
 GPS week: 1107   Day: 4   MJD: 51997                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2770      0    -0.49     0.44     5.45     0.00
 cod |   287     0  19002     52    -5.62     4.23     0.10    18.54
 esa |   288     0  16155   1922    28.68    15.15     0.18     8.65
 gfz |   288     0  13401    550     0.18    -0.63     0.06    33.04
 igu |    96     0   2208      0    -0.14    -0.66     5.18     0.00
 jpl |   284     0   9566    526     1.23    -3.27     0.09    23.66
 ngs |    96     0   2770      0    -0.38     0.19     5.02     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  15958    627  2192.33    15.07     0.11    16.11

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 |  7777   -14   366   -38 14413   158  6672     -  -213 |
    2 | -9091   187  -194   160 -8055    40 -8844     -  -557 |
    3 |  8066  -203    29   -24  2576   193  7285     -   119 |
    4 |  2704   222   235   -48  3577  -223  2392     -  -129 |
    5 | -7545    48  -221   118  3877    80 -7550     -  -239 |
    6 | -7205   183  -165   -35     -  -109 -6345     -    30 |
    7 | -2261    88  -226   176   444   -57 -2272     -  -299 |
    8 | -6030   230    94    67 -9074    70 -5037     -  -501 |
    9 | -4030    27   -49   106 -7281  -168 -3370     -   -95 |
   10 |   145    56    77   134  1612   -26    25     -  -359 |
   11 |  6729  -113   -43     2 -5617     3  5901     -   135 |
   13 |  2404   148   142  -194   622   -22  2665     -   172 |
   14 |  3976   -92    28   -26  3968   -46  4175     -   173 |
   15 |  -307    52     -     -     -   142  -500     -  -166 |
   17 |  3740   197     X  -310     -     1  3636     -  -205 |
   18 |  5493  -109   -44   -93 -5547    67  5464     -   279 |
   19 |-24251   124   490   -61-34373  -325-21420     -     - |
   20 |  6707   -90   161    51   139   158  6731     -  -200 |
   21 | -4539    23     X  -108 -6396   113 -3201     -   114 |
   22 |  6975  -175    80    30 25462   141  5619     -     X |
   23 |   749   -13     X    27     -    64   711     -   -84 |
   24 | -6428   184   157   -26 -5952   -45 -6508     -  -213 |
   25 |  -861   -18   389    98   946  -249  -870     -  -207 |
   26 | -3374    29     X   140 -1279  -273 -3163     -  -133 |
   27 |   637   143    62   165     -  -165   627     -  -414 |
   28 |  8770  -125    83  -149     -   267  7621     -   204 |
   29 | -1076  -193   301    88  1283  -152  -906     -    11 |
   30 |  3887    78  -133   137   798  -274  4132     -  -110 |
   31 |  8219  -271   -82    37 23859   298  6300     -    48 |
 -----+-------------------------------------------------------+
 ALBH |     -   -57     -     -     -    44     -     -     - |
 ALGO |     -  -101   563   -65     -  -105     -     -    99 |
 AMC2 |     -   100     -     -     -   -78     -     -     - |
 AREQ |     -  -143    70     -     -     -     -     -   126 |
 AUCK |     -  -127     X     X     -   149     -     -   -75 |
 BAHR |     -    -1   -17   -10     -   -34     -     -    79 |
 BRMU |     -    -9     -  -109     -     -     -     -   233 |
 CAS1 |     -     -  -292   -70     -     -     -     -   300 |
 CRO1 |     -     6     -     -     -    -5     -     -     - |
 DRAO |     -   -63     -     -     -     -     -     -    72 |
 EISL |     -     -  -222     -     -     -     -     -   119 |
 FAIR |     -     -   -78     -     -     X     -     -    42 |
 FORT |     -     -  -467     -     -     -     -     -   251 |
 GALA |     -    50     -    51     -  -109     -     -     - |
 GODE |     -    86  -184     -     -     -     -     -     - |
 GUAM |     -   -93  -136    61     -   -27     -     -    87 |
 HRAO |     -   -46     -   -31     -    84     -     -     - |
 KERG |     -   -48     -     X     -     -     -     -    55 |
 KOKB |     -     -   298     -     -     -     -     -  -160 |
 KOSG |     -  -157   337     -     -     -     -     -     - |
 KSTU |     -    44     -     -     -   -34     -     -     - |
 KWJ1 |     -     -  -178    66     -     -     -     -   -27 |
