
 GPS week: 1107   Day: 3   MJD: 51996                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2776      0     0.79    -1.57     4.97     0.00
 cod |   288     0  19442     40     1.20     1.72     0.11    19.28
 emr |    96     0   3659      0  2181.30    10.41     0.14    15.18
 esa |   288     0  16556   1200    16.77    10.86     0.16    12.16
 gfz |   288     0  13763     17     0.52    -0.09     0.11    19.99
 igu |    96     0   2016      0     0.84    -0.83     4.42     0.00
 jpl |   284     0   9735    394     1.63    -6.33     0.12    18.75
 ngs |    96     0   2680      0     0.70    -1.49     4.65     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  15382    288  2181.25    10.36     0.14    14.63

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 | -4555  -115    70   234    15 -8228   155 -3641     -  -177 |
    2 | -2282   204   136    82   -32   417   188 -1903     -  -465 |
    3 |  2418   -77  -216   137    28 13790   -50  2598     -    58 |
    4 |  1900   205  -211   517  -190     -  -221  1752     -  -222 |
    5 | -3169   231     5  -171   -46     -    31 -3033     -  -118 |
    6 | -6080   110  -104    69    71-15960  -321 -5734     -   -48 |
    7 |  3400   163   129   101   -46  9691    94  2736     -  -343 |
    8 |  8362    97   268   119   -21  -556   190  7098     -  -402 |
    9 | -5735    18    12   -50    72 -8768     8 -5515     -   -87 |
   10 | -2642   326    98  -238   197 -1464     5 -2118     -  -537 |
   11 | 11152   -47   -20    97  -175  8382   187 11048     -   118 |
   13 |  6880    51   332  -336  -112   811   245  6416     -   108 |
   14 |  7291  -130  -150   -15    63  2925   -15  6910     -   160 |
   15 | -9973   190     -     -     -     -  -134-10285     -  -136 |
   17 | -1246   240  -281     X     -     -  -353 -1812     -    -8 |
   18 |  8029   -27   -76   -16   -79  3216   -41  7726     -   206 |
   19 | -5438    -6  -142   -35     5     -   128 -4996     -     - |
   20 |  3866  -243   233    25   -32  2323   386  3773     -     6 |
   21 | -4013   -83  -200     X   103  1134    77 -3559     -    -7 |
   22 | -6138   -80  -202   176    82-13925    67 -4730     -  -121 |
   23 | -3821   158  -234     X    83     -  -137 -3877     -  -161 |
   24 | -1319   259   -93   115   -89 -4029  -147 -1283     -  -188 |
   25 |  -774  -170  -349   430    12     -  -114  -181     -    37 |
   26 |  -506    64  -234   367    34  5967   -85  -452     -  -305 |
   27 |  4337   116   162    75   -31  9432   159  4351     -  -334 |
   28 |  2631  -139   208   159   -57     -    96     -     -     - |
   29 |  1649  -113  -194   168    70  2520   -29  1278     -     1 |
   30 |  1291   175  -247  -193    73   154  -129  1017     -     X |
   31 | -6376   -99   -98   134    -9 -7836   264 -4452     -  -108 |
 -----+-------------------------------------------------------------+
 ALBH |     -   -49     -    14     -     -    42     -     -     - |
 ALGO |     -   -24   113    73  -147     -   -68     -     -   219 |
 AMC2 |     -  -198     -     -     -     -   204     -     -     - |
 AREQ |     -   -88     -    97    -4     -  -130     -     -   204 |
 AUCK |     -  -235     -   527     -     -  -184     -     -    93 |
 BAHR |     -    28   115  -115   -12     -    27     -     -     - |
 BRMU |     -     -     -     -  -226     -     -     -     -   309 |
 BRUS |     -    -5     -     -     -     -     5     -     -     - |
 CAS1 |     -   -95     -    46   -89     -     -     -     -   216 |
 CHAT |     -    91     -  -145     -     -     -     -     -     - |
 CRO1 |     -   -85     -     -     -     -    87     -     -     - |
 DAV1 |     -   -32     -     -    31     -     -     -     -     - |
 DRAO |     -  -125    62     -     -     -     -     -     -   143 |
 EISL |     -     -     -  -307     -     -     -     -     -   255 |
 FAIR |     -     -   189   -69     -     -  -132     -     -   165 |
 FORT |     -     -   243  -357     -     -     -     -     -   192 |
 GALA |     -    78     -   -86    18     -   -45     -     -     - |
 GODE |     -    95     -  -151     -     -     -     -     -     - |
 GUAM |     -     -     -     X  -158     -   105     -     -    70 |
 HOB2 |     -   -61     -  -232     -     -     -     -     -   274 |
 HRAO |     -    -5    14     -    67     -   -76     -     -     - |
 IRKT |     -    65     -  -103     -     -     -     -     -     - |
