
 GPS week: 1095   Day: 2   MJD: 51911                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2531      0     0.10    -0.17     4.77     0.00
 cod |   288     0  16074    171    -0.15     0.67     0.10    35.03
 esa |   288     0  15318     59  2454.75    10.46     0.13    27.39
 gfz |   288     0  12727      1    -0.08    -0.40     0.09    37.59
 igp |    96     0   2436      0    -0.14     0.33     5.92     0.00
 igu |    96     0   2154      0     0.13    -0.36     3.81     0.00
 jpl |     0     0      0      0    -0.85     0.00     0.00     0.00
 ngs |    96     0   2531      0     0.12    -0.21     4.55     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igp   igu   jpl   ngs   sio |
 -----+-------------------------------------------------------+
    1 | -9326   280  -623   252   180-13771     - -9554     - |
    2 |  5714   252  -529   187 37864 13031     -  4763     - |
    3 | -5783  -257   336   -37-12374  3501     - -5321     - |
    4 | -1098   -37  -173   156-16904  -225     -  -997     - |
    5 |  2630    -9   296  -209 20793   730     -  2516     - |
    6 |  2203  -198   258   -28  2812     -     -  1700     - |
    7 | -1272   157  -488   174-44842  6676     -  -974     - |
    8 | -7163  -262   740  -340-61787  7671     - -5929     - |
    9 |   141  -148   166    -1 -2294  8207     -  -523     - |
   10 |   417   279  -359    46 18033 -4815     -   505     - |
   11 |  6570  -135   112    30 32299  1567     -  6712     - |
   13 |  1380  -199   503  -246 -1381 -3550     -  1537     - |
   14 |  1790    -4  -106    83 -4476     -     -  1786     - |
   17 |  3942    55    19   -54 25260     -     -  3594     - |
   19 |   142  -173   388  -160 -1486  -740     -   398     - |
   20 |  7146   148  -187    24 10980-13577     -  7089     - |
   21 |  5172   217  -379   112 13042  6879     -  4515     - |
   22 | -3925    93  -255   120-17139  2348     - -2876     - |
   23 | -4623  -122   345  -167     - -3990     - -4628     - |
   24 |  3051    21   -94    52 11591  8379     -  3218     - |
   25 |  -334   -78   -61   101   281 -1559     -  -638     - |
   26 | -7387  -414   709  -160-11341 -8443     - -7077     - |
   27 |-12831  -170   314  -109-34232     -     --10469     - |
   28 |  6349    53  -145    66 37901-11186     -  4901     - |
   29 | -4255  -114   270  -101-22792 -4605     - -4365     - |
   30 |  2556   -99    37    51 14785 -3657     -  2578     - |
   31 |  7498   192  -548   241  -114 10996     -  6279     - |
 -----+-------------------------------------------------------+
 ALBH |     -  -105   134     -     -     -     -     -     - |
 ALGO |     -   945  -953  -186     -     -     -     -     - |
 ARTU |     -     5     -    -5     -     -     -     -     - |
 AUCK |     -   -70    90     -     -     -     -     -     - |
 BARB |     -    41   -53     -     -     -     -     -     - |
 BOR1 |     -     1    -1     -     -     -     -     -     - |
 BRMU |     -   -52    66     -     -     -     -     -     - |
 CRO1 |     -    20   -25     -     -     -     -     -     - |
 DRAO |     -    69     -   -64     -     -     -     -     - |
 EISL |     -    93  -118     -     -     -     -     -     - |
 GRAZ |     -  -112   143     -     -     -     -     -     - |
 GUAM |     -   -71    91     -     -     -     -     -     - |
 KELY |     -    95  -122     -     -     -     -     -     - |
 KIRU |     -  -216   277     -     -     -     -     -     - |
 KOKB |     -     -   112   -82     -     -     -     -     - |
 KWJ1 |     -     -    75   -54     -     -     -     -     - |
 LHAS |     -   -75   131   -27     -     -     -     -     - |
 MCM4 |     -     8  -111    76     -     -     -     -     - |
 MKEA |     -    56   -72     -     -     -     -     -     - |
 NLIB |     -   -62    80     -     -     -     -     -     - |
 NRC2 |     -   337  -431     -     -     -     -     -     - |
 NYA1 |     -    53     -   -49     -     -     -     -     - |
 PIE1 |     -   -89   113     -     -     -     -     -     - |
 RBAY |     -    42     -   -40     -     -     -     -     - |
 SANT |     -     X    -4     3     -     -     -     -     - |
 STJO |     -   -84   -75   133     -     -     -     -     - |
 TIXI |     -   -78     -    73     -     -     -     -     - |
 TRO1 |     -  -132     -   123     -     -     -     -     - |
 URUM |     -    32     -   -30     -     -     -     -     - |
 USNO |     -    -9    12     -     -     -     -     -     - |
 USUD |     -   -83   177   -52     -     -     -     -     - |
 VILL |     -   -62    79     -     -     -     -     -     - |
 WES2 |     -    52   -67     -     -     -     -     -     - |
 WHIT |     -   -18     -    16     -     -     -     -     - |
 WTZR |     -   -29     -    27     -     -     -     -     - |
 YAR2 |     -    38   -48     -     -     -     -     -     - |
 YELL |     -   -71    28    46     -     -     -     -     - |
 YSSK |     -    68     -   -63     -     -     -     -     - |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igp   igu   jpl   ngs   sio | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  7649    57   239   176  5675  7105     -  7078     - |  278   3.71