 LPGS |     -     -   100  -672     -   777     -     -     - |
 MAS1 |     -    56   -56  -129     -    22     -     -   197 |
 MKEA |     -    45   -96     -     -     -     -     -     - |
 NLIB |     -    29     -     -     -     -     -     -   -33 |
 NYA1 |     -   -23     -    35     -   -32     -     -     - |
 OHIG |     -    45  -306   -85     -     -     -     -   289 |
 ONSA |     -  -158    38     -     -     -     -     -   161 |
 PIE1 |     -     8  -211     -     -     -     -     -   105 |
 POL2 |     -   152  -327     -     -     -     -     -     - |
 POTS |     -   -98   172     -     -     -     -     -    20 |
 SANT |     -   267   118  -132     -     -     -     -     X |
 SELE |     -   280  -599     -     -     -     -     -     - |
 STJO |     -  -124     -    70     -     -     -     -     - |
 SUTH |     -     -   -75    20     -     -     -     -     - |
 THTI |     -   -47     -     -     -     -     -     -    55 |
 THU1 |     -   -22     -     -     -     -     -     -    26 |
 TIDB |     -    78     X   -44     -     -     -     -     - |
 TRO1 |     -  -228     -   128     -     -     -     -     - |
 TSKB |     -     -  -141     -     -     -     -     -    76 |
 URUM |     -  -115     -     -     -     -     -     -   132 |
 USNO |     -   -62   -95     -     -     X     -     -   122 |
 USUD |     -     3   -66     -     -    22     -     -     - |
 WHIT |     -   -12     -     7     -     -     -     -     - |
 WSRT |     -     0     -     -     -  -145     -     -   210 |
 WTZR |     -  -160   198     -     -  -132     -     -   268 |
 YAR2 |     -   208  -437     -     -  -154     -     -   275 |
 YELL |     -    27   246     -     -  -116     -     -     - |
 ZWEN |     -     -     -   103     -     -     -     -  -211 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  6469    68   143    35  3859   125  5974     -    54 |  288   1.97
    2 |  3733   117   254    59  4047   108  3612     -   143 |  287   2.85
    3 |  3471    71   285    39  3802    59  4260     -   127 |  288   2.18
    4 |  1549    88   222    88  1630   107  1515     -   100 |  288   0.62
    5 |  4794    69   195    34  2433    83  4798     -    43 |  288   3.05
    6 |  6793    95   267    54     -    94  5770     -   161 |  288   6.37
    7 |  1131    60   199    25  1461    71  1117     -    72 |  288   1.36
    8 |  5726   183   203    97  5367   161  5982     -   237 |  288   2.36
    9 |  7988    84   161    82  2693    48  6776     -    66 |  288   2.95
   10 |  2602    82   230    50  3120    48  2584     -    66 |  288   2.04
   11 |  4717    86   183    48  3301    68  3992     -   101 |  288   0.49
   13 |  1923    65   143    51   676    47  1854     -    35 |  288   0.29
   14 |  1415   115   175    57  1564    87  1330     -    56 |  288   0.23
   15 |  3372   219     -     -     -   135  3408     -   205 |  263   3.58
   17 | 10590   159     X   131     -   124  9113     -   199 |  283   4.34
   18 |   761   132   318    60  3167   139   785     -    52 |  288   0.49
   19 | 11191   188   141   100 14135   149  9777     -     - |  283   1.90
   20 |   703   131   134    45   691    59   644     -    63 |  288   0.32
   21 |  8516    68     X    49  3732   141  8288     -    59 |  287   3.99
   22 |  5303    41   121    27 13344    51  4474     -     X |  288   0.58
   23 |  6200   187     X   136     -    81  6251     -   119 |  287   6.01
   24 |  5228    75   264    40  4130    50  5214     -   165 |  288   1.71
   25 |  3191   127    78    64  2701    54  2830     -    46 |  288   1.84
   26 |  1878    74     X    68  1483    90  1973     -    96 |  288   0.49
   27 |  4479   148    89    87     -    50  4798     -    65 |  288   3.44
   28 |  7201   112   208    65     -    94  6520     -    82 |  288   1.65
   29 |  1578    56   439    34   735   108  1571     -   116 |  288   0.73
   30 |  4164    92   216    71  2298    61  3996     -    44 |  288   1.97
   31 |  8697    93   108    97  8611   197  7766     -    64 |  288   4.11
