
 GPS week: 1111   Day: 5   MJD: 52026                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2752      0    -1.11     0.97     5.35     0.00
 cod |   286     0  18646    325    -0.53    -0.42     0.15    13.49
 emr |    96     0   3606    203   418.35    10.24     0.12    19.10
 esa |   288     0  17057   1073   418.62    10.19     0.17    11.49
 gfz |   288     0  14001    605    -0.47    -0.58     0.09    24.26
 igu |    96     0   2478      0    -0.95     0.51     4.19     0.00
 jpl |   277    27   8577   1511     3.18    -2.82     0.16    11.93
 ngs |    96     0   2752      0    -1.09     0.94     5.16     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  15752    353  2956.14    30.81     0.11    19.73

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |  5572    49   -99  -229   136 14238  -122  4336     -     X |
    2 |  1580    -4  -162   113     -     -   -48  1916     -     - |
    3 |  -170  -135  -100   454   -22  2075   -44  -183     -  -105 |
    4 | -3814   -61   125     9   121  3124     7 -3834     -  -155 |
    5 |  2207   125   -62   -25    84     -    28  1693     -  -161 |
    6 | -2084    27   -79   239   151  9220   -78 -2097     -  -297 |
    7 | -1640   186   -63   -48    45   513    62 -1681     -  -143 |
    8 | -4550   -64  -125   300    25 -2055    23 -4415     -  -129 |
    9 |  6050   -80     X   273   150  2335   122  5320     -  -320 |
   10 | -4117  -105     X     X   226 -1067   100 -4180     -  -234 |
   11 |  2502    17   140  -126   -31   635     2  2740     -    55 |
   13 |  1012    93   -19  -107  -112 -3552    49  1046     -   135 |
   14 |  5142   136   177  -306   -59   804   -92  5000     -   125 |
   15 | -3403    48  -161     -    93  -466  -295 -3299     -   -30 |
   17 |-10487   279  -146     3    39     -   -52-10082     -  -166 |
   18 |  2452    18   313  -377   -10 -9727  -208  2545     -   173 |
   19 |   529   -82  -219   197   -55-11630   325  1568     -     - |
   20 |  3067   111   181  -230   -43   291   396  2879     -   -43 |
   21 | -9515   128    -4  -184   -31-27396   -52 -8100     -    68 |
   22 |  1463   355  -138   250  -279 21772    46  2047     -    31 |
   23 |  1160    96   -12    19    56 -4148   169  1083     -  -182 |
   24 |  5579  -105   100   328   120  6664  -131  5560     -  -267 |
   25 | -8344    12  -165  -139   109 -7500  -170 -7642     -    32 |
   26 | -1754    19   -76   489    27  1551    89 -1567     -  -327 |
   27 |    68   -74  -231   130   150   971   -20  -923     -  -131 |
   28 |  6227    51    13    73  -219  2242  -145  5861     -   214 |
   29 | -2927    50   -41  -298   113 -1428    63 -2778     -     3 |
   30 |  6557    74  -124   217    79  1298  -148  5943     -  -186 |
   31 |  1719   -73   -64   590  -107   402   221  1435     -  -192 |
 -----+-------------------------------------------------------------+
 ALBH |     -   -85     -  -236     -     -   364     -     -     - |
 ALGO |     -   -87   119  -125   -39     -     -     -     -   141 |
 AREQ |     -   -42     -   -20     -     -     -     -     -    40 |
 ARTU |     -   251     -    29  -155     -     -     -     -     - |
 ASC1 |     -   -99     -   -56     -     -     -     -     -    98 |
 AUCK |     -   -94     -  -123     X     -   -74     -     -   166 |
 BAHR |     -    56    44    70   -39     -    26     -     -   -59 |
 BOR1 |     -   -39     -    45     -     -     -     -     -     - |
 CAS1 |     -     -     -     -   -96     -     -     -     -   118 |
 CRO1 |     -   164     -     -   -87     -     5     -     -     - |
 DAV1 |     -     -     -     -  -130     -     -     -     -   160 |
 DRAO |     -   -69     9     -     -     -     -     -     -    44 |
 EISL |     -  -365     -  -490     -     -     -     -     -   508 |
 FAIR |     -     -    65   -63     -     -     X     -     -    16 |
 FORT |     -     -     -   101     -     -     -     -     -   -59 |
 GALA |     -   -60     -  -131   108     -   -41     -     -     - |
 GODE |     -   -37     -    43     -     -     -     -     -     - |
 GOLD |     -    88     -     X     -     -  -100     -     -     - |
 GUAM |     -     X     -    12  -122     -   -88     -     -   187 |
 HRAO |     -   211     -     -     -     -  -239     -     -     - |
 IISC |     -   222     -  -447     -     -     -     -     -   143 |
 KOKB |     -     -   247  -147     -     -     X     -     -   -42 |
 KSTU |     -    20     -     -     -     -   -23     -     -     - |
 LPGS |     -   -52     -     X  -135     -   187     -     -    79 |
