
 GPS week: 1101   Day: 5   MJD: 51956                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2718      6     0.09     0.03     3.87     0.00
 cod |   288     0  17984     39     0.66    -1.28     0.10    22.70
 emr |    96     0   3611    113   949.26    13.22     0.16    13.17
 esa |   288     0  18057    640   247.06    15.15     0.11    21.10
 gfz |   288     0  13581    175    -0.20     0.02     0.15    14.91
 igp |    96     0   2338     38     0.74     0.67     4.64     0.00
 igu |    96     0   2293      0    -0.08    -0.28     2.77     0.00
 jpl |   285     0   8945    796    -0.97     3.65     0.16    12.38
 ngs |    96     0   2718      4     0.05     0.03     3.90     0.00
 usn |   288     0  15718    122   250.02    15.08     0.14    15.74

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igp   igu   jpl   ngs   usn |
 -----+-------------------------------------------------------------+
    1 | -9167    86   -10   -20  -124 -1146 -9187   295 -9330   -70 |
    2 |  1363   166  -116    30   274-16035  5832   -90  1471  -431 |
    3 |   299  -109   -13   133  -101 -9071  2788   293  1282   -45 |
    4 |  1734    44  -162   102   242 -3649  -938    44  1669  -382 |
    5 |   324    56    -6   200  -146 22428 -6225  -274   286   -98 |
    6 |  7981   -71    -9  -132    57 14917  4958   307  7187    84 |
    7 |  -274    57   -65    49   183-34530  -516  -218  -297  -200 |
    8 | -5370   229  -125   -69    78-23177  -790   -16 -5455  -182 |
    9 |  5057   153   -96    40   116  5169 11901     X  4927  -319 |
   10 |  1683   120  -103     9   134 19503 -1211  -338  1788  -102 |
   11 |  1878    22   147    74    46 14028 -1463   -34  2283  -198 |
   13 |  4479     6    66    84  -147  -712    29   138  4431   -46 |
   14 |  5796   -28   133     5    24 -1146  1757   154  5681   -88 |
   15 | -3982  -201     -     -     - -6807     -   166 -3190   120 |
   17 | -9579   -54  -159    19    55     -     -  -565 -9429   191 |
   18 |  5909   -58    96     -     -     -     -    20  5312    39 |
   19 |  3310     -  -213    78     - 32204     -   -30  2684     - |
   20 |  4119   -47   -11   235  -223 -2266  -353   234  4148  -129 |
   21 |   600   -33   -45    -3   -10     -  -714   -39   252    80 |
   22 | -6034   -50   -49   -22  -136 -2146 -2911   253 -5823   141 |
   23 | -5195    37  -447   261    39     - -2412  -332 -4622  -179 |
   24 | -2931    16   -73    82   282 29728 -3708  -300 -2657  -306 |
   25 | -3237   -79    53   -90   103 -8063  3843   322 -3404   -31 |
   26 | -1276   151     3    -9   235-13809  1607  -282 -1399  -300 |
   27 |  -806   139  -144   -75   199  8623     -    30  -966  -200 |
   28 |  7376   -65   231    69  -168  5140 -5121   -31  7293    93 |
   29 | -2224    -5     X   -27    50 -9216  2816   241 -2251   -93 |
   30 | -6643   -33   200   -11   -20-23911  2922   236 -6303   -76 |
   31 |  2480   -16   -58   204  -122  1417 -2882   -23  2516  -112 |
 -----+-------------------------------------------------------------+
 ALBH |     -  -145     -   156     -     -     -     -     -     - |
 ALGO |     -  -168   -31     X  -135     -     -    79     -   317 |
 ANKR |     -   -29     -    31     -     -     -     -     -     - |
 AREQ |     -   -37     -    23   -57     -     -   -58     -   117 |
 ARTU |     -     5     -     -    -7     -     -     -     -     - |
 AUCK |     -   -39     -   -57     -     -     -   156     -     8 |
 BAHR |     -    11   154   -27   -78     -     -   -49     -    89 |
 BOR1 |     -   -29     -    31     -     -     -     -     -     - |
 BRMU |     -  -102     -   124  -216     -     -     -     -   184 |
 CAS1 |     -     -     -   -66   -68     -     -     -     -   153 |
 COCO |     -     -     -     -   -44     -     -     -     -    42 |
 CRO1 |     -    64     -   -81     -     -     -    32     -     - |
 DRAO |     -    14     9     -     -     -     -     -     -   -22 |
 EISL |     -  -108     -   -99     -     -     -     -     -   217 |
 FAIR |     -    62   155  -106     -     -     -     X     -    85 |
 FLIN |     -    33     -   -36     -     -     -     -     -     - |
 GALA |     -   171     -   -54  -214     -     -    60     -     - |
 GRAZ |     -    48     -   -52     -     -     -     -     -     - |
 GUAM |     -   180     -  -242   -62     -     -    93     -    75 |
 HOB2 |     -     -     -  -122     -     -     -     -     -   163 |
 IISC |     -     -     -  -205  -121     -     -  -160     -   454 |
