
 GPS week: 1099   Day: 6   MJD: 51943                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2581      0     0.01     0.03     5.25     0.00
 cod |   288     0  15586     13     2.99     0.04     0.09    31.92
 esa |   288     0  17567    286    60.10    11.34     0.09    32.02
 gfz |   288     0  13760    214     0.64    -0.71     0.08    36.06
 igp |    96     0   2294      0    -0.10     0.29     5.01     0.00
 igu |    96     0   2294      0    -0.03     0.11     3.62     0.00
 ngs |    96     0   2581      0     0.00     0.04     4.96     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igp   igu   ngs   sio |
 -----+-------------------------------------------------+
    1 |-10782   104   -42   -34-37309  6400-10023     - |
    2 |   735   157  -263   124 35090 -5941  1150     - |
    3 |  2908  -117   290  -168  5210  8928  2175     - |
    4 | -1144    10  -223   180-22130   743 -1357     - |
    5 |  5854   150  -103   -21   824  9371  5376     - |
    6 | -9944   -83    26    35 23777-12205-10330     - |
    7 | -4055   -68  -162   191-25954  -263 -4349     - |
    8 |  3684   134    -2   -85-25745 -1616  3492     - |
    9 | -5528   -22  -216   214 -7633 -9745 -5661     - |
   10 | -2598    61   -85    33 14869  2512 -2548     - |
   11 |  2943  -205   370  -179 12724  1487  2898     - |
   13 |  3839   111   128  -193 12337  3213  3545     - |
   14 |  8827     4  -130   113  5527  1959  8798     - |
   17 | -1934    37    11   -34 23401     - -1063     - |
   19 |  2611    24    59   -68     -     -  1439     - |
   20 |  5298   -77   173   -97  9790  5055  5101     - |
   21 | -4376  -151   134   -15     -     - -2768     - |
   22 |    91  -105   245  -146-13568   969   656     - |
   23 |  7825   -11    57   -44     -  3216  7138     - |
   24 | -1171    59   -54     2  6359-11777 -1599     - |
   25 |  1604  -155    -9   114 18635  1263   973     - |
   26 | -1706     1   -53    46 -9950  5798 -1752     - |
   27 | -8676    68    39   -81-41531-11176 -6496     - |
   28 |  6416   -88   170   -91  3294 -8029  6108     - |
   29 |  4298   -98   -41   107 -7606  5421  4487     - |
   30 | -3385    58  -115    57 13097 -1407 -3502     - |
   31 | -1762   -58   394  -310  5826  5375 -2017     - |
 -----+-------------------------------------------------+
 ALBH |     -    18   -18     -     -     -     -     - |
 ALGO |     -  -294   822  -469     -     -     -     - |
 AREQ |     -   -65    65     -     -     -     -     - |
 ARTU |     -    51     -   -46     -     -     -     - |
 AUCK |     -  -504  -423   714     -     -     -     - |
 BAHR |     -    51   104  -138     -     -     -     - |
 BOR1 |     -   -96    96     -     -     -     -     - |
 BRMU |     -  -110   224  -102     -     -     -     - |
 CAS1 |     -     -   -28    25     -     -     -     - |
 CRO1 |     -  -101    83    12     -     -     -     - |
 FLIN |     -  -151   151     -     -     -     -     - |
 GALA |     -    36    32   -59     -     -     -     - |
 GRAZ |     -    44   -44     -     -     -     -     - |
 GUAM |     -    42     X   -37     -     -     -     - |
 KIT3 |     -    59   -47   -10     -     -     -     - |
 KOKB |     -     -   -93    82     -     -     -     - |
 KOSG |     -   -63    63     -     -     -     -     - |
 KWJ1 |     -     -    17   -15     -     -     -     - |
 LPGS |     -   673  -671     X     -     -     -     - |
 MALI |     -     -   -31    28     -     -     -     - |
 MAS1 |     -   -38    96   -52     -     -     -     - |
 MCM4 |     -     -  -387   343     -     -     -     - |
 MDO1 |     -   -93    93     -     -     -     -     - |
 MKEA |     -   -83    83     -     -     -     -     - |
 NLIB |     -   -38    38     -     -     -     -     - |
 NRC2 |     -   562  -561     -     -     -     -     - |
 PIE1 |     -   -52    52     -     -     -     -     - |
 POTS |     -    39    51   -80     -     -     -     - |
 REYK |     -   -87    86     -     -     -     -     - |
 SANT |     -     -   168  -149     -     -     -     - |
 STJO |     -    10  -113    91     -     -     -     - |
 SUTH |     -   -31     -    27     -     -     -     - |
 TSKB |     -    33   -32     -     -     -     -     - |
 USUD |     -  -135   135     -     -     -     -     - |
 VILL |     -   578  -576     -     -     -     -     - |
 WHIT |     -   -13     -    12     -     -     -     - |
 WTZR |     -  -167   166     -     -     -     -     - |
 WUHN |     -   -21     -    18     -     -     -     - |
 YAR2 |     -   240  -239     -     -     -     -     - |
 YELL |     -   -14   -57    63     -     -     -     - |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igp   igu   ngs   sio | NEPO RMS (ns)
 -----+-------------------------------------------------+--------------
    1 |  6370    90    34    76  8974  2085  5924     - |  288   3.30
