
 GPS week: 1112   Day: 3   MJD: 52031                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2768      0    -0.09     0.18     6.16     0.00
 cod |   288     0  19214     29    -0.94    -3.12     0.09    25.42
 emr |    96     0   3805     50 -1192.69    26.13     0.16    10.52
 esa |   288     0  16255    634   -12.64   -15.80     0.13    16.02
 gfz |   288     0  13891      0    -0.06    -0.02     0.08    28.07
 igu |    96    96      0      0     0.00     0.00     0.00     0.00
 ngs |    96     0   2768      0    -0.09     0.16     6.03     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  15409     25 -1192.61    25.93     0.11    19.97

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 | -5075   -64  -195  -151   113     - -5087     -    74 |
    2 | -6888    -2   -89  -238   149     - -5310     -     - |
    3 |  8854  -120  -364   724  -151     -  8420     -  -162 |
    4 |  -835   -43   126   -87   298     - -1077     -  -316 |
    5 |  3226   164   -33  -121    26     -  2131     -  -148 |
    6 |  1434   155    17   133   -12     -  1009     -  -291 |
    7 | -1808    38   124    17   -48     - -2095     -   -16 |
    8 |  -428   232   107  -287    -1     -  -509     -   -83 |
    9 | -3999   190   109    63    12     - -4198     -  -328 |
   10 |  1946   -22   -66   132   120     -  1754     -  -226 |
   11 |  3317    95  -114    36   -72     -  3577     -   -30 |
   13 |  1386   -50    48  -222   -56     -  1391     -   311 |
   14 |  3470    36   -19   -18   -80     -  3666     -    86 |
   15 |  4395    45    20     -   -35     -  3448     -   -12 |
   17 | -6588   251   -24   156   -89     - -7149     -  -295 |
   18 |  4164  -132   128   199   -91     -  4228     -   108 |
   19 |  5894   136  -416    38    46     -  6183     -  -191 |
   20 |  3684    44   -46  -360   133     -  3633     -    62 |
   21 | -6354    77    51   202  -153     - -5088     -   -43 |
   22 | -1173   119  -118   106   -75     - -1081     -  -113 |
   23 |  1333    57    38   -81     -     -   598     -   -93 |
   24 | -3846    19   101   114    93     - -3619     -  -265 |
   25 |  1779  -107  -192   125    64     -  2966     -   -21 |
   26 | -1395    99   135   365     8     - -1546     -  -455 |
   27 | -3330   165    52   -96   -26     - -2990     -  -106 |
   28 | -4870   -39   116   191  -303     - -3472     -   282 |
   29 |  -453   -79  -225    76    48     -  -268     -    12 |
   30 | -3101    95    34  -165    86     - -3314     -  -117 |
   31 |  4993   -60  -268   715  -187     -  3541     -  -189 |
 -----+-------------------------------------------------------+
 AREQ |     -    -8     -   -68     -     -     -     -    65 |
 ARTU |     -    14     -   -22     -     -     -     -     - |
 AUCK |     -  -495     -  -584   990     -     -     -  -294 |
 BAHR |     -    80   295  -336    -2     -     -     -   118 |
 BOR1 |     -   -35     -    56     -     -     -     -     - |
 CAS1 |     -   -11     -    57   -55     -     -     -    52 |
 CRO1 |     -   -14     -     -    13     -     -     -     - |
 DAV1 |     -    10     -     -   -80     -     -     -   100 |
 DRAO |     -   -42     6     -     -     -     -     -    52 |
 EISL |     -  -376     -  -241     -     -     -     -   578 |
 FAIR |     -     -    94   -97     -     -     -     -    61 |
 FORT |     -     -  -330   137     -     -     -     -   -48 |
 GALA |     -   -12     -  -134    87     -     -     -     - |
 GODE |     -    51     -   -82     -     -     -     -     - |
 GUAM |     -  -197     -   520  -172     -     -     -   102 |
 HOB2 |     -     -     -  -122    48     -     -     -    35 |
 IISC |     -     -     -  -449     -     -     -     -   360 |
 KERG |     -   -64     -     -     -     -     -     -    82 |
 KOKB |     -     -     X   -66     -     -     -     -    53 |
 MAC1 |     -   -26     -    64  -143     -     -     -   184 |
 MALI |     -    92     -  -146     -     -     -     -     - |
