
 GPS week: 1100   Day: 3   MJD: 51947                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2624      0    -0.18     0.18     4.84     0.00
 cod |   288     0  17224     17     0.51    -1.25     0.11    17.55
 emr |    96     0   3761    193   828.67    15.21     0.11    18.34
 esa |   288     0  17616    409   113.91    17.01     0.17    11.06
 gfz |   288     0  14432      5    -0.04    -0.47     0.07    29.25
 igp |    96     0   2388      0    -0.16    -0.03     4.35     0.00
 igu |    96     0   2296      0    -0.24     0.05     3.33     0.00
 jpl |     0     0      0      0    -0.57     0.00     0.00     0.00
 ngs |    96     0   2624      0    -0.18     0.17     4.48     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  15512    330   114.72    16.81     0.08    23.79

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igp   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------------+
    1 |  -807   236   -30    13  -166-14515  3499     -  -734     -    53 |
    2 | -8598   173  -147   107   169-10784-10705     - -7856     -  -341 |
    3 |  6431    36  -163   500    14 14358  5182     -  5429     -  -230 |
    4 |  1466   108  -192    -3   115-15049 -2365     -  1485     -  -167 |
    5 |  -331    94   -11  -117    18 19995   129     -  -901     -   -23 |
    6 | -3223   -12   -35  -450    38-42991  9422     - -3507     -   178 |
    7 |   481   -27  -189   463    75-15232  1842     -   509     -  -240 |
    8 |  -153   232  -134   -67    87 -1203  4353     -  -148     -  -196 |
    9 |  5230   -23  -134   186   121 18484  7284     -  4136     -  -187 |
   10 | -2888   126   -76   -22   120 11208  1144     - -3198     -  -204 |
   11 |  1124  -108    26   691  -112  9395  -333     -  1597     -  -113 |
   13 |  3356    92   124  -128   -77  8560 -2695     -  3328     -    64 |
   14 |  5436    88   120  -334   163 10426   775     -  5348     -  -137 |
   15 | -9533   -47     -     -    28     -     -     - -9430     -     - |
   17 | -4295   108    60   -23    59  2073     -     - -3794     -  -146 |
   19 | -2946    76   -61   107   -72 21996     -     - -2512     -     - |
   20 |  4828    17   108   259  -231  1941  -369     -  4974     -   125 |
   21 |   528    38   -12     X    88     -  -631     -   604     -  -128 |
   22 |  2851    -2   -26   173   -22-43404 13230     -  3593     -   -46 |
   23 |  3962   129    37     7    22     - -3509     -  3678     -  -121 |
   24 | -5779   -19  -161   184    18 24178 -8306     - -5698     -   -48 |
   25 | -5021  -107    -9  -139    23-27481  -581     - -4663     -   113 |
   26 | -1815   -56  -174   229    66-14291   942     - -1906     -  -104 |
   27 |  7707    85   -98   147   106 28145     -     -  7490     -  -231 |
   28 |  1049   -90   128    64  -142  2309 -5856     -   955     -   173 |
   29 |   291   -17     X  -184   278   338 -1176     -   300     -  -253 |
   30 | -3209  -105     X  -136    97  7029 -7171     - -2803     -    14 |
   31 | -1603    23  -185   385    -4  4992 -4553     - -1597     -  -142 |
 -----+-------------------------------------------------------------------+
 ALGO |     -  -116    22   771  -304     -     -     -     -     -    95 |
 AREQ |     -  -187     -    16     6     -     -     -     -     -   121 |
 ARTU |     -   -58     -     -    35     -     -     -     -     -     - |
 AUCK |     -  -158     -   -18     -     -     -     -     -     -   124 |
 BAHR |     -   -12     -  -123   -13     -     -     -     -     -    82 |
 BRMU |     -  -160     -    79  -151     -     -     -     -     -   265 |
 CAS1 |     -     -     -   101  -108     -     -     -     -     -    86 |
 COCO |     -     -     -     -  -118     -     -     -     -     -   145 |
 CRO1 |     -    11     -   -18     -     -     -     -     -     -     - |
 DRAO |     -   -45    42     -     -     -     -     -     -     -    22 |
 EISL |     -     -     -  -154     -     -     -     -     -     -    72 |
 FAIR |     -  -222    54   -74     -     -     -     -     -     -    49 |
 FORT |     -     -   114  -583  -347     -     -     -     -     -   533 |
 GALA |     -    11     -    91  -187     -     -     -     -     -   178 |
 GRAZ |     -   378     -  -599     -     -     -     -     -     -     - |
 GUAM |     -    -4     -     6     -     -     -     -     -     -     - |
 HOB2 |     -     -     -  -114     -     -     -     -     -     -    53 |
 IISC |     -     -     -  -548     -     -     -     -     -     -   255 |
 KOKB |     -     -   -78   544   372     -     -     -     -     -  -696 |
 KOSG |     -   -38     -    61     -     -     -     -     -     -     - |
