
 GPS week: 1100   Day: 2   MJD: 51946                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2581      0     0.05    -0.10     5.12     0.00
 cod |   288     0  18389      1     5.83    -5.82     0.06    32.31
 emr |    96     0   3390    137   814.87    11.81     0.14    11.57
 esa |   288     0  17258   1290   100.33    13.63     0.14    13.02
 gfz |   288     0  13730      0     0.23    -0.54     0.11    18.27
 igp |    96     0   2389      0     0.00     0.02     5.27     0.00
 igu |    96     0   2293      5     0.22    -0.42     3.97     0.00
 jpl |     0     0      0      0     3.83     0.00     0.00     0.00
 ngs |    96     0   2581      0     0.05    -0.10     4.82     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  14664    389   101.68    13.58     0.08    24.83

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igp   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------------+
    1 | -8058    35  -318     4   140 -2126 -5188     - -7399     -   -97 |
    2 |  -991   250   -67  -167   184  3814  3520     -  -942     -  -319 |
    3 |    11   -60  -309   -36   179 13343 -2717     -   294     -    -1 |
    4 |    86    91  -183    20   234-18267  3958     -   344     -  -267 |
    5 |  7557    77   261   -24   -68 41812     -     -  6327     -   -64 |
    6 |-14915   -53   198  -266    87-27717-20306     --12962     -   105 |
    7 |  2014   -69  -227   301   213-25215  1238     -  1971     -  -199 |
    8 |  5964   134   -98   -14    54 -3507 -7980     -  5921     -  -168 |
    9 | -7891    37   150   310   -29  2021 -3959     - -7932     -  -197 |
   10 | -2414    77    97   232    -4 -1230  6496     - -2851     -  -223 |
   11 |  4124  -185  -275   501   -53 10941  1786     -  3972     -    36 |
   13 |  3787    39    18   -34   -37  6634  2062     -  3773     -    -3 |
   14 |  6059    67   276    70   -81  8128  4979     -  6008     -   -86 |
   17 | -3158   146   158  -299   100 27633 -4125     - -2966     -  -123 |
   19 |   790   -51  -315    32   122  3189     -     -  -617     -     - |
   20 |  5432   -42  -249   323  -238  4521  4003     -  5504     -    96 |
   21 | -3038    56  -165     X   102     -     -     - -1686     -  -116 |
   22 |-10547    42   -88  -129   -45-30789 -4866     - -9644     -    64 |
   23 |  6891   171   168     X    48     - -1474     -  6329     -  -264 |
   24 | 10030    -5   -71    85    55 -7366  9843     -  9628     -   -59 |
   25 | -7586  -153  -229   -38   134  3688-11676     - -6484     -   130 |
   26 | -3533    66   213   249   -11-19751  1020     - -3473     -  -237 |
   27 |  5740   103  -166    43   157  5513 23038     -  4429     -  -225 |
   28 |  5299   -27   -29  -152    29 -7392 -3794     -  5333     -    94 |
   29 | -1547   -24    57   268    28   254  -335     - -1886     -  -143 |
   30 |     3    11   302  -260    40  6061   587     -  -685     -    47 |
   31 |   175   -92  -326   338    -2  6082  5492     -     5     -   -16 |
 -----+-------------------------------------------------------------------+
 ALBH |     -   285     -  -706     -     -     -     -     -     -     - |
 ALGO |     -   -98   109     X  -105     -     -     -     -     -   188 |
 AREQ |     -   -88     -    46   -71     -     -     -     -     -   139 |
 ARTU |     -   -24     -     -    42     -     -     -     -     -     - |
 AUCK |     -    -2     -  -296     -     -     -     -     -     -   158 |
 BAHR |     -   -26     -   -96     -     -     -     -     -     -    83 |
 BOR1 |     -     6     -   -15     -     -     -     -     -     -     - |
 BRMU |     -   -40     -   -30  -207     -     -     -     -     -   218 |
 CAS1 |     -   -22     -    72   -47     -     -     -     -     -    26 |
 COCO |     -    55     -     -  -103     -     -     -     -     -     5 |
 CRO1 |     -   -76     -   190     -     -     -     -     -     -     - |
 DRAO |     -   -47    43     -     -     -     -     -     -     -    54 |
 EISL |     -     -     -   197     -     -     -     -     -     -  -103 |
 FAIR |     -   251    -6  -205     -     -     -     -     -     -   103 |
 FORT |     -     -   668    71  -201     -     -     -     -     -     X |
 GALA |     -   -64     -   -63  -151     -     -     -     -     -   228 |
 GRAZ |     -   279     -  -693     -     -     -     -     -     -     - |
 GUAM |     -   -40     -   107     -     -     -     -     -     -    -5 |
 HOB2 |     -   -98     -   -30     -     -     -     -     -     -   143 |
 IISC |     -     -     -  -493     -     -     -     -     -     -   259 |
 KARR |     -    -2     -     -     4     -     -     -     -     -     - |
