
 GPS week: 1098   Day: 2   MJD: 51932                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2578      0    -0.03     0.02     4.13     0.00
 cod |   288     0  18925    113     3.38    -5.88     0.10    23.00
 emr |    96     0   3463    240   622.66    15.31     0.18    10.35
 esa |   288     0  17631    585    33.06    15.16     0.14    15.99
 gfz |   287     0  14162      0    -0.82     0.34     0.09    27.87
 igp |    96     0   2388      0     0.52    -0.38     4.39     0.00
 igu |    96     0   2196      0     0.51    -0.45     3.45     0.00
 jpl |   288     0   8456    233    -8.13    22.81     0.16     0.00
 ngs |    96     0   2578      0     0.01     0.00     3.95     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  15305    253   310.03     5.87     0.10    22.79

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igp   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------------+
    1 |  6314   217  -160    -4  -131  5278 10496   243  5630     -   -22 |
    2 |  -205   155  -192   -42   109   -17  6085  -141  -227     -  -208 |
    3 | -5679    54  -267   236    41-14710  -877   206 -5399     -  -227 |
    4 | -2244    76  -234   168    91-22462 -5409    87 -2164     -  -268 |
    5 |  8642   -15   -49    -8    40 25017 12799  -464  7783     -   -23 |
    6 |  4674   -38    65   -92    52  7821 -6363   -96  4262     -    27 |
    7 | -3563   -88  -357    15   169-10759   996   -70 -3626     -   -75 |
    8 |  -554   189  -107    29    27-21485  3280    18  -412     -  -215 |
    9 | -5285   -13  -124   208    37  1544 -2969  -238 -5220     -  -160 |
   10 |   648    86    57    82   -42  3975  1299  -285   132     -   -99 |
   11 |  4909  -221    32   454    24 -1819 -1255   179  5239     -  -141 |
   13 |  5805    61  -113    67   -87 10368 -3216   143  5552     -    14 |
   14 |  2052    65   328  -102   -34   868 -1018    30  2140     -    -4 |
   17 | -3944   -33    37   -90   148 13675     -  -548 -3281     -   -92 |
   19 | -3885   117  -245    32   -79 -9247     -   400 -3474     -     - |
   20 |  6547    73   202   -33   -42 18843 -1848   182  6437     -   -29 |
   21 | -9031   108  -158     X     -     -     -     6 -8198     -   -88 |
   22 | -4967    47   190    -6   -71-16697 -7080    70 -4318     -    15 |
   23 |  3614   184     3  -178    68     -     -  -204  3190     -  -138 |
   24 |  2954    31     -    58   -30 -1677  3649  -191  2586     -   -35 |
   25 | -7000  -174    63    74    53 -8314  1950   304 -6240     -    49 |
   26 | -4013  -156  -191   567   -36-13913 -4802  -388 -3705     -  -146 |
   27 |  3726   208  -116     7    31 18585  5268   367  2463     -  -226 |
   28 |  4562   -54   134    18   -45 31149-12480   263  4427     -    75 |
   29 | -2855   -28   165     7   126 -9887 -6308   -17 -2396     -  -150 |
   30 |  3742   -80  -202    89     3 14061  1916   118  3561     -    41 |
   31 | -5244    50  -288   150    60-21072  5817    98 -5007     -  -183 |
 -----+-------------------------------------------------------------------+
 ALGO |     -    84     -   -37   -48     -     -   -42     -     -     - |
 AREQ |     -   -23     -   -53   -77     -     -  -140     -     -   155 |
 ARTU |     -   -10     -     -     8     -     -     -     -     -     - |
 AUCK |     -  -152     -   -59     -     -     -    18     -     -   195 |
 BAHR |     -   -68     -   158   -57     -     -  -135     -     -    28 |
 BOR1 |     -   -65     -    94     -     -     -     -     -     -     - |
 BRMU |     -   -24     -  -214     -     -     -     -     -     -   174 |
 CAS1 |     -  -104     -    11    22     -     -     -     -     -    69 |
 COCO |     -   156     -     -  -134     -     -     -     -     -     7 |
 CRO1 |     -    12     -   -18     -     -     -   251     -     -     - |
 DAV1 |     -   -20     -     -    17     -     -     -     -     -     - |
 DRAO |     -   -30   210     -     -     -     -     -     -     -    -2 |
 EISL |     -     -     -   -15     -     -     -     -     -     -    10 |
 FAIR |     -     X    88  -141     -     -     -   -98     -     -    87 |
 FORT |     -     -   278  -220     -     -     -     -     -     -    90 |
 GALA |     -    84     -  -237  -120     -     -    52     -     -   230 |
 GRAZ |     -   353     X  -508     -     -     -     -     -     -     - |
 GUAM |     -    76     -  -109     -     -     -   331     -     -     - |
 HOB2 |     -  -136     -   -49     -     -     -     -     -     -   171 |
 KERG |     -   -60     -     -     -     -     -     -     -     -    61 |
 KOKB |     -   -85     X   -67    56     -     -   287     -     -     X |
 KOSG |     -  -178     -   256     -     -     -  -291     -     -     - |
 KWJ1 |     -     -     -   -79   134     -     -  -139     -     -  -117 |
