
 GPS week: 1105   Day: 4   MJD: 51983                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2725      0    -0.22     0.27     5.48     0.00
 cod |   288     0  17257     40     1.61    -4.27     0.10    22.48
 emr |    96     0   3714    101   668.57    11.03     0.09    23.46
 esa |   288     0  13525    388   665.92     3.34     0.30     0.00
 gfz |   288     0  13792     38     0.92    -2.09     0.09    24.81
 igp |    96     0   2390      0    -0.02    -0.13     4.40     0.00
 igu |    96     0   2391      0    -0.18     0.39     3.99     0.00
 jpl |   288     0   6512     21    -3.62     6.89     0.18     0.00
 ngs |    96     0   2725      0    -0.23     0.28     5.17     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  14248    263   668.54    11.17     0.07    29.25

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igp   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------------+
    1 |  -508    55   -84  -374    51 17157  -250   370  -407     -   -63 |
    2 | -3263   346   -92   167   -33 17525 -6139   450 -3431     -  -214 |
    3 |   390    76    -8   143   -21 18238 -3237   419  -356     -   -39 |
    4 |  1457   259  -191   269   179 -6725   -36   465  1467     -  -293 |
    5 |   956   162   -31   652    76     9 -3996   160  1093     -  -179 |
    6 |  3847   -42    46   339   293 13372  2746   246  3463     -  -230 |
    7 | -6149   336  -133  -189    73-29061 -7882   435 -5739     -  -284 |
    8 |   583   177   -43  -265   -64-21594  4413   550   413     -   -69 |
    9 | -3441   213   -46   143    91-18713 -3661   199 -3553     -  -227 |
   10 |  1839     5  -110   350   325-15739  3822   179  -292     -  -250 |
   11 | -1852   189     X   -73   -52  5757 -3107   271 -1561     -   -95 |
   13 |  2783    66   -59  -373  -164 12881   798   414  2697     -   105 |
   14 |  6597     0    91  -129   -16 13443 -1804   129  6644     -   -11 |
   15 | -5049  -162     -     -     -     -     -   143 -5106     -   124 |
   17 |-10672  -160   -67   404   330     -     -  -187 -8459     -  -136 |
   18 |  6893   -79    52   188  -102  -815 -7876   -42  6759     -   134 |
   19 | -9881    93  -103  -133   -52 38797     -   341 -7886     -     - |
   20 |  3649    55  -109  -144    24  6498   363   339  3704     -   -32 |
   21 |  9831    18   -31  -101   -72     - 24917    -1 10087     -    56 |
   22 |   167   -56   112    79   -75-34408 13086   212  -623     -    76 |
   23 |  7051   473   229 -2528 -1126     -  7914   445  6929     -   375 |
   24 |  -573    96   -76   110   170 28834 -3904    26 -1247     -  -198 |
   25 |-10144   -45    61  -265    24-41039 -9560   268 -8676     -    -2 |
   26 | -3085   -35  -145   255   275-13480  -809   308 -3179     -  -166 |
   27 |  3778   113    14  -212    22-26719     -   500  3680     -  -108 |
   28 |  2576   -10   131  -427  -221 18582  5658   356  2434     -   162 |
   29 | -1815    81    -6   163    53 -6320 -6024   174 -1930     -  -106 |
   30 | -1867   -35    97   356   136  8671 -3061   273 -1910     -  -115 |
   31 |  3134   216   -47  -619  -127 14873 -2381   163  2308     -   -44 |
 -----+-------------------------------------------------------------------+
 ALGO |     -   -30    93  6526  -115     -     -    39     -     -    96 |
 AREQ |     -   -39     -   -82    -5     -     -    91     -     -    34 |
 ARTU |     -    65     -     2   -59     -     -     -     -     -     - |
 BAHR |     -    64   102  -166  -105     -     -   225     -     -    13 |
 BRMU |     -   -95     -   -91  -219     -     -     -     -     -   253 |
 CAS1 |     -   -75     -  -269     1     -     -     -     -     -    52 |
 DAEJ |     - -1173     -     -     -     -     -     -     -     -   901 |
 DRAO |     -   -44   -64     -     -     -     -     -     -     -    51 |
 FAIR |     -     -   -33  -218     -     -     -   -49     -     -    27 |
 GALA |     -   -33     -  -466    30     -     -   247     -     -     - |
 GUAM |     -   -51     -  -806     -     -     -   269     -     -    39 |
 HOB2 |     -   -72     -   -81     -     -     -     -     -     -    55 |
