
 GPS week: 1098   Day: 3   MJD: 51933                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2676      0     0.03    -0.16     4.64     0.00
 cod |   288     0  19545    144     1.94    -1.00     0.10    28.70
 esa |   288     0  18195    249    46.47    10.95     0.14    19.99
 gfz |   288     0  14732      0     0.04    -0.17     0.09    32.98
 igp |    96     0   2485      0     0.10    -0.33     5.06     0.00
 igu |    96     0   2389      0     0.01    -0.13     4.11     0.00
 jpl |   288     0   8185    326     1.65     2.46     0.19     0.00
 ngs |    96     0   2676      0     0.03    -0.13     4.62     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  15597    832   315.28     1.18     0.15    18.33

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igp   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |  3394   162   -26   -29 23939  6306   296  2743     -  -175 |
    2 | -1017    19     7   130 11233  1501  -333 -1003     -  -270 |
    3 | -2834     8    54    10-13993   169    71 -1677     -   -90 |
    4 | -3125    39   182   169 -8264  1525  -117 -3230     -  -547 |
    5 | -4652     0    23  -100 17257-20127  -334 -3846     -   155 |
    6 |  3788    -4   -84     4 14315 18102  -166  3588     -    91 |
    7 | -1520   -34    47    98-18882 -1003  -141 -1350     -  -179 |
    8 | -1405   183    24   116-12574  8759  -169 -1510     -  -505 |
    9 |  1992   -68    98    44 -3279  1184  -302  1843     -   -86 |
   10 | -2351   184   184   -49  8898   -10  -297 -2475     -  -385 |
   11 |  3332  -228   532  -117 -2293  1132   342  3711     -   -41 |
   13 |  3798   233   107   -52 12132 -7335   395  3419     -  -372 |
   14 |  6891   -83  -180   106  9781 -2273   -33  6755     -   141 |
   15 | -7171    32     -   -55     -     -  -148 -7347     -    50 |
   17 |  4834   -38   -11   101  6201  3161  -471  4194     -  -113 |
   19 |  1941   138  -380   111  7494 10023   186   650     -     - |
   20 |  7993   120    27  -128 11371  1098   186  8091     -    28 |
   21 |  6123    53  -187   -19 -1595     -     2  4784     -   157 |
   22 | -7668   -18    31  -149-27671 -2537    97 -6910     -   256 |
   23 |  5087    82    47  -157     -     -  -144  4469     -   108 |
   24 |  1613    81   -79   201 10152 -1386  -235  1787     -  -399 |
   25 |   -35  -127   -55     7 -8908  4191   236  -134     -   237 |
   26 | -3364   -63   730  -145-17232 -2852  -353 -3164     -  -186 |
   27 | -8618   184   -46   265  4945 -9341   127 -7535     -  -707 |
   28 |  1518  -187     6    89 -6953  5128    46  2570     -   118 |
   29 |  1482   -42  -324   262-11905-12696    46  1400     -  -124 |
   30 | -2991   -51   -96   112 13848 -6388   -74 -3253     -   -20 |
   31 | -7032    93    61   -62-18067  3292   -77 -6592     -   -96 |
 -----+-------------------------------------------------------------+
 ALBH |     -   -94   136     -     -     -     -     -     -     - |
 ALGO |     -  -116   446  -170     -     -   -88     -     -     - |
 AOML |     -  -136     -     -     -     -     -     -     -   213 |
 AREQ |     -     4   -55   -43     -     -   -92     -     -   128 |
 ARTU |     -    64     -   -56     -     -     -     -     -     - |
 AUCK |     -   -73    89     -     -     -     X     -     -    17 |
 BAHR |     -    95  -314     -     -     -     -     -     -   199 |
 BOR1 |     -   -20    28     -     -     -     -     -     -     - |
 BRMU |     -  -104    45     -     -     -     -     -     -   101 |
 CAS1 |     -    -4     9    -3     -     -     -     -     -     3 |
 COCO |     -   122     -  -107     -     -     -     -     -     2 |
 CRO1 |     -   -32    46     -     -     -   129     -     -     - |
 DAV1 |     -   172     -  -150     -     -     -     -     -     X |
 DRAO |     -   -77     -     -     -     -     -     -     -   120 |
 EISL |     -     -  -227     -     -     -     -     -     -   247 |
 FAIR |     -     X  -116     -     -     -   -79     -     -   127 |
 FLIN |     -   -32    46     -     -     -     -     -     -     - |
 GALA |     -   -26  -182   -20     -     -   118     -     -   268 |
 GRAZ |     -  -290   635     -     -     -     -     -     -  -196 |
 GUAM |     -    64   -76  -105     -     -    10     -     -   172 |
 HOB2 |     -    12  -144     -     -     -     -     -     -   138 |
 IISC |     -     -  -392     -     -     -   453     -     -   427 |