 KIT3 |     -    78     -  -301    77     -     -     -     -     -     - |
 KOKB |     -     -  -221   156   -90     -     -     -     -     -     X |
 KOSG |     -   -83     -   206     -     -     -     -     -     -     - |
 KWJ1 |     -     -     -    10  -182     -     -     -     -     -   129 |
 MAC1 |     -   -53     -   188   -40     -     -     -     -     -     - |
 MALI |     -     -     -   252     -     -     -     -     -     -  -132 |
 MATE |     -  -105   -17     -     -     -     -     -     -     -   140 |
 MCM4 |     -     -     -   416  -349     -     -     -     -     -    41 |
 MDO1 |     -    -2     -     5     -     -     -     -     -     -     - |
 NRC2 |     -    71   255  -253     -     -     -     -     -     -     - |
 OHIG |     -   -46     -   267  -109     -     -     -     -     -     - |
 PIE1 |     -   -89   -25  -119     -     -     -     -     -     -   167 |
 POTS |     -    13     -    66   -69     -     -     -     -     -     - |
 REYK |     -   -44     -   110     -     -     -     -     -     -     - |
 STJO |     -   -81   189     -   103     -     -     -     -     -     - |
 THU1 |     -   -99     -     -     -     -     -     -     -     -   129 |
 TOW2 |     -   -11     -     -    19     -     -     -     -     -     - |
 TSKB |     -   -29     -  -146     -     -     -     -     -     -   115 |
 URUM |     -   -61     -     -     -     -     -     -     -     -    79 |
 USNO |     -   -41     -  -111     -     -     -     -     -     -   111 |
 USUD |     -  -182   281   369     -     -     -     -     -     -     - |
 VILL |     -   278     -  -690     -     -     -     -     -     -     - |
 WHIT |     -   -60     -     -   106     -     -     -     -     -     - |
 WSRT |     -   -31     -     -     -     -     -     -     -     -    41 |
 WTZR |     -  -109     -   -36     -     -     -     -     -     -   160 |
 WUHN |     -    60     -     -     7     -     -     -     -     -   -82 |
 YELL |     -    21     X     X   -37     -     -     -     -     -     - |
 YSSK |     -    14     -     -   -25     -     -     -     -     -     - |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igp   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------------+--------------
    1 |  4459    67   117    86   122  3948  5055     -  3680     -    77 |  288   2.25
    2 |  4009    93    82   151   204  2799  2726     -  3833     -    57 |  288   2.40
    3 |  6098    68    94   140    99  6408  3700     -  6070     -    60 |  288   2.09
    4 |  2520    77   225   154    81  2673  4295     -  2295     -    86 |  277   0.83
    5 |  6115    48   171   100    43 10042     -     -  5853     -    35 |  288   2.95
    6 |  9344    66   176   105    76 10140 10060     -  7982     -    48 |  288   6.98
    7 |   761    94   257   107   116  9520   645     -   700     -    43 |  288   1.07
    8 |  2197    73    75   134    67  4589  5253     -  2078     -    56 |  288   2.25
    9 |  2200   101    76   292    37  1929  2433     -  2409     -    38 |  288   1.95
   10 |  3362    50    81   100    55  3099  3731     -  3267     -    51 |  288   2.35
   11 |  1556    99   123    56    92  2297  1281     -  1446     -   171 |  288   0.63
   13 |   929    58   185    86    60  2327  1338     -   761     -    60 |  288   0.37
   14 |   676   109   278   331   110   661  2932     -   618     -   137 |  288   0.19
   17 |  8351   181   157   230   207  6332  3906     -  8336     -    76 |  276   3.53
   19 |  9772    54    76   122    61  4025     -     -  9765     -     - |  288   3.61
   20 |   936    89   204    95   119  1059  2170     -   756     -    91 |  288   0.17
   21 | 10786    51   274     X    72     -     -     - 10678     -    77 |  288   3.39
   22 |  5639    71   172    79   159 10798  5697     -  4796     -    86 |  288   1.06
   23 |  4563    99   125     X    67     -  1760     -  4609     -    69 |  288   4.76
   24 |  2603   102   129   403    58  2705  2414     -  2733     -   102 |  278   2.78
   25 |  6257    64   178    92   127  3570  1742     -  4979     -    66 |  288   1.89
   26 |   966    91   115   216   166  3569   915     -   777     -    56 |  288   0.75
   27 |  7946    77    93    50    60  7526  8542     -  6795     -    67 |  288   4.13
   28 |   730    55   103    68   145   864  1271     -   640     -   140 |  288   0.43
   29 |  1560    73   180   241    81   930  1434     -  1332     -    92 |  288   0.50
   30 |  4142    76   114    62    43  2862  2157     -  4055     -    50 |  288   1.75
   31 |  4689   110    89   131   108  3991  3444     -  4525     -    45 |  288   3.72
