
 GPS week: 1101   Day: 6   MJD: 51957                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2668      0     0.05     0.16     4.76     0.00
 cod |   288     0  19095    179    -0.51     0.24     0.12    18.19
 emr |    96     0   3350     89   961.78    14.57     0.09    26.35
 esa |   288     0  18036    596   261.66    17.34     0.13    16.08
 gfz |   288     0  13585      0     0.11    -0.15     0.11    19.78
 igp |    96     0   2476      0    -0.01     0.05     5.97     0.00
 igu |    96     0   2294      0     0.01    -0.03     3.19     0.00
 jpl |   288     0   7827    335     0.49     6.96     0.17     0.00
 ngs |    96     0   2668      0     0.04     0.20     4.42     0.00
 usn |   288     0  15804    440   263.39    17.31     0.11    19.61

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igp   igu   jpl   ngs   usn |
 -----+-------------------------------------------------------------+
    1 | -6261    -7   -90   128    57 -9159 -5104    77 -5281  -116 |
    2 |  4914   276   -19   111    54 12451  6253   230  4274  -378 |
    3 |  3513   -96   -43    91    54 -5626  3308   148  2781   -32 |
    4 |  2677   179     X   107   105  6833  3105  -159  2472  -341 |
    5 |  2543   118  -188   -18   131  3559  1499   -58  2576  -132 |
    6 |   445   108   -59   -82   178 20170 -5186   -72   243  -183 |
    7 | -7312   130   -35     1   105-21353 -1888    15 -7386  -209 |
    8 | -4191   299  -219    77   -56-32337  3857    13 -3853  -158 |
    9 | -6344   116  -102   102   178 26842 -6088  -107 -6575  -303 |
   10 |  5664   190   -28     5    27  6497  5591   -77  5060  -181 |
   11 |  2080   -35   101   220   -65 -2301  2940   216  1972  -132 |
   13 |  2875     6    10   193  -165  7678  2358  -239  3079    -2 |
   14 |  7428    67   142    63   -61   177   457    98  7369  -112 |
   17 | -7015   -32  -154  -254   214-34053     -  -491 -5277    76 |
   18 |  3703  -139    98     -     -     -     -   -79  4124    81 |
   19 | 12293   139  -146    -7   -50 40127     -   -13  9759     - |
   20 |  2745    26    17   254   -70  7841 -1307   105  2615  -169 |
   21 |  1005  -129   -31     X   150 23662  1931   -14   241   -22 |
   22 |-11088    31   104  -137   -74-34486-12098   337 -9435   115 |
   23 |  5058    29  -155  -137   226     - 13026  -238  4152   -72 |
   24 | -3492    54   -31   -63    90 -8054-12490  -144 -2593   -76 |
   25 | -2585   -79   129    -9    47  8731  1355   -31 -2447   -29 |
   26 | -3042   178   -45  -195   205 -2419  1081  -178 -3031  -186 |
   27 | -5514   217   -17    61    86 -6776     -    59 -4327  -297 |
   28 |  3944  -149   119   285  -239  4595 -2897   119  3862    85 |
   29 |  -319    -2    40   116    90  -413  4584    75  -387  -202 |
   30 | -6717    69   -46  -135   214-20745 -1776     2 -6246  -139 |
   31 |  3031    46  -101   224   -85  9168 -2579   185  2299   -92 |
 -----+-------------------------------------------------------------+
 ALBH |     -   166     -  -188     -     -     -     -     -     - |
 ALGO |     -    32    89     X  -197     -     -  -105     -   129 |
 AREQ |     -   -78     -   -83   -41     -     -     -     -   177 |
 ARTU |     -     7     -     -    -6     -     -     -     -     - |
 AUCK |     -  -104     -   -77     -     -     -     X     -   158 |
 BAHR |     -    77     -   -71     -     -     -     -     -   -13 |
 BOR1 |     -  -109     -   123     -     -     -     -     -     - |
 BRMU |     -   -29     -    13  -154     -     -     -     -   170 |
 CAS1 |     -     -     -   133  -197     -     -     -     -    89 |
 COCO |     -     -     -     -   -46     -     -     -     -    46 |
 CRO1 |     -    43     -   -49     -     -     -   230     -     - |
 DAEJ |     - -1043     -     -     -     -     -     -     -   967 |
 DRAO |     -   -58   -14     -     -     -     -     -     -    60 |
 EISL |     -  -460     -    92     -     -     -     -     -   121 |
 FAIR |     -   174     -   -70     -     -     -   -98     -    21 |
 FLIN |     -    86     -   -97     -     -     -     -     -     - |
 GALA |     -     X     -    49   -39     -     -   183     -     - |
 GRAZ |     -   -91     -   103     -     -     -     -     -     - |
 GUAM |     -  -130     -   310  -266     -     -    75     -   132 |
 HOB2 |     -     -     -  -121     -     -     -     -     -    99 |
 KERG |     -    47     -     -     -     -     -     -     -   -43 |