 KOUR |     -  -113     -   179     -     -     -     -     -     -     - |
 KWJ1 |     -  -109     -    61    14     -     -     -     -     -    36 |
 MAC1 |     -     -     -    95   -36     -     -     -     -     -     - |
 MALI |     -     -     -  -497    21     -     -     -     -     -   190 |
 MAS1 |     -   -63    99  -130   -10     -     -     -     -     -    94 |
 MCM4 |     -    75     -    84   -74     -     -     -     -     -     X |
 MKEA |     -   -89     -   141     -     -     -     -     -     -     - |
 NRC2 |     -    53   183  -185     -     -     -     -     -     -     - |
 OHIG |     -    16     -    26   -19     -     -     -     -     -     - |
 PIE1 |     -  -222    57  -230     -     -     -     -     -     -   246 |
 POTS |     -    12     -    32   -19     -     -     -     -     -     - |
 REYK |     -     7     -   -11     -     -     -     -     -     -     - |
 SANT |     -     -     -  -233     -     -     -     -     -     -   108 |
 STJO |     -  -218   219     -    84     -     -     -     -     -     - |
 SUTH |     -   -44     -     -    27     -     -     -     -     -     - |
 THU1 |     -  -103     -     -     -     -     -     -     -     -    76 |
 TSKB |     -   -23    40  -319     -     -     -     -     -     -   155 |
 URUM |     -  -153     -     -   -18     -     -     -     -     -   136 |
 USNO |     -   -28     -  -156     -     -     -     -     -     -    93 |
 USUD |     -  -247   216   273     -     -     -     -     -     -     - |
 VILL |     -   679     - -1077     -     -     -     -     -     -     - |
 WHIT |     -     8     -     -    -5     -     -     -     -     -     - |
 WSRT |     -     4     -     -     -     -     -     -     -     -    -3 |
 WTZR |     -  -121     -  -151     -     -     -     -     -     -   159 |
 WUHN |     -   -24     -     -   -78     -     -     -     -     -   113 |
 YAR2 |     -   158   147  -414     -     -     -     -     -     -    45 |
 YELL |     -    -1   144   269  -131     -     -     -     -     -     - |
 YSSK |     -    65     -     -   -39     -     -     -     -     -     - |
 ZWEN |     -     -     -     -   221     -     -     -     -     -  -272 |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igp   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------------+--------------
    1 |  3411   128    74    84    80  3114  1886     -  3200     -    49 |  288   2.98
    2 |  4231   171   179   180    37  3057  4281     -  3716     -    59 |  288   2.89
    3 |  6996   117    79   172    95  3137  1717     -  6842     -   111 |  288   1.73
    4 |   992   161   163   237   100  4090  2019     -  1079     -    78 |  276   1.08
    5 |  4906    54    91   104    39  5777  3927     -  5162     -    53 |  288   4.42
    6 |  6819    56   174    93    43  6857  4749     -  6894     -    91 |  288   7.05
    7 |   821   146   118   133    41  8230   868     -   526     -    42 |  288   1.64
    8 |  2950    86   123    67    59  4883  3486     -  2855     -    91 |  288   2.75
    9 |  5941   158    65   111    79  7770  4780     -  5315     -    48 |  288   1.82
   10 |  2517   110    89    94    46  3149  1752     -  2365     -    86 |  288   1.84
   11 |  1972    96   127   285    85  2005   395     -  2567     -    52 |  288   0.47
   13 |   738   115   111    42    73  2410   825     -   729     -    54 |  288   0.30
   14 |  1037   109   155   296    42  1466   611     -  1101     -   134 |  288   0.43
   15 |  4361   276     -     -   166     -     -     -  4342     -     - |  134   3.63
   17 |  9050   127   151    71    61  5989     -     -  7906     -   118 |  276   2.91
   19 | 12024    66    77    81    28  5851     -     - 10054     -     - |  288   4.81
   20 |   921   102   114    59    74  1550   458     -  1026     -    39 |  288   0.22
   21 |  2551    78   122     X    45     -  2637     -  2378     -    64 |  288   2.33
   22 |  9583   124    87   112   142  6168  9243     -  8103     -    53 |  288   0.58
   23 |  4995    61    86   155    43     -  3225     -  5338     -    98 |  288   5.04
   24 |  2597   119   123   116   102  3275  3451     -  2554     -    52 |  277   1.92
   25 |  3431   127    82   286    79  2450  2635     -  3826     -    41 |  288   2.12
   26 |   918   132   116   260    48  2227   828     -  1119     -    32 |  288   1.01
   27 |  5145    85    49    73    31  3109     -     -  5100     -    50 |  288   2.89
   28 |  4562   175   129    67   152  4100  4842     -  4480     -    82 |  288   0.72
   29 |   946   129     X   352    68   758   598     -  1089     -   108 |  288   0.58
   30 |  2812    81     X   104    50  3025  2357     -  2974     -    65 |  288   1.78