 -----+-------------------------------------------------------------------+--------------
 ALBH |     -    28     -    70     -     -     -     -     -     -     - |  287   0.07
 ALGO |     -    41    59     X    61     -     -     -     -     -    25 |  288   0.05
 AREQ |     -    33     -    63    46     -     -     -     -     -    21 |  288  28.62
 ARTU |     -    25     -     -    44     -     -     -     -     -     - |  287  27.97
 AUCK |     -    72     -    86     -     -     -     -     -     -   106 |  288  43.59
 BAHR |     -    37     -    68     -     -     -     -     -     -    69 |  288   0.46
 BOR1 |     -    23     -    58     -     -     -     -     -     -     - |  287   3.78
 BRMU |     -    58     -    66    78     -     -     -     -     -    40 |  288  18.23
 CAS1 |     -    39     -    86    60     -     -     -     -     -    77 |  288  13.39
 COCO |     -    47     -     -    49     -     -     -     -     -    43 |  288  14.56
 CRO1 |     -    33     -    81     -     -     -     -     -     -     - |  263   0.19
 DRAO |     -    27    61     -     -     -     -     -     -     -    30 |  288   0.08
 EISL |     -     -     -    59     -     -     -     -     -     -    31 |  287  32.70
 FAIR |     -    98   112   133     -     -     -     -     -     -    72 |  153   0.13
 FORT |     -     -   151    45    49     -     -     -     -     -     X |  164   0.49
 GALA |     -    37     -    45    61     -     -     -     -     -    38 |  288  37.61
 GRAZ |     -    27     -    68     -     -     -     -     -     -     - |  284  82.44
 GUAM |     -    74     -    79     -     -     -     -     -     -    71 |  288  28.77
 HOB2 |     -   103     -    72     -     -     -     -     -     -   112 |  288   0.06
 IISC |     -     -     -   270     -     -     -     -     -     -   142 |  174  28.47
 KARR |     -    41     -     -    73     -     -     -     -     -     - |  288 149.76
 KIT3 |     -    23     -    33    35     -     -     -     -     -     - |  287  31.66
 KOKB |     -     -    84   174   126     -     -     -     -     -     X |  170   1.41
 KOSG |     -    32     -    81     -     -     -     -     -     -     - |  287  39.51
 KWJ1 |     -     -     -   238   186     -     -     -     -     -   189 |  274  95.39
 MAC1 |     -    69     -    89    77     -     -     -     -     -     - |  288  13.56
 MALI |     -     -     -   258     -     -     -     -     -     -   135 |  103  30.63
 MATE |     -    45    48     -     -     -     -     -     -     -    53 |  204   0.07
 MCM4 |     -     -     -   379   245     -     -     -     -     -   130 |  287  14.47
 MDO1 |     -    18     -    45     -     -     -     -     -     -     - |  258  10.02
 NRC2 |     -    24    58    60     -     -     -     -     -     -     - |  288   0.04
 OHIG |     -    48     -    74    55     -     -     -     -     -     - |  288  17.03
 PIE1 |     -    36    83    33     -     -     -     -     -     -    29 |  288   0.10
 POTS |     -   101     -   183   301     -     -     -     -     -     - |  265  17.82
 REYK |     -    42     -   103     -     -     -     -     -     -     - |  287   9.69
 STJO |     -    38   106     -    50     -     -     -     -     -     - |  288   2.83
 THU1 |     -    49     -     -     -     -     -     -     -     -    63 |  231  14.30
 TOW2 |     -    32     -     -    57     -     -     -     -     -     - |  286  25.34
 TSKB |     -    35     -    63     -     -     -     -     -     -    32 |  288   1.52
 URUM |     -    36     -     -     -     -     -     -     -     -    47 |  287  21.58
 USNO |     -    42     -    53     -     -     -     -     -     -    35 |  288   0.04
 USUD |     -    21    58    43     -     -     -     -     -     -     - |  288   0.27
 VILL |     -    24     -    60     -     -     -     -     -     -     - |  286   2.74
 WHIT |     -    32     -     -    57     -     -     -     -     -     - |  282   6.43
 WSRT |     -    55     -     -     -     -     -     -     -     -    71 |  285 117.24
 WTZR |     -    35     -   134     -     -     -     -     -     -    86 |  278 352.49
 WUHN |     -    46     -     -    62     -     -     -     -     -    37 |  287  22.48
 YELL |     -    36     X     X    64     -     -     -     -     -     - |  277   0.09
 YSSK |     -    23     -     -    40     -     -     -     -     -     - |  279  15.75
 -----+-------------------------------------------------------------------+--------------
 TOT  |  5124    63   141   141   108  5270  3968     -  4820     -    79 |


 BEST CLOCK FIT: NRC2   288   0.04 (ns) 

