
 GPS week: 1095   Day: 0   MJD: 51909                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2361      0    -0.52     0.58     4.32     0.00
 cod |   288     0  10886     15     0.43    -3.24     0.10    39.95
 emr |    96     0   2733      5  2431.57     6.71     0.17    19.87
 esa |     0     0      0      0   487.08     0.00     0.00     0.00
 igp |    96     0   2269      0     0.01     0.62     4.84     0.00
 igu |    96     0   2093      0    -0.31    -0.82     6.74     0.00
 jpl |     0     0      0      0   -13.99     0.00     0.00     0.00
 ngs |    96     0   2361      0    -0.50     0.63     4.27     0.00
 usn |   288     0  11304     42  2431.67     6.74     0.10    40.17

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   igp   igu   jpl   ngs   usn |
 -----+-------------------------------------------------------+
    1 |  3076   309   -88     - 11140 -6335     -  2412  -274 |
    2 | -2869   299  -329     --28933  6352     - -2285  -237 |
    3 | -6723     4  -204     -  6172  3037     - -6406    33 |
    4 | -2489    92     1     --21963  4162     - -2053   -88 |
    5 |  7775   218   132     - 17721 16697     -  7290  -251 |
    6 |  1796   -34   -35     - 11350  9069     -  1594    38 |
    7 | -4581   220  -166     --18842  1555     - -4489  -203 |
    8 | -9126   310  -218     --12068 -5145     - -8958  -244 |
    9 | -5077    67  -159     --16785  8704     - -4523   -36 |
   10 |  1747   183  -142     -  8343-16558     -  2022  -150 |
   11 |  5998    24   150     -  1722-22930     -  6013   -46 |
   13 |  1181    16   -56     -  5258-15145     -  1412    -4 |
   14 | -1470   -99   510     -  -954-31588     - -1293   -11 |
   17 |  1357   -11  -186     - -7413     -     -  1988    41 |
   19 |  2009   258  -258     --17908 12055     -  1695  -200 |
   20 |  3606  -496  -222     - 20815-10943     -  3888   628 |
   21 |  -342    93   -43     - 20026 -6539     -  -520   -77 |
   22 |  4313   -25  -122     - 23212 -4716     -  3676    42 |
   23 |  2097   -92   132     -     -     -     -  1218    56 |
   24 | -5235    49  -186     - -5886-10860     - -4806   -12 |
   25 | -4005   -56   143     --19745  6212     - -3511    27 |
   26 | -3074   -67   -28     - -4262 -5147     - -2755    68 |
   27 |  8440   232   -67     - 16413 31270     -  7039  -192 |
   28 |   424   -79   358     --10620 35886     -  1949    17 |
   29 | -4864    65    33     - -9928     -     - -5553   -63 |
   30 |   645   -79   266     - -3218 18179     -   791    21 |
   31 |  5586   187    86     - 42833-15980     -  4715  -191 |
 -----+-------------------------------------------------------+
 ALGO |     -   -85   115     -     -     -     -     -    65 |
 AREQ |     -  -162     -     -     -     -     -     -   161 |
 AUCK |     -  -110     -     -     -     -     -     -   110 |
 BRMU |     -  -101     -     -     -     -     -     -   101 |
 DRAO |     -  -117   -36     -     -     -     -     -   121 |
 FAIR |     -     -     7     -     -     -     -     -    -4 |
 GRAZ |     -    -6     -     -     -     -     -     -     6 |
 GUAM |     -   -14     -     -     -     -     -     -    14 |
 KERG |     -    41     -     -     -     -     -     -   -41 |
 MATE |     -   -48     -     -     -     -     -     -    47 |
 MCM4 |     -   150     -     -     -     -     -     -  -149 |
 NLIB |     -     5     -     -     -     -     -     -    -5 |
 ONSA |     -   -84     -     -     -     -     -     -    84 |
 PIE1 |     -  -275    66     -     -     -     -     -   255 |
 SANT |     -  -381     -     -     -     -     -     -   379 |
 STJO |     -   -90   182     -     -     -     -     -     - |
 USNO |     -   -72     -     -     -     -     -     -    72 |
 USUD |     -   -38  -155     -     -     -     -     -    63 |
 WTZR |     -   -80     -     -     -     -     -     -    80 |
