
 GPS week: 1096   Day: 5   MJD: 51921                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2570      0     0.27    -1.23     4.97     0.00
 cod |   288     0  15244    259     2.23    -6.41     0.08    21.88
 esa |   288     0  16489    607  2525.78     8.00     0.18    10.39
 gfz |    98     0   4520     39     0.58    -2.85     0.05    53.48
 igp |    96     0   2476      0     0.25    -2.44     5.31     0.00
 igu |    96    96      0      0     0.00     0.00     0.00     0.00
 jpl |   288     0   7774     59    12.33    -7.28     0.34     0.00
 ngs |    96     0   2570      0     0.35    -1.33     4.74     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  15063    190  1362.76  2336.96     0.13    14.25

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igp   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 | -2465   270   114    -3 -5435     -   913 -2362     -  -355 |
    2 | -4698   197   -84    98  8143     -   682 -4318     -  -279 |
    3 |  3543   -32   112    35  8964     -   600  3176     -   -86 |
    4 |   238    -3   219   -26-18662     -   556   407     -  -116 |
    5 |   301   -55   101    -4 12485     -   600   -66     -    -3 |
    6 |  7088  -124    82    26 34387     -   685  5511     -    53 |
    7 | -3353   107    87    68-27266     -   650 -3267     -  -272 |
    8 |  3102   228   -78   133 -9731     -   590  2911     -  -347 |
    9 | -8494   -28   146    17-16292     -   444 -7434     -   -96 |
   10 |  -322   125     X    32 10311     -   715  1006     -  -241 |
   11 |  2459   -28   494  -124  5205     -   547  2694     -  -169 |
   13 |  3850   127  -402   -29  3773     -   573  3900     -   184 |
   14 |  1516  -107   135    50 -8462     -   492  1604     -   -43 |
   15 | -1798    62     -    41 -6519     -   617 -1115     -  -140 |
   17 |  2234   146    41   -11-21530     -   322  2735     -  -183 |
   19 | 14006    82  -183     5 63560     -   478  9555     -     - |
   20 |  8038    79   318  -164  1488     -   981  7965     -  -118 |
   21 |-11005   200  -522   133 -7098     -   728 -9209     -    -7 |
   22 | -1998   -20   -68   -14-20399     -  1153 -1439     -    88 |
   23 |  1518    64    64  -103     -     -   540  1272     -     2 |
   24 | -2811     4   123  -112  3151     -   386 -2689     -    50 |
   25 | -1512    11  -619   173 -4477     -  1036 -1671     -   186 |
   26 | -3428    92     X  -130-19424     -   510 -3470     -    61 |
   27 | -2894   139   232    49  7419     -   618 -2890     -  -390 |
   28 |  5017  -189   230    54   606     -   430  5088     -    -6 |
   29 | -4808   133  -260     9 -5027     -   752 -4765     -     X |
   30 | -3480   -92   -72   121  -484     -   768 -3254     -     7 |
   31 |   911    77   354    11 23606     -   738   248     -  -355 |
 -----+-------------------------------------------------------------+
 ANKR |     -    -3     6     -     -     -     -     -     -     - |
 AREQ |     -     -   -55     -     -     -     -     -     -    40 |
 AUCK |     -   137  -329     -     -     -   683     -     -    35 |
 BAHR |     -    21  -176    29     -     -   654     -     -    60 |
 BOR1 |     -    -7    14     -     -     -     -     -     -     - |
 BRMU |     -  -229   496     -     -     -     -     -     -   -11 |
 CAS1 |     -     -     -    -2     -     -     -     -     -     7 |
 COCO |     -     -     -   -46     -     -     -     -     -   173 |
 CRO1 |     -   -46    97     -     -     -   553     -     -     - |
 DRAO |     -   -21     -   -45     -     -     -     -     -    88 |
 EISL |     -  -480    81     -     -     -     -     -     -    61 |
 FAIR |     -     -  -556     -     -     -   238     -     -   406 |
 GALA |     -     -    -9     2     -     -   764     -     -     - |
 GRAZ |     -   116  -244     -     -     -     -     -     -     - |
 GUAM |     -   -25  -216     -     -     -   751     -     -   194 |
 IISC |     -     -  -340     -     -     --18875     -     -   248 |
 KERG |     -   -12     -     X     -     -     -     -     -    19 |
 KOKB |     -     -    95   -38     -     -   763     -     -   -28 |
 KOSG |     -   -67   142     -     -     -   424     -     -     - |
 KWJ1 |     -     -     2   -20     -     -     -     -     -    24 |
