
 GPS week: 1098   Day: 6   MJD: 51936                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2672      0     0.23    -0.38     5.30     0.00
 cod |   288     0  16922     32    -2.90     6.42     0.11    23.44
 emr |    96     0   3476    265   681.27    14.44     0.17    13.62
 esa |   288     0  18173    566    88.11    11.64     0.13    19.86
 gfz |   288     0  14547     18     0.21    -0.99     0.11    24.20
 igp |    96     0   2480      0     0.20    -0.23     6.07     0.00
 igu |    96    96      0      0     0.00     0.00     0.00     0.00
 jpl |   288     0   8076    644    -1.43    11.45     0.14     0.00
 ngs |    96     0   2672      0     0.22    -0.37     5.01     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  15711    553   329.33     2.41     0.14    18.88

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igp   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------------+
    1 | -8276   188   -46     6  -157-10897     -   198 -7863     -    18 |
    2 | -1552   355    -2  -154    26  5536     -   -14 -1908     -  -246 |
    3 | -5027  -121  -246    34   121-36569     -  -155 -3812     -     8 |
    4 |  -324    41   -98    15   218-15114     -   -58  -108     -  -317 |
    5 |  2587    87    36   -29    44 30688     -   -81  2011     -  -119 |
    6 | -1510   -61   102   -99   109 14847     -    35  -417     -    -3 |
    7 | -1722     3   -89  -339   179-49271     -   -37 -1596     -   193 |
    8 |  4577   253  -354   -48    96-20867     -  -114  4685     -  -239 |
    9 | -4325    64   411    46   128-12882     -  -152 -4190     -  -376 |
   10 | -1907    68    69  -112   130 11645     -    23 -1834     -  -135 |
   11 |  9534    42  -306   165    96 19482     -   376  8876     -  -264 |
   13 |  1317    29  -117    88  -139  9362     -  -142  1295     -    77 |
   14 |    17    42     X    73   -97  7411     -    90   114     -     X |
   15 |  -244   132  -299     -  -157     -     -   190  -620     -   141 |
   17 | -3187    75    90     X   -62 -2988     -  -284 -1584     -   -19 |
   19 | 12488    64   -78    28   -60 30626     -   -22  9517     -     - |
   20 |  4978   189  -291    98  -170  9921     -   372  5031     -   -27 |
   21 |  5358    37    45     0  -133 16891     -   110  4064     -   124 |
   22 |  -980   -61   244   -58   -83 -7706     -   367  -933     -   178 |
   23 |  5106   161     X   119  -133     -     -    56  4514     -  -118 |
   24 | -9922   -38   224   -36   118-21785     -  -352 -9010     -  -130 |
   25 | -1164  -122  -244    75   121  8291     -   205 -1125     -   -47 |
   26 | -5096   159   257     X    39-20519     -  -320 -4786     -  -288 |
   27 |  1351   146  -231   -95   134 24115     -   -89   606     -  -159 |
   28 |  4457  -139    52    25   -87  8558     -  -217  4267     -   226 |
   29 | -2853    80   -23    46   -30-15175     -   114 -2177     -   -82 |
   30 | -3698   -38  -113    92   127-10038     -   -82 -3068     -  -194 |
   31 |  -596    67  -326   189    50 24873     -  -106  -452     -  -257 |
 -----+-------------------------------------------------------------------+
 ALBH |     -  -133     -   157     -     -     -     -     -     -     - |
 ALGO |     -  -194     -   590  -297     -     -  -223     -     -     - |
 AREQ |     -  -146     -    15   -71     -     -  -106     -     -   214 |
 ARTU |     -    33     -     -   -32     -     -     -     -     -     - |
 AUCK |     -   -20     -   -58     -     -     - -1333     -     -    82 |
 BAHR |     -   -21     -    25     -     -     -     -     -     -     - |
 BOR1 |     -   184     -  -217     -     -     -     -     -     -     - |
 BRMU |     -  -158     -    38     -     -     -     -     -     -   155 |
 CAS1 |     -     -     -    15  -126     -     -     -     -     -   146 |
 COCO |     -     -     -     -   -86     -     -     -     -     -   110 |
 CRO1 |     -   -28     -    33     -     -     -   131     -     -     - |
 DAV1 |     -     -     -     -   529     -     -     -     -     -  -678 |
 DRAO |     -   -54    36     -     -     -     -     -     -     -    59 |
 EISL |     -  -180     -  -225     -     -     -     -     -     -   316 |
 FAIR |     -   125    79  -193     -     -     -    98     -     -   139 |
 FLIN |     -    -7     -     9     -     -     -     -     -     -     - |
 FORT |     -     -   239  -616     -     -     -     -     -     -   355 |
 GALA |     -   117     -   -77   -31     -     -   174     -     -     - |
 GUAM |     -  -109     -    56   -60     -     -   182     -     -   151 |
 HOB2 |     -     -     -  -120     -     -     -     -     -     -   126 |
 KERG |     -     6     -     -     -     -     -     -     -     -    -8 |
 KOKB |     -     X     X    93   -76     -     -     X     -     -     X |