 MAS1 |     -     2   128   -19   -85     -     -     -   110 |
 MCM4 |     -   114     -     X   -90     -     -     -     7 |
 MDO1 |     -   -31   -99     -     -     -     -     -    57 |
 MKEA |     -    45     -   -71     -     -     -     -     - |
 NLIB |     -   -40     -     -     -     -     -     -    50 |
 NRC2 |     -     2   103     -   -14     -     -     -     - |
 NYA1 |     -    38     -     -   -34     -     -     -     - |
 NYAL |     -     -    88  -136     -     -     -     -    94 |
 OHIG |     -    73     -   396  -327     -     -     -    52 |
 ONSA |     -  -157     -   331  -102     -     -     -    77 |
 PETP |     -   -57     -     -    52     -     -     -     - |
 PIE1 |     -   -87     -     X     -     -     -     -   111 |
 POL2 |     -   232     -  -368     -     -     -     -     - |
 REYK |     -  -115     -   182     -     -     -     -     - |
 STJO |     -    69   149     -   -81     -     -     -     - |
 SUTH |     -    61     -  -129    21     -     -     -     - |
 THTI |     -    95     -     -     -     -     -     -  -121 |
 TRO1 |     -  -146     -     -   132     -     -     -     - |
 TSKB |     -     -   334  -290     -     -     -     -   150 |
 USNO |     -     4     -  -282     -     -     -     -   221 |
 USUD |     -   -78     -   124     -     -     -     -     - |
 WHIT |     -     0     -     -     0     -     -     -     - |
 WSRT |     -   -68     -     -     -     -     -     -    86 |
 WTZR |     -  -128     -     4     -     -     -     -   160 |
 YELL |     -   -20   136  -228     -     -     -     -   183 |
 YSSK |     -   -11     -     -    10     -     -     -     - |
 ZIMM |     -  -103     -   164     -     -     -     -     - |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  8210    55   334    67    43     -  8263     -    75 |  288   2.12
    2 |  5169    42   173    37    22     -  4652     -     - |  288   2.33
    3 |  4291    91   142    84   153     -  4007     -    74 |  288   1.83
    4 |  1106    97   203    84   170     -  1254     -    72 |  288   0.90
    5 | 10585    76   107    73    49     -  9592     -    61 |  288   4.23
    6 |  8672   141    43   272    32     -  9001     -    56 |  288   8.55
    7 |  1682    78   184   145    67     -  1868     -    77 |  288   1.69
    8 |  4045    80   171    77    44     -  4000     -    66 |  288   3.42
    9 |  8554    52    95   118    46     -  8091     -    62 |  288   2.01
   10 |  3508   101    80   146    66     -  3462     -    86 |  277   2.68
   11 |  2680   142   103    73    86     -  2361     -    64 |  288   0.37
   13 |   734   113   146    49    67     -   774     -    92 |  288   0.30
   14 |  1356    89    71    51   150     -  1409     -   169 |  288   0.23
   15 |  4341    54    70     -    25     -  3901     -    70 |  288   2.84
   17 |  6348   128   180   329   186     -  5891     -   257 |  288   2.36
   18 |   859    91   165    97    44     -   891     -   134 |  288   0.37
   19 | 14732   167   198    44    87     - 14890     -    95 |  288   3.60
   20 |   514    81   160    57    77     -   670     -   100 |  288   0.24
   21 |  7343   168   256   172   168     -  8207     -   151 |  277   3.63
   22 |  1343    42    46   140    57     -  1309     -   116 |  288   1.42
   23 |  6126   170   249   306     -     -  6412     -    50 |  263   4.22
   24 |  1464    50   234    55    58     -  1962     -    88 |  288   1.15
   25 | 11176    74   179    65    76     - 10345     -    54 |  288   1.54
   26 |  1113   130   275   274    49     -  1248     -    66 |  288   0.30
   27 |  2588    94   221    31    54     -  2434     -    47 |  288   1.67
   28 |  9109    74    78   269    42     -  8567     -   158 |  288   0.74
   29 |  1766    59   152    79    65     -  1698     -    57 |  288   0.56
   30 |  4174    93   165   152    72     -  4136     -    77 |  278   1.71
