
 GPS week: 1112   Day: 2   MJD: 52030                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2767      0     0.02    -0.18     4.75     0.00
 cod |   288     0  21143      8    -2.17    -0.76     0.10    15.95
 emr |    96     0   3716      8   457.14     7.20     0.12    13.34
 esa |   288     0  17590   1761   453.63     6.91     0.17     8.36
 gfz |   288     0  13329      6    -0.01    -0.45     0.07    27.76
 igu |    96    96      0      0     0.00     0.00     0.00     0.00
 jpl |   281     0   9696    320     0.70     0.30     0.08    22.58
 ngs |    96     0   2767      0     0.02    -0.18     4.54     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  16187    380 -1221.27    29.12     0.13    12.01

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 | -4808    18   164  -319    75     -   -70 -4720     -    23 |
    2 |  2557    11  -161   -59   131     -    47  3231     -  -235 |
    3 |  3229   -11  -113   705   -53     -  -162  2662     -  -162 |
    4 | -5249   -40    11  -111    98     -    47 -4640     -  -144 |
    5 |  4426   181  -156   -50   -77     -    80  4565     -   -35 |
    6 |  1640   235  -157   262   -10     -  -154  1782     -  -265 |
    7 | -4493   -35     8  -104    28     -   172 -4079     -  -112 |
    8 | -1056   157    54  -199   -53     -   134 -1655     -   -73 |
    9 |  7393   125  -268   167   -12     -   141  6592     -  -298 |
   10 |   852    26   -53     X    36     -   143   532     -  -216 |
   11 |  3016    55   332    61  -183     -     0  2770     -   181 |
   13 |  3668     3   321  -187  -109     -   -67  3831     -   326 |
   14 |  3933   191   -18  -133  -104     -    34  3955     -    52 |
   15 | -3836    85  -116     -    59     -  -177 -4051     -   -39 |
   17 |  -828   296  -123     X   -36     -   146   318     -  -445 |
   18 |  3758  -139    38   431   -16     -  -129  3867     -    67 |
   19 | -3123    15  -145   -80    58     -   -49 -3529     -     - |
   20 |  3072    -7   140  -313    26     -   241  3357     -   -91 |
   21 | -3922    19   -71   323   -80     -   -61 -4241     -    22 |
   22 | -3808    77  -206    33    70     -    30 -2735     -  -233 |
   23 | -2156   127  -124   298     -     -   -26 -1971     -  -288 |
   24 |  -987    -3    56    34    28     -    84  -835     -  -173 |
   25 | -6202    91  -134  -324    99     -   -96 -5528     -    22 |
   26 | -1260    41   -81   145    39     -    31 -1145     -  -243 |
   27 | -3057    67   123  -207    16     -    96 -3309     -  -124 |
   28 |  3654   -54   205   -53    20     -  -141  2928     -   100 |
   29 |   375    15  -198  -158   151     -   -98   369     -  -100 |
   30 | -5499    49  -223   648   -69     -   -96 -6043     -  -170 |
   31 |  8490   -14  -109   758  -112     -    13  7537     -  -223 |
 -----+-------------------------------------------------------------+
 ALBH |     -  -153     -     X     -     -   108     -     -     - |
 ALGO |     -  -102   142     X   -73     -     -     -     -   251 |
 AREQ |     -   -23     -   -56    78     -  -153     -     -   167 |
 AUCK |     -  -110     -  -265     -     -    40     -     -   292 |
 BAHR |     -    52   157   -48   -33     -     -     -     -   -18 |
 BOR1 |     -   -21     -    41     -     -     -     -     -     - |
 BRUS |     -  -102     -     -     -     -    72     -     -     - |
 CAS1 |     -   -16     -  -108    -1     -     -     -     -   102 |
 CRO1 |     -    79     -   -14     -     -   -52     -     -     - |
 DAV1 |     -    17     -     -  -109     -     -     -     -   230 |
 DRAO |     -   -49    32     -     -     -     -     -     -    53 |
 EISL |     -  -163     -   311     -     -     -     -     -     X |
 FAIR |     -     -    40  -114     -     -     X     -     -    65 |
 FLIN |     -   -69     -     -     -     -    48     -     -     - |
 FORT |     -     -     -    57     -     -     -     -     -   -39 |
 GALA |     -  -118     -   -35   165     -  -111     -     -     - |
 GODE |     -    -1     -     2     -     -     -     -     -     - |
 GOLD |     -    73     -     X     -     -   -52     -     -     - |
 GUAM |     -  -108     -     6   -58     -    57     -     -   160 |
 HRAO |     -     0     -     -     -     -     0     -     -     - |
 IISC |     -     -     -  -715     -     -     -     -     -   498 |
 KARR |     -  -266     -     -   153     -     -     -     -     - |
 KERG |     -   -19     -     -     -     -     -     -     -    25 |
 KOKB |     -     -    44   -79     -     -    58     -     -   -73 |
 KOUR |     -   -28     -    85     -     -   -48     -     -    74 |