 KOSG |     -    -9     -    10     -     -     -   -71     -     -     - |
 KWJ1 |     -     -     -   -33    31     -     -   105     -     -     2 |
 MAC1 |     -     -     -    27   -22     -     -     -     -     -     - |
 MALI |     -     -     -   -90  -163     -     -     -     -     -   301 |
 MCM4 |     -   -28     -   327  -237     -     -     -     -     -    -7 |
 MDO1 |     -   -61   193    28     -     -     -   255     -     -     - |
 MKEA |     -   -53     -    62     -     -     -     -     -     -     - |
 NLIB |     -  -159     -     -     -     -     -     -     -     -   197 |
 NRC2 |     -  -152     -   325  -120     -     -     -     -     -     - |
 OHIG |     -   -66     -  -105  -103     -     -     -     -     -   311 |
 ONSA |     -   -36   165    41  -151     -     -     -     -     -   155 |
 PIE1 |     -  -253     -    69     -     -     -     -     -     -   240 |
 POTS |     -    63     -   -64   -81     -     -     -     -     -    94 |
 REYK |     -  -153     -   180     -     -     -    13     -     -     - |
 SANT |     -     -     -   -29     -     -     -     -     -     -    31 |
 SEY1 |     -     -     -  -101    83     -     -     -     -     -     - |
 STJO |     -   -55   282  -121   100     -     -     -     -     -     - |
 THTI |     -    57     -     -     -     -     -  -327     -     -   -71 |
 THU1 |     -  -103     -     -     -     -     -  -144     -     -   128 |
 TSKB |     -   -31   108   -25    15     -     -     -     -     -    20 |
 USNO |     -   -54     -  -115     -     -     -     -     -     -   188 |
 USUD |     -   -20     -    24     -     -     -   -73     -     -     - |
 VILL |     -   161     -  -190     -     -     -     -     -     -     - |
 WHIT |     -    26     -     -   -25     -     -     -     -     -     - |
 WSRT |     -   -47     -     -     -     -     -     -     -     -    58 |
 WTZR |     -    12     -  -148     -     -     -     -     -     -   141 |
 YELL |     -   -21   191   -14    -3     -     -   -25     -     -     - |
 YSSK |     -    72     -     -   -70     -     -     -     -     -     - |
 ZWEN |     -     -     -     -   526     -     -     -     -     -  -674 |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igp   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------------+--------------
    1 |  5191    96    96   113    39  5370     -   130  5724     -    96 |  275   3.96
    2 |  3687   175   256    75    61  2952     -    60  3221     -    66 |  288   2.82
    3 |  7885    93   162    61    91  2390     -    99  7797     -    47 |  288   1.89
    4 |  1726    77    92   149    53  4355     -    90  1759     -    93 |  288   0.79
    5 |  7268    40    43   102    46  4657     -    50  6403     -    55 |  288   4.82
    6 | 12665   149   265   198   175 10217     -    70 11960     -   153 |  288   7.50
    7 |  1205   165    99    84    90 12807     -   109  1236     -   326 |  288   1.35
    8 |  3027    60   198    34   105  6381     -    58  3128     -    70 |  288   3.18
    9 |  2270   117   124   301    86  2520     -    93  2253     -   338 |  288   2.17
   10 |  1877   121    68    69    78  3110     -    86  1861     -    46 |  288   1.33
   11 |  2721    94   110    43   116  4747     -    42  2429     -   108 |  288   0.45
   13 |  1883   119    99    84    49  1179     -   291  1846     -    77 |  288   0.39
   14 |  1259   211     X   109   122  1956     -   159  1243     -     X |  288   0.36
   15 |  4609   244   257     -   234     -     -   149  3733     -   305 |  287   2.21
   17 | 12483   197   244     X    73  6867     -    95 11825     -   177 |  269   4.90
   19 | 10036   277   388   138   187 18002     -   145  9099     -     - |  285   4.92
   20 |  1395    81   125   116    73   738     -    72  1310     -    74 |  288   0.21
   21 |  3683   245   171   215   298  6653     -   313  3450     -   278 |  288   2.62
   22 |   897    87   280   136    62  2414     -   175   963     -   161 |  288   0.44
   23 |  4918   187     X   368    86     -     -   169  4839     -   156 |  288   5.08
   24 |  2184   150   131   126   110  4254     -   101  2258     -    73 |  288   1.62
   25 |  2853    87   136   100    78  2170     -   163  2805     -    50 |  288   1.69
   26 |   659    81   194     X    55  4875     -   178   687     -    77 |  277   0.83
   27 |  8658   123    63    72    65  4895     -    85  8478     -   102 |  288   4.70
   28 |  2874    90   194    60    69  1103     -    63  2567     -    48 |  288   0.47
   29 |  1975   189   162   152    75  5239     -   503  1488     -    86 |  277   0.55
   30 |  4194    60   101   149    56  1330     -    73  3593     -   172 |  288   1.21
   31 |  3263   101    55   159    77  3293     -    64  3206     -    67 |  288   2.97