 MALI |     -   -76     -    90     -     -     -     -     -     - |
 MAS1 |     -   -28    47   170  -135     -     -     -     -    70 |
 MCM4 |     -    -2     -   349   -62     -     -     -     -  -122 |
 MKEA |     -     -     -   -23     -     -    22     -     -     - |
 NLIB |     -    41     -     -     -     -     -     -     -   -28 |
 OBER |     -     -     -     -    90     -  -183     -     -     - |
 OHIG |     -   -70     -   102  -131     -     -     -     -   149 |
 PIE1 |     -    54     -  -256     -     -     -     -     -   113 |
 POL2 |     -   294     -  -345     -     -     -     -     -     - |
 POTS |     -  -120     -    53     -     -   -83     -     -    92 |
 REYK |     -   126     -  -148     -     -     -     -     -     - |
 SEY1 |     -   -75     -    89     -     -     -     -     -     - |
 STJO |     -   -98   113     -    24     -     -     -     -     - |
 SUTH |     -   213     -   -54    58     -  -401     -     -     - |
 THTI |     -     -     -     -   -43     -     -     -     -    53 |
 TIDB |     -  -393     -     X   218     -     X     -     -     - |
 TRO1 |     -  -197     -     -   109     -     -     -     -     - |
 TROM |     -     -     -   -39     -     -     -     -     -    23 |
 TSKB |     -   -38   242  -187     -     -     -     -     -    40 |
 URUM |     -     -     -     -  -125     -     -     -     -   153 |
 USNO |     -   -45     -   -42     -     -     -     -     -    55 |
 USUD |     -  -109     -   172     -     -   -54     -     -     - |
 WHIT |     -  -107     -     -    60     -     -     -     -     - |
 WILL |     -   -78     -     -     -     -    88     -     -     - |
 WSRT |     -   -93     -     -     -     -     -     -     -    64 |
 WTZR |     -  -132     -  -163     -     -     -     -     -   160 |
 WUHN |     -  -120     -     -     X     -     -     -     -    82 |
 YAR2 |     -    78     -   -48     -     -     -     -     -   -20 |
 YELL |     -    67   144  -159     -     -     -     -     -     - |
 ZIMM |     -  -538     -   631     -     -     -     -     -     - |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  6810    36    76   277   169  2932   172  6467     -     X |  288   2.81
    2 |  5587   339   313   296     -     -   161  5172     -     - |  246   2.97
    3 |  2390    90    70    81    74  2587   148  2250     -    50 |  288   1.60
    4 |  1423   137    91   103   130  1264   201  1255     -    54 |  288   1.26
    5 | 10998   193   161   403   100     -   209 10521     -    98 |  277   3.88
    6 |  8627    94    45   114   133  3758   164  8660     -    68 |  288   8.58
    7 |  1756   161   143   127    91   747   233  1666     -   102 |  288   0.67
    8 |  2719   155    77    65   107  1331   193  2678     -   170 |  288   2.42
    9 |  3459   178     X    62    97  3737   135  3159     -    35 |  288   1.49
   10 |  4801    84     X     X    48  4268   124  4655     -    66 |  276   1.99
   11 |  1535   107    60   130    45   958   207  1205     -    48 |  288   0.59
   13 |  1090    90   141    62    54  1839   157   917     -    44 |  288   0.27
   14 |   947    71    91   125    64   821   140   969     -    61 |  288   0.17
   15 |  4189    73    56     -    26  3331    95  4209     -    50 |  288   2.87
   17 |  4420   261   288   287    72     -   197  4649     -   109 |  288   3.00
   18 |  1368   131   115   157    82  4918   135  1157     -    72 |  288   0.52
   19 | 15129   163    94    79    62  6532   166 15182     -     - |  288   4.39
   20 |  1427   103   108   139    49   950   126  1234     -    43 |  288   0.21
   21 |  7066   107   106   229    88  9110   205  6316     -   190 |  278   2.95
   22 |  7792   223    73   334    75 12316   203  5945     -   107 |  279   0.68
   23 |  4848   128   165   198   100  4139   126  4770     -    92 |  278   4.87
   24 |  5016   121   105    84    43  5034   202  5117     -    60 |  288   2.65
   25 |  2444   160   206   267    82  3579   165  2218     -   105 |  288   1.89
   26 |  1378   108   109   121   121   747   106  1253     -   163 |  288   0.60
   27 |  7153   131   105   131    44  2779   171  7145     -    50 |  288   3.23
   28 |   739   187    89   208   112  1041   163   916     -    97 |  288   0.54
   29 |  1341    74    96   106    30   915   137   883     -    44 |  288   0.69
   30 |  2988   178   109   204    92  1318   149  2276     -   110 |  279   1.24
   31 |  3773    69    82    60    55  4006   193  3908     -    36 |  288   3.83
 -----+-------------------------------------------------------------+--------------