 YELL |     -   -94   118     -     -     -     -     -    74 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   igp   igu   jpl   ngs   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  3607   103   165     -  5296  2212     -  3523   107 |  253   3.24
    2 |  3029    85   138     -  3496  4797     -  2863    73 |  241   2.05
    3 |  4354    49   171     -  3319  2471     -  4130    60 |  222   1.91
    4 |  1538    64   102     -  6648  3120     -  1831    66 |  230   1.02
    5 |  4309   216   279     -  5021  4967     -  3545   258 |  211   3.98
    6 |  8154    90   171     -  9877  4612     -  7754    80 |  217   7.98
    7 |  2887   109    87     - 10361   820     -  2641   111 |  213   2.14
    8 |  3970   140   212     -  6167  1911     -  3708   109 |  223   3.27
    9 |  1703    80   403     -  2315  2869     -  1518    96 |  222   1.49
   10 |  3545   151   312     -  5014  3358     -  3657   135 |  223   3.03
   11 |  2137    62   127     -  2616 10023     -  2451    62 |  250   0.58
   13 |  2185    61    96     -  1658  7168     -  2022    60 |  240   0.19
   14 |  1871   124   170     -  3187 14393     -  1877   114 |  243   0.52
   17 |  9284   112   159     -  5309     -     -  9449   105 |  224   3.42
   19 |  6164   102   165     -  4506  3755     -  6058    90 |  253   4.39
   20 |  1037   220   285     -  2033  4024     -   909   251 |  156   0.53
   21 |  2287   133    83     -  4013  3797     -  1995   122 |  250   2.76
   22 |  2764    80    80     -  1908  2630     -  3052    76 |  230   0.56
   23 |  6093   147   308     -     -     -     -  6023   116 |  228   5.57
   24 |  2384    76   199     -  2338  2931     -  2381    72 |  229   2.06
   25 |  3802    59   166     -  3312  3005     -  3530    60 |  239   1.63
   26 |  1302    67   372     -  2646  1256     -  1081    74 |  238   0.63
   27 |  6098   146   147     -  6872  8956     -  6795   123 |  220   3.19
   28 |  6976    74   135     -  3342 19385     -  6030    70 |  235   0.43
   29 |  3697   135    99     -  4512     -     -  2242   118 |  216   0.89
   30 |  3207    46   101     -  4147  5769     -  3289    52 |  244   1.76
   31 |  4583    58   123     -  5873  5367     -  6119    57 |  230   3.93
 -----+-------------------------------------------------------+--------------
 ALGO |     -    56    41     -     -     -     -     -    54 |  288   0.02
 AREQ |     -    77     -     -     -     -     -     -    77 |  278  13.58
 AUCK |     -    60     -     -     -     -     -     -    60 |  276  19.01
 BRMU |     -    44     -     -     -     -     -     -    43 |  286  18.92
 DRAO |     -    35    64     -     -     -     -     -    41 |  288   0.03
 FAIR |     -     -    67     -     -     -     -     -    33 |   95   0.05
 GRAZ |     -    39     -     -     -     -     -     -    39 |  288  17.96
 GUAM |     -   144     -     -     -     -     -     -   143 |  284  29.13
 KERG |     -    98     -     -     -     -     -     -    98 |  279    >>>
 MATE |     -    36     -     -     -     -     -     -    36 |  287   0.07
 MCM4 |     -   136     -     -     -     -     -     -   135 |  276    >>>
 NLIB |     -    72     -     -     -     -     -     -    72 |  285   0.03
 ONSA |     -    34     -     -     -     -     -     -    34 |  287   0.09
 PIE1 |     -   140    70     -     -     -     -     -   138 |  288  93.96
 SANT |     -    99     -     -     -     -     -     -    98 |  194   7.84
 STJO |     -    15    31     -     -     -     -     -     - |   96   4.18
 USNO |     -    64     -     -     -     -     -     -    64 |  288   0.03
 USUD |     -   107    59     -     -     -     -     -   106 |  287   0.46
 WTZR |     -    29     -     -     -     -     -     -    28 |  287   0.81
 YELL |     -    51    83     -     -     -     -     -    47 |  284   0.03
 -----+-------------------------------------------------------+--------------
 TOT  |  4324    97   173     -  4843  6740     -  4268    95 |


 BEST CLOCK FIT: ALGO   288   0.02 (ns) 

