
 GPS week: 1109   Day: 3   MJD: 52010                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2773     32    -0.41     0.47     4.33     0.00
 cod |   288     0  19560      5    -1.05     4.19     0.12    20.60
 emr |    96     0   3350     25  2416.08    31.75     0.11    22.34
 esa |   288     2  16826    901   188.89    11.14     0.18    12.38
 gfz |   288     0  13750    315    -0.15     0.07     0.13    18.20
 igu |    96     0   2293      0    -2.75     3.44     3.13     0.00
 ngs |    96     0   2773     24    -0.85     0.90     4.29     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  14520     53  2416.03    31.90     0.09    26.47

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 |   -84   -32   -19    39    40  7645  -825     -   -15 |
    2 | -8056   -14   181   131  -141  7159 -8370     -     - |
    3 |   713   -83    30   512  -107  3916   218     -  -110 |
    4 | -4373   122   470  -357  -106    47 -4305     -    12 |
    5 |  -734   187     8   -28   109  3012  -819     -  -211 |
    6 | -1176   164  -215   679   -61 -8963  -554     -  -341 |
    7 |  3138    62   293  -216   -20 -5858  2817     -   -15 |
    8 |  6078    54   218   -45   -86   418  5352     -   -23 |
    9 | -4325   154  -241    61   214 -7075 -3579     -  -227 |
   10 | -4262   130   100   298    -1 -1608 -4289     -  -267 |
   11 |  7214    79   540  -253  -340  4668  7083     -   165 |
   13 |  7027   -20    48  -296   -11  2472  6992     -   147 |
   14 |  8748   112  -251    95     1  1057  8699     -   -65 |
   15 | -4141   174     -     -  -159  2607 -3393     -   -26 |
   17 |-16804   294  -239     X   207     --15778     -  -295 |
   18 |  8526  -141  -236    55   231 -2446  8610     -    -9 |
   19 | -7041   -53    11   143   -45     - -7356     -     - |
   20 |  6483  -110   350  -119   -97  1138  6434     -   109 |
   21 | -6144   213  -379   259   -23     - -4956     -  -163 |
   22 | -3830    37  -139   101    50 -2312 -2584     -   -67 |
   23 | -5664   157  -339   115   314     - -4733     -  -293 |
   24 | 11321    88   197   368  -313 12475  9365     -   -80 |
   25 | 11954    34  -406  -137   191     - 10088     -    20 |
   26 |  -285    28  -115   255   171  3462   -58     -  -228 |
   27 | -6163    99   132  -222    13 -1497 -5414     -   -20 |
   28 |  1694    16   270   -47  -193 -7250  1656     -    61 |
   29 |  1908   110  -356    42   101 -1615  1870     -   -75 |
   30 | -3785   126  -372   303   117 -4744 -3061     -  -199 |
   31 | -4078    41   255    93  -250 -6342 -3548     -    25 |
 -----+-------------------------------------------------------+
 ALBH |     -    36     -   -59     -     -     -     -     - |
 ALGO |     -    62     -     X   -99     -     -     -    20 |
 ANKR |     -   -28     -    46     -     -     -     -     - |
 AREQ |     -   -95     -    12     -     -     -     -    68 |
 ARTU |     -   197     -     -  -223     -     -     -     - |
 AUCK |     -  -644     -  -563  1942     -     -     -  -347 |
 BAHR |     -    77    29    86  -118     -     -     -   -25 |
 CAS1 |     -   -76     -   -83  -151     -     -     -   220 |
 DAEJ |     - -1103     -     -     -     -     -     -   859 |
 DRAO |     -    -6    12     -     -     -     -     -     1 |
 FAIR |     -     -    81  -273     -     -     -     -   105 |
 FORT |     -     -     -  -278     -     -     -     -   130 |
 GALA |     -  -177     -  -286  -339     -     -     -   566 |
 GODE |     -   136     -  -226     -     -     -     -     - |
 GUAM |     -   -31     -   -75  -153     -     -     -   164 |
 HOB2 |     -   143     -  -526     -     -     -     -   134 |
 KARR |     -     0     -     -     0     -     -     -     - |
 KIRU |     -    16     -   -26     -     -     -     -     - |
 KOKB |     -     -    97   265     -     -     -     -  -145 |
 KOSG |     -  -104     -   172     -     -     -     -     - |
 KOUR |     -   -58     -    97     -     -     -     -     - |
 KWJ1 |     -     -     -    21   -32     -     -     -    12 |
 LPGS |     -   225     -  -337   -16     -     -     -     - |