 MAC1 |     -    19     -    55   -47     -     -     -     -     -     - |
 MALI |     -     -     -  -229   120     -     -   -96     -     -    10 |
 MATE |     -   -31     -     -     -     -     -     -     -     -    31 |
 MAW1 |     -    58     -     -   -48     -     -     -     -     -     - |
 MCM4 |     -     -     -     X  -230     -     -     -     -     -   281 |
 MDO1 |     -  -141   312     -     -     -     -     -     -     -     - |
 MKEA |     -   -12     -    17     -     -     -     -     -     -     - |
 NRC2 |     -    -2   184  -142    52     -     -     -     -     -     - |
 NYA1 |     -    32     -     -   -27     -     -     -     -     -     - |
 NYAL |     -     -     -   -50     -     -     -     -     -     -    35 |
 ONSA |     -  -118     -     4     -     -     -     -     -     -   116 |
 PERT |     -  -148     -   213     -     -     -     -     -     -     - |
 PIE1 |     -  -173     -   -64     -     -     -     -     -     -   217 |
 POTS |     -     2     -   153   -89     -     -     -     -     -     - |
 REYK |     -     0     -     0     -     -     -   134     -     -     - |
 SANT |     -     -     -   -39   246     -     -     -     -     -  -212 |
 STJO |     -     9    13     -    -9     -     -  -169     -     -     - |
 TSKB |     -   -99     -   -40    -9     -     -    34     -     -   138 |
 USNO |     -    76     -  -288     -     -     -     -     -     -   122 |
 USUD |     -  -113     -   163     -     -     -     -     -     -     - |
 VILL |     -    55   168  -115     -     -     -     -     -     -     - |
 WHIT |     -    86     -     -   -71     -     -     -     -     -     - |
 WSRT |     -   -17     -     -     -     -     -     -     -     -    17 |
 WTZR |     -  -168     -    65     -     -     -     -     -     -   124 |
 WUHN |     -   -28     -     -  -152     -     -    40     -     -   213 |
 YAR2 |     -     -    10    10     -     -     -     -     -     -    -9 |
 YELL |     -    21   299  -194    57     -     -   -38     -     -     - |
 YSSK |     -   -68     -     -    56     -     -     -     -     -     - |
 ZWEN |     -     -     -     -    10     -     -     -     -     -   -12 |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igp   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------------+--------------
    1 |  3643   163   149    59    51  6161  6123   262  3731     -   145 |  277   4.20
    2 |  1902   137   204   131   100  3197  4392   119  1689     -   203 |  286   1.80
    3 |  2212    88   207    80    77  2636  2117   213  2316     -    75 |  288   1.92
    4 |  1068   142   105    94    47  5435  2516    68   947     -    68 |  288   0.69
    5 |  6599    80   130    76    42  9150  7565    44  5863     -    78 |  288   2.32
    6 |  7426   155   146   103    54  7507  3881    95  7213     -    43 |  288   7.57
    7 |  2270   156   152   190    74  7040  2091    89  1753     -    76 |  288   0.52
    8 |  3506    78   241   143    57  5451  3755   388  3346     -    58 |  288   2.47
    9 |  1734    78    73   307   100  2527  2395   112  1698     -   260 |  288   2.06
   10 |  3621   136   112    80    67  3114  1571   157  3312     -    47 |  288   2.45
   11 |   959    76   106    58    53   614   613   189   833     -    27 |  288   0.40
   13 |  1318   127   142    55    48  2310  1580   127  1142     -    88 |  288   0.19
   14 |  1154    89    91   188    66   989   550   102  1051     -    52 |  288   0.31
   17 |  5280   137   355   269   102  3598     -   151  5842     -    56 |  288   3.98
   19 |  3448   175   142   269   228  3601     -   102  3881     -     - |  288   3.34
   20 |  1292    86   137    72    58  1898   884    65  1144     -    25 |  288   0.27
   21 |  4112    88   376     X     -     -     -   170  4004     -    85 |  277   2.31
   22 |  2386   124   163   169   105  5126  2271   239  2316     -    68 |  288   0.28
   23 |  8362   135   393   203   108     -     -   213  8027     -   118 |  288   5.43
   24 |  2330   117     -   154    52  2965  2722   142  1955     -    64 |  288   2.15
   25 |  3407   110   125   271   115  2059  2100   117  3212     -    46 |  288   2.00
   26 |  1425   320   178   253   184  3432  1764    86  1165     -    79 |  277   0.92
   27 | 10346    68   226   105    82  4371  4325   191  9304     -   117 |  288   4.67
   28 |  3526    44   118   196    93  1882  6774    51  3563     -    57 |  288   1.20
   29 |  2339   254   415   194    86  2493  2444   159  1924     -   175 |  276   1.20
   30 |  1645    74   130   111    91  4998  2779    65  1797     -    79 |  288   1.09
   31 |  4960    61   173    68    53  5121  2921   336  5118     -    85 |  288   2.68
 -----+-------------------------------------------------------------------+--------------