 -----+-------------------------------------------------------------------+--------------
 ALBH |     -    48     -    57     -     -     -     -     -     -     - |  288   0.10
 ALGO |     -    94     -    50    57     -     -    57     -     -     - |  288   0.03
 AREQ |     -   185     -    88    52     -     -   125     -     -   124 |  288  30.12
 ARTU |     -    44     -     -    43     -     -     -     -     -     - |  287  18.27
 AUCK |     -    74     -    78     -     -     -   105     -     -    40 |  288  18.15
 BAHR |     -    35     -    41     -     -     -     -     -     -     - |  288   0.45
 BOR1 |     -    35     -    41     -     -     -     -     -     -     - |  288   2.57
 BRMU |     -    70     -   121     -     -     -     -     -     -    49 |  288  15.48
 CAS1 |     -     -     -    37    42     -     -     -     -     -    60 |  288  10.80
 COCO |     -     -     -     -    48     -     -     -     -     -    62 |  288  13.11
 CRO1 |     -    76     -    90     -     -     -    58     -     -     - |  280   0.12
 DAV1 |     -     -     -     -    39     -     -     -     -     -    50 |  277  14.01
 DRAO |     -    38    88     -     -     -     -     -     -     -    31 |  288   0.31
 EISL |     -   210     -    83     -     -     -     -     -     -    85 |  288  26.21
 FAIR |     -   209   188   211     -     -     -   206     -     -   283 |  286   0.32
 FLIN |     -    56     -    66     -     -     -     -     -     -     - |  288  10.75
 FORT |     -     -   187   172     -     -     -     -     -     -   133 |  172   0.17
 GALA |     -    92     -    47    57     -     -    98     -     -     - |  288  36.70
 GUAM |     -    52     -   100   103     -     -    43     -     -   226 |  288  25.66
 HOB2 |     -     -     -    29     -     -     -     -     -     -    30 |  288   0.15
 KERG |     -    42     -     -     -     -     -     -     -     -    52 |  281    >>>
 KOKB |     -     X     X   299   246     -     -     X     -     -     X |  193  10.05
 KOSG |     -    29     -    34     -     -     -    57     -     -     - |  288  58.73
 KWJ1 |     -     -     -   174   148     -     -   215     -     -   222 |  252 150.62
 MAC1 |     -     -     -    32    26     -     -     -     -     -     - |  288  20.24
 MALI |     -     -     -   185   286     -     -     -     -     -   181 |  235  18.78
 MCM4 |     -    69     -   396   199     -     -     -     -     -   110 |  288  15.89
 MDO1 |     -    47   112    62     -     -     -    61     -     -     - |  288  23.40
 MKEA |     -    72     -    85     -     -     -     -     -     -     - |  224  47.44
 NLIB |     -    23     -     -     -     -     -     -     -     -    29 |  283   0.03
 NRC2 |     -    95     -    56    53     -     -     -     -     -     - |  288   0.03
 OHIG |     -   232     -    70   112     -     -     -     -     -   107 |  288  76.73
 ONSA |     -    49    74    45    31     -     -     -     -     -    72 |  288   0.11
 PIE1 |     -    49     -    71     -     -     -     -     -     -    30 |  288   0.04
 POTS |     -   137     -   111   149     -     -     -     -     -   103 |  277  14.60
 REYK |     -    35     -    41     -     -     -    80     -     -     - |  180   7.62
 SANT |     -     -     -   131     -     -     -     -     -     -   138 |  135   7.99
 SEY1 |     -     -     -    59    48     -     -     -     -     -     - |  232  30.14
 STJO |     -    87    99    91    40     -     -     -     -     -     - |  288   2.31
 THTI |     -   275     -     -     -     -     -   326     -     -   341 |  175   1.76
 THU1 |     -    71     -     -     -     -     -    79     -     -    88 |  253  13.43
 TSKB |     -    52   141    64    56     -     -     -     -     -    29 |  288   1.18
 USNO |     -    53     -    84     -     -     -     -     -     -    41 |  288   0.02
 USUD |     -    61     -    72     -     -     -    86     -     -     - |  285   0.28
 VILL |     -    39     -    46     -     -     -     -     -     -     - |  276   7.89
 WHIT |     -    61     -     -    59     -     -     -     -     -     - |  288  15.04
 WSRT |     -    34     -     -     -     -     -     -     -     -    43 |  288   0.03
 WTZR |     -    28     -    69     -     -     -     -     -     -    56 |  288   0.11
 YELL |     -    43   143    40    34     -     -    79     -     -     - |  288   0.03
 YSSK |     -    42     -     -    41     -     -     -     -     -     - |  279  18.37
 ZWEN |     -     -     -     -    53     -     -     -     -     -    68 |  288  17.62
 -----+-------------------------------------------------------------------+--------------
 TOT  |  5296   113   166   130   109  6070     -   136  5008     -   136 |


 BEST CLOCK FIT: USNO   288   0.02 (ns) 