    2 |  5004    81   109    55  5647  2883     -  4637     - |  283   2.11
    3 |  3070    41    63    44  2977  2561     -  2994     - |  288   2.18
    4 |  1045   103   140    73  5600  1527     -   953     - |  254   0.71
    5 |  3937   106    65    78  6360  4439     -  4379     - |  288   4.29
    6 | 10841   173    48   140 11886     -     -  9781     - |  288   7.26
    7 |  1606    76   208   127 12597  2911     -  1770     - |  287   1.50
    8 |  4422    70    46    50 11825  4617     -  3669     - |  261   1.60
    9 |  6506   105    54    92  3568  3487     -  6856     - |  288   3.08
   10 |  3037    75   157    81  3213  3610     -  2937     - |  275   2.82
   11 |  2193   148   120    53  5818  1824     -  2223     - |  288   0.48
   13 |  1029   175    69   126   947  1367     -  1108     - |  286   0.23
   14 |  1601    88   138   114  2900     -     -  1605     - |  288   0.54
   17 |  4235    98   243   152  4332     -     -  3726     - |  267   4.07
   19 |  6367   109   119    68  6321  4045     -  6505     - |  286   2.92
   20 |  1533   112   102    49  1182  5983     -  1294     - |  288   0.23
   21 |  3944    67    68    74  5450  4108     -  4173     - |  288   2.94
   22 |  6032    55    53    28  3842  3854     -  5359     - |  288   0.68
   23 |  4436    98   175    78     -  1854     -  4278     - |  286   4.38
   24 |  3611   128   356   190  6277  3131     -  3738     - |  263   1.83
   25 |  4058   112   152   116  2668  2292     -  4272     - |  287   2.64
   26 |  1049   197   210   212  4507  2463     -  1071     - |  266   0.56
   27 |  4323    52    81    63  6775     -     -  4692     - |  288   3.61
   28 | 10078    86    52    74  1863  7720     -  9111     - |  284   0.89
   29 |  1215   197   145   133  4777   756     -  1017     - |  276   0.67
   30 |  1632    58    58    27  2727  1859     -  1605     - |  288   1.33
   31 |  4447   105   135    84  4730  4000     -  4247     - |  287   3.14
 -----+-------------------------------------------------------+--------------
 ALBH |     -    33    43     -     -     -     -     -     - |  288   0.09
 ALGO |     -    69    30    79     -     -     -     -     - |  288   0.03
 ARTU |     -    39     -    36     -     -     -     -     - |  283  12.07
 AUCK |     -    43    55     -     -     -     -     -     - |  249  15.90
 BARB |     -   345   441     -     -     -     -     -     - |  282  25.86
 BOR1 |     -    37    47     -     -     -     -     -     - |  287   2.10
 BRMU |     -    17    22     -     -     -     -     -     - |  286  16.14
 CRO1 |     -    30    38     -     -     -     -     -     - |  280   0.28
 DRAO |     -    90     -    84     -     -     -     -     - |  287   0.05
 EISL |     -   117   150     -     -     -     -     -     - |  263  21.60
 GRAZ |     -    26    34     -     -     -     -     -     - |  287 147.04
 GUAM |     -    33    43     -     -     -     -     -     - |  285  26.86
 KELY |     -    31    40     -     -     -     -     -     - |  287  15.39
 KIRU |     -    23    29     -     -     -     -     -     - |  288   2.53
 KOKB |     -     -   104    76     -     -     -     -     - |  254   3.79
 KWJ1 |     -     -   199   145     -     -     -     -     - |  200    >>>
 LHAS |     -    42    43    61     -     -     -     -     - |  288  14.90
 MCM4 |     -   224   134   149     -     -     -     -     - |  287  22.42
 MKEA |     -    26    33     -     -     -     -     -     - |  287  42.69
 NLIB |     -    58    74     -     -     -     -     -     - |  282   0.07
 NRC2 |     -    29    38     -     -     -     -     -     - |  288   0.07
 NYA1 |     -    27     -    25     -     -     -     -     - |  288   0.06
 PIE1 |     -    36    46     -     -     -     -     -     - |  288   0.05
 RBAY |     -   143     -   133     -     -     -     -     - |  165  30.17
 SANT |     -     X   146   106     -     -     -     -     - |  286   7.30
 STJO |     -    58    76    61     -     -     -     -     - |  288   3.09
 TIXI |     -    25     -    23     -     -     -     -     - |  286   9.28
 TRO1 |     -    21     -    20     -     -     -     -     - |  285  10.12
 URUM |     -    28     -    26     -     -     -     -     - |  286  81.37
 USNO |     -    30    38     -     -     -     -     -     - |  288   0.05
 USUD |     -   113    59    76     -     -     -     -     - |  288   0.51
 VILL |     -    20    25     -     -     -     -     -     - |  288   6.73
 WES2 |     -    37    47     -     -     -     -     -     - |  286   0.11
 WHIT |     -    50     -    47     -     -     -     -     - |  288   7.22
 WTZR |     -    48     -    45     -     -     -     -     - |  287   0.11
 YAR2 |     -   265   338     -     -     -     -     -     - |  217 416.79
 YELL |     -    29    19    26     -     -     -     -     - |  288   0.03
 YSSK |     -    55     -    51     -     -     -     -     - |  279  13.79
 -----+-------------------------------------------------------+--------------
 TOT  |  4774   100   134    94  5916  3805     -  4551     - |


 BEST CLOCK FIT: ALGO   288   0.03 (ns) 

