
 GPS week: 1106   Day: 2   MJD: 51988                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2688      0     0.06     0.07     4.85     0.00
 cod |   288     0  18467      0     1.58     0.12     0.08    24.39
 emr |    96     0   3192    300  2065.88    13.06     0.14    10.46
 esa |   288     0  15206   1274   -78.09    -0.29     0.11    17.70
 gfz |   288     0  13771      0    -0.14     0.48     0.08    23.91
 igu |    96     0   2490      0     0.06     0.03     3.37     0.00
 jpl |     0     0      0      0    -2.26     0.00     0.00     0.00
 ngs |    96     0   2688      0     0.06     0.07     4.69     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  15174      0  2065.86    13.22     0.08    23.53

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |-10528   158    46   -10   -76 -9781     --10605     -   -85 |
    2 | -6323   406   298  -780   146 -1422     - -5829     -   -27 |
    3 |  6694  -118  -204   229   -70  5785     -  6103     -    51 |
    4 |  -360   -18     X   458    90  1097     -  -438     -  -417 |
    5 |-10064   250  -272   -90   -46 -8459     - -9245     -  -104 |
    6 | -6123   133  -274  -290    47-11970     - -5329     -    73 |
    7 |  -689   174  -104   -93   152   431     -  -643     -  -249 |
    8 | -3199   240    58     X    -3 -4268     - -2969     -  -254 |
    9 |-13012   220    28  -335   124 -3417     --11838     -  -106 |
   10 | -2189   342   -12  -319   212  6903     - -2154     -  -328 |
   11 |  4081    55   130  -324  -135 -2328     -  4402     -   305 |
   13 |  5395   174   259  -400    27 -2504     -  5119     -    54 |
   14 |  6660   105    20  -475    91  3260     -  6395     -   153 |
   17 |  2618   177  -267  -675   219     -     -  1176     -    40 |
   18 |  3984  -338     X  1091  -262 -4745     -  3940     -  -210 |
   19 |  8162   102   100   455  -123  8593     -  7016     -  -337 |
   20 |  5358    89   419  -745   145  6028     -  5158     -   259 |
   21 | -9431   -47  -341    42   -50     -     - -7766     -   118 |
   22 | -3071    -5  -187   438  -162 -1347     - -2596     -  -131 |
   23 | -5772    32     X   -44   114   511     - -5858     -  -118 |
   24 |   901    65  -220   258   -25  5781     -   873     -  -203 |
   25 |  8498    60   -66  -342   160  7709     -  8079     -    42 |
   26 |  -302    92    61     X   171  2678     -  -304     -  -278 |
   27 |  6112   229   165   -74    88   973     -  6043     -  -295 |
   28 |  9120     3   314  -218   -70 -6232     -  8203     -   185 |
   29 |  2057     4  -331     X   117  1753     -  1703     -   -78 |
   30 |  5402   104   -10  -496   320  6296     -  5540     -   -58 |
   31 | -3976    51   140   -93  -100 -1268     - -4174     -    98 |
 -----+-------------------------------------------------------------+
 ALBH |     -   138     -  -191     -     -     -     -     -     - |
 AREQ |     -  -219     -   119     -     -     -     -     -   137 |
 ASC1 |     -     4     -   108  -101     -     -     -     -    16 |
 AUCK |     -   -79     -   208     -     -     -     -     -   -75 |
 BAHR |     -  -101     -   232   -80     -     -     -     -    11 |
 BRMU |     -  -300     -   671  -354     -     -     -     -   163 |
 CAS1 |     -   -55     -   359  -200     -     -     -     -    40 |
 DAEJ |     -  -994     -     -     -     -     -     -     -  1030 |
 DAV1 |     -    45     -     -   -46     -     -     -     -     - |
 DRAO |     -    43     9     -     -     -     -     -     -   -46 |
 FAIR |     -     -    29   -87     -     -     -     -     -    63 |
 FORT |     -     -     - -1004     -     -     -     -     -   755 |
 GALA |     -   -30     -     -    30     -     -     -     -     - |
 HOB2 |     -   -50     -     -     -     -     -     -     -    52 |
 IISC |     -     -     -   198     -     -     -     -     -  -149 |
 KARR |     -   -46     -     -    47     -     -     -     -     - |
 KIRU |     -   -15     -    20     -     -     -     -     -     - |
 KOKB |     -     -     -   -80     -     -     -     -     -    60 |
 KOSG |     -  -119     -   164     -     -     -     -     -     - |
 KOUR |     -  -138     -   190     -     -     -     -     -     - |