   31 |  3115   113   114   296    60  3112  3041     -  2929     -    42 |  288   2.64
 -----+-------------------------------------------------------------------+--------------
 ALGO |     -    51    85    44    15     -     -     -     -     -    35 |  288   0.03
 AREQ |     -    87     -   306    61     -     -     -     -     -    58 |  281    >>>
 ARTU |     -    68     -     -    41     -     -     -     -     -     - |   84  16.73
 AUCK |     -    76     -    90     -     -     -     -     -     -    60 |  288  19.14
 BAHR |     -    43     -    94    28     -     -     -     -     -    21 |  288   0.72
 BRMU |     -    71     -    78    43     -     -     -     -     -    47 |  288  16.55
 CAS1 |     -     -     -    60    65     -     -     -     -     -    90 |  288  12.35
 COCO |     -     -     -     -    42     -     -     -     -     -    51 |  288  13.17
 CRO1 |     -    21     -    33     -     -     -     -     -     -     - |  274   0.38
 DRAO |     -    71    54     -     -     -     -     -     -     -    40 |  288   0.03
 EISL |     -     -     -   158     -     -     -     -     -     -    73 |  248  26.70
 FAIR |     -   165   132   189     -     -     -     -     -     -    94 |  286   0.16
 FORT |     -     -    60   167    33     -     -     -     -     -    79 |  179   0.66
 GALA |     -    64     -   114    45     -     -     -     -     -    44 |  288  40.03
 GRAZ |     -    39     -    62     -     -     -     -     -     -     - |  287  48.70
 GUAM |     -   283     -   449     -     -     -     -     -     -     - |  279  27.31
 HOB2 |     -     -     -    75     -     -     -     -     -     -    35 |  288   0.08
 IISC |     -     -     -   101     -     -     -     -     -     -    47 |  162  39.97
 KOKB |     -     -   245   419   208     -     -     -     -     -   264 |  256   1.48
 KOSG |     -    48     -    76     -     -     -     -     -     -     - |  287  27.36
 KOUR |     -    50     -    79     -     -     -     -     -     -     - |  258   6.97
 KWJ1 |     -   317     -   282   181     -     -     -     -     -   195 |  268    >>>
 MAC1 |     -     -     -    92    35     -     -     -     -     -     - |  287  11.95
 MALI |     -     -     -   259   171     -     -     -     -     -   290 |  260    >>>
 MAS1 |     -    46    29   104    32     -     -     -     -     -    35 |  288   2.09
 MCM4 |     -   246     -   376    44     -     -     -     -     -     X |  287  92.57
 MKEA |     -    40     -    63     -     -     -     -     -     -     - |  281  40.84
 NRC2 |     -    35    60    37     -     -     -     -     -     -     - |  288   0.08
 OHIG |     -    62     -    56    35     -     -     -     -     -     - |  288  23.10
 PIE1 |     -    71    24    42     -     -     -     -     -     -    41 |  288   0.03
 POTS |     -    86     -    56    57     -     -     -     -     -     - |  288  22.54
 REYK |     -    39     -    61     -     -     -     -     -     -     - |  287  10.44
 SANT |     -     -     -   140     -     -     -     -     -     -    65 |   97  12.61
 STJO |     -    61    49     -    37     -     -     -     -     -     - |  288   3.61
 SUTH |     -   103     -     -    62     -     -     -     -     -     - |  199  15.47
 THU1 |     -    83     -     -     -     -     -     -     -     -    61 |  287  16.68
 TSKB |     -    41   117   101     -     -     -     -     -     -    42 |  288   1.02
 URUM |     -    50     -     -    38     -     -     -     -     -    21 |  288  57.72
 USNO |     -    50     -    42     -     -     -     -     -     -    46 |  288   0.04
 USUD |     -    52    67    86     -     -     -     -     -     -     - |  288   0.25
 VILL |     -    30     -    47     -     -     -     -     -     -     - |  226   5.21
 WHIT |     -    66     -     -    39     -     -     -     -     -     - |  288  23.08
 WSRT |     -    41     -     -     -     -     -     -     -     -    30 |  287   0.05
 WTZR |     -    39     -    53     -     -     -     -     -     -    29 |  288   0.03
 WUHN |     -   164     -     -    55     -     -     -     -     -    67 |  287  25.92
 YAR2 |     -   121    47    73     -     -     -     -     -     -    75 |  270 237.02
 YELL |     -    43   134    46    44     -     -     -     -     -     - |  288   0.05
 YSSK |     -    64     -     -    38     -     -     -     -     -     - |  279  20.53
 ZWEN |     -     -     -     -    16     -     -     -     -     -    20 |  288  15.75
 -----+-------------------------------------------------------------------+--------------
 TOT  |  4840   111   111   168    74  4348  3326     -  4478     -    84 |


 BEST CLOCK FIT: DRAO   288   0.03 (ns) 