   31 |  9260    91    65    99   112     -  9306     -    31 |  288   2.65
 -----+-------------------------------------------------------+--------------
 AREQ |     -    68     -   170     -     -     -     -    62 |  197    >>>
 ARTU |     -    48     -    76     -     -     -     -     - |  287  21.79
 AUCK |     -    58     -    61    45     -     -     -    57 |  288  18.19
 BAHR |     -   112    68    31    70     -     -     -    63 |  288   1.26
 BOR1 |     -    22     -    36     -     -     -     -     - |  288   3.13
 CAS1 |     -   138     -   109    63     -     -     -   221 |  288  13.96
 CRO1 |     -    70     -     -    63     -     -     -     - |  287   0.30
 DAV1 |     -    99     -     -    59     -     -     -    61 |  286  19.93
 DRAO |     -    20    43     -     -     -     -     -    30 |  288   0.04
 EISL |     -    57     -    69     -     -     -     -    45 |  250  50.33
 FAIR |     -     -   377   225     -     -     -     -   237 |  286   0.29
 FORT |     -     -   256   113     -     -     -     -    61 |  201   0.51
 GALA |     -    49     -    68    71     -     -     -     - |  285  29.82
 GODE |     -   153     -   242     -     -     -     -     - |  104 216.64
 GUAM |     -   151     -    72    96     -     -     -   119 |  288  20.44
 HOB2 |     -     -     -   161   156     -     -     -   226 |  268 927.89
 IISC |     -     -     -   154     -     -     -     -   124 |  185  31.26
 KERG |     -    55     -     -     -     -     -     -    70 |  287    >>>
 KOKB |     -     -     X   172     -     -     -     -   138 |  117   0.10
 MAC1 |     -    37     -   154    44     -     -     -    66 |  288  13.06
 MALI |     -   178     -   283     -     -     -     -     - |  177  12.29
 MAS1 |     -    70    69   102    46     -     -     -    36 |  288   1.74
 MCM4 |     -   296     -     X   192     -     -     -   373 |  251    >>>
 MDO1 |     -    14    36     -     -     -     -     -    21 |  278  14.06
 MKEA |     -    47     -    75     -     -     -     -     - |  287  31.47
 NLIB |     -    29     -     -     -     -     -     -    37 |  288   0.08
 NRC2 |     -    32    50     -    30     -     -     -     - |  288   0.12
 NYA1 |     -    40     -     -    36     -     -     -     - |  288   0.14
 NYAL |     -     -    46    17     -     -     -     -    11 |  288   0.15
 OHIG |     -    73     -    67    39     -     -     -    62 |  288  10.85
 ONSA |     -    39     -    36    41     -     -     -    26 |  288   0.44
 PETP |     -    23     -     -    21     -     -     -     - |  287  12.69
 PIE1 |     -    31     -     X     -     -     -     -    40 |  284   0.03
 POL2 |     -    22     -    34     -     -     -     -     - |  277  45.17
 REYK |     -    27     -    43     -     -     -     -     - |  288  10.31
 STJO |     -    56    50     -    46     -     -     -     - |  288   2.49
 SUTH |     -   100     -    63    82     -     -     -     - |  288  27.09
 THTI |     -    33     -     -     -     -     -     -    42 |  255   1.73
 TRO1 |     -    59     -     -    53     -     -     -     - |  288  14.46
 TSKB |     -     -   105   121     -     -     -     -    98 |  203   1.15
 USNO |     -    37     -    41     -     -     -     -    31 |  288   0.04
 USUD |     -    24     -    38     -     -     -     -     - |  288   0.21
 WHIT |     -    37     -     -    33     -     -     -     - |  287  22.61
 WSRT |     -    34     -     -     -     -     -     -    43 |  288   0.07
 WTZR |     -    37     -    49     -     -     -     -    45 |  288   0.14
 YELL |     -    57    61   190     -     -     -     -    91 |  286   0.10
 YSSK |     -    24     -     -    22     -     -     -     - |  287  15.26
 ZIMM |     -    41     -    64     -     -     -     -     - |   86    >>>
 -----+-------------------------------------------------------+--------------
 TOT  |  6157    88   164   131    83     -  6034     -   108 |


 BEST CLOCK FIT: PIE1   284   0.03 (ns) 