 KIT3 |     -   172     -  -141   -43     -     -   -22     -     - |
 KOKB |     -   -15   -26  -230   124     -     -  -340     -   -11 |
 KOSG |     -   -68     -    77     -     -     -  -134     -     - |
 KWJ1 |     -     -     -   -91    45     -     -     -     -    35 |
 MAC1 |     -     -     -    43   -35     -     -     -     -     - |
 MALI |     -   323     -    78  -409     -     -   259     -   153 |
 MATE |     -   -17     -     -     -     -     -     -     -    16 |
 MCM4 |     -   153     -  -256    92     -     -     -     -     X |
 MDO1 |     -   -69   123     9     -     -     -     -     -     - |
 MKEA |     -     1     -    -2     -     -     -     -     -     - |
 NLIB |     -   -26     -   -79     -     -     -     -     -    88 |
 NRC2 |     -  -460  -142   600     -     -     -     -     -     - |
 OHIG |     -  -107     -  -234   125     -     -     -     -   164 |
 PIE1 |     -   -30     -  -167     -     -     -     -     -   164 |
 POTS |     -    73     -    19   -82     -     -     -     -     - |
 REYK |     -     2     -    -2     -     -     -     -     -     - |
 SANT |     -  -328     -   246    37     -     -  -192     -     X |
 STJO |     -  -151   177   -91   134     -     -     -     -     - |
 SUTH |     -   196     -     -  -181     -     -     -     -     - |
 THTI |     -     4     -     -     -     -     -  -170     -    -4 |
 THU1 |     -   -10     -     -     -     -     -     -     -    10 |
 TIXI |     -    -7     -     -     6     -     -    31     -     - |
 TSKB |     -    71     -  -239     -     -     -     -     -   134 |
 USNO |     -   -24     -  -190     -     -     -     -     -   178 |
 USUD |     -   -83   325   -84     -     -     -   -51     -     - |
 WHIT |     -    25     -     -   -23     -     -     -     -     - |
 WSRT |     -    52     -     -     -     -     -     -     -   -48 |
 WTZR |     -    20     -   -96   -57     -     -     -     -   118 |
 YAR2 |     -   121   193  -340     -     -     -    26     -    81 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igp   igu   jpl   ngs   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  6285    92    70    56    57  4519  3513    66  5422    74 |  288   3.08
    2 |  3334   134    91    44   128  3764  3131   122  3482    40 |  288   1.63
    3 |  3434    93    75    47   140  2635  2291   198  2985    74 |  288   1.95
    4 |  2216   177     X   131    87  1050  2761   103  2216   142 |  276   1.04
    5 |  3056    87    88    79    78  2900  2979    91  3156    49 |  288   3.10
    6 |  5354   185    37   161    92  6272  4167    51  5154    91 |  288   5.58
    7 |  3086   120   111   108    63 10241  1351   193  3107    62 |  288   0.63
    8 |  3214    79   117    62    63  9538  2021   104  3070   152 |  288   1.99
    9 |  1978   274    67   211   238  2946  3962    59  1997    50 |  287   1.60
   10 |  4370   148    51    50    50  5282  3890    82  4130    83 |  288   2.49
   11 |  1012    84   145   153   101   635  1807   183   876    48 |  288   0.40
   13 |   971    57   116    70    56  1655  1511   133  1132    34 |  288   0.64
   14 |   911   102   128    91   116  1279   579    56   850    92 |  288   0.41
   17 |  6863   105   105   150   227  9644     -   262  6437   137 |  277   3.36
   18 |  2057   143    65     -     -     -     -   138  2131   118 |  279   0.61
   19 |  7876    86   115    84    55 16916     -   107  6447     - |  278   2.62
   20 |   642   147   127   113    74  1399   494   206   685    74 |  288   0.20
   21 |  4778   172   115     X   181  5021  3329   402  4031   284 |  288   3.38
   22 |  5279   155    92    75   110 10410  5050   107  4509   157 |  288   0.64
   23 |  8253    63    70   272    63     -  4765   130  8240   123 |  288   6.66
   24 |  4366   344   154   118   108  2253  5823   206  4203   184 |  278   1.51
   25 |  5741    82    66   109   118  7431  4693    78  5869    38 |  278   1.72
   26 |   881   153    55   407    87  1436  1231    84   865   135 |  288   0.68
   27 | 12118   139    86   175    69  4757     -    64 10379    72 |  283   4.38
   28 |   928   110    99    50    49  1181   753    63  1030    52 |  288   0.45
   29 |  1374   115    89   189    66   738  2664    86  1375   141 |  288   0.39
   30 |  2488   103    66   142    53  1875  1390    64  2440    66 |  288   1.06