 KWJ1 |     -     -     -  -262   296     -     -     -     -  -112 |
 LPGS |     -     -     -  -335   248     -     -     -     -     - |
 MAC1 |     -    11     -     -   -12     -     -     -     -     - |
 MAS1 |     -    -2    18    23  -163     -     -     -     -   148 |
 MATE |     -  -147     -     -     -     -     -     -     -   152 |
 MCM4 |     -     -     -   341   -35     -     -     -     -  -221 |
 MKEA |     -  -106   205   108     -     -     -     -     -     - |
 NLIB |     -     -  -158     -     -     -     -     -     -    70 |
 NRC2 |     -    51     -     -   -52     -     -     -     -     - |
 NYA1 |     -    68     -     -   -70     -     -     -     -     - |
 OHIG |     -     -     -   289  -214     -     -     -     -     - |
 ONSA |     -   -26     -   160  -179     -     -     -     -    88 |
 PIE1 |     -    14     -   -93     -     -     -     -     -    47 |
 POTS |     -   -81     -   112     -     -     -     -     -     - |
 STJO |     -    10   126     -   -29     -     -     -     -     - |
 SUTH |     -     -     -   485  -359     -     -     -     -     - |
 THTI |     -    80     -     -     -     -     -     -     -   -83 |
 THU1 |     -   -54     -     -     -     -     -     -     -    56 |
 TRO1 |     -   -86     -     -    88     -     -     -     -     - |
 TSKB |     -     -     -   -11     -     -     -     -     -     9 |
 URUM |     -   -25     -     -     -     -     -     -     -    26 |
 USNO |     -   -60     -     X     -     -     -     -     -    62 |
 USUD |     -  -197     -   271     -     -     -     -     -     - |
 WHIT |     -   -92     -     -    94     -     -     -     -     - |
 WSRT |     -   -58     -     -     -     -     -     -     -    61 |
 WTZR |     -  -107     -    55     -     -     -     -     -    69 |
 YAR2 |     -   -91     -   275     -     -     -     -     -  -113 |
 YSSK |     -     3     -     -    -3     -     -     -     -     - |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  5707    72   173    65   105  4296     -  5837     -    70 |  288   3.24
    2 |  3116    90   108    79    44  2595     -  2799     -   104 |  288   2.67
    3 |  2599    41   198    99    63  2748     -  2203     -    69 |  288   1.70
    4 |  1297    89     X    76    41   736     -  1410     -    46 |  288   0.64
    5 |  4639   105   214    56    62  4050     -  4124     -    50 |  288   3.22
    6 |  8099    80    91    93   146  4273     -  8127     -    64 |  288   5.37
    7 |  1338    71    51   101    77  1032     -  1229     -    68 |  288   0.67
    8 |  3919    54   117     X    58  2700     -  3689     -    50 |  288   2.61
    9 |  3668    69    56    52    59  2053     -  3574     -    74 |  288   1.86
   10 |  4473   108    90    90    73  2176     -  4430     -    41 |  288   1.63
   11 |  1217    84   215   112    36   771     -  1210     -    46 |  288   0.59
   13 |  1822    40   182    82    58  1921     -  1848     -    53 |  288   0.22
   14 |  1085    72   166   172   119  1670     -  1251     -    48 |  288   0.22
   17 | 12221   104   110   172    62     -     - 11204     -    57 |  288   2.55
   18 |   540   129     X    32    27  1569     -   720     -   132 |  288   0.41
   19 |  9213    76   213   187    94  6193     -  9295     -   185 |  288   5.04
   20 |   827    30   132    64    58  3144     -   762     -    50 |  288   0.25
   21 |  5682   107   189    99    99     -     -  5147     -    67 |  288   3.21
   22 |  5169    61   148   124    41  1904     -  5210     -    47 |  288   1.62
   23 |  6512   226     X   227   117  3970     -  6410     -    43 |  288   6.41
   24 |  4073    63    64    73    42  5280     -  3987     -    57 |  288   2.29
   25 |  3045   112   163    70    56  3503     -  2733     -   124 |  288   2.43
   26 |  1508   109   167     X    36  1627     -  1514     -    94 |  288   0.71
   27 |  4180    56   108    83    43  4811     -  4217     -    47 |  288   3.70
   28 |  6422    30   116    43    59  4953     -  6078     -    53 |  288   1.14
   29 |  1457   129   181     X   164   944     -  1529     -    46 |  288   0.60
   30 |  3648    85    50    58   118  4230     -  3509     -    69 |  288   1.61
   31 |  5689   100    52    58    83  5076     -  5866     -    52 |  288   3.98