 KERG |     -    21     -     -     X     -     -     -     -   -31 |
 KIT3 |     -   -34     -    13    33     -     -     -     -     - |
 KOKB |     -  -364   123   -17   294     -     -     X     -  -253 |
 KOSG |     -   -34     -    92     -     -     -   -97     -     - |
 KSTU |     -   -14     -     -     -     -     -    26     -     - |
 KWJ1 |     -     -     -   -59    57     -     -     -     -    29 |
 MAC1 |     -     -     -    40   -57     -     -     -     -     - |
 MALI |     -     -     -  -129   -57     -     -    98     -   132 |
 MATE |     -   -52     -     -     -     -     -     -     -    74 |
 MCM4 |     -   151     -  -185  -108     -     -     -     -   139 |
 MDO1 |     -  -187     -   186     -     -     -    37     -     - |
 MKEA |     -  -130     -   140     -     -     -     -     -     - |
 NLIB |     -  -102     -     -     -     -     -     -     -   147 |
 PIE1 |     -   -34   -90  -103     -     -     -     -     -   211 |
 POTS |     -    56     -    35  -134     -     -     -     -     - |
 REYK |     -  -117     -   126     -     -     -     -     -     - |
 STJO |     -   -70   215  -104   189     -     -     -     -     - |
 SUTH |     -   132     -     -     -     -     -  -241     -     - |
 THTI |     -    22     -     -     -     -     -  -224     -   150 |
 THU1 |     -    -5     -     -     -     -     -     -     -     8 |
 TIDB |     -    70     -     X  -106     -     -     -     -     - |
 TSKB |     -   -68    78   -11     -     -     -     -     -    91 |
 USNO |     -    44     -  -177     -     -     -     -     -   173 |
 USUD |     -  -142     -   102     -     -     -    88     -     - |
 VILL |     -  1215     - -1307     -     -     -     -     -     - |
 WHIT |     -   -16     -     -    25     -     -     -     -     - |
 WSRT |     -   -13     -     -     -     -     -     -     -    19 |
 WTZR |     -  -140   154    88   -39     -     -     -     -    77 |
 YAR2 |     -  -120   130   128     -     -     -    60     -   -69 |
 YSSK |     -   -31     -     -    47     -     -     -     -     - |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igp   igu   jpl   ngs   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  7240    77    56    93    62  5887  4815   109  7279   103 |  288   4.74
    2 |  3582   162   171    83   144  3624  4384   100  3651   222 |  288   2.18
    3 |  7896    70   141    83   323  2724  3352   104  7851   129 |  288   2.48
    4 |  1236   109   108   196   222  2811  1423   157  1247    79 |  277   1.13
    5 |  5099   150   246   162    50  3479  6386   148  5040    74 |  288   3.43
    6 |  6164   188    86   168   248  9026  2405   240  6180    77 |  287   7.37
    7 |  1312   131   172    79   110 11055  1472   104  1340    77 |  288   1.71
    8 |  3816    92    91   165   102  8375  2052   132  3782   145 |  288   1.94
    9 |  2848   125   106   115    49  4643  4263     X  2908    93 |  288   2.22
   10 |  3067   306   126   154   176  4248  1484    90  2941    97 |  288   1.90
   11 |  2063   189   191   127    82  2188   727   288  2064   171 |  288   0.41
   13 |  1177    92   134   122   117  1056   552    70  1139   104 |  288   0.62
   14 |   515    69    97    37    59  1075   515   103   587    37 |  288   0.36
   15 |  8626   164     -     -     -  1450     -   290  8841   258 |  167    >>>
   17 |  2791   291   409   172   381     -     -   452  3005   261 |  276   3.09
   18 |  2958   130   159     -     -     -     -   125  2836   165 |  274   0.79
   19 |  3244     -   245   157     -  5451     -   262  3263     - |  174   2.57
   20 |   776    97   149   100    45   896   667    81   809    89 |  288   0.38
   21 |  5215   110   151   164   151     -  3514   126  5221    84 |  287   3.83
   22 |  1812    88    93    59   118  2132  2738   151  2106   206 |  288   1.56
   23 |  6435   131   129    66   141     -  2197   208  6688    73 |  288   5.05
   24 |  2221   149   137   157   150  4510  2654   218  2306   485 |  278   1.79
   25 |  1789   185   220   154    69  3070  2405   131  1782    81 |  278   1.83
   26 |  1368   109   135   102   105  2965   717   180  1390   178 |  288   0.90
   27 |  5228    64   102   158   149  3998     -    83  5190   117 |  288   4.40
   28 |  1391   172   194   102   148  2000  2649   274  1487   126 |  288   1.34
   29 |   605    71     X    61   126  2479  1860   178   599   110 |  288   0.85
   30 |  2137   121   169    72   105  2715   729   186  1771    53 |  288   0.89
