -42     -    70  8208   -41   719     - |
   17 | -5106   187  -260   200     -  -552 -5735     - |
   18 |  3503  -104  -150   200 -3686   118  3470     - |
   19 |   706    10   288  -141 -2195  -275  -192     - |
   20 |  4097   -15  -158   -40   413   359  4134     - |
   21 | -2811   198  -220   -91 26207    78 -1616     - |
   22 |  2279   139    11  -176  9354    10  3018     - |
   23 | -4440    10  -395   200     -   236 -4252     - |
   24 |  2008  -208   137    32  1404   178  1971     - |
   25 |  2107   201   -89    62 -3217  -433   950     - |
   26 |  1540  -215   437   -62 -3779   -81  1468     - |
   27 | -1137  -148   227   -27  1007    32 -1923     - |
   28 |  3719   220   122  -354 -6957   -34  3465     - |
   29 |  1889   135  -144    74 -9712  -235  1687     - |
   30 | -3919   262  -494   282 -5364  -422 -3893     - |
   31 |  -986   -81   410  -304  2510   137  -390     - |
 -----+-------------------------------------------------+
 ALBH |     -   -20  -172     -     -   160     -     - |
 ALGO |     -   113  -163     -     -     -     -     - |
 AREQ |     -    -4    19     -     -   -11     -     - |
 AUCK |     -  -126    58     -     -    97     -     - |
 BAHR |     -   -40    57     -     -     -     -     - |
 BOR1 |     -   -46    66     -     -     -     -     - |
 BRMU |     -   286  -412     -     -     -     -     - |
 BRUS |     -     5     -     -     -    -5     -     - |
 CHAT |     -     -   103   -84     -     -     -     - |
 CRO1 |     -    -9   -61     -     -    60     -     - |
 EISL |     -  -145   209     -     -     -     -     - |
 FORT |     -  -575   829     -     -     -     -     - |
 GALA |     -     1  -131    84     -    20     -     - |
 GODE |     -   -28    41     -     -     -     -     - |
 GOLD |     -     8     X     -     -    -9     -     - |
 GUAM |     -  -708  1019     -     -     -     -     - |
 HRAO |     -    96     -     -     -  -106     -     - |
 KOKB |     -     -   -95     -     -    72     -     - |
 MAC1 |     -     -     8    -7     -     -     -     - |
 MAS1 |     -    69  -152    42     -     -     -     - |
 MCM4 |     -    96  -423   200     -     -     -     - |
 MKEA |     -    50   -48    13     -   -32     -     - |
 NLIB |     -    43     -   -51     -     -     -     - |
 NYA1 |     -    15     -   -17     -     -     -     - |
 OHIG |     -   -60   207   -98     -     -     -     - |
 ONSA |     -   -21    30     0     -     -     -     - |
 PETP |     -   -79     -    93     -     -     -     - |
 PIE1 |     -  -445   641     -     -     -     -     - |
 POL2 |     -    74  -107     -     -     -     -     - |
 REYK |     -   -83   120     -     -     -     -     - |
 SEY1 |     -   180  -259     -     -     -     -     - |
 STJO |     -   -40     -    46     -     -     -     - |
 SUTH |     -   212  -156    93     -  -187     -     - |
 THTI |     -   120     -  -140     -     -     -     - |
 TRO1 |     -   -94     -   110     -     -     -     - |
 TSKB |     -   140  -201     -     -     -     -     - |
 USUD |     -  -137    10     -     -   151     -     - |
 WHIT |     -    42     -   -49     -     -     -     - |
 WTZR |     -   -46    66     -     -     -     -     - |
 YAR2 |     -  -199   287     -     -     -     -     - |
 YELL |     -   175  -296    33     -     -     -     - |
 YSSK |     -   -67     -   141     -   -62     -     - |
 ZIMM |     -  -397   572     -     -     -     -     - |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igu   jpl   ngs   sio | NEPO RMS (ns)
 -----+-------------------------------------------------+--------------
    1 |  9572   120   146    93 14495   131  9114     - |  288   4.25
    2 |  5077   116    51    87   657    96  4201     - |  288   1.88
    3 |  3928    70   102   116  6081   116  3770     - |  288   1.85
    4 |  1949   122   211    91  3618    71  1545     - |  288   1.58
    5 |  3909    80   156   116   370    69  3983     - |  288   3.15
    6 | 10210   156   282    74  4717    62 10459     - |  288   8.89
    7 |  2683    56    47    63  3173    97  2905     - |  288   0.95
    8 |  4594   238   153   154  5138    89  4623     - |  288   4.01
    9 |  2553    93    97    87  4602   204  2128     - |  288   1.71
   10 |  4605   171   166   167  5096   208  4563     - |  274   2.02
   11 |  1660    74    65    65   995    94  1575     - |  288   0.39
   13 |   953    64    65    61  1224   189   889     - |  288   0.35
