
 GPS week: 1111   Day: 6   MJD: 52027                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2757      0     0.91    -0.99     5.59     0.00
 cod |   288     0  20183     54     0.51    -2.73     0.12    18.97
 emr |    96     0   3764    110   429.32    12.30     0.15    15.56
 esa |   288     0  17654   1424   425.79    12.14     0.19    11.57
 gfz |   288     0  13794    609    -0.49     0.79     0.12    20.73
 igu |    96     0   2473      4     1.05    -0.35     3.79     0.00
 jpl |   273     0   9619    854    -0.93    -1.29     0.18    11.24
 ngs |    96     0   2757      2     0.87    -0.97     5.17     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  16337    264  2989.27    32.89     0.11    21.92

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 | -8354   136    19  -117    50-13628    65 -6952     -  -121 |
    2 |   357   237  -222   -41    92     -    10   968     -  -216 |
    3 | -2312   -56  -112   469   -90 -3305  -209 -1831     -   -57 |
    4 | -4874   -41  -151   297    49 -1676  -184 -4122     -   -83 |
    5 | -6375   102    91  -269   149 -7194  -157 -6027     -   -87 |
    6 |  2593   117   -85    43    77   370  -121  1919     -  -146 |
    7 | -1344    32   171   -79    85  1702   -98 -1040     -   -80 |
    8 | -4177    77   -37   412   -60  3262  -138 -3827     -  -192 |
    9 |  1008    31  -174    -5   257   373  -204   402     -  -186 |
   10 | -7275    31  -279     3   228 -3024  -118 -6929     -  -153 |
   11 |  6163    61    81    38  -168  6360   -41  5984     -    75 |
   13 |   590    58   236   128  -272  3837   -56  1069     -   100 |
   14 |  4511    85   208  -258   -39  -177     3  4939     -    59 |
   15 |  9386   -32   -45     -    54 22547  -227  7745     -    41 |
   17 | -4270   285   -84     X     9     -  -181 -3617     -  -190 |
   18 |  3744  -136   198  -351    41 -8218    -2  4035     -   218 |
   19 | 16223   126    27   291  -296     -   111 12657     -     - |
   20 |  1153   168   176  -132   -50   742   365  1396     -  -150 |
   21 | -8422   102  -239     7     -  3284  -114 -8429     -    13 |
   22 |  5438   251  -147     X   -59  1610    45  4432     -  -127 |
   23 | -5015    21  -228    60   119  -904    -4 -4671     -  -124 |
   24 |  7545  -114  -172   348    87-11269  -212  7733     -   -88 |
   25 | -1442    83     5  -186    24  6880  -163  -866     -    28 |
   26 |  -797   -96  -156   538   241 -2811  -160  -643     -  -356 |
   27 | -2346   108    43   353  -216  1150   257 -2450     -  -150 |
   28 |  2893   -21   214   139  -153 -7793   -94  2728     -    56 |
   29 |  -666    -1   -86  -173    87  2812    17   -97     -    26 |
   30 |  3765    79  -182  -194   224  -811  -299  3613     -   -73 |
   31 | -8596     5   111   473  -120  5266    14 -8711     -  -169 |
 -----+-------------------------------------------------------------+
 ALBH |     -  -173     -   290     -     -    56     -     -     - |
 ALGO |     -  -100   104     X  -102     -     -     -     -   159 |
 AREQ |     -  -190     -   -27    58     -  -129     -     -   183 |
 ARTU |     -   -28     -    46     -     -     -     -     -     - |
 ASC1 |     -    36     -  -215   -94     -     -     -     -   172 |
 AUCK |     -  -153     -     3     X     -    63     -     -    92 |
 BAHR |     -   143    15   -42   -81     -     -     -     -   -28 |
 BOR1 |     -    37     -   -61     -     -     -     -     -     - |
 BRUS |     -    -8     -     -     -     -    13     -     -     - |
 CAS1 |     -     -     -     -  -119     -     -     -     -   113 |
 CRO1 |     -   -39     -     -     -     -    66     -     -     - |
 DAV1 |     -     -     -     -  -131     -     -     -     -   124 |
 DRAO |     -  -122   135     -     -     -     -     -     -    73 |
 EISL |     -   -37     -  -304     -     -     -     -     -   173 |
 FAIR |     -     -    96  -157     -     -     X     -     -    66 |
 FORT |     -     -     -   -98     -     -     -     -     -    52 |
 GALA |     -   -28     -   -22   103     -  -144     -     -     - |
 GODE |     -    12     -   -19     -     -     -     -     -     - |
 GOLD |     -     2     -     X     -     -    -4     -     -     - |
 GUAM |     -   -65     -    98     -     -   -67     -     -    27 |
 HRAO |     -    68     -     -     -     -  -115     -     -     - |
 KOKB |     -     -   132   141     -     -  -203     -     -   -15 |
 KSTU |     -    98     -     -     -     -  -165     -     -     - |
 LPGS |     -     -     -   -24   -44     -   -60     -     -    73 |
 MALI |     -   -29     -   -64     -     -     -     -     -    57 |
 MAS1 |     -   -11    44    88   -73     -     -     -     -    21 |
 MCM4 |     -    37     -   480     -     -     -     -     -  -266 |