 ALBH |     -   100     -   203     -     -   164     -     -     - |  280   0.13
 ALGO |     -    63    35    49    31     -     -     -     -    31 |  288   0.04
 AREQ |     -   102     -    43     -     -     -     -     -    49 |  288  12.95
 ARTU |     -   111     -    77    33     -     -     -     -     - |  285  22.23
 ASC1 |     -   133     -   124     -     -     -     -     -    84 |  152    >>>
 AUCK |     -    62     -    77     X     -   127     -     -    76 |  288  20.63
 BAHR |     -    63   101    47    34     -   124     -     -    37 |  288   0.67
 BOR1 |     -    55     -    65     -     -     -     -     -     - |  285   2.45
 CAS1 |     -     -     -     -    69     -     -     -     -    85 |  285  11.55
 CRO1 |     -   108     -     -    54     -   110     -     -     - |  284   0.18
 DAV1 |     -     -     -     -    20     -     -     -     -    25 |  275  24.03
 DRAO |     -    62    36     -     -     -     -     -     -    37 |  287   0.04
 EISL |     -    58     -   472     -     -     -     -     -   278 |  244  39.11
 FAIR |     -     -    72   142     -     -     X     -     -    68 |  286   0.14
 FORT |     -     -     -    76     -     -     -     -     -    44 |  193   0.74
 GALA |     -   245     -   117    85     -   152     -     -     - |  285  32.82
 GODE |     -   328     -   385     -     -     -     -     -     - |  121   0.28
 GOLD |     -    87     -     X     -     -    98     -     -     - |  196  21.71
 GUAM |     -     X     -   120    68     -   132     -     -   149 |  288  28.01
 HRAO |     -    79     -     -     -     -    89     -     -     - |  221    >>>
 IISC |     -   203     -   103     -     -     -     -     -   121 |  175 208.91
 KOKB |     -     -    78   185     -     -     X     -     -    89 |  207   0.13
 KSTU |     -   174     -     -     -     -   197     -     -     - |  228  12.36
 LPGS |     -   271     -     X   349     -   340     -     -   234 |  261    >>>
 MALI |     -   222     -   261     -     -     -     -     -     - |  265  12.40
 MAS1 |     -    80    93    33    25     -     -     -     -    76 |  288   1.54
 MCM4 |     -   358     -   295   120     -     -     -     -   246 |  285    >>>
 MKEA |     -     -     -   105     -     -   101     -     -     - |  238  32.82
 NLIB |     -   496     -     -     -     -     -     -     -   339 |  283 463.99
 OBER |     -     -     -     -    45     -    92     -     -     - |  239   8.52
 OHIG |     -   181     -   244   161     -     -     -     -   159 |  285  21.80
 PIE1 |     -    57     -    70     -     -     -     -     -    28 |  288   0.06
 POL2 |     -   136     -   159     -     -     -     -     -     - |  278  31.80
 POTS |     -    56     -    72     -     -   114     -     -    52 |  288  14.11
 REYK |     -    32     -    37     -     -     -     -     -     - |  116   6.35
 SEY1 |     -   115     -   135     -     -     -     -     -     - |  107  36.56
 STJO |     -    48    60     -    23     -     -     -     -     - |  287   1.78
 SUTH |     -   141     -   355   119     -   158     -     -     - |  288  34.05
 THTI |     -     -     -     -    38     -     -     -     -    46 |  287   1.97
 TIDB |     -   119     -     X    66     -     X     -     -     - |  149  16.29
 TRO1 |     -    57     -     -    32     -     -     -     -     - |  285  13.20
 TROM |     -     -     -    46     -     -     -     -     -    27 |  288  16.39
 TSKB |     -    60   112    56     -     -     -     -     -    59 |  260   0.77
 URUM |     -     -     -     -    17     -     -     -     -    21 |  288  29.23
 USNO |     -    92     -    51     -     -     -     -     -    49 |  287  73.62
 USUD |     -    73     -   106     -     -    86     -     -     - |  284   0.20
 WHIT |     -   113     -     -    63     -     -     -     -     - |  286  13.19
 WILL |     -    74     -     -     -     -    83     -     -     - |  232   2.28
 WSRT |     -    41     -     -     -     -     -     -     -    28 |  286   0.05
 WTZR |     -   136     -    49     -     -     -     -     -    96 |  282    >>>
 WUHN |     -    48     -     -     X     -     -     -     -    33 |  285  28.21
 YAR2 |     -   175     -   101     -     -     -     -     -    72 |  272  17.82
 YELL |     -    44    46    44     -     -     -     -     -     - |  287   0.07
 ZIMM |     -    15     -    18     -     -     -     -     -     - |   79    >>>
 -----+-------------------------------------------------------------+--------------
 TOT  |  5354   151   118   173    91  4195   157  5156     -   107 |


 BEST CLOCK FIT: DRAO   287   0.04 (ns) 

