
 GPS week: 1099   Day: 4   MJD: 51941                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2578      0     0.14    -0.12     5.53     0.00
 cod |   288     0  17786      0     2.52    -4.47     0.09    21.42
 emr |    96     0   3134      0   -88.09     3.51     0.64     0.00
 esa |   288     0  16996    303    24.90    17.63     0.13    15.12
 gfz |   288     0  14130    509    -0.41     0.94     0.07    29.24
 igp |    96     0   2482      0  -111.06   100.59    40.09     0.00
 igu |    96     0   2290      0     0.18    -0.17     5.06     0.00
 jpl |   288     0   7662    288   -10.50    17.22     0.11     0.00
 ngs |    96     0   2578      0     0.13    -0.10     5.36     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  15269    392    24.54    17.27     0.06    34.23

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igp   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------------+
    1 |-17696   180  -117    37  -104******-23146   310-14740     -   -29 |
    2 |  4583   234   223  -184   176******  2611    95  4902     -  -210 |
    3 | -2086     2   -95   268   -25******     -    95 -1997     -   -98 |
    4 | -4405     8  -321    62   143****** -5268   126 -4222     -  -153 |
    5 |  5558   109   -41   -52   141****** 10683  -378  5247     -  -158 |
    6 | -1010    49   -98  -127   144****** -4568  -250  -575     -   -93 |
    7 | -4648  -151  -109   344    77******  2433  -132 -4256     -  -129 |
    8 | -5543   115    -8   138   -72******  7317   -14 -5410     -   -64 |
    9 | -1167    67  -181   171   210******  9317  -225 -1079     -  -289 |
   10 | -3163    19   -89  -151   -92****** -2632  -278 -4210     -   134 |
   11 |  3596  -106    55   370   141****** -1700   464  3498     -  -221 |
   13 |  3401    58    31   -41  -190******  -394   297  3394     -   151 |
   14 |  4396    51    17    -4    79******  -489     8  4413     -   -94 |
   17 | -5306   112  -118  -138    52******     -  -533 -4342     -   -48 |
   19 |  8860   -17  -466   267  -126******     -   -13  6350     -     - |
   20 |  3321    67   111   177   -49******  -521   274  3288     -   -73 |
   21 |  7615     0   128     X    32******  7529   -45  5410     -   -25 |
   22 |  2083   -37    95   -41    41******  8949    23  1633     -     5 |
   23 |  -503   122  -116   168    85     -  4988  -202   -61     -  -219 |
   24 | -3990  -108  -230   191    78******-19213  -237 -4023     -   -86 |
   25 |  2455   -70  -185    83   131******  1442   199  2126     -  -107 |
   26 | -1073   105  -225    37    71******  2996  -221 -1058     -  -140 |
   27 | -3801    30  -132   138    36******   -84   -32 -3112     -  -115 |
   28 |  2870  -143   197    82  -170******-10308    96  2387     -   191 |
   29 |  -418    53  -304   119   142****** -4682   239  -341     -  -205 |
   30 |  3766    69  -204  -172   304******  7822    69  4196     -  -223 |
   31 |  2487   123   -70   349  -149******  6347   323  2616     -  -101 |
 -----+-------------------------------------------------------------------+
 ALGO |     -     9   226  -352   -82     -     -   -96     -     -   220 |
 AREQ |     -   -44     -    60  -148     -     -  -167     -     -   128 |
 ARTU |     -   -19     -     -    14     -     -     -     -     -     - |
 AUCK |     -  -157     -   176     X     -     -     X     -     -    18 |
 BAHR |     -    23     -   -33     -     -     -     -     -     -     - |
 BOR1 |     -   189     -  -268     -     -     -     -     -     -     - |
 BRMU |     -   -46     -   115  -285     -     -     -     -     -   221 |
 CAS1 |     -     -     -  -119   -21     -     -     -     -     -    71 |
 COCO |     -     -     -     -    -1     -     -     -     -     -     1 |
 CRO1 |     -   -58     -    82     -     -     -   294     -     -     - |
 DRAO |     -   -16  -121     -     -     -     -     -     -     -    10 |
 EISL |     -     -     -  -616     -     -     -     -     -     -   272 |
 FAIR |     -     -   331  -171     -     -     -     -     -     -    76 |
 FORT |     -     - -2944  -517     -     -     -     -     -     -   229 |
 GALA |     -   123     -   -26   -76     -     -   117     -     -     - |
 GRAZ |     -    -6     -     9     -     -     -     -     -     -     - |
 GUAM |     -    63     -    -4   -43     -     -    92     -     -     - |
 HOB2 |     -     -     -   -86     -     -     -     -     -     -    38 |
 KERG |     -     0     -     -     -     -     -     -     -     -     0 |
 KIT3 |     -   -19     -   -74    52     -     -     -     -     -     - |
 KOKB |     -     -   533  -168    87     -     -     -     -     -     X |