 -----+-------------------------------------------------------------+--------------
 ALBH |     -   104     -   143     -     -     -     -     -     - |  263   0.23
 AREQ |     -    77     -    79     -     -     -     -     -    50 |  286 210.00
 ASC1 |     -    39     -    26    50     -     -     -     -    22 |  288    >>>
 AUCK |     -    58     -    55     -     -     -     -     -    70 |  288  24.06
 BAHR |     -    73     -    62    76     -     -     -     -   161 |  288   0.33
 BRMU |     -    22     -    51    52     -     -     -     -    32 |  288  20.68
 CAS1 |     -    71     -   147    73     -     -     -     -    72 |  288  16.27
 DAEJ |     -    74     -     -     -     -     -     -     -    77 |  287    >>>
 DAV1 |     -    62     -     -    63     -     -     -     -     - |  288  19.97
 DRAO |     -    48    23     -     -     -     -     -     -    51 |  288   0.05
 FAIR |     -     -   169   175     -     -     -     -     -   125 |  168   0.18
 FORT |     -     -     -    58     -     -     -     -     -    44 |  118   0.06
 GALA |     -    24     -     -    25     -     -     -     -     - |  287  49.89
 HOB2 |     -    57     -     -     -     -     -     -     -    59 |  287   0.11
 IISC |     -     -     -    72     -     -     -     -     -    54 |   86  48.32
 KARR |     -    46     -     -    47     -     -     -     -     - |  288 155.31
 KIRU |     -    43     -    59     -     -     -     -     -     - |  273   1.64
 KOKB |     -     -     -   331     -     -     -     -     -   249 |  214   0.38
 KOSG |     -    49     -    68     -     -     -     -     -     - |  288  49.46
 KOUR |     -    31     -    43     -     -     -     -     -     - |  288   2.27
 KWJ1 |     -     -     -   259   143     -     -     -     -   202 |  246  87.17
 LPGS |     -     -     -   136   101     -     -     -     -     - |  189  81.65
 MAC1 |     -   262     -     -   268     -     -     -     -     - |  280  14.29
 MAS1 |     -    66    62    66    52     -     -     -     -    39 |  288   1.78
 MATE |     -    41     -     -     -     -     -     -     -    42 |  287   0.23
 MCM4 |     -     -     -    53    56     -     -     -     -    47 |  288   2.98
 MKEA |     -    40   107    65     -     -     -     -     -     - |  242  36.30
 NLIB |     -     -   282     -     -     -     -     -     -   125 |   96 322.17
 NRC2 |     -    21     -     -    21     -     -     -     -     - |  287   0.10
 NYA1 |     -    33     -     -    34     -     -     -     -     - |  285   0.14
 OHIG |     -     -     -    90    67     -     -     -     -     - |  217  24.92
 ONSA |     -    34     -    43    25     -     -     -     -    55 |  288   0.20
 PIE1 |     -    35     -    34     -     -     -     -     -    35 |  285   0.06
 POTS |     -    16     -    22     -     -     -     -     -     - |  288  16.10
 STJO |     -    42    33     -    41     -     -     -     -     - |  288   3.70
 SUTH |     -     -     -    67    50     -     -     -     -     - |  225  21.02
 THTI |     -    42     -     -     -     -     -     -     -    44 |  286   2.26
 THU1 |     -    80     -     -     -     -     -     -     -    82 |  287  16.50
 TRO1 |     -    32     -     -    32     -     -     -     -     - |  287  12.92
 TSKB |     -     -     -    37     -     -     -     -     -    28 |  191   0.92
 URUM |     -    32     -     -     -     -     -     -     -    33 |  287  49.32
 USNO |     -    27     -     X     -     -     -     -     -    28 |  288   0.06
 USUD |     -    91     -   125     -     -     -     -     -     - |  207   0.24
 WHIT |     -    26     -     -    27     -     -     -     -     - |  267  22.28
 WSRT |     -    30     -     -     -     -     -     -     -    32 |  288   0.11
 WTZR |     -    32     -    44     -     -     -     -     -    51 |  288   0.11
 YAR2 |     -    44     -    53     -     -     -     -     -    27 |  268  14.49
 YSSK |     -    68     -     -    70     -     -     -     -     - |  286  15.12
 -----+-------------------------------------------------------------+--------------
 TOT  |  4850    79   143   105    82  3368     -  4692     -    79 |


 BEST CLOCK FIT: DRAO   288   0.05 (ns) 