    2 |  3752   104   117   139  6275  2171  3570     - |  288   1.87
    3 |  5816   147    46    92  4703  4275  5553     - |  285   2.38
    4 |  1458   133    84   116  3770   985  1402     - |  277   0.54
    5 |  3988    87    45    40  6218  6645  3670     - |  288   2.80
    6 |  8861    78    58    51  7625  8104  8674     - |  288   7.96
    7 |  4198   199    81   140 10208  2092  3856     - |  288   1.74
    8 |  3202    82    92    82  6365  2768  3344     - |  288   3.01
    9 |  4205   105    99    30  1803  2259  4074     - |  287   1.60
   10 |  2679    90    49    43  3939  1628  2688     - |  288   2.53
   11 |  1741   115   154    97  2915   901  1600     - |  288   0.32
   13 |  1740    77    53    40  2732  1785  1598     - |  288   0.43
   14 |   810    96   105    75   772   846   790     - |  288   0.52
   17 |  9944    78    57    56  7051     - 10141     - |  288   4.76
   19 |  4470    85    97    75     -     -  4382     - |  288   2.78
   20 |  1242    69    43    55  2535  2292  1180     - |  288   0.33
   21 | 12109   151   100   168     -     - 10870     - |  287   3.90
   22 | 10038    68    66    72  2937  2946  8326     - |  288   0.53
   23 |  5198    77   126    81     -  1923  5382     - |  288   5.91
   24 |  5836    92   110    72  2563  8738  5348     - |  276   2.58
   25 |  2997    63    63    85  5808  2691  2858     - |  288   2.06
   26 |  1047   173   199    80  2498  2750   900     - |  288   0.76
   27 |  5607   106    30    75  6736  2609  5870     - |  288   3.61
   28 |  2999    76    48    77  1040  3899  2978     - |  288   0.61
   29 |  2395    95    61   101  1336  2852  1949     - |  288   0.75
   30 |  2860   151    38    99   921  1954  2772     - |  288   1.32
   31 |  3879   147   173    74  3790  3738  3830     - |  288   3.43
 -----+-------------------------------------------------+--------------
 ALBH |     -    50    49     -     -     -     -     - |  288   0.05
 ALGO |     -    21    55    39     -     -     -     - |  288   0.01
 AREQ |     -    26    26     -     -     -     -     - |  283  17.57
 ARTU |     -    35     -    31     -     -     -     - |  239  20.62
 AUCK |     -   108    50    61     -     -     -     - |  288  35.34
 BAHR |     -    43    23    28     -     -     -     - |  288   0.48
 BOR1 |     -    19    19     -     -     -     -     - |  288   2.72
 BRMU |     -    21    40    31     -     -     -     - |  288  15.23
 CAS1 |     -     -    34    30     -     -     -     - |  288  14.63
 CRO1 |     -    29    32    42     -     -     -     - |  288   0.18
 FLIN |     -   132   131     -     -     -     -     - |  286   7.38
 GALA |     -    43    36    46     -     -     -     - |  288  38.36
 GRAZ |     -    12    12     -     -     -     -     - |  288  34.45
 GUAM |     -    56     X    50     -     -     -     - |  286  24.85
 KIT3 |     -    27    25    21     -     -     -     - |  288  30.64
 KOKB |     -     -   184   164     -     -     -     - |  236   1.70
 KOSG |     -    15    15     -     -     -     -     - |  288  76.68
 KWJ1 |     -     -   146   129     -     -     -     - |  216 131.22
 LPGS |     -   388   387     X     -     -     -     - |  214  20.67
 MALI |     -     -   148   132     -     -     -     - |  269  16.17
 MAS1 |     -    29    34    45     -     -     -     - |  288   2.37
 MCM4 |     -     -   186   165     -     -     -     - |  277    >>>
 MDO1 |     -    34    34     -     -     -     -     - |  286  24.64
 MKEA |     -    65    65     -     -     -     -     - |  287  41.61
 NLIB |     -    92    92     -     -     -     -     - |  278 422.52
 NRC2 |     -    39    39     -     -     -     -     - |  288   0.06
 PIE1 |     -    62    61     -     -     -     -     - |  286   0.12
 POTS |     -    44    53    40     -     -     -     - |  266  16.02
 REYK |     -    16    16     -     -     -     -     - |  288   7.97
 SANT |     -     -    40    35     -     -     -     - |   75   5.57
 STJO |     -    45    33    48     -     -     -     - |  288   3.24
 SUTH |     -    54     -    48     -     -     -     - |  214  10.87
 TSKB |     -    83    83     -     -     -     -     - |  288   1.92
 USUD |     -    68    68     -     -     -     -     - |  287   0.26
 VILL |     -    23    23     -     -     -     -     - |  288   3.41
 WHIT |     -    50     -    44     -     -     -     - |  288  19.91
 WTZR |     -    16    16     -     -     -     -     - |  288   0.08
 WUHN |     -    51     -    45     -     -     -     - |  286  27.97
 YAR2 |     -    32    32     -     -     -     -     - |  275  13.29
 YELL |     -    14    56    54     -     -     -     - |  288   0.08
 -----+-------------------------------------------------+--------------
 TOT  |  5251    92    92    81  5013  3617  4962     - |


 BEST CLOCK FIT: ALGO   288   0.01 (ns) 

