
 GPS week: 1104   Day: 6   MJD: 51978                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2656      0     0.31    -0.29     5.33     0.00
 cod |   288     0  16057      0     2.30    -1.28     0.11    28.92
 gfz |   288     0  12933      0    -0.29     1.49     0.07    43.59
 igp |    96     0   2277     92     7.12     5.43     5.38     0.00
 igu |    96     0   2192      0     0.27    -0.24     4.30     0.00
 jpl |   288     0   6212    256     7.08    -6.58     0.21     0.00
 ngs |    96     0   2656      0     0.30    -0.29     4.97     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  14329     50   585.87    18.33     0.12    27.49

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   gfz   igp   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 | -9391    47    51-25652 -7941   173 -7919     -  -130 |
    2 | -9206   127    20-11104-10267   119 -8267     -  -159 |
    3 |  3034    65   -22  7248  7457   193  2416     -   -33 |
    4 |  -720  -128   265-16086 -6845   -77 -1564     -  -285 |
    5 | -9065    13    54  4963-17243  -165 -7623     -  -100 |
    6 |  7270   -31    81 15202 10016  -113  6435     -   -97 |
    7 |  2905    13   107-11730  9084    71  2768     -  -184 |
    8 |  3181   286   -79-11332   101   164  2809     -  -176 |
    9 |   895   -43   138-11901  3837  -467   611     -  -175 |
   10 |  3894   -16   126 -4019  3898  -368  4232     -  -182 |
   11 |  6655    82    91 12455 -1075   302  6309     -  -224 |
   13 |  2494    -1   -46 -2534   980   297  2691     -    74 |
   14 |  3929    24     9 11722  -364   -39  3657     -   -39 |
   17 |  -838   -58    16     -     -  -240  -260     -    35 |
   18 |  7125   -24    16     -     -  -180  6294     -     - |
   19 |-21792   127    39     X     -   346-17808     -  -197 |
   20 |  5673   122    15  9107   563   377  5467     -  -152 |
   21 | -1245   145  -109     - -6655  -286 -1480     -    20 |
   22 | -5568     6   -91-21991  4400     5 -5759     -   138 |
   23 |   370    57    -2     -  3663  -235   254     -   -57 |
   24 | -3958   -99    77 17084     -  -240 -4495     -   -18 |
   25 | -1112    77   -79-19928 -2471    44 -1619     -    45 |
   26 | -1087   -44   111 -7635  -320  -152 -1119     -  -129 |
   27 |  8741   310   -55 59200     -   498  6217     -  -240 |
   28 |  7751   -34   -92  8907  1878   350  7791     -   182 |
   29 |  -270    33   -35 -1442  1444    47  -376     -    21 |
   30 | -1237   -58   -57 -1718  4898    75 -1116     -   152 |
   31 |  1026   149    24  1795   748   290   895     -  -195 |
 -----+-------------------------------------------------------+
 ALGO |     -   -83   -32     -     -  -198     -     -   138 |
 AREQ |     -   -75     -     -     -   -59     -     -    79 |
 ARTU |     -    26   -17     -     -     -     -     -     - |
 AUCK |     -  -108     -     -     -   160     -     -   114 |
 BAHR |     -   -47    39     -     -     -     -     -   -12 |
 BRMU |     -   -92  -102     -     -     -     -     -   258 |
 CAS1 |     -     -  -154     -     -     -     -     -   245 |
 DRAO |     -   -88     -     -     -     -     -     -    93 |
 EISL |     -   -99     -     -     -     -     -     -   105 |
 GALA |     -   -34    22     -     -    80     -     -     - |
 KERG |     -   -72     -     -     -     -     -     -    75 |
 KWJ1 |     -     -   148     -     -  -279     -     -  -235 |
 MATE |     -  -157     -     -     -     -     -     -   165 |
 MCM4 |     -   147  -186     -     -     -     -     -   170 |
 NLIB |     -   -45     -     -     -     -     -     -    47 |
 NYA1 |     -   102   -68     -     -     -     -     -     - |
 OHIG |     -    71   -47     -     -     -     -     -     - |
 PIE1 |     -  -146     -     -     -     -     -     -   154 |
 STJO |     -   -28    19     -     -     -     -     -     - |
 SUTH |     -   223  -148     -     -     X     -     -     - |
 THTI |     -     9     -     -     -     -     -     -   -10 |
 THU1 |     -   -69     -     -     -   -63     -     -    72 |
 TIDB |     -    81   -54     -     -     -     -     -     - |
 TRO1 |     -  -111    74     -     -     -     -     -     - |
 TSKB |     -   -95     -     -     -     -     -     -   100 |
 URUM |     -     -   -96     -     -     -     -     -   153 |
 USNO |     -   -13     -     -     -     -     -     -    13 |
 WHIT |     -   -30    20     -     -     -     -     -     - |
 WSRT |     -   -90     -     -     -     -     -     -    94 |
 WTZR |     -  -100     -     -     -     -     -     -   105 |
 WUHN |     -   -75    67     -     -  -115     -     -   -28 |
 YAR2 |     -  -139     -     -     -   -68     -     -   146 |
 ZWEN |     -     -   -16     -     -     -     -     -    25 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   gfz   igp   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  8822    78    36  6595  4392   142  8519     -    71 |  288   4.35