 KOSG |     -  -181     -   256     -     -     -  -224     -     -     - |
 KWJ1 |     -  -116     -  -118    83     -     -    58     -     -    57 |
 MALI |     -     -     -  -248     X     -     -     -     -     -   110 |
 MAS1 |     -    94   365  -116  -124     -     -     -     -     -    99 |
 MATE |     -   -59  2087     -     -     -     -     -     -     -    37 |
 MCM4 |     -   -12     -   616    -8     -     -     -     -     -  -286 |
 MKEA |     -   -33     -    47     -     -     -     9     -     -     - |
 NLIB |     -  -186     -     -     -     -     -     -     -     -   117 |
 OHIG |     -    -4     -   259  -131     -     -     -     -     -     - |
 PIE1 |     -  -214 -1902  -278     -     -     -     -     -     -   256 |
 POTS |     -    28     -     4   -22     -     -     -     -     -     - |
 REYK |     -     4     -    -5     -     -     -     -     -     -     - |
 SANT |     -     -     -    53   -28     -     -     -     -     -     X |
 STJO |     -   -50  4801     -    37     -     -     -     -     -     - |
 SUTH |     -     1     -     -    -1     -     -   -54     -     -     - |
 THTI |     -  -203     -     -     -     -     -   -42     -     -   127 |
 THU1 |     -    -9     -     -     -     -     -     -     -     -     6 |
 TSKB |     -    60 -1647  -149     -     -     -    58     -     -    28 |
 USNO |     -    37  2820  -337     -     -     -     -     -     -   126 |
 USUD |     -   -81 -4229   115     -     -     -     -     -     -     - |
 VILL |     -   204     -  -289     -     -     -     -     -     -     - |
 WHIT |     -    55     -     -   -40     -     -     -     -     -     - |
 WSRT |     -   -58     -     -     -     -     -     -     -     -    36 |
 WTZR |     -   -28     -  -185     -     -     -     -     -     -    99 |
 WUHN |     -  -218     -     -   -83     -     -   -77     -     -   207 |
 YAR2 |     -     - -1252   -45     -     -     -     -     -     -    20 |
 YELL |     -    49    70  -135    34     -     -   -33     -     -     - |
 ZWEN |     -     -     -     -  -301     -     -     -     -     -   257 |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igp   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------------+--------------
    1 |  8605    89   547    93    32 42968 13156    42  8291     -    51 |  288   4.32
    2 |  7765   106   577   142    57 41473  5948    65  7374     -    59 |  288   1.64
    3 |  3539   165   404   254   111 40621     -   128  3615     -   120 |  288   2.12
    4 |  1225   119   655   121    62 36004  2216   171  1218     -    59 |  278   0.52
    5 |  6191   147   587   124    45 40035  7886   112  6165     -    33 |  288   2.78
    6 |  7954    90   606    61    82 39468  3771   108  8531     -    61 |  288   7.61
    7 |  2550    58   730   152    76 42163  2106    64  2323     -    47 |  288   1.98
    8 |  4158    69   515   111    38 41797  2935    65  4368     -    92 |  288   1.62
    9 |  2460    82   487   103    49 40461  3658    52  2452     -    67 |  288   1.71
   10 |  7331   184   565    69    57 40296  3597   148  7083     -    55 |  288   1.73
   11 |  1014    92   570   160    63 40403  1177   156   958     -    65 |  288   0.35
   13 |  1631    68   875    49    49 40591   571    72  1362     -    45 |  288   0.26
   14 |  1254   195   557   129   100 40410   845    47  1048     -    41 |  288   0.34
   17 |  6535    79   812   151    51 40006     -    38  6249     -    35 |  288   3.56
   19 |  9926    68   546    96    81 41595     -    59  8815     -     - |  288   4.13
   20 |  1063   128   462   110    28 40577   523    54   871     -    26 |  288   0.23
   21 |  8567   110   620     X   195 38174  4378   102  7907     -   127 |  272   3.70
   22 |  3156   137   520    69   115 40666  5361    76  2889     -    28 |  288   0.62
   23 |  9311   131   493   231    52     -  4694    49  9423     -    55 |  288   6.56
   24 |  8403    87   488    98    36 35451 11279   201  7635     -    24 |  277   1.87
   25 |  5587    94   480   232    87 40006  2620    75  5963     -    42 |  288   2.45
   26 |  1480   177   562    56    41 40297  1558   100  1404     -   120 |  288   0.56
   27 |  3191    80   531    94    72 40038  3591    33  3230     -    74 |  288   3.24
   28 |  4946    58   618   145    40 40897  4921    74  4947     -    59 |  288   1.11
   29 |  1032   147   670   120    83 40450  2337    75   862     -    47 |  288   0.61
   30 |  5227    89   591    43    48 40874  4165    77  4870     -    31 |  288   1.22
   31 |  4537    64   494   157    69 40706  5159   158  4418     -    94 |  288   3.58
