
 GPS week: 1096   Day: 0   MJD: 51916                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2678      0    -0.07     0.16     5.30     0.00
 cod |   288     0  14558     67     2.36    -2.74     0.08    29.49
 emr |    96     0   3529      0  2504.19     9.70     0.09    29.73
 gfz |   288     0  13457      0    -0.20     0.17     0.11    21.58
 igp |    96     0   2391      0    -0.08     0.16     4.69     0.00
 igu |    96     0   2486      0    -0.08     0.13     4.89     0.00
 ngs |    96     0   2678      0    -0.07     0.17     5.04     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  15212    326   294.77   -40.17     0.12    19.21

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   igp   igu   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 | -1762   179  -195   157 -2941 -3443 -1907     -  -311 |
    2 | -4550   204   -55     5-15632-16126 -3216     -  -245 |
    3 |-10125  -140  -104   207-12892-13386 -8665     -     1 |
    4 |    57   -36    29    44   217  -278   -85     -   -17 |
    5 | -3614    66   -15   -30  5703  5209 -3337     -   -43 |
    6 |   905   136   -71   -50 -5959 -6454  1174     -   -86 |
    7 | -7309    93   -46    70-31942-32437 -7500     -  -176 |
    8 |  2495   208  -123    27 12692 12197  2563     -  -244 |
    9 |  -991    80    32    67     -     - -1843     -  -194 |
   10 | -1221   211  -107   -95  3105  2611  -797     -  -111 |
   11 |  8730   -11    14     6  3701  3206  8675     -     1 |
   13 |  2296   -11    79   -99 -1589 -2084  2207     -    80 |
   14 |  2170   -38   127   -70-10185-10680  2305     -    60 |
   15 |  1152   -68  -126   204 19225 18731   319     -   -77 |
   17 | -3278    67     7    10     -     - -3509     -   -98 |
   19 |  5207    61  -199    18 24991 24496  4685     -     - |
   20 |  7004    -7    92    47 17198 16703  6804     -   -91 |
   21 |  1145   -45   -99   166 -5306 -5801   941     -   -78 |
   22 | -3718  -107    24   162-34736-35231 -2753     -   -58 |
   23 |  9561    40   287  -192     - 12456  8145     -     X |
   24 | -8311    40   -17   -46 -6190 -6685 -7294     -     8 |
   25 |  2725   -45   -75   153 -6165 -6659  2409     -   -75 |
   26 |   586   110    43  -132-12152-12647  -155     -   -21 |
   27 | -5154   121  -118   117  2091  1596 -3984     -  -230 |
   28 | 10189  -179     2    85 21865 21371  9549     -   137 |
   29 | -2358   -13    -4     5 -2498 -2990 -2287     -    12 |
   30 |  2352    69   -30    61  6370  5876  1793     -  -143 |
   31 | -4226    44   -71   159 30552 30058 -4322     -  -199 |
 -----+-------------------------------------------------------+
 AREQ |     -   -86     -     -     -     -     -     -   132 |
 ARTU |     -     8     -   -11     -     -     -     -     - |
 AUCK |     -   -73     -     -     -     -     -     -   112 |
 BAHR |     -    22    67  -122     -     -     -     -    69 |
 BRMU |     -   -26     -     -     -     -     -     -    40 |
 CAS1 |     -     -     -   -90     -     -     -     -   101 |
 COCO |     -     -     -   -94     -     -     -     -   105 |
 DAV1 |     -     -     -    25     -     -     -     -   -28 |
 DRAO |     -   -62   108   -96     -     -     -     -   147 |
 FAIR |     -     -    39     -     -     -     -     -   -61 |
 GUAM |     -   -13     -     -     -     -     -     -    20 |
 KERG |     -    20     -     -     -     -     -     -   -30 |
 KOKB |     -     -     -   197     -     -     -     -  -222 |
 KOUR |     -   -47     -     -     -     -     -     -    72 |
 MALI |     -     -     -  -125     -     -     -     -   141 |
 MATE |     -   -27   -33     -     -     -     -     -    58 |
 MCM4 |     -    57     -   227     -     -     -     -  -431 |
 NLIB |     -   -58     -     -     -     -     -     -    89 |
 NYA1 |     -    53     -   -72     -     -     -     -     - |
 ONSA |     -   -88    63     -     -     -     -     -   102 |
 PIE1 |     -  -162    65     -     -     -     -     -   216 |
 SANT |     -     X     -  -167     -     -     -     -   188 |
 STJO |     -   -78   125    49     -     -     -     -     - |
 THTI |     -    -2     -  -331     -     -     -     -   375 |
 THU1 |     -   -26     -     -     -     -     -     -    40 |
 TIDB |     -    54     -   -74     -     -     -     -     - |
 TRO1 |     -   -63     -    86     -     -     -     -     - |
 URUM |     -  -100     -    -7     -     -     -     -   159 |
 USNO |     -   -78     -     -     -     -     -     -   120 |
 VILL |     -  -112   111     -     -     -     -     -     - |
 WHIT |     -     5     -    -6     -     -     -     -     - |
 WSRT |     -    -8     -     -     -     -     -     -    12 |
 WTZR |     -   -48     -     -     -     -     -     -    73 |
 WUHN |     -   -21     -  -169     -     -     -     -   222 |
 YELL |     -   -10   163   -60     -     -     -     -     - |
 ZWEN |     -     -     -  -300     -     -     -     -   337 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   igp   igu   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  5272    93   116    57  4838  5067  5372     -    65 |  277   4.81