 KOKB |     -     X    59   -36     -     -  -120     -     -     X |
 KOSG |     -   -68    98     -     -     -   -82     -     -     - |
 KWJ1 |     -     -    59   -68     -     -   417     -     -    44 |
 MAC1 |     -   -21    24     4     -     -     -     -     -     - |
 MALI |     -     -   -70    52     -     -   314     -     -   -20 |
 MATE |     -   -41     -     -     -     -     -     -     -    65 |
 MAW1 |     -   130     -  -113     -     -     -     -     -     - |
 MCM4 |     -   -10  -215   105     -     -     -     -     -     X |
 MDO1 |     -    58   -83     -     -     -     -     -     -     - |
 MKEA |     -    21   -31     -     -     -     -     -     -     - |
 NRC2 |     -   140  -340    85     -     -     -     -     -     - |
 ONSA |     -     5    22   -17     -     -     -     -     -     - |
 PERT |     -     4    -5     -     -     -     -     -     -     - |
 POTS |     -    80    89  -124     -     -     -     -     -     - |
 REYK |     -  -214   307     -     -     -    77     -     -     - |
 SEY1 |     -     -  -104    63     -     -     -     -     -     - |
 STJO |     -    -1  -255   155     -     -   -58     -     -     - |
 TSKB |     -    83  -166   -19     -     -   -62     -     -    85 |
 USNO |     -   -29  -155     -     -     -     -     -     -   215 |
 USUD |     -   -96   138     -     -     -     -     -     -     - |
 VILL |     -    86  -123     -     -     -     -     -     -     - |
 WHIT |     -   -31     -    27     -     -     -     -     -     - |
 WSRT |     -   -56     -     -     -     -     -     -     -    88 |
 WTZR |     -  -121    -4     -     -     -     -     -     -   194 |
 WUHN |     -    41     -  -198     -     -     6     -     -   293 |
 YAR2 |     -     -    92     -     -     -     -     -     -  -100 |
 YELL |     -  -137   133     3     -     -     -     -     -    63 |
 YSSK |     -   -35     -    31     -     -     -     -     -     - |
 ZWEN |     -     -     -   -86     -     -     -     -     -   154 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igp   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  7042   124   151    87  5180  3521   140  6993     -   131 |  276   4.57
    2 |  3303    36    55    74  2002  1980    66  3269     -    90 |  288   1.91
    3 |  4193    92    63    44  1505  2469   111  3780     -    33 |  288   1.22
    4 |  1752   139   123    97  3777  1093   145  1673     -    68 |  288   0.83
    5 |  6435    40    65    30  3304  9524   100  6263     -    90 |  288   2.83
    6 |  9421    58    59    47 10940  6791   165  9387     -    43 |  288   8.54
    7 |   911   132    71   100  8210   692   124  1256     -    56 |  288   0.61
    8 |  3572   148    87    98  5996  4267   143  3525     -   375 |  288   3.12
    9 |  2061   103    80    34  3194  2945   158  1941     -    63 |  288   2.14
   10 |  1850   163    41    75  2252  1883   212  1947     -   125 |  288   1.98
   11 |  1395   137   166    74  1140   926   157  1279     -    59 |  288   0.39
   13 |  1134   157   130    54  2131  2415    83  1095     -   380 |  288   0.26
   14 |   806   105    62    36   833   541   159   939     -    83 |  288   0.40
   15 |  5310    78     -    53     -     -   161  5840     -    46 |  287   3.02
   17 |  5355   125    60    87  9450  7651   230  5691     -   208 |  288   3.82
   19 |  5677    64   324   158  6347  7070    86  5962     -     - |  288   3.55
   20 |  1279   181   117    74  1586  1611   116  1269     -    90 |  288   0.49
   21 | 10098    63   200   108  9985     -   120  9914     -    76 |  288   3.72
   22 |  3445   153   109    66  7457  2829   124  2965     -    35 |  288   0.41
   23 |  6614    67   211    43     -     -    86  6478     -   130 |  288   5.45
   24 |  5293   195   226   139  2720  3611   134  5755     -    65 |  288   2.27
   25 |  3721   105    54    54  2836  2981    75  3769     -   125 |  288   2.60
   26 |  1594   294   361   187  4076  1643   193  1417     -   206 |  277   0.83
   27 |  3667   156   174    46  4354  5282   108  4166     -    70 |  288   3.01
   28 |  5862    88    45    43  4076  2265    96  5014     -    76 |  288   0.45
   29 |  1998   127   342   147  1952  5308   100  2121     -    56 |  277   1.44
   30 |  4310    61   155    53  1123  3668    91  4116     -   126 |  288   1.01
   31 |  3271   185    57   129  2961  3185    95  2754     -    51 |  288   2.01