   31 |  4021    99   126    89   171  4777  2519   146  4034    64 |  288   3.52
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    60     -    64     -     -     -     -     -     - |  288   0.11
 ALGO |     -    57    42     X    68     -     -    79     -    44 |  288   0.06
 ANKR |     -    61     -    66     -     -     -     -     -     - |  288  28.86
 AREQ |     -   207     -   255   220     -     -   163     -   133 |  270    >>>
 ARTU |     -    41     -     -    62     -     -     -     -     - |  282  21.57
 AUCK |     -    56     -    39     -     -     -   107     -    72 |  288  19.39
 BAHR |     -   125   137    68    46     -     -   151     -   153 |  288   0.35
 BOR1 |     -    32     -    35     -     -     -     -     -     - |  288   2.34
 BRMU |     -    63     -    38    59     -     -     -     -    36 |  288  16.91
 CAS1 |     -     -     -    85    29     -     -     -     -   111 |  288  11.96
 COCO |     -     -     -     -    28     -     -     -     -    26 |  288  14.78
 CRO1 |     -    53     -    56     -     -     -   109     -     - |  286    >>>
 DRAO |     -    22    36     -     -     -     -     -     -    29 |  286   0.06
 EISL |     -    99     -    66     -     -     -     -     -    48 |  288  23.57
 FAIR |     -   108    76    82     -     -     -     X     -   103 |  287   0.38
 FLIN |     -    40     -    43     -     -     -     -     -     - |  288   9.04
 GALA |     -    66     -    40   101     -     -   106     -     - |  284  42.35
 GRAZ |     -    29     -    31     -     -     -     -     -     - |  288 114.51
 GUAM |     -    53     -    92    73     -     -    79     -    55 |  288  24.44
 HOB2 |     -     -     -    44     -     -     -     -     -    59 |  288   0.11
 IISC |     -     -     -    89   166     -     -   141     -   142 |  278  47.73
 KERG |     -    50     -     -     X     -     -     -     -    72 |  154    >>>
 KIT3 |     -    47     -    45    66     -     -     -     -     - |  288  32.90
 KOKB |     -    72   368   223   160     -     -     X     -   356 |  286   0.48
 KOSG |     -    47     -   109     -     -     -   148     -     - |  288  37.36
 KSTU |     -    28     -     -     -     -     -    51     -     - |  284  12.98
 KWJ1 |     -     -     -   185   192     -     -     -     -   224 |  252 134.19
 MAC1 |     -     -     -    22    31     -     -     -     -     - |  287  16.49
 MALI |     -     -     -   223   425     -     -   311     -   413 |  288  27.06
 MATE |     -    50     -     -     -     -     -     -     -    72 |  287   0.17
 MCM4 |     -   118     -   136    94     -     -     -     -    74 |  287    >>>
 MDO1 |     -    77     -    58     -     -     -   112     -     - |  286  29.72
 MKEA |     -    72     -    77     -     -     -     -     -     - |  233  36.54
 NLIB |     -    49     -     -     -     -     -     -     -    71 |  286   0.06
 PIE1 |     -    61    44    41     -     -     -     -     -    38 |  288   0.11
 POTS |     -    66     -   103   104     -     -     -     -     - |  280  23.50
 REYK |     -    32     -    35     -     -     -     -     -     - |  287   7.36
 STJO |     -    43    57    57    40     -     -     -     -     - |  288   3.21
 SUTH |     -    40     -     -     -     -     -    74     -     - |  216  26.37
 THTI |     -    74     -     -     -     -     -   121     -    59 |  281   1.58
 THU1 |     -    48     -     -     -     -     -     -     -    69 |  288  14.02
 TIDB |     -    72     -     X   110     -     -     -     -     - |  278   0.17
 TSKB |     -    36    85    45     -     -     -     -     -    33 |  288   1.61
 USNO |     -    54     -    35     -     -     -     -     -    46 |  288   0.05
 USUD |     -    93     -    97     -     -     -    52     -     - |  288   0.33
 VILL |     -    28     -    30     -     -     -     -     -     - |  125   2.03
 WHIT |     -    24     -     -    36     -     -     -     -     - |  286   6.64
 WSRT |     -    37     -     -     -     -     -     -     -    53 |  287   0.05
 WTZR |     -    61   118    32    48     -     -     -     -    49 |  288   0.05
 YAR2 |     -   138   138    47     -     -     -   105     -   148 |  285  96.88
 YSSK |     -    22     -     -    34     -     -     -     -     - |  286  15.75
 -----+-------------------------------------------------------------+--------------
 TOT  |  3867   103   159   109   145  4643  2771   157  3897   143 |


 BEST CLOCK FIT: USNO   288   0.05 (ns) 