    2 |  8133    92    34   227  2078  2056  7532     -   235 |  288   2.20
    3 |  3392    75    94    71  4920  5103  3590     -    57 |  288   2.20
    4 |  1756   104    34    57  2299  2569  1738     -    92 |  288   0.75
    5 |  3145   152   109    97  2588  2618  3201     -   114 |  288   2.94
    6 |  9196    80    72    49  8453  8247  9211     -   100 |  288   7.74
    7 |  4065    82   176    64 11200 11441  3844     -   185 |  288   1.59
    8 |  4114    83    66    64  3949  4209  4270     -    75 |  288   3.83
    9 |  4982    82    74    61     -     -  4672     -    46 |  288   2.46
   10 |  4183   133    79    64  3889  3724  4481     -   109 |  288   3.35
   11 |  1692   109   110   144  2146  1901  1760     -    93 |  288   0.52
   13 |   519    73   108    80   771   723   774     -    50 |  288   0.22
   14 |  1278   124   119   119  2680  2890  1439     -    60 |  288   0.46
   15 |  6053    68    71    99  9083  8813  5360     -    90 |  288   3.43
   17 | 15561    57    49    78     -     - 14058     -    73 |  288   3.97
   19 |  4920    59    71    60  3882  3731  5049     -     - |  267   2.57
   20 |  1393   157   118   105  3073  2871  1636     -   122 |  288   0.40
   21 |  2473   147    51   118  3209  2974  2461     -    81 |  288   1.99
   22 |  7926    91    64    74  6627  6863  6711     -   101 |  287   0.37
   23 |  7235    64   133    83     -  8317  7833     -     X |  267   6.17
   24 |  3270    78    77    86  3988  4284  4078     -    73 |  288   2.29
   25 |  1736    60    63    37  3995  3736  1813     -    40 |  288   1.55
   26 |  3494   109   108    62  1759  1989  3305     -   147 |  278   0.91
   27 |  5318    63    77    82  4060  4330  4665     -   120 |  288   3.94
   28 |  2831   107   106   122  3501  3301  2373     -    84 |  288   1.57
   29 |  1161    65    69    81  2437  2540  1206     -   105 |  277   1.28
   30 |  3136    88    69    45  2984  2733  2452     -    66 |  288   1.77
   31 |  3194    68    99    53  3496  3283  3081     -    69 |  288   2.99
 -----+-------------------------------------------------------+--------------
 AREQ |     -    56     -     -     -     -     -     -    86 |  287  28.99
 ARTU |     -    23     -    32     -     -     -     -     - |  287  15.57
 AUCK |     -    50     -     -     -     -     -     -    77 |  266  19.45
 BAHR |     -   142    93   114     -     -     -     -   305 |  288   0.47
 BRMU |     -    25     -     -     -     -     -     -    38 |  287  18.50
 CAS1 |     -     -     -    41     -     -     -     -    46 |  288  12.96
 COCO |     -     -     -    36     -     -     -     -    40 |  288  16.12
 DAV1 |     -     -     -    53     -     -     -     -    60 |  287  13.42
 DRAO |     -    84    66    72     -     -     -     -    54 |  288   0.04
 FAIR |     -     -    50     -     -     -     -     -    77 |   95   0.24
 GUAM |     -    65     -     -     -     -     -     -   100 |  284  29.20
 KERG |     -    94     -     -     -     -     -     -   144 |  248    >>>
 KOKB |     -     -     -   282     -     -     -     -   316 |  220   0.32
 KOUR |     -    56     -     -     -     -     -     -    87 |  271   2.33
 MALI |     -     -     -   315     -     -     -     -   354 |  251  11.63
 MATE |     -    58    46     -     -     -     -     -    73 |  287   0.05
 MCM4 |     -    89     -   123     -     -     -     -    46 |  286    >>>
 NLIB |     -    37     -     -     -     -     -     -    57 |  288   0.06
 NYA1 |     -    38     -    52     -     -     -     -     - |  288   0.05
 ONSA |     -    40    59     -     -     -     -     -    37 |  288   0.36
 PIE1 |     -    40    51     -     -     -     -     -    64 |  288   0.04
 SANT |     -     X     -   304     -     -     -     -   342 |  204   2.70
 STJO |     -    29    41    45     -     -     -     -     - |  288   2.15
 THTI |     -    42     -    36     -     -     -     -    70 |  287   4.28
 THU1 |     -   117     -     -     -     -     -     -   180 |  262  14.77
 TIDB |     -    64     -    87     -     -     -     -     - |  287   0.14
 TRO1 |     -    48     -    66     -     -     -     -     - |  288  10.37
 URUM |     -    37     -    48     -     -     -     -    50 |  288  28.93
 USNO |     -    34     -     -     -     -     -     -    52 |  288   0.08
 VILL |     -    33    32     -     -     -     -     -     - |   96   5.83
 WHIT |     -    27     -    36     -     -     -     -     - |  288   9.93
 WSRT |     -    54     -     -     -     -     -     -    83 |  288   0.09
 WTZR |     -    24     -     -     -     -     -     -    37 |  288   0.04
 WUHN |     -    41     -    58     -     -     -     -    52 |  241  27.34
 YELL |     -    44   113    46     -     -     -     -     - |  287   0.04
 ZWEN |     -     -     -    82     -     -     -     -    93 |  267    >>>
 -----+-------------------------------------------------------+--------------
 TOT  |  5298    79    86   105  4694  4890  5044     -   122 |


 BEST CLOCK FIT: WTZR   288   0.04 (ns) 