 LHAS |     -    96  -202     -     -     -     -     -     -     - |
 MALI |     -     -   168  -282     -     -   898     -     -   260 |
 MAS1 |     -     1   -64   -43     -     -   603     -     -   100 |
 MATE |     -    29     -     -     -     -     -     -     -   -44 |
 MCM4 |     -    61  -163    22     -     -     -     -     -    -1 |
 MDO1 |     -   -41    87     -     -     -     -     -     -     - |
 NLIB |     -   -89     -     -     -     -     -     -     -   136 |
 NRC2 |     -  -123   260     -     -     -     -     -     -     - |
 ONSA |     -  -101   217     -     -     -     -     -     -    -3 |
 PERT |     -   235  -495     -     -     -     -     -     -     - |
 PIE1 |     -  -187   -86     -     -     -     -     -     -   349 |
 POTS |     -    17   -37     -     -     -     -     -     -     - |
 REYK |     -    20   -42     -     -     -     -     -     -     - |
 SANT |     -     X    63   -60     -     -   791     -     -    34 |
 STJO |     -  -151     -    62     -     -   555     -     -     - |
 THU1 |     -  -110     -     -     -     -     -     -     -   169 |
 TIDB |     -    63     X   -26     -     -     -     -     -     - |
 TRO1 |     -  -170     -    70     -     -     -     -     -     - |
 TSKB |     -    75  -143   -19     -     -     -     -     -    15 |
 USNO |     -  -119   125     -     -     -     -     -     -    91 |
 USUD |     -   -34    72     -     -     -   737     -     -     - |
 WHIT |     -     5     -    -2     -     -     -     -     -     - |
 WSRT |     -    -7     -     -     -     -     -     -     -    11 |
 WTZR |     -   -57     1     -     -     -     -     -     -    87 |
 WUHN |     -  -180     -    -6     -     -   841     -     -   283 |
 YAR2 |     -     -  -108     -     -     -     -     -     -    79 |
 YELL |     -    -8   109   -53     -     -   622     -     -     - |
 ZWEN |     -     -     -    88     -     -     -     -     -  -330 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igp   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  3325    54   121    22  3066     -   252  3297     -   100 |  276   3.28
    2 |  2662    97   118    34  1619     -   243  2482     -    64 |  288   1.87
    3 |  1950   114   214    39  4539     -   269  1533     -    69 |  288   1.71
    4 |   859   111   338    44  5512     -   239   948     -   125 |  288   0.95
    5 |  5238    61    92    16  4086     -   266  4866     -    44 |  288   3.94
    6 | 12079    66   118    28 11164     -   238  9820     -    63 |  288   8.91
    7 |   903    68    99    33  9046     -   223   721     -    84 |  288   1.74
    8 |  4272   156   130    61  4382     -   256  4529     -    96 |  288   3.80
    9 |  3835    50    55    27  4345     -   279  3324     -    50 |  288   2.12
   10 |  7908    30     X    19  3291     -   185  7996     -    51 |  215   2.66
   11 |  1443   121    98    64  2185     -   216  1204     -    81 |  288   0.39
   13 |  1250    63   100    27  2620     -   283  1290     -    55 |  288   0.32
   14 |  1281   101   281    71  2835     -   266  1150     -   153 |  287   0.26
   15 |  6364    51     -    31  4055     -   209  6377     -    65 |  246   2.88
   17 |  7742    75   184    38  6583     -   229  7840     -    85 |  282   2.81
   19 | 10441   149   306    29 14700     -   212  9177     -     - |  219   4.82
   20 |  1449    67   221    68  1849     -   356  1490     -    52 |  288   0.32
   21 |  7011    87   131    58  5809     -   242  7378     -   134 |  288   3.96
   22 |  3379    79   143    33  4534     -   308  3618     -   165 |  288   0.45
   23 |  6392   109   362    67     -     -   263  6545     -    95 |  282   6.66
   24 |  2922    89   345    42  4856     -   206  3024     -   114 |  285   2.29
   25 |  3507   121   171    95  2136     -   286  3252     -   144 |  288   1.68
   26 |  2578   164     X   102  4971     -   318  2484     -   107 |  245   0.51
   27 |  6732    77   151    31  5171     -   223  6504     -    74 |  288   4.93
   28 |  1692    88   180    30  1662     -   333  1523     -   188 |  288   0.50
   29 |  2620   166   275    37  3020     -   307  2517     -     X |  188   0.81
   30 |  2027    90   112    58  2709     -   235  1906     -    41 |  288   0.78