   31 |  7356    67    58   162    45  3750  4183   219  7754   120 |  288   3.58
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    72     -    81     -     -     -     -     -     - |  288   0.04
 ALGO |     -    91    29     X    50     -     -    38     -    38 |  288   0.01
 AREQ |     -   156     -    88    54     -     -     -     -   124 |  288  19.88
 ARTU |     -    61     -     -    56     -     -     -     -     - |  287  24.61
 AUCK |     -   125     -    78     -     -     -     X     -    64 |  288  15.05
 BAHR |     -    66     -    31     -     -     -     -     -    76 |  288   0.33
 BOR1 |     -    91     -   103     -     -     -     -     -     - |  288   5.22
 BRMU |     -   114     -    36    56     -     -     -     -    49 |  288  16.64
 CAS1 |     -     -     -   167   275     -     -     -     -   202 |  288  12.32
 COCO |     -     -     -     -    40     -     -     -     -    40 |  288  14.93
 CRO1 |     -    31     -    36     -     -     -    61     -     - |  271    >>>
 DAEJ |     -    38     -     -     -     -     -     -     -    35 |  286    >>>
 DRAO |     -    33    23     -     -     -     -     -     -    28 |  288   0.03
 EISL |     -   141     -    56     -     -     -     -     -    54 |  288  23.95
 FAIR |     -   148     -   209     -     -     -   339     -   207 |  285   0.29
 FLIN |     -    85     -    97     -     -     -     -     -     - |  288   8.57
 GALA |     -     X     -    57    46     -     -   236     -     - |  286  42.89
 GRAZ |     -    87     -    98     -     -     -     -     -     - |  288  13.99
 GUAM |     -   182     -   380   258     -     -   159     -   120 |  287  31.80
 HOB2 |     -     -     -    25     -     -     -     -     -    21 |  288   0.05
 KERG |     -    28     -     -     -     -     -     -     -    26 |  250    >>>
 KIT3 |     -    65     -    78    37     -     -    79     -     - |  287  35.60
 KOKB |     -   124    65    72   101     -     -   163     -    42 |   97   0.50
 KOSG |     -    32     -    36     -     -     -    81     -     - |  287  42.82
 KWJ1 |     -     -     -   209   182     -     -     -     -   190 |  247  87.45
 MAC1 |     -     -     -    49    40     -     -     -     -     - |  287  12.81
 MALI |     -    55     -    77    29     -     -   157     -    69 |  288  25.51
 MATE |     -   225     -     -     -     -     -     -     -   208 |  286   0.13
 MCM4 |     -    82     -    91    91     -     -     -     -     X |  286  28.13
 MDO1 |     -    41    40    43     -     -     -     -     -     - |  284  30.76
 MKEA |     -    32     -    37     -     -     -     -     -     - |  252  36.96
 NLIB |     -   175     -   121     -     -     -     -     -    94 |  287   0.10
 NRC2 |     -    82    53    82     -     -     -     -     -     - |  288   0.05
 OHIG |     -   166     -   104    32     -     -     -     -   157 |  283  19.88
 PIE1 |     -   114     -    70     -     -     -     -     -    53 |  288   0.05
 POTS |     -    47     -    53    34     -     -     -     -     - |  288  38.17
 REYK |     -    20     -    23     -     -     -     -     -     - |  288   8.13
 SANT |     -   105     -   252   227     -     -   468     -     X |  165  11.11
 STJO |     -    43    57    38    34     -     -     -     -     - |  288   3.73
 SUTH |     -    40     -     -    37     -     -     -     -     - |  284  17.35
 THTI |     -   104     -     -     -     -     -    94     -    96 |  247   1.81
 THU1 |     -   130     -     -     -     -     -     -     -   121 |  262  15.73
 TIXI |     -    26     -     -    24     -     -    96     -     - |  287  10.52
 TSKB |     -   109     -    68     -     -     -     -     -    50 |  288   1.53
 USNO |     -    44     -    28     -     -     -     -     -    30 |  288   0.05
 USUD |     -    71   103    62     -     -     -   149     -     - |  287   0.23
 WHIT |     -    27     -     -    25     -     -     -     -     - |  288  12.55
 WSRT |     -    35     -     -     -     -     -     -     -    33 |  288   0.04
 WTZR |     -   109     -    49    29     -     -     -     -    41 |  288   0.07
 YAR2 |     -    46    57    75     -     -     -   108     -    41 |  288  17.51
 -----+-------------------------------------------------------------+--------------
 TOT  |  4761   116    88   128   107  5967  3192   165  4422   108 |


 BEST CLOCK FIT: ALGO   288   0.01 (ns) 