 KARR |     -   -97     -     -    88     -     -     -     -     -     - |
 KWJ1 |     -     -     -  -392   162     -     -   154     -     -  -138 |
 MAS1 |     -   102   183  -519  -282     -     -     -     -     -   116 |
 MATE |     -  -168   -51     -     -     -     -     -     -     -   142 |
 MAW1 |     -    57     -     -   -52     -     -     -     -     -     - |
 MCM4 |     -   109     -   -47   -99     -     -     -     -     -     X |
 MDO1 |     -    -2     2     -     -     -     -     -     -     -     - |
 MKEA |     -  -201   193   -11     -     -     -   270     -     -     - |
 NLIB |     -  -301   102     -     -     -     -     -     -     -   165 |
 OHIG |     -  -108     -  -360   -23     -     -     -     -     -    76 |
 ONSA |     -  -507     -  -555   890     -     -     -     -     -  -365 |
 PIE1 |     -  -173     -  -162     -     -     -     -     -     -   133 |
 STJO |     -   118   107     -  -141     -     -   131     -     -     - |
 SUTH |     -   247     -     -  -224     -     - -4959     -     -     - |
 THTI |     -  -119     -    -7     -     -     -   270     -     -    91 |
 THU1 |     -   -20     -     -     -     -     -     -     -     -    16 |
 TIDB |     -   -53     -     X    48     -     -     -     -     -     - |
 TIXI |     -   141     -     -  -128     -     -     -     -     -     - |
 TRO1 |     -   -91     -     -    82     -     -     -     -     -     - |
 TSKB |     -  -130   -81  -381     -     -     -     -     -     -   119 |
 USNO |     -     3     -  -217     -     -     -     -     -     -    -2 |
 WHIT |     -    53     -     -   -48     -     -     -     -     -     - |
 WSRT |     -   -74     -     -     -     -     -     -     -     -    57 |
 WTZR |     -  -108     -  -140     -     -     -     -     -     -    83 |
 YSSK |     -    68     -     -   -61     -     -     -     -     -     - |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igp   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------------+--------------
    1 |  4753   118   103   117    63  5186  4640   137  4566     -    48 |  288   4.00
    2 |  4019   117    66   134    63  2076  4579    92  4008     -    46 |  288   2.18
    3 |  6410    67    95   137   132  3880  4335   241  5865     -   133 |  288   3.20
    4 |  1188   100    63   269   145  3057   952   153  1222     -    71 |  288   1.14
    5 |  5750    89    57   125    54  6163  4945    77  5867     -    52 |  288   5.97
    6 |  4901   169    97   171    79  7289  3234   143  4786     -    59 |  288   4.67
    7 |  2668    63    96   195    50 10326  2358   127  2523     -    43 |  288   0.72
    8 |  3858   106    78   145   114  7861  1442   132  4062     -    56 |  276   2.12
    9 |  2824   154    43   192    65  2585  2465   167  3016     -    73 |  283   2.79
   10 |  7494    87    78   105    75  2438  2100   121  5450     -    48 |  288   2.49
   11 |  2203    98     X   139    62   868  1383   217  2157     -    76 |  288   0.55
   13 |  1197   101    81   115    52  2589   737   108  1135     -    70 |  288   0.42
   14 |   878   118   104    97    41  1660  1114   111   931     -    68 |  288   0.21
   15 |  4399   256     -     -     -     -     -   536  4141     -   197 |  151   2.27
   17 | 14460   179   183   691    95     -     -   278 14109     -    48 |  284   5.15
   18 |   886   105    78    86    97  3317  3631   102  1157     -   113 |  288   0.22
   19 |  9309   109    99   368    87  4256     -   262  7618     -     - |  287   4.28
   20 |  1722    65    42   129    50   756   799    89  1818     -    41 |  288   0.20
   21 |  9854   121   113   376   175     - 11638   229  9718     -   160 |  288   2.36
   22 |  3401    55   108   163    38  1899  8444   123  2883     -    45 |  288   1.03
   23 |  6073    72   153   375   120     -  1980   215  5701     -   116 |  246   5.74
   24 |  4603   144    93   319   109  4272  2697    94  3734     -    50 |  277   2.29
   25 |  7888    85    83   160   144  2370  1562    89  7573     -   111 |  288   1.48