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    18    26     -     -     -     -     -     -     - |  288   0.08
 ALGO |     -    41    38    36     -     -    60     -     -     - |  288   0.04
 AOML |     -    30     -     -     -     -     -     -     -    47 |  277  27.78
 AREQ |     -    82   419   107     -     -   105     -     -   321 |  276    >>>
 ARTU |     -    44     -    39     -     -     -     -     -     - |  282  18.74
 AUCK |     -    48    66     -     -     -     X     -     -    39 |  288  19.53
 BAHR |     -   107   204     -     -     -     -     -     -   396 |  288   0.52
 BOR1 |     -    42    60     -     -     -     -     -     -     - |  287   2.25
 BRMU |     -    54    80     -     -     -     -     -     -    52 |  288  18.99
 CAS1 |     -   121    77    17     -     -     -     -     -   159 |  223  12.27
 COCO |     -   125     -    42     -     -     -     -     -   151 |  288  15.39
 CRO1 |     -    16    24     -     -     -    66     -     -     - |  270   0.14
 DAV1 |     -    57     -    50     -     -     -     -     -     X |  250  15.98
 DRAO |     -    44     -     -     -     -     -     -     -    69 |  288   0.03
 EISL |     -     -   114     -     -     -     -     -     -   125 |  288  28.62
 FAIR |     -     X    91     -     -     -   142     -     -    99 |  258   0.23
 FLIN |     -    98   140     -     -     -     -     -     -     - |  286   8.18
 GALA |     -   187   144    84     -     -   129     -     -    86 |  280  32.97
 GRAZ |     -   169   187     -     -     -     -     -     -    80 |  287 114.38
 GUAM |     -    82    49    49     -     -    70     -     -    42 |  288  25.51
 HOB2 |     -    50    47     -     -     -     -     -     -    37 |  288   0.06
 IISC |     -     -   129     -     -     -   278     -     -   141 |  214  51.03
 KOKB |     -     X   288   174     -     -   323     -     -     X |  253   1.54
 KOSG |     -    33    48     -     -     -    66     -     -     - |  287 108.08
 KWJ1 |     -     -   226   277     -     -   690     -     -   399 |  248  86.20
 MAC1 |     -    62    56    28     -     -     -     -     -     - |  288  14.61
 MALI |     -     -   201   125     -     -   337     -     -   101 |  270  35.20
 MATE |     -    55     -     -     -     -     -     -     -    86 |  275   0.12
 MAW1 |     -    66     -    57     -     -     -     -     -     - |  287  18.31
 MCM4 |     -    87    64    64     -     -     -     -     -     X |  285  52.24
 MDO1 |     -    47    67     -     -     -     -     -     -     - |  268  34.41
 MKEA |     -    50    72     -     -     -     -     -     -     - |  265  48.62
 NRC2 |     -    40    50    40     -     -     -     -     -     - |  288   0.03
 ONSA |     -    64    36    58     -     -     -     -     -     - |  288   0.20
 PERT |     -   121   174     -     -     -     -     -     -     - |  278    >>>
 POTS |     -    53    31    52     -     -     -     -     -     - |  277  16.03
 REYK |     -   102   146     -     -     -    84     -     -     - |  276  13.00
 SEY1 |     -     -   164   100     -     -     -     -     -     - |  186  25.44
 STJO |     -    31    93    70     -     -    83     -     -     - |  288   3.11
 TSKB |     -    43    50    24     -     -    87     -     -    42 |  288   1.00
 USNO |     -    26    27     -     -     -     -     -     -    51 |  288   0.03
 USUD |     -    23    33     -     -     -     -     -     -     - |  288   0.23
 VILL |     -    19    28     -     -     -     -     -     -     - |  288   3.06
 WHIT |     -    52     -    45     -     -     -     -     -     - |  286  10.43
 WSRT |     -    44     -     -     -     -     -     -     -    68 |  287   0.04
 WTZR |     -    37    55     -     -     -     -     -     -    97 |  288   0.08
 WUHN |     -    71     -    65     -     -    77     -     -    27 |  287  23.64
 YAR2 |     -     -   121     -     -     -     -     -     -   132 |  166 433.87
 YELL |     -    73   129   131     -     -     -     -     -   207 |  288   0.08
 YSSK |     -    19     -    16     -     -     -     -     -     - |  287  14.88
 ZWEN |     -     -     -    37     -     -     -     -     -    67 |  288  14.35
 -----+-------------------------------------------------------------+--------------
 TOT  |  4644   100   140    88  5062  4111   187  4616     -   146 |


 BEST CLOCK FIT: NRC2   288   0.03 (ns) 