 KARR |     -   -89     -     -    86     -     -     -     -     - |
 KERG |     -  -125     -     -     -     -     -     -     -   164 |
 KOKB |     -     -     -   112     -     -     -     -     -   -94 |
 KOSG |     -  -173     -   275     -     -     -     -     -     - |
 KWJ1 |     -     -     -   -99    42     -     -     -     -    27 |
 MAC1 |     -   -44     -     -    42     -     -     -     -     - |
 MAS1 |     -    71    88   -47  -130     -     0     -     -    94 |
 MCM4 |     -     -     -   294     3     -     -     -     -  -232 |
 MKEA |     -     -   121  -151     -     -     -     -     -     - |
 NRC2 |     -   -86   110     -     -     -     X     -     -     - |
 NYA1 |     -    46     -     -   -75     -    34     -     -     - |
 OHIG |     -   -12     -  -213   -40     -     -     -     -   247 |
 ONSA |     -   -69     -  -117   129     -     -     -     -    12 |
 PIE1 |     -     -     -  -340     -     -     -     -     -   282 |
 POTS |     -   102     -  -128     -     -     -     -     -   -28 |
 SANT |     - -1182     -   550   537     -     -     -     -    66 |
 STJO |     -     9   245     -   -71     -     -     -     -     - |
 SUTH |     -     -     -    20   -12     -     -     -     -     - |
 THU1 |     -    12     -     -     -     -     -     -     -   -16 |
 TIXI |     -   -15     -     -     -     -    16     -     -     - |
 TRO1 |     -  -133     -     -   129     -     -     -     -     - |
 URUM |     -   -40     -     -     -     -     -     -     -    53 |
 USNO |     -     9     -  -209     -     -     X     -     -   162 |
 USUD |     -   -52     -     5     -     -     -     -     -    64 |
 WHIT |     -    47     -     -   -45     -     -     -     -     - |
 WSRT |     -    67     -     -     -     -  -153     -     -   105 |
 WTZR |     -     0     -  -107     -     -   -91     -     -   204 |
 YAR2 |     -   551     - -1170     -     -   110     -     -    49 |
 YELL |     -    73   208  -187     -     -    -7     -     -     - |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  7358    97   180    49    92  4562   181  6937     -    61 |  288   4.40
    2 |  5367   140   141    67    87  3569   108  5091     -   142 |  288   3.71
    3 |  3974    88    73    71    38  5948   120  4106     -    59 |  288   1.43
    4 |  1664    71    56   252   140     -   200  1399     -   163 |  288   0.40
    5 |  9786    87   135    63    65     -   112  8571     -   170 |  288   4.37
    6 |  7187    85   103    86    92  8595    96  6262     -   188 |  288   6.56
    7 |  4052    93   350   191   148  3214    62  4250     -    83 |  288   1.44
    8 |  3768   119    98   111    53  1973    77  4914     -    65 |  288   2.84
    9 |  2445   384   167   138   152  1928   229  2072     -    79 |  288   1.62
   10 |  3868    96    66    62    90  2374    99  3182     -    64 |  288   2.15
   11 |  1195   119    46    74    96  3039   114  1415     -   154 |  288   0.44
   13 |  3991    88   108    88    80  1161   103  3384     -    37 |  288   0.29
   14 |  1849    88   152   318    70   558    54  1599     -   216 |  288   0.23
   15 |  4619   190     -     -     -     -   178  4460     -   188 |  268   3.84
   17 |  5453   228   162     X     -     -   200  4782     -   292 |  286   3.55
   18 |  2352   152   142   228    44   865    73  2078     -    32 |  288   0.51
   19 |  5808   178   280   147   159     -   347  5215     -     - |  287   3.69
   20 |  1475    85   141    94    81   563   238  1174     -    83 |  288   0.33
   21 |  2871   175   241     X   195  1840   125  3365     -   108 |  288   2.02
   22 |  7590    88    75    63    64  7536    97  7063     -    69 |  288   1.00
   23 |  3947   195   129     X   125     -   166  4056     -   142 |  288   4.19
   24 |  3430    70   146   216    71  2819   136  3576     -   154 |  288   1.44
   25 |  4464    69   102   108    54     -    95  3607     -   107 |  288   2.06
   26 |  1464   111    98   346   177  2973    92  1040     -    34 |  288   0.64
   27 |  8706   105    57    75    48 12066   112  9174     -    48 |  288   6.48
   28 |  5410   117    80   170    67     -   130     -     -     - |  288   0.77
   29 |  2979    42    98   133    55   818    66  2555     -    76 |  288   0.81
   30 |  3041   120    78    55   117  1361    48  2737     -     X |  288   1.45
   31 |  8378    96    97    95    34  3454   163  7485     -   115 |  288   3.52