   26 |  2573    56    93   184    55  4283   469   133  2705     -    66 |  288   0.76
   27 |  5428    78    46   171    31  5779     -    77  5440     -    48 |  288   4.01
   28 |   995    82   208   191   126  4052  3631   112  1106     -   107 |  288   0.74
   29 |  1734    52    32    85    95  2841  3244   142  1632     -    70 |  288   0.85
   30 |  1677   143    65   184    64  3584  1198   143  1636     -    68 |  288   1.75
   31 |  7386   176    35   209    89  2503  4757   309  7426     -    70 |  288   2.29
 -----+-------------------------------------------------------------------+--------------
 ALGO |     -    52    55  1629    24     -     -   115     -     -    29 |  288   0.01
 AREQ |     -    88     -   286    68     -     -   131     -     -    47 |  276    >>>
 ARTU |     -    28     -    91    26     -     -     -     -     -     - |  282  27.21
 BAHR |     -    65    63   103    50     -     -   102     -     -    57 |  288   0.55
 BRMU |     -    46     -    84    42     -     -     -     -     -    43 |  288  21.83
 CAS1 |     -   103     -   164    70     -     -     -     -     -    56 |  288  13.21
 DAEJ |     -    88     -     -     -     -     -     -     -     -    67 |  280    >>>
 DRAO |     -    34    42     -     -     -     -     -     -     -    30 |  288   0.07
 FAIR |     -     -   156   594     -     -     -   591     -     -   126 |   96   0.48
 GALA |     -    67     -   173    61     -     -   105     -     -     - |  243  45.71
 GUAM |     -    68     -   544     -     -     -    96     -     -    52 |  210  27.38
 HOB2 |     -    49     -   125     -     -     -     -     -     -    38 |  288   0.06
 KARR |     -    47     -     -    42     -     -     -     -     -     - |  283 140.46
 KWJ1 |     -     -     -   338   224     -     -   177     -     -   190 |  218  76.76
 MAS1 |     -   103    49    99    73     -     -     -     -     -    22 |  276   3.01
 MATE |     -    48    35     -     -     -     -     -     -     -    31 |  287   0.14
 MAW1 |     -    74     -     -    67     -     -     -     -     -     - |  288  30.74
 MCM4 |     -    80     -   531    73     -     -     -     -     -     X |  265  12.38
 MDO1 |     -   162   156     -     -     -     -     -     -     -     - |   87 499.99
 MKEA |     -    51    49   153     -     -     -   125     -     -     - |   96  41.75
 NLIB |     -    32    51     -     -     -     -     -     -     -    24 |  225   0.06
 OHIG |     -    73     -   143    65     -     -     -     -     -    29 |  288  18.82
 ONSA |     -    64     -    85    47     -     -     -     -     -    16 |  288   0.07
 PIE1 |     -    25     -    76     -     -     -     -     -     -    20 |  285   0.10
 STJO |     -    25    41     -    25     -     -    97     -     -     - |  288   2.53
 SUTH |     -    67     -     -    60     -     -   346     -     -     - |  287  37.00
 THTI |     -   120     -   125     -     -     -    93     -     -    92 |  274   2.19
 THU1 |     -   141     -     -     -     -     -     -     -     -   109 |  287  16.22
 TIDB |     -   279     -     X   253     -     -     -     -     -     - |  263    >>>
 TIXI |     -    26     -     -    23     -     -     -     -     -     - |  287  12.73
 TRO1 |     -    49     -     -    44     -     -     -     -     -     - |  287  10.90
 TSKB |     -    54    62   233     -     -     -     -     -     -    47 |  267   1.23
 USNO |     -    47     -    80     -     -     -     -     -     -    36 |  288   0.05
 WHIT |     -    46     -     -    41     -     -     -     -     -     - |  288  12.45
 WSRT |     -    48     -     -     -     -     -     -     -     -    37 |  285   0.05
 WTZR |     -    39     -    90     -     -     -     -     -     -    30 |  288   0.07
 YSSK |     -    21     -     -    19     -     -     -     -     -     - |  287  19.74
 -----+-------------------------------------------------------------------+--------------
 TOT  |  5477    98    92   299    89  4400  3990   182  5175     -    74 |


 BEST CLOCK FIT: ALGO   288   0.01 (ns) 