 -----+-------------------------------------------------------------------+--------------
 ALGO |     -    91   688   101    39     -     -    25     -     -    17 |  288   0.02
 AREQ |     -    80     -   104    56     -     -    40     -     -    36 |  288  29.04
 ARTU |     -    28     -     -    21     -     -     -     -     -     - |  283  23.69
 AUCK |     -    88     -   160     X     -     -     X     -     -    42 |  288  32.96
 BAHR |     -    69     -    98     -     -     -     -     -     -     - |  287   0.94
 BOR1 |     -    29     -    41     -     -     -     -     -     -     - |  287   3.96
 BRMU |     -    80     -    38    52     -     -     -     -     -    16 |  288  19.59
 CAS1 |     -     -     -   149    32     -     -     -     -     -    55 |  288  11.39
 COCO |     -     -     -     -    15     -     -     -     -     -    13 |  288  13.74
 CRO1 |     -    51     -    72     -     -     -    65     -     -     - |  280   0.16
 DRAO |     -    15   862     -     -     -     -     -     -     -     9 |  287   0.02
 EISL |     -     -     -    92     -     -     -     -     -     -    41 |  288  66.75
 FAIR |     -     -   519   295     -     -     -     -     -     -   130 |  172   0.25
 FORT |     -     -   974   183     -     -     -     -     -     -    81 |  143   0.11
 GALA |     -    68     -    37    38     -     -    69     -     -     - |  281  33.80
 GRAZ |     -    67     -    95     -     -     -     -     -     -     - |  283  50.22
 GUAM |     -   106     -   128    55     -     -    60     -     -     - |  288  22.84
 HOB2 |     -     -     -   111     -     -     -     -     -     -    49 |  288   0.09
 KERG |     -    94     -     -     -     -     -     -     -     -    59 |  257    >>>
 KIT3 |     -   147     -   245    53     -     -     -     -     -     - |  286  65.22
 KOKB |     -     -  1374   244   126     -     -     -     -     -     X |  174   2.85
 KOSG |     -    20     -    28     -     -     -    68     -     -     - |  287  17.75
 KWJ1 |     -   158     -   204   222     -     -   242     -     -   117 |  266  93.01
 MALI |     -     -     -   175     X     -     -     -     -     -    77 |  190    >>>
 MAS1 |     -   105   523    36    48     -     -     -     -     -    39 |  288   1.68
 MATE |     -    19   578     -     -     -     -     -     -     -    12 |  287   0.13
 MCM4 |     -    87     -   115    63     -     -     -     -     -    51 |  288   8.78
 MKEA |     -    59     -    83     -     -     -    93     -     -     - |  281  36.35
 NLIB |     -    61     -     -     -     -     -     -     -     -    38 |  288   0.05
 OHIG |     -    97     -   120    42     -     -     -     -     -     - |  288  40.81
 PIE1 |     -   108  1277   145     -     -     -     -     -     -    21 |  288   0.02
 POTS |     -    50     -    48    49     -     -     -     -     -     - |  277  17.29
 REYK |     -    53     -    76     -     -     -     -     -     -     - |  274   9.15
 SANT |     -     -     -   167    87     -     -     -     -     -     X |  177   5.50
 STJO |     -    25   501     -    18     -     -     -     -     -     - |  281   2.93
 SUTH |     -    59     -     -    43     -     -    75     -     -     - |  235  12.05
 THTI |     -    63     -     -     -     -     -    46     -     -    39 |  283   2.29
 THU1 |     -    87     -     -     -     -     -     -     -     -    55 |  287  16.81
 TSKB |     -    80   514   145     -     -     -    40     -     -    29 |  288   1.25
 USNO |     -    90   346   120     -     -     -     -     -     -    15 |  288   0.02
 USUD |     -    73   366   103     -     -     -     -     -     -     - |  287   0.26
 VILL |     -    21     -    29     -     -     -     -     -     -     - |  288   4.48
 WHIT |     -    14     -     -    10     -     -     -     -     -     - |  287  13.36
 WSRT |     -    19     -     -     -     -     -     -     -     -    12 |  287   0.03
 WTZR |     -    60     -    74     -     -     -     -     -     -    17 |  287    >>>
 WUHN |     -   133     -     -    76     -     -    69     -     -    26 |  287  19.98
 YAR2 |     -     -   607    65     -     -     -     -     -     -    29 |  156 380.91
 YELL |     -    58   629   217    73     -     -   238     -     -     - |  287   0.05
 ZWEN |     -     -     -     -    91     -     -     -     -     -    78 |  253    >>>
 -----+-------------------------------------------------------------------+--------------
 TOT  |  5534    94   637   131    72 40085  5064   105  5356     -    58 |


 BEST CLOCK FIT: PIE1   288   0.02 (ns) 