 MDO1 |     -   -69   -14     -     -     -   130     -     -     - |
 MKEA |     -   -24     -    11     -     -    31     -     -     - |
 MONP |     -    52     -     -     -     -   -87     -     -     - |
 NLIB |     -   -87     -     -     -     -     -     -     -    75 |
 NRC2 |     -  -102   124     -     -     -     -     -     -     - |
 NYA1 |     -    27     -     -   -25     -     -     -     -     - |
 NYAL |     -     -     -  -128     -     -     -     -     -    67 |
 OBER |     -     -     -     -    94     -  -173     -     -     - |
 OHIG |     -    58     -   -24   -38     -     -     -     -     - |
 PIE1 |     -   -65     -   -83     -     -    64     -     -    72 |
 POL2 |     -   354     -  -581     -     -     -     -     -     - |
 POTS |     -   -42     -    28     -     -  -128     -     -    83 |
 REYK |     -     0     -     0     -     -     -     -     -     - |
 STJO |     -  -119   167     -    67     -     -     -     -     - |
 SUTH |     -    82     -    67  -108     -     -     -     -     - |
 THTI |     -   -16     -     -  -160     -     -     -     -   165 |
 TIDB |     -  -948     -     X   867     -     X     -     -     - |
 TRO1 |     -   -83     -     -    76     -     -     -     -     - |
 TROM |     -     -     -   -11     -     -     -     -     -     6 |
 TSKB |     -   195   -74  -288     -     -     -     -     -     X |
 URUM |     -     -     -     -  -128     -     -     -     -   121 |
 USNO |     -   -69     -  -160     -     -     -     -     -   144 |
 USUD |     -   -61     -   186     -     -   -96     -     -     - |
 WHIT |     -   -54     -     -    49     -     -     -     -     - |
 WSRT |     -   -90     -     -     -     -     -     -     -    78 |
 WTZR |     -  -107     -  -122     -     -     -     -     -   157 |
 WUHN |     -   -59     -     -     X     -     -     -     -    51 |
 YAR2 |     -     8     X  -562     -     -    83     -     -   254 |
 YELL |     -    62   145  -166     -     -     -     -     -     - |
 ZIMM |     -  -224     -   367     -     -     -     -     -     - |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  6751    77    99   114    59  5071   115  6731     -    59 |  288   3.49
    2 |  4574   169   185   315   123     -   101  3942     -    94 |  276   3.76
    3 |  3107   124   136    56    94  1572   122  3027     -    76 |  288   1.61
    4 |  2709    71   161   135    71   628   181  2780     -    76 |  288   0.68
    5 |  6069   116    82   313   119  4256   129  5989     -    81 |  277   3.81
    6 | 11236   105   144    91   170  5270   173  9572     -   141 |  288   8.75
    7 |  1569   171   134   119   167  1154   113  1587     -    55 |  288   0.56
    8 |  3523    96   221   139    64  2359   106  3705     -    47 |  288   2.89
    9 |  7087   148    66   261    65  4160   166  6621     -    52 |  288   2.09
   10 |  2982   126   107    66   128  2555   264  3119     -    48 |  277   2.42
   11 |  1578   120   214   147    70  2401   221  1546     -    50 |  288   0.41
   13 |  1109    90   136    59   131  1231   133  1124     -    38 |  288   0.25
   14 |  1567    98    87   174   119   434   143  1333     -    56 |  288   0.24
   15 |  6189   133   260     -    89  6700   193  6170     -   115 |  288   3.06
   17 |  2752   192    95     X   207     -   349  2324     -   310 |  288   1.52
   18 |  1037   239   126   182    87  4125   138  1095     -   103 |  288   0.52
   19 | 18701   141    81    99    66     -   106 16700     -     - |  288   5.70
   20 |   945   130    90   112    36   403   184   940     -    45 |  288   0.19
   21 |  4615   187   336   416     -  2471   230  4618     -   204 |  264   2.58
   22 |  4706   171   186     X   308   707   298  4505     -   117 |  278   0.97
   23 |  4067   222   199   112    90  2139   303  3978     -   104 |  278   3.99
   24 |  3388   140    98   122    98 10557   101  3224     -    92 |  288   2.85
   25 |  4675    95   311   212    70  3289   143  4418     -    44 |  288   2.24
   26 |   973   203   100   427   112  2004   241   943     -    65 |  288   0.47
   27 |  6613   123    61   103    59  6309    69  6780     -    37 |  288   4.31
   28 |  3914   171   146   126   105  4429   187  3780     -    89 |  288   0.87
   29 |  2676   107   199   228    52  1331    98  2527     -   134 |  288   0.28
   30 |  2896   124   162   196    83  1423   152  2519     -    69 |  279   1.69
   31 |  4544    77   107    61    41  2162   145  4564     -    71 |  288   2.92
 -----+-------------------------------------------------------------+--------------
 ALBH |     -   177     -   488     -     -   196     -     -     - |  283   0.20