    2 | 12347    94    72 11589 12475   122 11023     -   156 |  288   2.17
    3 |  1864    52    24  4017  3061   301  1909     -    55 |  288   1.65
    4 |  2830    58    49  4197  3324   121  2023     -    43 |  277   0.52
    5 |  8230   172    82  4763  8563    90  7381     -    82 |  288   4.02
    6 |  8373   136   130 10551  6646   161  7642     -   116 |  288   5.60
    7 |  1293    68    97  7982  3676   119  1202     -   123 |  288   1.29
    8 |  3108   179   107  4570  1889    93  2724     -    79 |  278   2.36
    9 |  5152   216    87  5240  6331   395  5077     -   294 |  279   3.59
   10 |  4720    98    59  3019  3392    63  4536     -    48 |  288   2.66
   11 |  1752   171   114  3094   458   172  1328     -   152 |  288   0.37
   13 |  1118   131    79   997   800   151   978     -    79 |  288   0.44
   14 |  1182    74    71  2918   461   266   877     -    64 |  288   0.28
   17 |  5569   177    78     -     -   350  4971     -   145 |  277   3.64
   18 |  6237   113    75     -     -   262  5060     -     - |  286   0.39
   19 |  7207    98    48     X     -   146  5942     -    64 |  277   3.80
   20 |  1305    65    34  2764   407   116  1007     -    40 |  288   0.25
   21 |  7234   172    43     -  2929   411  6963     -   204 |  287   3.14
   22 |  4361    78    85  6779  2845   149  4312     -    92 |  288   2.92
   23 |  5857   138   117     -  2652   248  5907     -   115 |  288   5.77
   24 |  3389    92    89  3665     -   106  3002     -    79 |  278   2.33
   25 |  2508   127   149  2608  2113   301  2780     -   118 |  277   2.29
   26 |  1597    77    79  1443   604   123  1366     -    75 |  288   0.52
   27 |  8902   196   115  9001     -   174  9626     -    53 |  277   4.61
   28 |  2765   101    91  2637  2138   116  2427     -   102 |  288   0.64
   29 |  1112   117    38  1543   555   379   984     -    88 |  288   0.91
   30 |  4106   197    95  3533  2356   135  3966     -    87 |  288   2.41
   31 |  2016    72    34  2945  2575   102  2007     -    42 |  288   2.53
 -----+-------------------------------------------------------+--------------
 ALGO |     -    53    37     -     -    89     -     -    27 |  288   0.03
 AREQ |     -    91     -     -     -   130     -     -    96 |  287    >>>
 ARTU |     -    26    17     -     -     -     -     -     - |  282  27.09
 AUCK |     -    93     -     -     -   170     -     -    98 |  286  21.15
 BAHR |     -    87    68     -     -     -     -     -    51 |  288   0.43
 BRMU |     -    50    45     -     -     -     -     -    33 |  288  15.09
 CAS1 |     -     -    86     -     -     -     -     -   137 |  287  13.08
 DRAO |     -    33     -     -     -     -     -     -    35 |  288   0.04
 EISL |     -   164     -     -     -     -     -     -   173 |  215  33.38
 GALA |     -    44    29     -     -   204     -     -     - |  252  49.16
 KERG |     -    58     -     -     -     -     -     -    61 |  287    >>>
 KWJ1 |     -     -   123     -     -   312     -     -   195 |  184 106.67
 MATE |     -    58     -     -     -     -     -     -    62 |  287   0.07
 MCM4 |     -   267   104     -     -     -     -     -   424 |  284    >>>
 NLIB |     -    38     -     -     -     -     -     -    40 |  278   0.04
 NYA1 |     -    36    24     -     -     -     -     -     - |  288   0.09
 OHIG |     -    37    24     -     -     -     -     -     - |  277  17.32
 PIE1 |     -    51     -     -     -     -     -     -    53 |  286   0.03
 STJO |     -    49    32     -     -     -     -     -     - |  287   1.64
 SUTH |     -    54    36     -     -     X     -     -     - |  256  27.18
 THTI |     -    70     -     -     -     -     -     -    74 |  287   1.60
 THU1 |     -   143     -     -     -   115     -     -   151 |  287  16.56
 TIDB |     -    57    38     -     -     -     -     -     - |  282   0.16
 TRO1 |     -    47    31     -     -     -     -     -     - |  288  13.39
 TSKB |     -    60     -     -     -     -     -     -    63 |  266   2.42
 URUM |     -     -    32     -     -     -     -     -    51 |  288  19.83
 USNO |     -    31     -     -     -     -     -     -    32 |  288   0.03
 WHIT |     -    65    43     -     -     -     -     -     - |  288   9.04
 WSRT |     -    16     -     -     -     -     -     -    17 |  288   0.04
 WTZR |     -    47     -     -     -     -     -     -    50 |  288   0.04
 WUHN |     -    35    32     -     -    71     -     -    40 |  287  44.46
 YAR2 |     -   236     -     -     -   440     -     -   248 |  263  15.88
 ZWEN |     -     -    27     -     -     -     -     -    43 |  288  21.28
 -----+-------------------------------------------------------+--------------
 TOT  |  5330   111    73  5383  4296   214  4971     -   117 |


 BEST CLOCK FIT: USNO   288   0.03 (ns) 