 MAC1 |     -   -18     -    44   -59     -     -     -     -   129 |
 MALI |     -    18     -   -34     -     -     -     -     -     - |
 MAS1 |     -   -41   128     2    -6     -     -     -     -    20 |
 MCM4 |     -    83     -    76  -113     -     -     -     -   110 |
 MDO1 |     -   -12    46     -     -     -     -     -     -    -2 |
 MKEA |     -   -46     -   -47     -     -   -70     -     -   214 |
 MONP |     -   -19     -     -     -     -    14     -     -     - |
 NLIB |     -   -26     -     -     -     -     -     -     -    35 |
 NRC2 |     -   122     -  -397     -     -    62     -     -     - |
 NYA1 |     -    38     -     -   -22     -     -     -     -     - |
 NYAL |     -     -    24   -64     -     -     -     -     -    36 |
 OHIG |     -    24     -   -28   -96     -     -     -     -   209 |
 ONSA |     -     -     -    92   -28     -     -     -     -     - |
 PETP |     -   -68     -     -    52     -   -17     -     -     - |
 PIE1 |     -   -84     -     X     -     -     -     -     -   112 |
 POL2 |     -    98     -  -187     -     -     -     -     -     - |
 REYK |     -   -89     -   170     -     -     -     -     -     - |
 STJO |     -   -41   250     -    -8     -   -10     -     -     - |
 SUTH |     -    -8     -   -36    14     -     -     -     -     - |
 THTI |     -   -53     -     -     -     -     -     -     -    70 |
 TIXI |     -    56     -     -     -     -   -40     -     -     - |
 TRO1 |     -  -166     -     -    95     -     -     -     -     - |
 TROM |     -     -     -    74     -     -     -     -     -   -51 |
 TSKB |     -    68   101  -145     -     -     -     -     -   -19 |
 USNO |     -    -7     -  -168     -     -     -     -     -   126 |
 USUD |     -    35     -  -394     -     -   126     -     -     - |
 WSRT |     -   -70     -     -     -     -     -     -     -    93 |
 WTZR |     -  -239     -   138     -     -     -     -     -   222 |
 YSSK |     -    72     -     -    34     -   -94     -     -     - |
 ZIMM |     -  -371     -   707     -     -     -     -     -     - |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  4623    49    38    66    39     -    49  4619     -    89 |  288   3.57
    2 |  7093   105   151   378    81     -    80  6608     -   122 |  287   2.37
    3 |  3228   149    76    81   177     -   109  3263     -   133 |  288   1.26
    4 |  2347    39   117   170    29     -    73  2372     -   139 |  288   0.39
    5 |  6740    77   114   222    55     -    76  6724     -    33 |  277   3.78
    6 |  8489   101    80    83    70     -    78  8274     -    55 |  288   7.09
    7 |  1572    53    41    50    68     -   124  1480     -   212 |  288   1.80
    8 |  6751    63    84    76    58     -    88  6882     -    63 |  288   5.02
    9 |  2586    88   151   116    33     -    56  2562     -    93 |  288   1.52
   10 |  1844   112    66     X    65     -   152  1873     -   154 |  276   1.51
   11 |  1674   121    68   135    67     -   148  1480     -   122 |  288   0.42
   13 |   722    88   147    96    46     -    73   805     -    61 |  288   0.28
   14 |   694   248   105   328    88     -    63   833     -    36 |  288   0.34
   15 |  4513   134   180     -    90     -    86  4211     -    69 |  288   3.06
   17 |  5055   119    58     X    72     -   140  4908     -   317 |  288   2.54
   18 |   800    70   101   352    56     -    52   808     -   204 |  288   0.39
   19 |  8533    75    53   136    50     -    68  8590     -     - |  288   2.54
   20 |   708   144    96   172    55     -    62   773     -    60 |  288   0.27
   21 |  2861   323   241   175    99     -   238  2723     -   313 |  278   2.12
   22 |  5838   107   123   229   132     -   115  4264     -   119 |  283   0.66
   23 |  4847   147   193   266     -     -   101  4764     -   187 |  276   4.59
   24 |  4056    63   106   167    54     -    94  4025     -    79 |  288   1.91
   25 |  3628   101   127    63    55     -   104  3778     -    99 |  288   2.62
   26 |  1513    62    69   152    39     -    76  1536     -    91 |  288   0.55
   27 |  6913   109   262   135    40     -    79  5616     -   165 |  288   3.10
   28 |  8176    67    74   187    94     -    66  7944     -   102 |  288   1.43
   29 |   914   195   132   153   126     -    85  1054     -    57 |  288   0.76
   30 |  6565    86   102   165    41     -   171  5919     -    77 |  278   3.06
   31 |  4205    65    71   109    37     -   116  4193     -    39 |  288   2.25
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    36     -     X     -     -    25     -     -     - |  280   0.15