 -----+-------------------------------------------------------+--------------
 ALBH |     -    50     -     -     -    40     -     -     - |  280   0.04
 ALGO |     -    39    72    27     -    39     -     -    70 |  288   0.02
 AMC2 |     -    45     -     -     -    36     -     -     - |  280   0.03
 AREQ |     -    76    82     -     -     -     -     -   110 |  288  37.89
 AUCK |     -    62     X     X     -    56     -     -    41 |  288  46.31
 BAHR |     -    47   204    35     -    55     -     -    40 |  287   0.72
 BRMU |     -   164     -    56     -     -     -     -    85 |  270  38.46
 CAS1 |     -     -   242    48     -     -     -     -    56 |  288  13.43
 CRO1 |     -    48     -     -     -    37     -     -     - |  282  40.66
 DRAO |     -    59     -     -     -     -     -     -    68 |  287   0.04
 EISL |     -     -    58     -     -     -     -     -    31 |  158  49.60
 FAIR |     -     -   236     -     -     X     -     -   127 |  250   0.21
 FORT |     -     -   107     -     -     -     -     -    58 |  156   0.15
 GALA |     -   143     -    79     -   179     -     -     - |  239  45.09
 GODE |     -   134   288     -     -     -     -     -     - |  233   0.14
 GUAM |     -   174    76    31     -    86     -     -    24 |  288  33.56
 HRAO |     -    72     -    31     -    56     -     -     - |  287    >>>
 KERG |     -    15     -     X     -     -     -     -    17 |  209    >>>
 KOKB |     -     -   314     -     -     -     -     -   169 |  160   0.11
 KOSG |     -    39    85     -     -     -     -     -     - |  287  91.03
 KSTU |     -    92     -     -     -    72     -     -     - |  240  12.41
 KWJ1 |     -     -   271   103     -     -     -     -   174 |  257  87.05
 LPGS |     -     -    68    60     -    69     -     -     - |  286 178.55
 MAS1 |     -    36   133    54     -    49     -     -    23 |  288   1.82
 MKEA |     -    29    62     -     -     -     -     -     - |  287  48.14
 NLIB |     -   240     -     -     -     -     -     -   276 |  275 322.22
 NYA1 |     -    50     -    22     -    35     -     -     - |  288   0.09
 OHIG |     -    57   319    21     -     -     -     -   140 |  286  14.99
 ONSA |     -    74    77     -     -     -     -     -    75 |  277   0.19
 PIE1 |     -    62   166     -     -     -     -     -    45 |  288   0.06
 POL2 |     -    36    77     -     -     -     -     -     - |  286  44.61
 POTS |     -    71    46     -     -     -     -     -    69 |  288  17.55
 SANT |     -   124   129    50     -     -     -     -     X |  288   6.61
 SELE |     -    38    82     -     -     -     -     -     - |  277  51.06
 STJO |     -    49     -    28     -     -     -     -     - |  287   2.84
 SUTH |     -     -   107    28     -     -     -     -     - |  124  39.67
 THTI |     -    39     -     -     -     -     -     -    44 |  286   1.62
 THU1 |     -   107     -     -     -     -     -     -   124 |  280  17.59
 TIDB |     -    49     X    27     -     -     -     -     - |  287   0.11
 TRO1 |     -    42     -    24     -     -     -     -     - |  287  12.19
 TSKB |     -     -    45     -     -     -     -     -    24 |  187   0.76
 URUM |     -    59     -     -     -     -     -     -    68 |  273    >>>
 USNO |     -    85    48     -     -     X     -     -    88 |  288   0.04
 USUD |     -    33    78     -     -    27     -     -     - |  288   0.23
 WHIT |     -    27     -    15     -     -     -     -     - |  287  17.09
 WSRT |     -   114     -     -     -    72     -     -    37 |  288   0.07
 WTZR |     -    49    63     -     -    45     -     -    33 |  288   0.08
 YAR2 |     -   316   217     -     -   127     -     -   159 |  287  18.16
 YELL |     -   124   136     -     -   130     -     -     - |  288   0.11
 ZWEN |     -     -     -    32     -     -     -     -    66 |  288  23.23
 -----+-------------------------------------------------------+--------------
 TOT  |  5447   103   183    59  5185    88  5021     -   105 |


 BEST CLOCK FIT: ALGO   288   0.02 (ns) 