 ALGO |     -    31     -    37    23     -     -    64     -     -     - |  288   0.07
 AREQ |     -    81     -   174    39     -     -    71     -     -    70 |  288  22.31
 ARTU |     -    37     -     -    30     -     -     -     -     -     - |  282  18.84
 AUCK |     -    63     -    76     -     -     -   554     -     -    49 |  288  20.93
 BAHR |     -    97     -    80   108     -     -    97     -     -   232 |  288   0.52
 BOR1 |     -    19     -    27     -     -     -     -     -     -     - |  287   3.65
 BRMU |     -    48     -    67     -     -     -     -     -     -    22 |  288  17.28
 CAS1 |     -   123     -   160    71     -     -     -     -     -    92 |  288  12.23
 COCO |     -    49     -     -    78     -     -     -     -     -    72 |  288  13.31
 CRO1 |     -    77     -   110     -     -     -    97     -     -     - |  270   0.15
 DAV1 |     -   100     -     -    83     -     -     -     -     -     - |  287  12.46
 DRAO |     -    30    91     -     -     -     -     -     -     -    33 |  288   0.04
 EISL |     -     -     -    43     -     -     -     -     -     -    30 |  288  18.50
 FAIR |     -     X    98   147     -     -     -   159     -     -    95 |  281   0.37
 FORT |     -     -   202   223     -     -     -     -     -     -   150 |  208   1.16
 GALA |     -    79     -    76    25     -     -   165     -     -    50 |  288  36.06
 GRAZ |     -    24     X    34     -     -     -     -     -     -     - |  285  78.03
 GUAM |     -    69     -   100     -     -     -    77     -     -     - |  278  25.52
 HOB2 |     -    98     -   131     -     -     -     -     -     -    50 |  288   0.15
 KERG |     -    39     -     -     -     -     -     -     -     -    39 |  285    >>>
 KOKB |     -   380     X   172   173     -     -   305     -     -     X |  249   1.18
 KOSG |     -    44     -    63     -     -     -   106     -     -     - |  287  47.89
 KWJ1 |     -     -     -   148   129     -     -   324     -     -   195 |  244  86.47
 MAC1 |     -   122     -    86    73     -     -     -     -     -     - |  288  14.87
 MALI |     -     -     -   210    96     -     -   100     -     -    52 |  277 110.07
 MATE |     -    46     -     -     -     -     -     -     -     -    47 |  287   0.16
 MAW1 |     -    78     -     -    64     -     -     -     -     -     - |  272  27.29
 MCM4 |     -     -     -     X   201     -     -     -     -     -   246 |  234   5.31
 MDO1 |     -    34    76     -     -     -     -     -     -     -     - |   88  31.63
 MKEA |     -    55     -    79     -     -     -     -     -     -     - |  167  43.90
 NRC2 |     -    32    63    43    19     -     -     -     -     -     - |  287   0.04
 NYA1 |     -    51     -     -    42     -     -     -     -     -     - |  286   0.06
 NYAL |     -     -     -   210     -     -     -     -     -     -   147 |  288   0.09
 ONSA |     -    37     -    37     -     -     -     -     -     -    52 |  288   0.07
 PERT |     -    95     -   137     -     -     -     -     -     -     - |  270   2.75
 PIE1 |     -    56     -    85     -     -     -     -     -     -    20 |  288   0.08
 POTS |     -    27     -    37    27     -     -     -     -     -     - |  288  20.29
 REYK |     -   100     -   144     -     -     -   151     -     -     - |  260   8.25
 SANT |     -     -     -   178    30     -     -     -     -     -   131 |  131  12.07
 STJO |     -    51    86     -    44     -     -    66     -     -     - |  287   1.95
 TSKB |     -    74     -    78    31     -     -    75     -     -    30 |  288   1.92
 USNO |     -    65     -   158     -     -     -     -     -     -    75 |  287   0.05
 USUD |     -    61     -    88     -     -     -     -     -     -     - |  288   0.35
 VILL |     -    41    70    58     -     -     -     -     -     -     - |  287   5.40
 WHIT |     -    41     -     -    34     -     -     -     -     -     - |  284  22.01
 WSRT |     -    73     -     -     -     -     -     -     -     -    74 |  287   0.06
 WTZR |     -    37     -    44     -     -     -     -     -     -    59 |  288   0.08
 WUHN |     -    50     -     -    32     -     -    41     -     -    30 |  287  31.79
 YAR2 |     -     -    85   185     -     -     -     -     -     -   119 |  226 127.73
 YELL |     -    36   104    53    23     -     -    40     -     -     - |  288   0.03
 YSSK |     -    47     -     -    39     -     -     -     -     -     - |  277  17.96
 ZWEN |     -     -     -     -    39     -     -     -     -     -    48 |  265  19.66
 -----+-------------------------------------------------------------------+--------------
 TOT  |  4132   100   179   141    86  4394  3453   162  3952     -   100 |


 BEST CLOCK FIT: YELL   288   0.03 (ns) 