 ALGO |     -    66    38     X    24     -     -     -     -    44 |  288   0.07
 AREQ |     -    42     -   157    48     -    47     -     -    39 |  288  50.46
 AUCK |     -   150     -   228     -     -    87     -     -   251 |  288  18.61
 BAHR |     -    93    44    65    41     -     -     -     -    81 |  288   0.67
 BOR1 |     -    27     -    51     -     -     -     -     -     - |  288   1.96
 BRUS |     -    49     -     -     -     -    35     -     -     - |  280   0.06
 CAS1 |     -   174     -   172    84     -     -     -     -   372 |  288  14.80
 CRO1 |     -   105     -   103     -     -    56     -     -     - |  288   0.74
 DAV1 |     -    97     -     -    53     -     -     -     -    25 |  287  20.46
 DRAO |     -    38    36     -     -     -     -     -     -    43 |  288   0.04
 EISL |     -    68     -   129     -     -     -     -     -     X |  206  42.35
 FAIR |     -     -    58   120     -     -     X     -     -    66 |  287   0.09
 FLIN |     -    44     -     -     -     -    31     -     -     - |  281   9.32
 FORT |     -     -     -   204     -     -     -     -     -   142 |  194   0.34
 GALA |     -    69     -   169    43     -    54     -     -     - |  288  28.02
 GODE |     -   133     -   254     -     -     -     -     -     - |   85 206.05
 GOLD |     -    43     -     X     -     -    31     -     -     - |  199  28.43
 GUAM |     -    38     -    68    37     -    46     -     -    47 |  288  24.68
 HRAO |     -   121     -     -     -     -    85     -     -     - |  276    >>>
 IISC |     -     -     -   181     -     -     -     -     -   126 |  150  28.72
 KARR |     -    34     -     -    20     -     -     -     -     - |  288 112.05
 KERG |     -    40     -     -     -     -     -     -     -    53 |  287    >>>
 KOKB |     -     -   274   220     -     -   152     -     -   251 |  285   0.55
 KOUR |     -    92     -   152     -     -    52     -     -    62 |  280    >>>
 MAC1 |     -    55     -   141    34     -     -     -     -    51 |  288  11.04
 MALI |     -   156     -   297     -     -     -     -     -     - |  201  14.20
 MAS1 |     -    81    46   353    40     -     -     -     -    76 |  288   2.48
 MCM4 |     -   214     -   174   109     -     -     -     -   156 |  265    >>>
 MDO1 |     -    34    38     -     -     -     -     -     -    35 |  275  15.61
 MKEA |     -    79     -    69     -     -    36     -     -    54 |  288  31.26
 MONP |     -    25     -     -     -     -    17     -     -     - |  279  30.62
 NLIB |     -   130     -     -     -     -     -     -     -   173 |  268   0.40
 NRC2 |     -    59     -    99     -     -    31     -     -     - |  288   0.12
 NYA1 |     -    38     -     -    22     -     -     -     -     - |  288   0.06
 NYAL |     -     -    16    27     -     -     -     -     -    16 |  288   0.05
 OHIG |     -    95     -   131    51     -     -     -     -    67 |  288  15.07
 ONSA |     -     -     -    66    20     -     -     -     -     - |  288   0.08
 PETP |     -    47     -     -    40     -    48     -     -     - |  287  11.70
 PIE1 |     -    47     -     X     -     -     -     -     -    62 |  285  26.25
 POL2 |     -    33     -    63     -     -     -     -     -     - |  288  34.89
 REYK |     -    34     -    66     -     -     -     -     -     - |  287   7.55
 STJO |     -    41    38     -    27     -    38     -     -     - |  288   4.59
 SUTH |     -    59     -   253    48     -     -     -     -     - |  287  19.93
 THTI |     -    51     -     -     -     -     -     -     -    68 |  270   1.44
 TIXI |     -    35     -     -     -     -    25     -     -     - |  279  12.40
 TRO1 |     -    38     -     -    22     -     -     -     -     - |  288  12.21
 TROM |     -     -     -    25     -     -     -     -     -    17 |  287  15.87
 TSKB |     -    72    34   150     -     -     -     -     -    59 |  278   0.88
 USNO |     -    51     -    86     -     -     -     -     -    32 |  288   0.04
 USUD |     -    50     -    60     -     -    41     -     -     - |  288   0.17
 WSRT |     -    43     -     -     -     -     -     -     -    57 |  288   0.05
 WTZR |     -    55     -    46     -     -     -     -     -    53 |  288   0.23
 YSSK |     -    27     -     -    24     -    37     -     -     - |  287  13.69
 ZIMM |     -    49     -    93     -     -     -     -     -     - |   86    >>>
 -----+-------------------------------------------------------------+--------------
 TOT  |  4747    98   116   167    65     -    79  4541     -   126 |


 BEST CLOCK FIT: DRAO   288   0.04 (ns) 