   14 |   858   121   166   139   583   131   923     - |  288   0.25
   15 |  4497   113     -    89  2828   109  4331     - |  285   2.83
   17 |  5727   164   475   233     -   193  5126     - |  287   2.32
   18 |  1772   101   129   129  1627    64  1607     - |  288   0.40
   19 |  6429   194   145   285  4395   195  6946     - |  286   3.26
   20 |   893   127    71    91   672    81  1003     - |  288   0.37
   21 |  7925   150   253   195   833   214  7800     - |  273   3.19
   22 |  5600   106    91    91  4941   124  4529     - |  288   0.59
   23 |  5077   110   370   343     -   132  4985     - |  272   5.00
   24 |  3878    95   117   150  2637    57  3959     - |  288   2.25
   25 |  9532   101   117   130  6488   222  8346     - |  288   3.21
   26 |  1178    93   119    66  2074   111  1116     - |  288   0.73
   27 |  6246   223    78   185  2923    87  6597     - |  288   3.26
   28 |  2936    86   115   140  4894   117  2895     - |  288   0.81
   29 |  2068    95   132   138  4405   139  2095     - |  288   0.37
   30 |  1850   179   147   110  1335   201  1753     - |  285   1.76
   31 |  7879    89   102    62  3160   115  6818     - |  288   2.29
 -----+-------------------------------------------------+--------------
 ALBH |     -   150   336     -     -   118     -     - |  288   0.20
 ALGO |     -   183   263     -     -     -     -     - |  274   0.16
 AREQ |     -    34    34     -     -    44     -     - |  288  40.06
 AUCK |     -    99   139     -     -   131     -     - |  287  18.23
 BAHR |     -   100   144     -     -     -     -     - |  288   0.66
 BOR1 |     -    55    79     -     -     -     -     - |  288   2.97
 BRMU |     -    19    27     -     -     -     -     - |  286  22.02
 BRUS |     -    23     -     -     -    25     -     - |  275   0.13
 CHAT |     -     -    65    53     -     -     -     - |  288  24.77
 CRO1 |     -    78    58     -     -    72     -     - |  283    >>>
 EISL |     -   108   155     -     -     -     -     - |  179  37.34
 FORT |     -    46    67     -     -     -     -     - |  106   0.06
 GALA |     -    65    72    64     -    81     -     - |  285  29.21
 GODE |     -   219   315     -     -     -     -     - |   78  11.73
 GOLD |     -    46     X     -     -    50     -     - |  220  21.35
 GUAM |     -    30    43     -     -     -     -     - |  129  16.08
 HRAO |     -   100     -     -     -   110     -     - |  273    >>>
 KOKB |     -     -   188     -     -   143     -     - |  262   0.85
 MAC1 |     -     -    69    56     -     -     -     - |  288  21.60
 MAS1 |     -    31    46    35     -     -     -     - |  288   1.98
 MCM4 |     -   137   221    69     -     -     -     - |  280   1.00
 MKEA |     -    57    71    39     -    72     -     - |  283  32.33
 NLIB |     -    22     -    26     -     -     -     - |  288   0.09
 NYA1 |     -    45     -    53     -     -     -     - |  288   0.19
 OHIG |     -    99    80    94     -     -     -     - |  288   9.81
 ONSA |     -    80    68    45     -     -     -     - |  288   0.14
 PETP |     -    20     -    23     -     -     -     - |  287  12.07
 PIE1 |     -    37    54     -     -     -     -     - |  279   0.04
 POL2 |     -    82   118     -     -     -     -     - |  285  35.21
 REYK |     -    34    49     -     -     -     -     - |  288   8.55
 SEY1 |     -    35    50     -     -     -     -     - |  170  49.48
 STJO |     -    28     -    33     -     -     -     - |  288   2.88
 SUTH |     -    56   102    74     -    89     -     - |  284  38.90
 THTI |     -   155     -   181     -     -     -     - |  268   2.13
 TRO1 |     -    62     -    72     -     -     -     - |  288  11.43
 TSKB |     -    38    55     -     -     -     -     - |  264   1.53
 USUD |     -   111   115     -     -    89     -     - |  285   0.27
 WHIT |     -    40     -    47     -     -     -     - |  285  13.78
 WTZR |     -    60    87     -     -     -     -     - |  288  44.76
 YAR2 |     -    99   142     -     -     -     -     - |  221  18.17
 YELL |     -   135   241   262     -     -     -     - |  284   0.14
 YSSK |     -    68     -    62     -   125     -     - |  287  12.31
 ZIMM |     -    27    38     -     -     -     -     - |   85    >>>
 -----+-------------------------------------------------+--------------
 TOT  |  5084   106   153   125  4717   119  4870     - |


 BEST CLOCK FIT: PIE1   279   0.04 (ns) 