   31 |  5184    69   179    14  3515     -   307  5993     -    69 |  288   3.94
 -----+-------------------------------------------------------------+--------------
 ANKR |     -    79   166     -     -     -     -     -     -     - |  288   9.16
 AREQ |     -     -    88     -     -     -     -     -     -    64 |  288  12.53
 AUCK |     -    78    62     -     -     -   348     -     -   101 |  288  21.21
 BAHR |     -    74   132    32     -     -   261     -     -   128 |  288   0.56
 BOR1 |     -    60   126     -     -     -     -     -     -     - |  288   2.43
 BRMU |     -    34    59     -     -     -     -     -     -    62 |  288  15.56
 CAS1 |     -     -     -     6     -     -     -     -     -    21 |   97  12.90
 COCO |     -     -     -    14     -     -     -     -     -    52 |   98  10.20
 CRO1 |     -    23    48     -     -     -   262     -     -     - |  277   0.36
 DRAO |     -    49     -    27     -     -     -     -     -    54 |  288   0.06
 EISL |     -   183   180     -     -     -     -     -     -   156 |  283  43.33
 FAIR |     -     -   307     -     -     -   350     -     -   224 |  247   0.19
 GALA |     -     -   139    27     -     -   150     -     -     - |   96  14.25
 GRAZ |     -   159   335     -     -     -     -     -     -     - |  286  41.12
 GUAM |     -    85    76     -     -     -   251     -     -   137 |  288  25.74
 IISC |     -     -    89     -     -     -  1078     -     -    65 |  260  28.42
 KERG |     -    61     -     X     -     -     -     -     -    94 |  217    >>>
 KOKB |     -     -   377   117     -     -   405     -     -   391 |  287   0.39
 KOSG |     -    40    85     -     -     -   256     -     -     - |  287  23.84
 KWJ1 |     -     -   209    35     -     -     -     -     -   158 |  198  66.05
 LHAS |     -    79   167     -     -     -     -     -     -     - |  281  14.61
 MALI |     -     -   196   125     -     -   349     -     -   199 |  249  16.65
 MAS1 |     -    50   102    16     -     -   235     -     -    60 |  288  18.66
 MATE |     -    16     -     -     -     -     -     -     -    24 |  287   0.19
 MCM4 |     -   117   328    21     -     -     -     -     -   394 |  287  17.38
 MDO1 |     -    23    48     -     -     -     -     -     -     - |  288  20.38
 NLIB |     -    80     -     -     -     -     -     -     -   123 |  285   0.04
 NRC2 |     -    23    47     -     -     -     -     -     -     - |  287   0.09
 ONSA |     -    63   130     -     -     -     -     -     -    48 |  288   0.22
 PERT |     -   161   340     -     -     -     -     -     -     - |   87   2.07
 PIE1 |     -    91    37     -     -     -     -     -     -   123 |  288   0.04
 POTS |     -    60   127     -     -     -     -     -     -     - |  288  18.56
 REYK |     -    42    89     -     -     -     -     -     -     - |  287   9.67
 SANT |     -     X   200    43     -     -   544     -     -   164 |  273   4.96
 STJO |     -    21     -     9     -     -    92     -     -     - |   97   1.52
 THU1 |     -    32     -     -     -     -     -     -     -    48 |  286  15.95
 TIDB |     -    69     X    28     -     -     -     -     -     - |   98   0.06
 TRO1 |     -    24     -    10     -     -     -     -     -     - |   98   9.48
 TSKB |     -    36   116    11     -     -     -     -     -    75 |  288   1.52
 USNO |     -    38    83     -     -     -     -     -     -    67 |  288   0.04
 USUD |     -    54   113     -     -     -   245     -     -     - |  287   0.86
 WHIT |     -    19     -     8     -     -     -     -     -     - |   98  10.61
 WSRT |     -    36     -     -     -     -     -     -     -    56 |  284   0.05
 WTZR |     -    27   101     -     -     -     -     -     -    46 |  288   0.04
 WUHN |     -    43     -    20     -     -   248     -     -    60 |  286  32.99
 YAR2 |     -     -    74     -     -     -     -     -     -    54 |  112  58.03
 YELL |     -   121   263    31     -     -   258     -     -     - |  287   0.10
 ZWEN |     -     -     -    10     -     -     -     -     -    36 |   87  15.51
 -----+-------------------------------------------------------------+--------------
 TOT  |  4974    81   183    46  5306     -   344  4737     -   126 |


 BEST CLOCK FIT: PIE1   288   0.04 (ns) 