 MAC1 |     -    32     -   170  -151     -     -     -     - |
 MATE |     -  -323   -15     -     -     -     -     -   256 |
 MCM4 |     -     -     -  -711     -     -     -     -   333 |
 MKEA |     -    45     -   -74     -     -     -     -     - |
 NLIB |     -     -    89     -     -     -     -     -   -75 |
 NYA1 |     -    52     -     -   -58     -     -     -     - |
 NYAL |     -     -    71  -128     -     -     -     -     - |
 OHIG |     -     -     -   223  -152     -     -     -     - |
 ONSA |     -  -132     -   -72     -     -     -     -   135 |
 PIE1 |     -     -     -  -286     -     -     -     -   134 |
 POL2 |     -    58     -   -97     -     -     -     -     - |
 POTS |     -   -88     -   146     -     -     -     -     - |
 STJO |     -    19     -     -   -21     -     -     -     - |
 SUTH |     -    73     -     X   -83     -     -     -     - |
 THU1 |     -   -54     -     -     -     -     -     -    42 |
 TOW2 |     -   -51     -     -    58     -     -     -     - |
 TRO1 |     -   -35     -     -    40     -     -     -     - |
 TSKB |     -     -     -    21     -     -     -     -   -10 |
 URUM |     -   -22     -     -     -     -     -     -    17 |
 USNO |     -   -26     -   -42     -     -     -     -    40 |
 USUD |     -   -36     -    60     -     -     -     -     - |
 WES2 |     -    39   -36     -     -     -     -     -     - |
 WHIT |     -    43     -     -   -48     -     -     -     - |
 WSRT |     -   -86     -     -     -     -     -     -    67 |
 WTZR |     -  -164     -    38     -     -     -     -   110 |
 WUHN |     -   -18     -     -     X     -     -     -    14 |
 YAR2 |     -   -75     -   613     -     -     -     -  -231 |
 YELL |     -   168     -  -252   -20     -     -     -     - |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  4942    70    91   145    75  5198  4886     -    48 |  288   2.50
    2 |  7565   268   264   336   260  3052  7251     -     - |  262   2.96
    3 |  3948    90    69   104   143  2882  3839     -   113 |  288   1.90
    4 |  1591    96   202    70   111  1384  1310     -    93 |  288   0.52
    5 |  3425   149    54   120    53  3273  3181     -   112 |  277   2.95
    6 |  9831   141    75   171    87  4079 10219     -    98 |  288   7.70
    7 |  1603   222    84   128    85  3380  1551     -    90 |  288   0.49
    8 |  2807    71    81   143    89  1836  3112     -    58 |  288   2.55
    9 |  3152    82    83    97    42  2220  3702     -    26 |  288   1.54
   10 |  2463   190    82    92   144  1742  2246     -   213 |  288   2.27
   11 |  1364   199   139   111    46  1702  1342     -    89 |  288   0.52
   13 |   866    64    92   171   134  1190   745     -    67 |  288   0.32
   14 |  1247   101    83   152    85  1973  1247     -   174 |  288   0.23
   15 |  6828   112     -     -    57  2180  6678     -   111 |  288   2.82
   17 |  5022   152   122     X   200     -  5377     -    74 |  287   1.20
   18 |  1364   160    88   236   146  2006  1452     -    72 |  288   0.50
   19 |  4592    98    80   117   176     -  4650     -     - |  288   3.87
   20 |   712   138    77    79    85  1030   573     -    83 |  288   0.28
   21 |  4067    83    92    54   219     -  3542     -   108 |  288   1.43
   22 |  7004    89   104   232   149  1177  6771     -   139 |  278   0.73
   23 |  5897   130    94   407   312     -  5743     -    70 |  288   4.77
   24 |  5398    68    96   145   110  7656  5652     -    68 |  288   2.75
   25 |  4215   110   136    83   118     -  4660     -    49 |  288   1.71
   26 |  1598   135   331   116   164  1479  1159     -   100 |  288   0.69
   27 |  5466    82    57    87    98  3462  4672     -   114 |  288   4.42
   28 |  3425   154    70   124   117  4459  3344     -    51 |  288   1.22
   29 |   913    88    63    73    81  3495   824     -   102 |  288   0.48
   30 |  3186   102   131   353    86  1590  3080     -    98 |  286   1.26
   31 |  4102   259    78   251   132  3717  3693     -    53 |  288   3.28
 -----+-------------------------------------------------------+--------------