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    32     -    73     -     -    29     -     -     - |  288   0.03
 ALGO |     -    43    89    91    19     -    22     -     -    75 |  288   0.06
 AMC2 |     -    22     -     -     -     -    23     -     -     - |  281   0.03
 AREQ |     -    35     -   261    81     -    79     -     -   208 |  281    >>>
 AUCK |     -    89     -   134     -     -   152     -     -    84 |  288  27.82
 BAHR |     -    28    31    87    57     -    41     -     -     - |  288   0.44
 BRMU |     -     -     -     -    29     -     -     -     -    40 |  260  48.43
 BRUS |     -    48     -     -     -     -    50     -     -     - |  284   0.05
 CAS1 |     -    74     -    78    71     -     -     -     -   150 |  288  13.69
 CHAT |     -    67     -   106     -     -     -     -     -     - |  285  28.81
 CRO1 |     -    49     -     -     -     -    51     -     -     - |  281  41.97
 DAV1 |     -   244     -     -   236     -     -     -     -     - |  281  15.98
 DRAO |     -    67    49     -     -     -     -     -     -    74 |  288   0.03
 EISL |     -     -     -    99     -     -     -     -     -    82 |  198  40.21
 FAIR |     -     -    76   242     -     -   223     -     -   117 |  275   0.38
 FORT |     -     -   199   244     -     -     -     -     -   212 |  177   0.50
 GALA |     -    56     -   124    79     -    66     -     -     - |  288  53.03
 GODE |     -   278     -   440     -     -     -     -     -     - |  268  24.95
 GUAM |     -     -     -     X   346     -   212     -     -   204 |  276  30.66
 HOB2 |     -    51     -    68     -     -     -     -     -    44 |  288   0.10
 HRAO |     -    72    30     -    51     -    71     -     -     - |  288    >>>
 IRKT |     -    42     -    66     -     -     -     -     -     - |  288   0.95
 KARR |     -    50     -     -    48     -     -     -     -     - |  288 150.57
 KERG |     -    50     -     -     -     -     -     -     -    66 |  287    >>>
 KOKB |     -     -     -   306     -     -     -     -     -   254 |  262   0.23
 KOSG |     -    26     -    41     -     -     -     -     -     - |  288  70.41
 KWJ1 |     -     -     -   327   225     -     -     -     -   160 |  246  81.92
 MAC1 |     -    53     -     -    51     -     -     -     -     - |  287  11.99
 MAS1 |     -    74    65    85    42     -    68     -     -    97 |  275   5.90
 MCM4 |     -     -     -   215   183     -     -     -     -   401 |  288  25.72
 MKEA |     -     -    54    68     -     -     -     -     -     - |   96  48.59
 NRC2 |     -    57    73     -     -     -     X     -     -     - |   96   0.03
 NYA1 |     -    25     -     -    20     -    31     -     -     - |  288   0.08
 OHIG |     -    71     -   182    49     -     -     -     -    92 |  287  22.75
 ONSA |     -    37     -    45    20     -     -     -     -    83 |  288   0.17
 PIE1 |     -     -     -    79     -     -     -     -     -    65 |  277   0.08
 POTS |     -    44     -    44     -     -     -     -     -    78 |  288  16.47
 SANT |     -   110     -   171    41     -     -     -     -    61 |  239   3.92
 STJO |     -    38    84     -    30     -     -     -     -     - |  288   2.80
 SUTH |     -     -     -    94    57     -     -     -     -     - |  171  22.93
 THU1 |     -    91     -     -     -     -     -     -     -   120 |  276  17.11
 TIXI |     -    43     -     -     -     -    44     -     -     - |  279  11.61
 TRO1 |     -    13     -     -    12     -     -     -     -     - |  288  13.60
 URUM |     -    43     -     -     -     -     -     -     -    57 |  288  27.04
 USNO |     -    43     -    73     -     -     X     -     -    87 |  288   0.02
 USUD |     -    40     -   133     -     -     -     -     -   137 |  288   0.20
 WHIT |     -    33     -     -    32     -     -     -     -     - |  288  23.45
 WSRT |     -    59     -     -     -     -    31     -     -    60 |  288   0.05
 WTZR |     -    77     -   178     -     -    37     -     -   205 |  285 496.83
 YAR2 |     -    80     -    45     -     -    50     -     -    59 |  288  17.33
 YELL |     -    49   266    68     -     -    43     -     -     - |  288   0.07
 -----+-------------------------------------------------------------+--------------
 TOT  |  4966   108   135   161   107  4424   116  4653     -   136 |


 BEST CLOCK FIT: USNO   288   0.02 (ns) 