 ALGO |     -    60    83     X    36     -     -     -     -    37 |  288   0.04
 AREQ |     -    70     -   111    54     -   138     -     -    47 |  288  12.14
 ARTU |     -    53     -    86     -     -     -     -     -     - |  286  23.86
 ASC1 |     -    52     -   111    26     -     -     -     -    57 |  288    >>>
 AUCK |     -   146     -    89     X     -    91     -     -    78 |  288  20.89
 BAHR |     -    44    98    48    40     -     -     -     -    25 |  288   0.53
 BOR1 |     -    35     -    58     -     -     -     -     -     - |  288   1.95
 BRUS |     -    71     -     -     -     -   120     -     -     - |  270   0.10
 CAS1 |     -     -     -     -   192     -     -     -     -   182 |  274  13.28
 CRO1 |     -    65     -     -     -     -   109     -     -     - |  265   0.15
 DAV1 |     -     -     -     -    98     -     -     -     -    92 |  277  21.62
 DRAO |     -    41    65     -     -     -     -     -     -    30 |  287   0.03
 EISL |     -   198     -   126     -     -     -     -     -   139 |  273  48.50
 FAIR |     -     -    66   123     -     -     X     -     -    65 |  283   0.09
 FORT |     -     -     -   242     -     -     -     -     -   128 |  175   0.58
 GALA |     -   212     -   188   109     -   115     -     -     - |  288  31.67
 GODE |     -   211     -   345     -     -     -     -     -     - |   87   0.21
 GOLD |     -    88     -     X     -     -   148     -     -     - |  207  25.09
 GUAM |     -   119     -    79     -     -   147     -     -    49 |  288  21.07
 HRAO |     -   192     -     -     -     -   324     -     -     - |  264    >>>
 KOKB |     -     -   210   392     -     -   366     -     -   315 |  288   0.36
 KSTU |     -    68     -     -     -     -   114     -     -     - |  262  30.66
 LPGS |     -     -     -   336   409     -   409     -     -   308 |  262 217.62
 MALI |     -    87     -   244     -     -     -     -     -    63 |  287  29.09
 MAS1 |     -    72   170   105    31     -     -     -     -    60 |  288   1.67
 MCM4 |     -   151     -   234     -     -     -     -     -   164 |  251  21.41
 MDO1 |     -    51    67     -     -     -    86     -     -     - |  284   8.96
 MKEA |     -    92     -    86     -     -   168     -     -     - |  288  36.55
 MONP |     -    70     -     -     -     -   118     -     -     - |  273  24.67
 NLIB |     -    44     -     -     -     -     -     -     -    38 |  279 497.71
 NRC2 |     -    56    68     -     -     -     -     -     -     - |   96   0.08
 NYA1 |     -    40     -     -    37     -     -     -     -     - |  288   0.09
 NYAL |     -     -     -    54     -     -     -     -     -    28 |  287   0.06
 OBER |     -     -     -     -    68     -   125     -     -     - |  272   3.88
 OHIG |     -   137     -   223    52     -     -     -     -     - |  288  16.70
 PIE1 |     -    59     -    49     -     -    69     -     -    49 |  288   0.05
 POL2 |     -    98     -   160     -     -     -     -     -     - |  271  44.42
 POTS |     -    57     -    92     -     -   145     -     -    47 |  288  14.07
 REYK |     -    27     -    44     -     -     -     -     -     - |  287  10.84
 STJO |     -    55    79     -    63     -     -     -     -     - |  288   1.77
 SUTH |     -   166     -   504   144     -     -     -     -     - |  288  37.61
 THTI |     -   308     -     -   143     -     -     -     -   141 |  287   2.59
 TIDB |     -   174     -     X   160     -     X     -     -     - |  168  13.61
 TRO1 |     -    36     -     -    33     -     -     -     -     - |  288  12.91
 TROM |     -     -     -    29     -     -     -     -     -    15 |  288  16.41
 TSKB |     -    89    54   158     -     -     -     -     -     X |  264   1.10
 URUM |     -     -     -     -    47     -     -     -     -    44 |  288  21.80
 USNO |     -    35     -    43     -     -     -     -     -    33 |  288   0.06
 USUD |     -    42     -   139     -     -   182     -     -     - |  288   0.18
 WHIT |     -    38     -     -    35     -     -     -     -     - |  288  11.43
 WSRT |     -    45     -     -     -     -     -     -     -    39 |  288   0.05
 WTZR |     -    41     -    47     -     -     -     -     -    36 |  288   0.07
 WUHN |     -    56     -     -     X     -     -     -     -    49 |  287  25.35
 YAR2 |     -   160     X   205     -     -   123     -     -    68 |  288  15.06
 YELL |     -    36    54    58     -     -     -     -     -     - |  284   0.08
 ZIMM |     -    19     -    31     -     -     -     -     -     - |   83    >>>
 -----+-------------------------------------------------------------+--------------
 TOT  |  5594   122   149   192   118  3792   184  5172     -   107 |


 BEST CLOCK FIT: DRAO   287   0.03 (ns) 