 ALBH |     -   142     -   237     -     -     -     -     - |  285   0.37
 ALGO |     -   210     -     X   148     -     -     -    80 |  282   0.10
 ANKR |     -    60     -   101     -     -     -     -     - |  285  86.06
 AREQ |     -    71     -   118     -     -     -     -    36 |  288  48.29
 ARTU |     -    17     -     -    20     -     -     -     - |  281  20.64
 AUCK |     -   146     -    85   118     -     -     -    94 |  288  22.10
 BAHR |     -    40   118   118    87     -     -     -    70 |  288   1.17
 CAS1 |     -    77     -   341   197     -     -     -    71 |  286  14.67
 DAEJ |     -    82     -     -     -     -     -     -    64 |  284    >>>
 DRAO |     -    45    52     -     -     -     -     -    29 |  288   0.09
 FAIR |     -     -    72   179     -     -     -     -    73 |  110   0.06
 FORT |     -     -     -   222     -     -     -     -   104 |  169   0.13
 GALA |     -    87     -    74    80     -     -     -    65 |  288  46.77
 GODE |     -   166     -   276     -     -     -     -     - |  279   2.88
 GUAM |     -    35     -   173    81     -     -     -   128 |  288  31.92
 HOB2 |     -   118     -    74     -     -     -     -    77 |  288   0.15
 KARR |     -    65     -     -    73     -     -     -     - |  288 136.19
 KIRU |     -    60     -   101     -     -     -     -     - |  272   1.81
 KOKB |     -     -    85   316     -     -     -     -   122 |  250   0.41
 KOSG |     -    65     -   108     -     -     -     -     - |  285  77.51
 KOUR |     -   143     -   237     -     -     -     -     - |  257    >>>
 KWJ1 |     -     -     -   200   135     -     -     -   140 |  239  61.57
 LPGS |     -   206     -   229   111     -     -     -     - |  284 182.45
 MAC1 |     -    79     -   214   153     -     -     -     - |  287  14.69
 MATE |     -    56    67     -     -     -     -     -    41 |  287   0.31
 MCM4 |     -     -     -   286     -     -     -     -   134 |   89    >>>
 MKEA |     -    58     -    97     -     -     -     -     - |  283  45.83
 NLIB |     -     -    35     -     -     -     -     -    29 |   80 948.94
 NYA1 |     -    20     -     -    22     -     -     -     - |  288   0.13
 NYAL |     -     -    43    77     -     -     -     -     - |   94   0.13
 OHIG |     -     -     -   328   223     -     -     -     - |  207  19.08
 ONSA |     -    84     -   124     -     -     -     -    85 |  287   0.27
 PIE1 |     -     -     -   135     -     -     -     -    63 |  235   0.05
 POL2 |     -   123     -   205     -     -     -     -     - |  283  51.24
 POTS |     -    55     -    91     -     -     -     -     - |  284  16.89
 STJO |     -   196     -     -   222     -     -     -     - |  285   2.72
 SUTH |     -    46     -     X    52     -     -     -     - |  247  23.10
 THU1 |     -   157     -     -     -     -     -     -   122 |  261  16.90
 TOW2 |     -    38     -     -    43     -     -     -     - |  288  20.17
 TRO1 |     -    19     -     -    22     -     -     -     - |  286  13.68
 TSKB |     -     -     -   148     -     -     -     -    69 |  247    >>>
 URUM |     -    38     -     -     -     -     -     -    30 |  287  68.14
 USNO |     -    94     -   101     -     -     -     -    44 |  288   0.12
 USUD |     -    35     -    58     -     -     -     -     - |  286   0.22
 WES2 |     -    44    41     -     -     -     -     -     - |   92   0.11
 WHIT |     -    34     -     -    39     -     -     -     - |  280  51.49
 WSRT |     -    63     -     -     -     -     -     -    49 |  288   0.13
 WTZR |     -    83     -   116     -     -     -     -    26 |  288   0.11
 WUHN |     -    57     -     -     X     -     -     -    44 |  263  33.09
 YAR2 |     -   100     -   431     -     -     -     -   159 |  287 267.33
 YELL |     -    38     -   108    65     -     -     -     - |  288   0.11
 -----+-------------------------------------------------------+--------------
 TOT  |  4328   116   113   184   130  3130  4286     -    92 |


 BEST CLOCK FIT: DRAO   288   0.09 (ns) 

